-- automatically generated by mosy 7.2 #163 (), do not edit!

-- object definitions compiled from DHCP-MIB

dhcp                 software.3
dhcpPar              dhcp.1
dhcpScope            dhcp.2

parDhcpStartTime     dhcpPar.1        DisplayString   read-only       mandatory
parDhcpTotalNoOfDiscovers dhcpPar.2        Counter         read-only       mandatory
parDhcpTotalNoOfRequests dhcpPar.3        Counter         read-only       mandatory
parDhcpTotalNoOfReleases dhcpPar.4        Counter         read-only       mandatory
parDhcpTotalNoOfOffers dhcpPar.5        Counter         read-only       mandatory
parDhcpTotalNoOfAcks dhcpPar.6        Counter         read-only       mandatory
parDhcpTotalNoOfNacks dhcpPar.7        Counter         read-only       mandatory
parDhcpTotalNoOfDeclines dhcpPar.8        Counter         read-only       mandatory
scopeTable           dhcpScope.1      Aggregate       read-only       mandatory
scopeTableEntry      scopeTable.1     Aggregate       read-only       mandatory
subnetAdd            scopeTableEntry.1 IpAddress       read-only       mandatory
noAddInUse           scopeTableEntry.2 Counter         read-only       mandatory
noAddFree            scopeTableEntry.3 Counter         read-only       mandatory
noPendingOffers      scopeTableEntry.4 Counter         read-only       mandatory

