Windows NT 4.0 HCL Contents

Microsoft Windows® NT Version 4.0

Hardware Compatibility List

The following computers and peripherals have been tested and have passed compatibility testing with Windows NT 4.0.  Some computers may be sold with peripherals that are not yet supported by the Windows NT operating system, or that require a device driver supplied by the manufacturer.  We have not tested every computer and/or device in all possible configurations. Please refer to the Release Notes for additional compatibility information when installing Windows NT 4.0.

Attached as an addendum is the current listings of Windows NT 3.51 only tested uniprocessor Computers; this includes the x86, MIPS®,and Digital Alpha platforms. All computer systems listed on the addendum are expected to run with Windows NT 4.0.  If you encounter problems while running Windows NT 4.0, please file a bug report by filling out 'PROBREP.TXT' located in the \i386 directory on the Windows NT 4.0 CD-ROM or floppy disk #2 of the Windows NT 4.0 installation disks and submit it as instructed in PROBREP.TXT. If you have any questions or comments about the problem reporting process, please contact ntbug@microsoft.com.

Items listed with footnote number1 require one of the device drivers available in the \DRVLIB directory on the Windows NT 4.0 CD-ROM.

Updates to the Windows NT 4.0 Hardware Compatibility List will appear on the World Wide Web at http://www.microsoft.com/hwtest.


Systems Menu
Microsoft Windows® NT Version 4.0

Hardware Compatibility List

Systems Menu

x86 Architecture Uniprocessor Computers

x86 Architecture Multiprocessor Computers

MIPS RISC Architecture Computers

MIPS RISC Multiprocessor Architecture Computers

Digital Alpha RISC Architecture Computers

Digital Alpha RISC Multiprocessor Architecture Computers

PowerPC Architecture Computers

PowerPC Multiprocessor Architecture Computers

Processor Upgrade Products


SCSI Menu
Microsoft Windows NT Version 4.0

Hardware Compatibility List

SCSI Menu

SCSI Host Adapters

SCSI CD-ROM Drives

SCSI Tape Drives

Removable Media

SCSI Scanners


Non-SCSI Menu
Microsoft Windows NT Version 4.0

Hardware Compatibility List

Non-SCSI Menu

Non-SCSI CD-ROM Drives

Other Tape Drives


PCMCIA Menu
Microsoft Windows NT Version 4.0

Hardware Compatibility List

PCMCIA Menu

PCMCIA Tested Systems

PCMCIA Add-In Adapters


Drive Systems Menu
Microsoft Windows NT Version 4.0

Hardware Compatibility List

Drive Systems Menu

Hard Drives

Storage Cabinets

RAID Systems


Communications Menu
Microsoft Windows NT Version 4.0

Hardware Compatibility List

Communications Menu

Network LAN Adapters

Network WAN Adapters

Network ATM Adapters

ISDN Adapters

Modems

Hardware Security Hosts

Multi-port Serial Adapters

Third Party Remote Access Servers


Accessories Menu
Microsoft Windows NT Version 4.0

Hardware Compatibility List

Accessories Menu

Uninterruptible Power Supplies

Multimedia Audio Adapters

Keyboards

Pointing Devices


Information Menu
Microsoft Windows NT Version 4.0

Hardware Compatibility List

Information Menu

Technical Notes

Disclaimer


Windows NT 3.51 Uniprocessor Computers Menu
Microsoft Windows NT Version 4.0

Hardware Compatibility List

Windows NT 3.51 Uniprocessor Computers Menu

3.51 Tested x86 Architecture Uniprocessor Computers

3.51 Tested MIPS RISC Architecture Computers

3.51 Tested Digital Alpha RISC Architecture Computers


x86 Architecture Uniprocessor Computers

The following x86 architecture uniprocessor systems have been tested.

ABIT PT5 P-133 430VX

ABIT PT5R2 C-133

ABIT PT5R2 C-166

ABIT PT5R2 P-100

ABIT PT5R2 P-120

ABIT PT5R2 P-133

ABIT PT5R2 P-133 430VX-2

ABIT PT5R2 P-150

ABIT PT5R2 P-166

ABIT PT5R2 P-75

ABIT PT5R2 P-90

Accurate Tech Pentium™ 100 FX Computer System

Accurate Tech Pentium 133 HX Computer System

ACER AcerAltos 300 F500HJ

ACER AcerAltos 300 F512HJ

ACER AcerAltos 300 F513HJ

ACER AcerAltos 300 F515HJ

ACER AcerAltos 300 F516HJ

ACER AcerAltos 300 F520HJ

ACER AcerAltos 360 F500HJ

ACER AcerAltos 360 F512HJ

ACER AcerAltos 360 F513HJ

ACER AcerAltos 360 F515HJ

ACER AcerAltos 360 F516HJ

ACER AcerAltos 360 F520HJ

ACER AcerAltos 560 F500HJ

ACER AcerAltos 560 F512HJ

ACER AcerAltos 560 F513HJ

ACER AcerAltos 560 F515HJ

ACER AcerAltos 560 F516HJ

ACER AcerAltos 560 F520HJ

ACER AcerAltos 900 F510HI/T

ACER AcerAltos 900 F510T1

ACER AcerAltos 900 F512HI/T

ACER AcerAltos 900 F512T1

ACER AcerAltos 900 F513HI/T

ACER AcerAltos 900 F513T1

ACER AcerAltos 900 F516HI/T

ACER AcerAltos 900 F516T1

ACER AcerAltos Uno F500HJ

ACER AcerAltos Uno F512HJ

ACER AcerAltos Uno F513HJ

ACER AcerAltos Uno F515HJ

ACER AcerAltos Uno F516HJ

ACER AcerAltos Uno F520HJ

ACER AcerMate 900 5200DR

ACER AcerPower 486/33

ACER AcerPower 560p (Pentium/60)

ACER AcerPower 560pt (Model P560M)

ACER AcerPower 560tu (Model P560TU)

ACER AcerPower Ultima F500HJ

ACER AcerPower Ultima F512HJ

ACER AcerPower Ultima F513HJ

ACER AcerPower Ultima F515HJ

ACER AcerPower Ultima F516HJ

ACER AcerPower Ultima F520HJ

ACER Aspire 1000 series 5200LR/5200SR

ACER Aspire 2000 series 5200DR/5200HR

ACER Aspire 2000 series 5200LR/5200SR

ACER Aspire 3000 series 5200LR/5200SR

ACMA sPOWER 166

ACMA xPOWER 166

ACMA zPOWER 166

ADS 590 PCI/VESA®/ISA

ADS Integration Series LSK133

ADS Integration Series LSK166

ADS Pro Series ADA133

ADS Pro Series ADA166

ADS Pro Series ASA5166

ADS Solution Server Series ESP133

ADS Solution Server Series ESP166

Advance Interface ExpressSM Micro 5000 (Pentium 166)

Advance Interface Express Micro Pro (Pentium 166)

Advance Interface Tangent 5000 (Pentium 166)

AEG SCHNEIDER TELEMECANIQUE FTX 517 5T

Alaris CIAN P560

Alfa DELTACOM PCI PENTIUM-75

Alfa DELTACOM PENTIUM-133  PERFORMA™

Alfa SUPERCOM PCI PENTIUM-75

ALR® BusinessVEISA 4/33D

ALR Evolution 5DT P/100

ALR Evolution 5DT P/133

ALR Evolution 5DT P/150

ALR Evolution 5DT P/166

ALR Evolution 5DT P/200

ALR Evolution 5ST P/100

ALR Evolution 5ST P/120

ALR Evolution 5ST P/133

ALR Evolution 5ST P/150

ALR Evolution 5ST P/166

ALR Evolution 5ST P/200

ALR Evolution Dual6/150 (1p)

ALR Evolution Dual6/200 (1p)

ALR Evolution V STP/60

ALR Evolution V/60

ALR OPTIMA DT 5100 (PCI/ISA)

ALR OPTIMA DT 5133 (PCI/ISA)

ALR OPTIMA DT 5150 (PCI/ISA)

ALR OPTIMA MT 5100 (PCI/ISA)

ALR OPTIMA MT 5133 (PCI/ISA)

ALR OPTIMA MT 5150 (PCI/ISA)

ALR OPTIMA SL 5100 (PCI/ISA)

ALR Rack-Mountable Revolution Q-SMP PCI P/100 (1p)

ALR Rack-Mountable Revolution Q-SMP PCI P/133 (1p)

ALR Rack-Mountable Revolution Q-SMP PCI P/166 (1p)

ALR Revolution MP P/133 (1p)

ALR Revolution MP P/166 (1p)

ALR Revolution Q-SMP PCI P/100 (1p)

ALR Revolution Q-SMP PCI P/133 (1p)

ALR Revolution Q-SMP PCI P/166 (1p)

Amax Engineering POWERSTATION™ BIZ 5166

Amax Engineering POWERSTATION GFX 5166

Amax Engineering POWERSTATION SOHO 5166

Amax Engineering POWERSTATION VDO 5166

Ambra 486DX2/50

American ProImage  APIP166STORM

Amsdell Pentium 100 System

Apricot® FTe 486DX2/66

Apricot LS 550-6200

Area Electronics AES-586ATS133

Area Electronics AES-586ATS150

Area Electronics AES-586DX150

Area Electronics AES-586HX150

Area Electronics AES-586HX166

Area Electronics AES-586MTP166

Area Electronics AES-590DX166

Ariel Apollo2 P150

Ariel Apollo2 P166

ASEM PRO-SERVER LX 586/166

ASEM PRO-SERVER MPX 586/100

ASI NSPIRE Pentium 166

Aspect Computers Viking 486-100

Aspect Computers Viking 486-133

Aspect Computers Viking 486-75

Aspect Computers Voyager C-133

Aspect Computers Voyager C-166

Aspect Computers Voyager P-100

Aspect Computers Voyager P-120

Aspect Computers Voyager P-133

Aspect Computers Voyager P-133 430VX

Aspect Computers Voyager P-133 430VX-2

Aspect Computers Voyager P-150

Aspect Computers Voyager P-166

Aspect Computers Voyager P-75

Aspect Computers Voyager P-90

AST® Ascentia 900N 4/100

AST Ascentia 910N 4/50

AST Ascentia 950N Pentium/75

AST Bravo MS P/90

AST Bravo MS-T 6150

AST Bravo MS-T 6200

AST Manhattan V Series 5090 (1p)

AST Premmia 4/66d

AST Premmia MX P/75

AT&T® Globalyst 363TPC

AT&T Globalyst 520 (3238) ISA/PCI

AT&T Globalyst 530 (3248) ISA/PCI

AT&T Globalyst 550 (3246) 486 ISA/PCI

AT&T Globalyst 590 (3346) Pentium ISA/PCI

AT&T Globalyst 620 Pentium 100

AT&T Globalyst 630 Pentium 100

AT&T System 3000 Model 3335

AT&T System 3000 Model 3350

AT&T System 3000 Model 3355

Athena Magica Pro P166

Atima MB586FGCVX Pentium 133

Atima MB586FGIVX/256 Pentium 120

Austin 486/50 EISA Tower PATRIOT

BCL Logic LMC Atlantis P166

BCL Logic LMC Classic® P100

BCL Logic LMC Endeavor P133

BCL Logic LMC Marl ATX P133

BINARY LOGIC  BOLD Server P100/FX/DV2-NT4 IDE

BINARY LOGIC  BOLD WorkStation P100/FX/DV2-NT4

Black Cat T1-100

Black Cat T1-120

Black Cat T1-133

Black Cat T1-150

Black Cat T1-166

Black Cat T1-75

Black Cat T1-P120+

Black Cat T1-P150+

Black Cat T2-100

Black Cat T2-120

Black Cat T2-133

Black Cat T2-150

Black Cat T2-166

Black Cat T2-75

Blitz Computer Inc. Contact Sierra 100

Blitz Computer Inc. Contact Sierra 120

Blitz Computer Inc. Contact Sierra 133

Blitz Computer Inc. Contact Sierra 150

Blitz Computer Inc. Contact Sierra 166

Blitz Computer Inc. Contact Sierra 75

BROTHER® BCT4486

BROTHER BCT4586

BROTHER BCT5486

BROTHER BCT5586

BROTHER BCT8486

BROTHER BCT8586

Caliber Viking 486-100

Caliber Viking 486-133

Caliber Viking 486-75

Caliber Voyager C-133

Caliber Voyager C-166

Caliber Voyager P-100

Caliber Voyager P-120

Caliber Voyager P-133

Caliber Voyager P-133 430VX

Caliber Voyager P-133 430VX-2

Caliber Voyager P-150

Caliber Voyager P-166

Caliber Voyager P-75

Caliber Voyager P-90

Can - Am CAT-586-133

Can - Am CAT-586-166

CCS Industrial Rackmount Operator Interface - P90

CELEM P100 IDE T1

CELEM P133 IDE T1

CELEM P133 IDE T2

CELEM P166 IDE T1

CELEM P166 SCSI T2

Cemtech Avenger 200 - (Pentium 166)

Centis PowerTech P100-1G6

Centis PowerTech P133-1GS

Centis ProfiLite 480-G8

Clone Computer Corporation 9586-166

CMC P100

CMC P133

CMC P150

CMC P166

CMOS Acrobat (Pentium 133)

CMOS Mountain (Pentium 75)

CMOS Signature (Pentium 120)

Comark Pentium/PCI 166

COMPAQ® Contura 430C

COMPAQ Contura 430CX

COMPAQ Deskpro® 2000 Model 5100

COMPAQ Deskpro 2000 Model 5120

COMPAQ Deskpro 2000 Model 5133

COMPAQ Deskpro 2000 Model 5166

COMPAQ Deskpro 2000 Model 5200

COMPAQ Deskpro 4/66i

COMPAQ Deskpro 4000 Model 5100

COMPAQ Deskpro 4000 Model 5120

COMPAQ Deskpro 4000 Model 5133

COMPAQ Deskpro 4000 Model 5166

COMPAQ Deskpro 466

COMPAQ Deskpro 486/33L

COMPAQ Deskpro 5100

COMPAQ Deskpro 5120

COMPAQ Deskpro 5133

COMPAQ Deskpro 5150

COMPAQ Deskpro 5166

COMPAQ Deskpro 575

COMPAQ Deskpro 590

COMPAQ Deskpro 6000 Model 5166

COMPAQ Deskpro 6000 Model 5200

COMPAQ Deskpro 6000 Model 6200

COMPAQ Deskpro XL 5100

COMPAQ Deskpro XL 5120

COMPAQ Deskpro XL 5133

COMPAQ Deskpro XL 560

COMPAQ Deskpro XL 575

COMPAQ Deskpro XL 590

COMPAQ Deskpro XL 6150

COMPAQ Deskpro XL 6200

COMPAQ LTE® 5000

COMPAQ LTE 5200

COMPAQ LTE 5280

COMPAQ LTE 5300

COMPAQ LTE Elite 4/50CX

COMPAQ LTE Elite 4/75CX

COMPAQ Presario CDS 992

COMPAQ ProLiant 1000 486DX2/66

COMPAQ ProLiant 1000R Model 486DX2/66

COMPAQ ProLiant 1500 Model 5/133

COMPAQ ProLiant 1500 Model 5/166

COMPAQ ProLiant 1500R Model 5/133

COMPAQ ProLiant 1500R Model 5/166

COMPAQ ProLiant 4500 Model 5/166

COMPAQ ProLiant 4500R Model 5/166

COMPAQ ProLinea 5100

COMPAQ ProLinea 5100e

COMPAQ ProLinea 5120

COMPAQ ProLinea 5120e

COMPAQ ProLinea 5133

COMPAQ ProLinea 5150

COMPAQ ProLinea 5166

COMPAQ ProLinea 575

COMPAQ ProLinea 575e

COMPAQ ProLinea 590

COMPAQ ProSignia 300 Model 5/120

COMPAQ ProSignia 300 Model 5/150

COMPAQ ProSignia 500 5/150

CompuAdd® 466E DX2

Computer Network Design Pelican 90i

Computer Stockroom Delta Micro Systems Gold Line MP5133 A/S

Computer Stockroom Delta Micro Systems Gold Line MP5150 A/S

Computrend PREMIO HX Pentium 100

Computrend PREMIO HX Pentium 120

Computrend PREMIO HX Pentium 133

Computrend PREMIO HX Pentium 150

Computrend PREMIO HX Pentium 166

Computrend PREMIO HX Pentium 200

Computrend PREMIO HX Pentium 75

Computrend PREMIO HX Pentium 90

Computrend PREMIO VX Pentium 100

Comtrade VESA/PCI WIN-Station P90

Corbey Maitre'd Web Server Pentium 133

Corbey NetSurfer Pentium 100

Corbey Shadow Server Pentium 133

CSS Labs MaxPro 1000 5/166

CSS Labs MaxPro 1500 5/166

CSS Labs MaxPro 800 5/166

CSS Labs MaxPro 800 5/166TR

CSS Labs MaxPro 800 5/166TR2

CSS Labs MaxSys 5/166

CSS Labs Preferred Desktop 5/166TR

CSS Labs Preferred Desktop 5/166TR2

CSS Labs Preferred Mid-Tower 5/166TR

CSS Labs Preferred Mid-Tower 5/166TR2

CSS Labs ProRack 4008 5/166TR

CSS Labs ProRack 4008 5/166TR2

CSS Labs ProRack 4512 5/166

CSS Labs ProRack 6012 5/166

CUBE 466 ATX Local Bus

CyberMax Computer ProMax I-150 WS

CyberMax Computer ProMax I-150 WS-1

CyberMax Computer ProMax I-180 WS

CyberMax Computer ProMax I-200 WS

CyberMax Computer ProMax II-180 WS-1

CyberMax Computer ProMax II-200 WS-1

CyberMax Computer ProMax III-150 WS-1

CyberMax Computer ProMax III-180 WS-1

CyberMax Computer ProMax III-200 WS-1

Cyrix 6x86 P166+ PC

Data General® (Canada) Co. OPTiiON FT/166

Data General (Canada) Co. OPTiiON MT+/166

Data General (Canada) Co. OPTiiON SL/166

Data Net Eclipse Pentium P5166/M

Data Stor 486-33DX Desktop/Tower

Data Stor 486-66DX2E Desktop/Tower

Datacom Technology  586/100 PCI

Datacom Technology  586/120 PCI

Datacom Technology  586/133 PCI

Datacom Technology  586/150 PCI

Datacom Technology  586/166 PCI

Datacom Technology  Adams p100IS3c.s.

Datacom Technology  Excalibur p575 Saa™

Datacom Technology  Mithandir srv p166

DATAFILEN PROFF Pentium 100 MHz Multimedie

DATAFILEN PROFF Pentium 133 MHz Multimedie

DATAFILEN PROFF Pentium 166 MHz Multimedie

DELL® 433/DE

DELL 433/M

DELL 450/M

DELL 450/ME

DELL 450DE

DELL 4560/XE

DELL 466/ME

DELL 466/T

DELL 466DE

DELL 486/D33

DELL 486/D50

DELL Dimension 433SV

DELL Dimension XPS P120c

DELL Dimension XPS P90

DELL Dimension XPS Pro 180N

DELL Dimension XPS Pro 200N

DELL Dimension XPS Pro 150

DELL Latitude XP 4100D

DELL Latitude XP475C

DELL Latitude XPi P100SD 2

DELL Latitude XPi P133ST 2

DELL Latitude XPi P75D

DELL Latitude XPi P75T

DELL OmniPlex 560

DELL OmniPlex 566

DELL OmniPlex 590

DELL OptiPlex 4100/MTe

DELL OptiPlex 466

DELL OptiPlex 466/MXV

DELL OptiPlex GL 5100

DELL OptiPlex GM 5100

DELL OptiPlex GMT 5100

DELL OptiPlex G 575

DELL OptiPlex GL 5166

DELL OptiPlex GM 5166

DELL OptiPlex GMT 5166

DELL OptiPlex GXpro 180Mhz

DELL OptiPlex GXL 5100

DELL OptiPlex GXL 5166

DELL OptiPlex GXM 5100

DELL OptiPlex GXM 5166

DELL OptiPlex GXMT 5100

DELL OptiPlex GXMT 5166

DELL OptiPlex GXMT 5200

DELL OptiPlex XLS 590

DELL OptiPlex XM 5120

DELL PowerLine System 450SE

DFI EV-MBG586IPC

Digital Equipment Corp. Celebris 5100

Digital Equipment Corp. Celebris 590

Digital Equipment Corp. Celebris FP 5100

Digital Equipment Corp. Celebris FP 590

Digital Equipment Corp. Celebris GL 5100

Digital Equipment Corp. Celebris GL 5100st

Digital Equipment Corp. Celebris GL 5120

Digital Equipment Corp. Celebris GL 5120st

Digital Equipment Corp. Celebris GL 5133

Digital Equipment Corp. Celebris GL 5133st

Digital Equipment Corp. Celebris GL 5150

Digital Equipment Corp. Celebris GL 5150st

Digital Equipment Corp. Celebris GL 5166

Digital Equipment Corp. Celebris GL 5166st

Digital Equipment Corp. Celebris GL 590

Digital Equipment Corp. Celebris GL 590st

Digital Equipment Corp. Celebris XL 5100

Digital Equipment Corp. Celebris XL 5120

Digital Equipment Corp. Celebris XL 5133

Digital Equipment Corp. Celebris XL 5150

Digital Equipment Corp. Celebris XL 5166

Digital Equipment Corp. Celebris XL 590

Digital Equipment Corp. Celebris XL 6150

Digital Equipment Corp. Celebris XL 6180

Digital Equipment Corp. Celebris XL 6200

Digital Equipment Corp. DECpc 4100 MTE

Digital Equipment Corp. DECpc 433dx MTE

Digital Equipment Corp. DECpc 450 ST

Digital Equipment Corp. DECpc 466d2 DT

Digital Equipment Corp. DECpc 466d2 MTE

Digital Equipment Corp. DECpc LPv 433dx

Digital Equipment Corp. DECpc LPv 433sx

Digital Equipment Corp. DECpc LPv 450d2

Digital Equipment Corp. DECpc LPv 466d2

Digital Equipment Corp. DECpc LPv+ 4100

Digital Equipment Corp. DECpc LPv+ 433dx

Digital Equipment Corp. DECpc LPv+ 433sx

Digital Equipment Corp. DECpc LPv+ 450d2

Digital Equipment Corp. DECpc LPv+ 466d2

Digital Equipment Corp. DECpc LPx 4100

Digital Equipment Corp. DECpc LPx 433dx

Digital Equipment Corp. DECpc LPx 433sx

Digital Equipment Corp. DECpc LPx 450d2

Digital Equipment Corp. DECpc LPx 466d2

Digital Equipment Corp. DECpc LPx 566

Digital Equipment Corp. DECpc LPx+ 4100

Digital Equipment Corp. DECpc LPx+ 433dx

Digital Equipment Corp. DECpc LPx+ 433sx

Digital Equipment Corp. DECpc LPx+ 450s2

Digital Equipment Corp. DECpc LPx+ 466d2

Digital Equipment Corp. DECpc XL 4100

Digital Equipment Corp. DECpc XL 433

Digital Equipment Corp. DECpc XL 466

Digital Equipment Corp. DECpc XL 560

Digital Equipment Corp. DECpc XL 566

Digital Equipment Corp. DECpc XL 590

Digital Equipment Corp. DECpc XL Server 566

Digital Equipment Corp. HiNote CT475

Digital Equipment Corp. HiNote Ultra CT475

Digital Equipment Corp. HiNote Ultra II CTE 5100

Digital Equipment Corp. HiNote Ultra II CTS 5100

Digital Equipment Corp. HiNote Ultra II CTS 5120 3

Digital Equipment Corp. HiNote Ultra II CTS 5133 3

Digital Equipment Corp. HiNote Ultra II LTS 5133 3

Digital Equipment Corp. HiNote Ultra II LTS 5133NT 3

Digital Equipment Corp. HiNote Ultra II LTS 5150

Digital Equipment Corp. HiNote Ultra II LTS 5150NT

Digital Equipment Corp. Multia MI Model VX51A/B-F2

Digital Equipment Corp. Multia Multi Client Workstation (Intel®) P100

Digital Equipment Corp. Prioris XL Server 566

Digital Equipment Corp. Venturis 4100

Digital Equipment Corp. Venturis 433sx

Digital Equipment Corp. Venturis 450s2

Digital Equipment Corp. Venturis 5100

Digital Equipment Corp. Venturis 5120

Digital Equipment Corp. Venturis 5133

Digital Equipment Corp. Venturis 5150

Digital Equipment Corp. Venturis 5166

Digital Equipment Corp. Venturis 575

Digital Equipment Corp. Venturis 575e

Digital Equipment Corp. Venturis 590

Digital Equipment Corp. Venturis FP 4100

Digital Equipment Corp. Venturis FP 450s2

Digital Equipment Corp. Venturis FP 466

Digital Equipment Corp. Venturis FP 5100

Digital Equipment Corp. Venturis FP 5120

Digital Equipment Corp. Venturis FP 5133

Digital Equipment Corp. Venturis FP 5150

Digital Equipment Corp. Venturis FP 5166

Digital Equipment Corp. Venturis FP 575

Digital Equipment Corp. Venturis FP 575e

Digital Equipment Corp. Venturis FP 590

Digital Equipment Corp. Venturis FX 5100

Digital Equipment Corp. Venturis FX 5100e

Digital Equipment Corp. Venturis FX 5100s

Digital Equipment Corp. Venturis FX 5100sm

Digital Equipment Corp. Venturis FX 5120

Digital Equipment Corp. Venturis FX 5120s

Digital Equipment Corp. Venturis FX 5133

Digital Equipment Corp. Venturis FX 5133s

Digital Equipment Corp. Venturis FX 5133sm

Digital Equipment Corp. Venturis FX 5150

Digital Equipment Corp. Venturis FX 5150s

Digital Equipment Corp. Venturis FX 5150sm

Digital Equipment Corp. Venturis FX 5166

Digital Equipment Corp. Venturis FX 5166s

Digital Equipment Corp. Venturis FX 5166sm

Digital Equipment Corp. Venturis FX 575

Digital Equipment Corp. Venturis FX 575e

Digital Equipment Corp. Venturis FX 575s

Dolch PAC 586-120C

Dolch PAC-62 Pentium 100

DTK QUIN-54 Pentium 100

DTK QUIN-55 Pentium 100

DTK QUIN-55 Pentium 120

DTK QUIN-55 Pentium 133

DTK QUIN-55 Pentium 150

DTK QUIN-55 Pentium 166

DTK QUIN-55 Pentium 75

DTK QUIN-55 Pentium 90

Dunn Computer Corporation Pentium 100

Dynamic Decisions DYNEX EXECUTIVE Pentium 100/S2/PI

Dynamic Decisions DYNEX EXECUTIVE Pentium 100/T/PI

Dynamic Decisions DYNEX EXECUTIVE Pentium 120/S2/Pi

Dynamic Decisions DYNEX EXECUTIVE Pentium 120/T/PI

Dynamic Decisions DYNEX EXECUTIVE Pentium 120/T2/PE

Dynamic Decisions DYNEX EXECUTIVE Pentium 120/T2/PI

Dynamic Decisions DYNEX EXECUTIVE Pentium 133/S2/PI

Dynamic Decisions DYNEX EXECUTIVE Pentium 133/T/PI

Dynamic Decisions DYNEX EXECUTIVE Pentium 133/T2/PE

Dynamic Decisions DYNEX EXECUTIVE Pentium 133/T2/PI

Dynamic Decisions DYNEX EXECUTIVE Pentium 150/S2/PI

Dynamic Decisions DYNEX EXECUTIVE Pentium 150/T/PI

Dynamic Decisions DYNEX EXECUTIVE Pentium 150/T2/PE

Dynamic Decisions DYNEX EXECUTIVE Pentium 150/T2/PI

Dynamic Decisions DYNEX EXECUTIVE Pentium 166/S2/PI

Dynamic Decisions DYNEX EXECUTIVE Pentium 166/T/PI

Dynamic Decisions DYNEX EXECUTIVE Pentium 166/T2/PE

Dynamic Decisions DYNEX EXECUTIVE Pentium 166/T2/PI

Dynamic Decisions DYNEX EXECUTIVE Pentium 75/S2/PI

Dynamic Decisions DYNEX EXECUTIVE Pentium 75/T/PI

Dynamic Decisions DYNEX EXECUTIVE Pentium 75/T2/PI

Dynamic Decisions DYNEX EXECUTIVE Pentium-120/T2/PE NT Server

Dynamic Decisions DYNEX EXECUTIVE Pentium-133/T2/PE NT Server

Dynamic Decisions DYNEX EXECUTIVE Pentium-150/T2/PE NT Server

Dynamic Decisions DYNEX EXECUTIVE Pentium-166/T2/PE NT Server

Electronic Data Systems (EDS) P-100

Electronic Data Systems (EDS) P-133

Electronic Data Systems (EDS) P-166

Electronic Data Systems (EDS) P-75

Elite Industries Elite 2000 WorkStation - Pentium 133

Elite Industries Elite 586/120

Elonex PC-5XXXH/I® P166

EMJ Data Systems Ltd. Trillium FT/166

EMJ Data Systems Ltd. Trillium MT/166

EMJ Data Systems Ltd. Trillium SL/166

EPS Technologies Pentium Powerstation 90

ESE P5-120

EverCom Pentium System 100Mhz

EverCom Pentium System 120Mhz

EverCom Pentium System 133Mhz

EverCom Pentium System 150Mhz

EverCom Pentium System 166Mhz

Everex™ eXplora Series Pentium 133

Everex Step Note Plus Pentium 133

Everex Tempo Plus/2002 Pentium 200

Everex TempoSelect Pentium 150

Everex Step 486/33 ISA

Everex Step Plus/2005 Pentium 150

Everex Step SP/2000A Pentium 133

Everex Step SP/2002A Pentium 200

Everex Step SP/Pro

Everex Tempo Plus/2005 Pentium 150

Evergreen Systems CAPcard 9500-120

FIC DesigNote 3500 Series Pentium 133

FIC LEO Titan (PA-2000) Pentium 133

FIC LEO Titan (PA-2002) Pentium 200

FIC LEO Titan (PA-2005) Pentium 150

FIC PA2000 Pentium 133

FIC PA2002 Pentium 200

FIC PA2005 Pentium 150

First FIC LEO TITAN 337 Pentium 166

First FIC LEO TITAN 505 (PAC2003) Pentium 133

First FIC LEO TITAN 506 Pentium 150

First LEO 66510 SERIES

First LEO 66512 SERIES

First LEO 66513 SERIES

First LEO 66515 SERIES

First LEO 66516 SERIES

First LEO 66520 SERIES

First LEO 6657 SERIES

First LEO 66615

First LEO PA2005 Pentium 120

First LEO PN-6010 Pentium 200

First LEO Predator Pro

First LEO PT-2006 Pentium 133

First LEO PTK-2110 Pentium 100

First PAK-2102 Pentium 120

First PO6000

Forte Company DELTA 10.0 486DX4/100

Forte Company DELTA 3.3 486DX/33 LB

Forte Company DELTA 5.0 486DX/50 LB

Forte Company DELTA 6.6 486DX2/66 LB

Forte Company EPSILON™ 10.0 586/100

Forte Company EPSILON 13.3 586/133

Fountain Technology FTN P5/100/X -B

Fountain Technology FTN P5/100/X -C

Fountain Technology FTN P5/120/X -B

Fountain Technology FTN P5/120/X -C

Fountain Technology FTN P5/133/X -B

Fountain Technology FTN P5/133/X -C

Fountain Technology FTN P5/150/X -B

Fountain Technology FTN P5/150/X -C

Fountain Technology FTN P5/166/X -B

Fountain Technology FTN P5/166/X -C

Fountain Technology FTN P5/200/X -B

Fountain Technology FTN P5/200/X -C

Fountain Technology FTNP5/100/X -A

Fountain Technology FTNP5/120/X -A

Fountain Technology FTNP5/133/X -A

Fountain Technology FTNP5/150/X -A

Fountain Technology FTNP5/166/X -A

Fountain Technology FTNP5/200/X -A

Fountain Technology FTNP6/150 WS

Fountain Technology FTNP6/150 WS-1

Fountain Technology FTNP6/180 WS

Fountain Technology FTNP6/180 WS-1

Fountain Technology FTNP6/200 WS

Fountain Technology FTNP6/200 WS-1

Freetech 586F63T Pentium 166

Fujitsu® ICL ErgoLite s120CD

Fujitsu ICL ErgoLite s75

Fujitsu ICL ErgoLite x75

Fujitsu ICL ErgoPro e450/100

Fujitsu ICL ErgoPro e451/120

Fujitsu ICL ErgoPro e451/150

Fujitsu ICL ErgoPro e650/90

Fujitsu ICL ErgoPro e651/100

Fujitsu ICL ErgoPro s450/133n

Fujitsu ICL ErgoPro s650/133

Fujitsu ICL ErgoPro x251/100

Fujitsu ICL ErgoPro x450/133

Fujitsu ICL ErgoPro x451/100

Fujitsu ICL ErgoPro x451/120

Fujitsu ICL ErgoPro x451/133

Fujitsu ICL ErgoPro x451/150

Fujitsu ICL ErgoPro x451/166

Fujitsu ICL ErgoPro x451/166s

Fujitsu ICL ErgoPro x650/100

Fujitsu ICL ErgoPro x650/133

Fujitsu ICL ErgoPro x651/133

Fujitsu ICL ErgoPro x651/166

Fujitsu ICL ErgoPro x651/166s

Fujitsu ICL TEAMSERVER C530i

Fujitsu ICL TEAMSERVER C550i

Fujitsu ICL TEAMSERVER C580i

Fujitsu ICL TEAMSERVER F580i

Fujitsu ICL TEAMSERVER G530i

Fujitsu ICL TEAMSERVER G550i

Fujitsu ICL TEAMSERVER G580i

Fujitsu ICL TEAMSERVER H530i

Gateway 2000 486/33

Gateway 2000 486/33C

Gateway 2000 486/33E

Gateway 2000 486DX2/50

Gateway 2000 4DX-33V

Gateway 2000 4DX2-66E

Gateway 2000 4DX2-66P

Gateway 2000 COLORBOOK DX4-75

Gateway 2000 P4D-100

Gateway 2000 P5-100XL

Gateway 2000 P5-120

Gateway 2000 P5-133XL

Gateway 2000 P5-150

Gateway 2000 P5-166

Gateway 2000 P5-200

Gateway 2000 P5-66

Gateway 2000 P5-75

Gateway 2000 P5-90

Gateway 2000 Pentium Pro 150

Gateway 2000 Solo P90 3,4

GEKKO ENERGIA 100

GEKKO ENERGIA 133

GEKKO ENERGIA 166

GEKKO TEMPRA 90

Genitech Stellar Capricorn Pentium 166

Genitech Stellar Microsystems Aurora Pentium 166

Genitech Stellar Microsystems Scorpio Pentium 166

Genitech Stellar Microsystems Sirius 486/100

Government Micro Resources Rembrandt Master Series 2000 IE Pentium 100

Government Micro Resources Rembrandt Master Series 2000 IE Pentium 120

Government Micro Resources Rembrandt Master Series 2000 IE Pentium 133

Government Micro Resources Rembrandt Master Series 2000 IE Pentium 166

GST/Microcity AAPOGEE 8000PT/LS2 Pentium 133

Hertz P90

Hewlett-Packard® NetServer 5/100 LC

Hewlett-Packard NetServer 5/100 LH

Hewlett-Packard NetServer 5/100 LM

Hewlett-Packard NetServer 5/133 LC

Hewlett-Packard NetServer 5/133 LH

Hewlett-Packard NetServer 5/133 LS

Hewlett-Packard NetServer 5/166 LC

Hewlett-Packard NetServer 5/166 LS

Hewlett-Packard NetServer 5/66 LC

Hewlett-Packard NetServer 5/66 LF

Hewlett-Packard NetServer LH Plus 5/133 SMP (1p)

Hewlett-Packard NetServer LH Plus 5/166 SMP (1p)

Hewlett-Packard OmniBook™ 4000CT 4/100 3

Hewlett-Packard OmniBook 5000CT Pentium 90 4,5

Hewlett-Packard OmniBook 5000CTS Pentium 90 4,5

Hewlett-Packard OmniBook 5500CT 5/120

Hewlett-Packard OmniBook 5500CT 5/120C

Hewlett-Packard OmniBook 5500CT 5/133

Hewlett-Packard OmniBook 5500CT 5/133C

Hewlett-Packard Vectra® 486/66ST

Hewlett-Packard Vectra VA 6/180 PC

Hewlett-Packard Vectra VA 6/200 PC

Hewlett-Packard Vectra VA MT 6/180 PC

Hewlett-Packard Vectra VA MT 6/200 PC

Hewlett-Packard Vectra VE 5/133 Series 2 PC

Hewlett-Packard Vectra VL 5/100 MT Series 4 PC

Hewlett-Packard Vectra VL 5/100 Series 3 PC

Hewlett-Packard Vectra VL 5/100 Series 4 MXM PC

Hewlett-Packard Vectra VL 5/100 Series 4 PC

Hewlett-Packard Vectra VL 5/120 Series 3 PC

Hewlett-Packard Vectra VL 5/133 MT Series 4 MXM PC

Hewlett-Packard Vectra VL 5/133 MT Series 4 PC

Hewlett-Packard Vectra VL 5/133 Series 4 PC

Hewlett-Packard Vectra VL 5/166 MT Series 4 MXM PC

Hewlett-Packard Vectra VL 5/166 MT Series 4 PC

Hewlett-Packard Vectra VL 5/166 Series 4 PC

Hewlett-Packard Vectra XA 6/180 PC

Hewlett-Packard Vectra XA 6/200 PC

Hewlett-Packard Vectra XM 5/166 Series 4 PC

Hewlett-Packard Vectra XM 5/200 Series 4 PC

Hewlett-Packard Vectra XU 5/120C PC  (1p)

Hewlett-Packard Vectra XU 5/133C PC (1p)

Hewlett-Packard Vectra XU 6/150 PC (1p)

Hewlett-Packard Vectra XU 6/200 PC (1p)

Hi-Tech USA ASUS P5-90/256K PCI

Hi-Tech USA HT-5X86-133/256K PCI

Hi-Tech USA HT-P5-166/512K PCI TAIWAN

Hi-Tech USA P5-75/256K ATLANTIS

Hypertec HyperFormance DT5 Pentium 166

Hypertec HyperFormance Series 5 & 10  ( ATX ) Pentium 166

Hyundai 425s

Hyundai 466d2

IBM® PC 330 Model 6575 Pentium/60

IBM PC 330 Model 6576 Pentium/100

IBM PC 330 Model 6576 Pentium/133

IBM PC 330 Model 6576 Pentium/90

IBM PC 330 Model 6577 Pentium/100

IBM PC 330 Model 6577 Pentium/133

IBM PC 330 Model 6577 Pentium/166

IBM PC 330 Model 6577 Pentium/200

IBM PC 350 Model 6585 Pentium/60

IBM PC 350 Model 6586 Pentium/100

IBM PC 350 Model 6586 Pentium/133

IBM PC 350 Model 6586 Pentium/90

IBM PC 350 Model 6587 Pentium/100

IBM PC 350 Model 6587 Pentium/133

IBM PC 350 Model 6587 Pentium/166

IBM PC 360 Model 6598 PentiumPro/200

IBM PC 365 Model 6589 PentiumPro/180 (1p)

IBM PC 365 Model 6589 PentiumPro/200 (1p)

IBM PC 730 Model 6875 Pentium/100

IBM PC 730 Model 6875 Pentium/90

IBM PC 730 Model 6877 Pentium/100

IBM PC 730 Model 6877 Pentium/133

IBM PC 730 Model 6877 Pentium/166

IBM PC 750 Model 6885 Pentium/100

IBM PC 750 Model 6885 Pentium/90

IBM PC 750 Model 6887 Pentium/100

IBM PC 750 Model 6887 Pentium/133

IBM PC 750 Model 6887 Pentium/166

IBM PC Server 300 486DX2/66 8640-0N0

IBM PC Server 300 486DX2/66 8640-0NJ

IBM PC Server 300 Pentium/60 8640-0P0

IBM PC Server 300 Pentium/60 8640-0PT

IBM PC Server 500 Pentium/90 8641-0Y0

IBM PC Server 500 Pentium/90 8641-0YR

IBM PC Server 500 Pentium/90 8641-0YS

IBM PC Server 500 Pentium/90 8641-0YT

IBM PC Server 500 Pentium/90 8641-0YV

IBM PC Server 500 Pentium/90 8641-1Y0

IBM PS/2® Model 76i 9576-xxx 486DX2/66

IBM PS/2 Model 76s 9576-xxx 486DX2/66

IBM PS/2 Model 77i 9577-xxx 486DX2/66

IBM PS/2 Model 77s 9577-xxx 486DX2/66

IBM PS/2 Model 80 8580-xxx 486-33

IBM PS/2 Model 95 XP 486 8595-0K* 486DX/33

IBM PS/2 Model 95 XP 486 8595-0L* 486DX2/50

IBM PS/2 Model 95 XP 486 8595-0M* 486DX/50

IBM PS/2 Model 95 XP 486 8595-xxx with 486DX2/66 processor upgrade

IBM PS/2 Model 95 XP 486 8595-xxx with Enhanced 486DX/50 processor upgrade

IBM PS/2 Model 95 XP 486 9595-0L* 486DX2/50

IBM PS/2 Model 95 XP 486 9595-0M* 486DX/50

IBM PS/2 Model 95 XP 486 9595-xxx with 486DX2/66 processor upgrade

IBM PS/2 Model 95 XP 486 9595-xxx with Enhanced 486DX/50 processor upgrade

IBM PS/2 Model P75 8573-xxx 486DX/33

IBM PS/2 Server 85 9585-0X* with 486DX2/66 processor upgrade

IBM PS/2 Server 95 Array 560 9595-3P*

IBM PS/2 Server 95 Array 566 9595-3Q*

IBM PS/ValuePoint 466DX2/D 6384-Wxx

IBM PS/ValuePoint 466DX2/T 6387-Wxx

IBM ThinkPad® 360CE 486DX2/50

IBM ThinkPad 365XD Pentium/100 3,6

IBM ThinkPad 560 Pentium/100 3

IBM ThinkPad 701C 486DX/50 3,5

IBM ThinkPad 701C 486DX4/75 3,5

IBM ThinkPad 750 486SL/33

IBM ThinkPad 750C 486SL/33

IBM ThinkPad 750CE 486DX2/50

IBM ThinkPad 755C 486DX4/75

IBM ThinkPad 755CD 486DX4/100 7

IBM ThinkPad 755CDV 486DX4/100

IBM ThinkPad 755CDV 486DX4/75

IBM ThinkPad 755CE 486DX4/100 7

IBM ThinkPad 755CX Pentium/75 7

IBM ThinkPad 760CD Pentium/90 6,7

IBM ThinkPad 760E Pentium/120 4,7

IBM ThinkPad 760ED Pentium/120 4,7

IBM ThinkPad 760EL Pentium/120

IBM ThinkPad 760ELD Pentium/120

IBM ThinkPad 760L Pentium/90 3,6

IBM ThinkPad 760LD Pentium/90 3,6

ICL ErgoLite s120CD

ICL ErgoLite s75

ICL ErgoLite x75

ICL ErgoPro e450/100

ICL ErgoPro e451/120

ICL ErgoPro e451/150

ICL ErgoPro e650/90

ICL ErgoPro e651/100

ICL ErgoPro s450/133n

ICL ErgoPro s650/133

ICL ErgoPro x251/100

ICL ErgoPro x450/133

ICL ErgoPro x451/100

ICL ErgoPro x451/120

ICL ErgoPro x451/133

ICL ErgoPro x451/150

ICL ErgoPro x451/166

ICL ErgoPro x451/166s

ICL ErgoPro x650/100

ICL ErgoPro x650/133

ICL ErgoPro x651/133

ICL ErgoPro x651/166

ICL ErgoPro x651/166s

ICL TEAMSERVER C530i

ICL TEAMSERVER C550i

ICL TEAMSERVER C580i

ICL TEAMSERVER F580i

ICL TEAMSERVER G530i

ICL TEAMSERVER G550i

ICL TEAMSERVER G580i

ICL TEAMSERVER H430i

Iconix International Advantage 501/166

Iconix International Advantage 504/166

Iconix International Advantage 515/166

Insight 66MHz-PCI

Intecolor Trenton TR-P5PCI/100

Intelligent Decisions AML-5100

Intelligent Decisions GA-575

Interaq Pentium Pro 200

INTERCOMP Explorer DT-10 Pentium 120

INTERCOMP Explorer MT-10 Pentium 120

INTERCOMP IDAS 9000 Pentium 120

INTERCOMP Master P120

INTERCOMP Target EN P150

Interface Electronic Pentium 100

Interface Electronic Pentium 133

Interface Electronic Pentium 166

Intergraph® ISMP-21 InterServe Pentium/166MHz

Intergraph ISMP610 InterServe Pentium Pro 150MHz

Intergraph PC 433

Intergraph PC 466

Intergraph TD 1 Personal Workstation

Intergraph TD 2 Personal Workstation

Intergraph TD 3 Personal Workstation Pentium/100MHz

Intergraph TD 3 Personal Workstation Pentium/90MHz

Intergraph TD-10 Personal Workstation Pentium/75Mhz

Intergraph TD-30 Personal Workstation Pentium/100Mhz

Intergraph TD-30 Personal Workstation Pentium/133Mhz

Intergraph TD-30 Personal Workstation Pentium/166Mhz

Intergraph TD-300 Personal Workstation Pentium Pro 200MHz

Intergraph TDZ-300 Personal Workstation Pentium Pro 200MHz

International Instrumentation BLUE MAX 486 DX66 PCI

International Instrumentation BLUE MAX MONOLITH P54-100

International Instrumentation BLUE MAX MONOLITH P54-133

International Instrumentation BLUE MAX PENTIUM P5-60

International Instrumentation BUSINESS PARTNER P-90

Inteva Microsystem INTP6/150 WS

Inteva Microsystem INTP6/150 WS-1

Inteva Microsystem INTP6/180 WS

Inteva Microsystem INTP6/180 WS-1

Inteva Microsystem INTP6/200 WS

Inteva Microsystem INTP6/200 WS-1

Inteva Microsystems Inc. INT P5/100/X -A

Inteva Microsystems Inc. INT P5/100/X -B

Inteva Microsystems Inc. INT P5/100/X -C

Inteva Microsystems Inc. INT P5/120/X -A

Inteva Microsystems Inc. INT P5/120/X -B

Inteva Microsystems Inc. INT P5/120/X -C

Inteva Microsystems Inc. INT P5/133/X -A

Inteva Microsystems Inc. INT P5/133/X -B

Inteva Microsystems Inc. INT P5/133/X -C

Inteva Microsystems Inc. INT P5/150/X -A

Inteva Microsystems Inc. INT P5/150/X -B

Inteva Microsystems Inc. INT P5/150/X -C

Inteva Microsystems Inc. INT P5/166/X -A

Inteva Microsystems Inc. INT P5/166/X -B

Inteva Microsystems Inc. INT P5/166/X -C

Inteva Microsystems Inc. INT P5/200/X -A

Inteva Microsystems Inc. INT P5/200/X -B

Inteva Microsystems Inc. INT P5/200/X -C

Iolair Engineering SVO-4 (AMD 486/160)

IPC Helios Corporate PC P100

IPC Helios Corporate PC P133

IPC Helios Corporate PC P166

Ipex Pentium 200/HX Centra 1000 ISA/PCI

Ipex Pentium 200/HX Centra 2000 ISA/PCI

Ipex Pentium 200/HX Centra 5000 ISA/PCI

Ipex Pentium 200/HX Desktop ISA/PCI

Ipex Pentium 200/HX Ultimate ISA/PCI

Ipex Pentium 200/VX Centra 1000 ISA/PCI

Ipex Pentium 200/VX Centra 2000 ISA/PCI

Ipex Pentium 200/VX Centra 5000 ISA/PCI

Ipex Pentium 200/VX Desktop ISA/PCI

Ipex Pentium 200/VX Ultimate ISA/PCI

Ipex Pentium/150S2 Centra 1000 ISA/PCI

Ipex Pentium/150S2 Centra 2000 ISA/PCI

Ipex Pentium/150S2 Centra 5000 ISA/PCI

Ipex Pentium/150S2 Desktop ISA/PCI

Ipex Pentium/150S2 Ultimate ISA/PCI

Ipex Pentium/150T Centra 1000 ISA/PCI

Ipex Pentium/150T Centra 2000 ISA/PCI

Ipex Pentium/150T Centra 5000 ISA/PCI

Ipex Pentium/150T Desktop ISA/PCI

Ipex Pentium/150T Ultimate ISA/PCI

Ipex Pentium/166S2 Centra 1000 ISA/PCI

Ipex Pentium/166S2 Centra 2000 ISA/PCI

Ipex Pentium/166S2 Centra 5000 ISA/PCI

Ipex Pentium/166S2 Desktop ISA/PCI

Ipex Pentium/166S2 Ultimate ISA/PCI

Ipex Pentium/166T Centra 1000 ISA/PCI

Ipex Pentium/166T Centra 2000 ISA/PCI

Ipex Pentium/166T Centra 5000 ISA/PCI

Ipex Pentium/166T Desktop ISA/PCI

Ipex Pentium/166T Ultimate ISA/PCI

Ipex Pentium/200T Centra 1000 ISA/PCI

Ipex Pentium/200T Centra 2000 ISA/PCI

Ipex Pentium/200T Centra 5000 ISA/PCI

Ipex Pentium/200T Desktop ISA/PCI

Ipex Pentium/200T Ultimate ISA/PCI

JDR-T586-133

Jeran Technology JT54-133

Jeran Technology JT54-166

JRE Consulting PL100

Karin Electronic COMPUCON Pentium/133N PCI+EISA

Karin Electronic COMPUCON Pentium/133N PCI+ISA

Karin Electronic COMPUCON Pentium/166APT PCI+ISA

Karin Electronic COMPUCON Pentium/166S PCI+ISA+MEDIA

Karin Electronic COMPUCON Pentium/166SAV PCI+ISA

Karin Electronic COMPUCON Pentium/166T2 PCI+ISA+MEDIA

Karin Electronic COMPUCON Pentium/166T2D PCI+EISA+MEDIA

Karin Electronic COMPUCON Pentium/166TPN PCI+ISA+MEDIA

Karin Electronic COMPUCON Pentium/166TVP PCI+ISA+MEDIA

Karin Electronic COMPUCON Pentium/166XT2 PCI+ISA+MEDIA

LANIX Brain Serie E 133 MHz

LANIX Brain Serie E 166 MHz

LANIX Mart Serie B 60 MHz

LANIX Mart Serie E 133 MHz

LANIX Mart Serie Z 100 MHz

LANIX Mart Serie Z 133 MHz

LANIX Mart Serie Z 75 MHz

LANIX Top Serie Z 100 MHz

LANIX Top Serie Z 133 MHz

LANIX Top Serie Z 75 MHz

LEO Systems Inc. LEO Server 6000

Maple Oak Computer Diz Pentium 100

Maple Oak Computer Diz Pentium 133

Maple Oak Computer HT-Pentium 100

Maple Oak Computer HT-Pentium 133

Maple Oak Computer YL Pentium 100

Maple Oak Computer YL Pentium 133

Mask Systems Rival FT/166

Mask Systems Rival MT/166

Mask Systems Rival SL/166

Mask Systems Rival SL/166

Master Cascade Pentium 120

MaxVision Symbion 5100 Pentium 166

Mega Computer ECO Series 486 DX2/66 VLB

Micro Arts Power Pro Pentium 166

Micro-Pro GREEN SERIES SP100

Micro-Pro GREEN SERIES SP120

Micro-Pro GREEN SERIES SP133

Micro-Pro GREEN SERIES SP150

Micro-Pro GREEN SERIES SP166

Micro-Pro GREEN SERIES SSP133

Micro-Pro GREEN SERIES T/SP100

Micro-Pro GREEN SERIES T/SP120

Micro-Pro GREEN SERIES T/SP133

Micro-Pro GREEN SERIES T/SP150

Micro-Pro GREEN SERIES T/SP166

Micron 4100 PCI Magnum

Micron ClientPro P100

Micron ClientPro P120

Micron ClientPro P133

Micron ClientPro P150

Micron ClientPro P166

Micron ClientPro P75

Micron ClientPro P90

Micron Home MPC P100hx

Micron Home MPC P120hx

Micron Home MPC P133hx

Micron Home MPC P150hx

Micron Home MPC P166hx

Micron Home MPC P200hx

Micron Home MPC P75hx

Micron Home MPC P90hx

Micron Magnum Pro 150

Micron Magnum Pro 180

Micron Magnum Pro 200

Micron Millennia P100

Micron Millennia P100hx

Micron Millennia P120

Micron Millennia P120hx

Micron Millennia P133

Micron Millennia P133hx

Micron Millennia P150

Micron Millennia P150hx

Micron Millennia P166

Micron Millennia P166hx

Micron Millennia P200hx

Micron Millennia P75

Micron Millennia P75hx

Micron Millennia P90

Micron Millennia P90hx

Micron Millennia Pro 200

Micron P75PCI PowerStation Si

Microniche Information Systems MIS-54HI Pentium 100

Microniche Information Systems MIS-54HIP Pentium 166

Microniche Information Systems MIS-54PE Pentium 133

Microtec Mythus 5100

Microtec Mythus 5133

Microtech MTECH AP53-P100

Microtech MTECH AP53-P120

Microtech MTECH AP53-P133

Microtech MTECH AP53-P150

Microtech MTECH AP53-P166

Microtech MTECH AP53-P75

Microtech MTECH AP53-P90

Microtech MTECH P55-TH-P166

Midwest Micro 486DX2/50 Vesa/ISA

MIKROLOG OY OSBORNE OFFICE P100

MIKROLOG OY OSBORNE POWER P166

MIKROLOG OY OSBORNE PRO P166

MIND ULTIMATE P100 HX-A

MIND ULTIMATE P100 VX

MIND ULTIMATE P133 HX-A

MIND ULTIMATE P133 VX

MIND ULTIMATE P166 VX

MIND ULTIMATE P75 HX-A

MIND ULTIMATE P75 VX

Minitronics MINTEC 100PT

Minitronics MINTEC 100PT/MPC

Minitronics MINTEC 133PT

Minitronics MINTEC 133PT/MPC

MiTAC DCP510PA (Desktop)

MiTAC DCP512PA (Desktop)

MiTAC DCP513PA (Desktop)

MiTAC DCP515PA (Desktop)

MiTAC DCP516PA (Desktop)

MiTAC DCP575PA (Desktop)

MiTAC DCP590PA (Desktop)

MiTAC DMP510PA (Desktop)

MiTAC DMP512PA (Desktop)

MiTAC DMP513PA (Desktop)

MiTAC DMP515PA (Desktop)

MiTAC DMP516PA (Desktop)

MiTAC DMP575PA (Desktop)

MiTAC DMP590PA (Desktop)

MiTAC FCP510PA (Full Tower)

MiTAC FCP512PA (Full Tower)

MiTAC FCP513PA (Full Tower)

MiTAC FCP515PA (Full Tower)

MiTAC FCP516PA (Full Tower)

MiTAC FCP590PA (Full Tower)

MiTAC FMP510PA (Full Tower)

MiTAC FMP512PA (Full Tower)

MiTAC FMP513PA (Full Tower)

MiTAC FMP515PA (Full Tower)

MiTAC FMP516PA (Full Tower)

MiTAC FMP590PA (Full Tower)

MiTAC MCP510PA (Mid Tower)

MiTAC MCP512PA (Mid Tower)

MiTAC MCP513PA (Mid Tower)

MiTAC MCP515PA (Mid Tower)

MiTAC MCP516PA (Mid Tower)

MiTAC MCP575PA (Mid Tower)

MiTAC MCP590PA (Mid Tower)

MiTAC MMP510PA (Mid Tower)

MiTAC MMP512PA (Mid Tower)

MiTAC MMP513PA (Mid Tower)

MiTAC MMP515PA (Mid Tower)

MiTAC MMP516PA (Mid Tower)

MiTAC MMP575PA (Mid Tower)

MiTAC MMP590PA (Mid Tower)

Mitsuba PREMIER 166

Mitsuba PREMIER SQ593-150

Mitsuba PREMIER SQ593-200

Mitsuba PREMIER SQ593-P150+

Mobius AS/2000 Pentium 166Mhz

MultiSource Premiere P5166

Multitech ProSpec P100

Multitech ProSpec P120

Multitech ProSpec P133

Multitech ProSpec P150

Multitech ProSpec P166

Mustek MECER5486-PIO

Mustek MECER5P54-PIO

Mustek MECER7486-PIO

Mustek MECER7P54-PIO

National Microcomputers Power System DX2-66

NCR® System 3000 Model 3335

NCR System 3000 Model 3350

NCR System 3000 Model 3355

NEC® PowerMate P150

NEC PowerMate Pro150

NEC PowerMate Pro2200

NEC PowerMate V133e

NEC ProServa 133 PH

NEC ProServa SH 200

NEC ProServa V100

NEC Ready 9619

NEC Versa 4000C/75

NEC Versa M/75 5

NEC Versa P/75 5

NETiS N590

NETiS Powerstation-166

NeTpower Calisto Workstation PentiumPro/200MHz

Network Data AB Crimson - Pentium 100

Network Data AB Crimson - Pentium 120

Network Data AB Crimson - Pentium 133

Network Data AB Crimson - Pentium 150

Network Data AB Crimson - Pentium 166

Network Data AB Crimson SP - Pentium 100

Network Data AB Crimson SP - Pentium 120

Network Data AB Crimson SP - Pentium 133

Network Data AB Crimson SP - Pentium 150

Network Data AB Crimson SP - Pentium 166

Network Data AB Magenta SP - Pentium 100

Network Data AB Magenta SP - Pentium 120

Network Data AB Magenta SP - Pentium 133

Network Data AB Magenta SP - Pentium 150

Network Data AB Magenta SP - Pentium 166

Northern Micro SPIRIT P5I Pentium 166

Northgate® Elegance 425i

Northgate Elegance SP 433

Northwest Micro CommServer 5P/120

Northwest Micro OfficePRO 5AX P/120

Northwest Micro OfficePRO 5P/75

Northwest Micro Signature Series - P/120

Novadata ND-P500-100

Novadata ND-P500-120

Novadata ND-P500-133

Novadata ND-P500-150

Novadata ND-P500-166

Novadata ND-P500-90

OA Comp Inc. Winstorm 100

OA Comp Inc. Winstorm 133

OA Comp Inc. Winstorm 166

Olivetti® LSX5025

Olivetti M6-460

Olivetti Modulo M4-P100i

Olivetti Modulo M4-P133

Olivetti Modulo M4-P133i

Olivetti Modulo M4-P166

Olivetti Modulo P-133-L

Olivetti Modulo P-133-T

Olivetti Modulo P-166-L

Olivetti Modulo P-166-T

Olivetti SNX 140/E Systema

Olivetti SNX 140/S Systema Pentium 133

Olivetti SNX 160/E Systema

Olivetti Suprema M6-950

Omni Tech OTC-5400MX Pentium 100

Omni Tech OTC-5500MX Pentium 120

Omni Tech OTC-5600MX Pentium 133

Omni Tech OTC-5800MX Pentium 166

Omni Tech OTC-5900MX Pentium 200

Omni Tech OTC-6300 PentiumPro 200

Oxford  Systems Integration - Pentium 100

Packard Bell Executive 1333CDT

Packard Bell F170 - Pentium 166

Packard Bell GT-500 Pentium 100

Packard Bell GT-500 Pentium 120

Packard Bell GT-500 Pentium 166

Packard Bell GT-500 Pentium 200

Packard Bell Legend 2440 Pentium 75

Packard Bell Pack-Mate 6215 - Pentium 120

Panasonic® CF-41 / MK III Pentium 120

Panasonic CF-62 / Pentium 100

Panasonic CF-62 / Pentium 133

PC Direct 565Si Pentium 166

PC Direct 565Si Pentium 200

PC Direct 565Ti Pentium 166

PC Direct 565Ti Pentium 200

PC Direct Discovery 545 Pentium 166

PC Importers CyrixP150+

PC Importers Professional Polar-100

PCM Inc PENTIUM 100 DESKTOP

PCM Inc PENTIUM 120 DESKTOP

PCM Inc PENTIUM 133 TOWER

Peacock Voyager 150 Pentium 120

Pionex 6150-A

Pionex 6150P-B

Pionex 6180-A

Pionex 6180P-B

Pionex 6200-A

Pionex 6200P-B

Pionex P5/100/X -A

Pionex P5/100/X -B

Pionex P5/100/X -C

Pionex P5/120/X -A

Pionex P5/120/X -B

Pionex P5/120/X -C

Pionex P5/133/X -A

Pionex P5/133/X -B

Pionex P5/133/X -C

Pionex P5/150/X -A

Pionex P5/150/X -B

Pionex P5/150/X -C

Pionex P5/166/X -A

Pionex P5/166/X -B

Pionex P5/166/X -C

Pionex P5/200/X -A

Pionex P5/200/X -B

Pionex P5/200/X -C

Pitney Bowes WMS91 Pentium 90

Polywell 5133T5B

Polywell 5166P8

Powerland Power2-P100

Powerland Power2-P120

Powerland Power2-P133

Powerland Power2-P166

Procomp Lan Station Pentium 75

Procomp Tower Pentium 100

Professional Concepts Beeker 4-100/VL2

Professional Concepts Beeker 4-66/VL2

Professional Concepts Marauder 5100/N

Professional Concepts Marauder 5100/XE

Professional Concepts Marauder 5133/N

Professional Concepts Marauder 5133/XE

Professional Concepts Marauder 5166/N

Professional Concepts Marauder 5166/XE

Professional Concepts Quinn 4-100/VLE Model G

Professional Concepts Quinn 4-66/VLE Model G

Professional Concepts Saavij 4-66/VL3

Professional Concepts Saavij 4100/VL3

Progen Atlas Multimedia Pentium 133

ProSys Ultra P100/ATX

ProSys Ultra P133/ATX

ProSys Ultra P166/ATX

ProSys Ultra P200/ATX

ProSys Ultra P75/ATX

Quantex QP5/120/X SM

Quantex QP5/120/X SM-1

Quantex QP5/120/X SM-2

Quantex QP5/133/X SM

Quantex QP5/133/X SM-1

Quantex QP5/133/X SM-2

Quantex QP5/150/X SM

Quantex QP5/150/X SM-1

Quantex QP5/150/X SM-2

Quantex QP5/166/X SM

Quantex QP5/166/X SM-1

Quantex QP5/166/X SM-2

Quantex QP5/200/X SM

Quantex QP5/200/X SM-1

Quantex QP5/200/X SM-2

Quantex QP6/150 WS

Quantex QP6/150 WS-1

Quantex QP6/180 WS

Quantex QP6/180 WS-1

Quantex QP6/200 WS

Quantex QP6/200 WS-1

Quattro® Prompt/5 Server Pentium 100

Quattro Prompt/5 WS Pentium 100

Radisys EPC-23

Rask REC Connection Pentium 75

Rask REC FT6000 Pentium 90

Rask REC Power-Line P5-166i

Rask REC Professional P5-166i

RDIpc Pentium PCI Triton 166 Mhz

Reason Technology Sence 5 MA-166

Reason Technology Square 5 HX/MA-166

Rosh Tech ABA P100 Server

Rosh Tech ABA P133 Server

Rosh Tech ABA Pentium 100

Rosh Tech ABA Pentium 150

Sage Technology Group Agenda® PCS Workstation 5/100

Sage Technology Group Agenda PCS Workstation 5/133

Sage Technology Group Agenda PCS Workstation 5/150

Sage Technology Group Agenda PCS Workstation 5/166

Sanyo MBC-T513S (Pentium 133)

Sanyo Winkey MBC-NJP9H10 (Pentium 90)

Sanyo Winkey MBC-NWP9H10 (Pentium 90)

Sanyo Winkey MBC-S700  (Pentium 120)

SeaChange GH1-060C-00 Pentium 100

SeaChange GH2-012C-00 Pentium 166

Seanix ASI 9000 9513AT16H

Seanix ASI 9000 9513DT16H

Seanix ASI 9000 9516AT16H

Seanix ASI 9000 9516DT16H

Seanix ASI 9000 9520AT16H

Seanix ASI 9000 9599AS08F

Seanix ASI 9000 9599AS16H

Seanix ASI 9000 9599DS08F

Seanix ASI 9000 9599DS16H

Seanix SONORA S513CS16H

Seanix SONORA S516CS16H

Seanix SONORA S599CS08F

Shuttle HOT-539 P90/VESA/ISA/PCI

Shuttle HOT-553 P133/ISA/PCI

Shuttle HOT-553 P150/ISA/PCI

Shuttle HOT-553 P166/ISA/PCI

Shuttle HOT-555 P100/ISA/PCI

Shuttle HOT-555 P133/ISA/PCI

Shuttle HOT-555 P150/ISA/PCI

Shuttle HOT-555 P166/ISA/PCI

Siemens-Nixdorf PCD-4T

Siemens-Nixdorf PCD-5H/200

Siemens-Nixdorf PCD-6H

Siemens-Nixdorf PRIMERGY 151

Siemens-Nixdorf PRIMERGY 160

Siemens-Nixdorf Pro C5

Siemens-Nixdorf Pro D5

Siemens-Nixdorf Pro M5

Siemens-Nixdorf SCENIC 5H

Siemens-Nixdorf SCENIC 6T

Siemens-Nixdorf SCENIC Celsius 1

Siemens-Nixdorf SCENIC Pro C6

Siemens-Nixdorf SCENIC Pro M6

SKAI AXIOM-V2-P166

SKAI ECLIPSE-P133

SKAI ULTIMATE-P100

SKAI ULTIMATE-P133

Softworks Citus PSMPC Pentium 133

Source Technology MULTINET P133

Source Technology NC P100

Source Technology NC P166

Source Technology STARLIGHT P100

Source Technology STARLIGHT P166

Source Technology TRITON II P100

Source Technology TRITON II P166

Source Technology ULTRACAD P166

SRC Systems Pentium 100

SRC Systems Pentium 120

SRC Systems Pentium 133

SRC Systems Pentium 166

SRC Systems Pentium 75

STS Systems FT/166

STS Systems MT/166

STS Systems SL/166

Supra 5211CP133 Notebook

Syncomp Pentium 100 / Desktop

Syncomp Pentium 100 / Tower

Syncomp Pentium 133 / Desktop

Syncomp Pentium 133 / Tower

Syncomp Pentium 166 / Desktop

Syncomp Pentium 166 / Tower

Sys Performance T2G Pentium 166

SysLink Computer Corp. Pentium 100 NT Workstation

System Designs MagPower P54TI/120

System Designs MagPower P54TI/133

Tangent Alcazar Server Pentium 166

Tangent Carthage Server Pentium 166

Tangent Gibraltar Server Pentium 166

Tangent Tornado MediaStorm Pentium 166

Tangent Tornado Pentium 166

Tatung TCS-5100 Pentium 90

Tatung TCS-5150 Pentium 90

Tatung TCS-5160 Pentium 166

Tatung TCS-5450 Pentium 90

Tatung TCS-5610 Pentium 166

Tatung TCS-5900 Pentium 90

Tatung TCS-5950 Pentium 90

Tatung TCS-5960 Pentium 166

TC Computers Pentium 90 ISA/PCI

Texas Instruments® TM6050 - Pentium 150

Texas Instruments TravelMate™ TM4000M TFT

The Panda Project Archistrat 4S Pentium 100M

The Panda Project Archistrat 4S Pentium 166M

Toshiba® 110CT/810

Toshiba 500CS/1.3

Toshiba 610CT 3,5

Toshiba 620CT/1.3

Toshiba 650CT/1.3

Toshiba Portege 620

Toshiba Portege 650

Toshiba Satellite 100CS/520 5

Toshiba Satellite 110CS

Toshiba Satellite 110CT

Toshiba Satellite Pro 400CDT 5

Toshiba Satellite Pro 420CDS

Toshiba Satellite Pro 420CDT

Toshiba T2150CDS/520 3,5

Toshiba T2150CDT/520 3,5

Toshiba T2400CT/320

Toshiba T3600CT/250

Toshiba T4700CT/320

Toshiba T4800CT/500

Toshiba T4900CT/810 5

Toshiba T6600C Multimedia Computer

Toshiba Tecra 500CDT

Toshiba Tecra 500CS

Toshiba Tecra 700CT/1.2GB 3,5

Toshiba Tecra 710CT 5

Toshiba Tecra 720CDT 1.2GB 5

TOTAL PERIPHERALS T2P4 Pentium 166

TOTAL PERIPHERALS TP PRO-P6 (200Mhz)

Tri-Star StarStation Pentium Pro 200

TriGem Cybernex-166

Tulip® Vision Line ID 5/100

U.S. Micro 486 DX/4-100

U.S. Micro 486 DX/4-120 (AMD)

U.S. Micro P5T Pen 100

U.S. Micro P5T Pen 120

U.S. Micro P5T Pen 133

U.S. Micro P5T Pen 150

U.S. Micro P5T Pen 166

U.S. Micro P5T Pen 75

U.S. Micro P5T Pen 90

US Robotics Edgeserver V 1.0

Unisys® CMT 620061

Urthgate Vortex FT/166

Urthgate Vortex MT/166

Urthgate Vortex SL/166

Vanguard VS-166

Vextrec Technologies VTIP54IPS/166WP2

Vextrec Technologies VTIP55IPS/150WP5

Vextrec Technologies VTIP55IPS/150WP5-Cyrix 6x86-120

Vextrec Technologies VTIP55IPS/166WP-Cyrix 6x86-133

Vextrec Technologies VTIP55IPS/166WP5

Vextrec Technologies VTIP56IPS/150WP2-Cyrix 6x86-120

Vextrec Technologies VTIP56IPS/166WP2

Vextrec Technologies VTIPAM63I/166NP5

Vextrec Technologies VTIPAM63I/166NP5-Cyrix 6x86-133

Viglen Contender ES Pentium 133

Viglen Dossier CD Pentium 120

Viglen Genie Pro 150 Desktop

Vtech Platinum® NXS100

Vtech Platinum NXS120

Vtech Platinum NXS133

Vtech Platinum NXS150

Vtech Platinum NXS166

Vtech Platinum NXS200

Vtech Platinum NXT100

Vtech Platinum NXT120

Vtech Platinum NXT133

Vtech Platinum NXT150

Vtech Platinum NXT166

Vtech Platinum NXT200

Vtech Platinum NXV100

Vtech Platinum NXV120

Vtech Platinum NXV133

Vtech Platinum NXV150

Vtech Platinum NXV166

Vtech Platinum NXV200

Western Technology Inc. WT-2133 Pentium Server

Western Technology Inc. WT-2133 Rackmountable Pentium Server

Win Laboratories 586-IXXEV-PCI Pentium 166

Win Laboratories 586-IXXTR-PCI Pentium 133

Win Laboratories Pentium 166 HOT-553

Win Laboratories Pentium 166 HOT-555

X-Bit Pentium 100

X-Bit Pentium 120

X-Bit Pentium 133

X-Bit Pentium 150

X-Bit Pentium 166

X-Bit Pentium 75

Zenith® Data Systems Z-NOTEFLEX 486DX4/100

Zenith Data Systems Z-SERVER LT 466XE Model 500 (incl. Model 1000)

Zenith Data Systems Z-STATION GT Pro

Zenon Z-OPTIMUS PCI,SCSI-II, Pentium/60

ZEOS® Meridian 800 486DX4-100 3,5

ZEOS Meridian 850 Pentium 75 3,5

ZEOS Meridian 850 Pentium 90 3,5

ZEOS Pantera Pentium-66

Zymos Computer AXXESS XP2-166

Zymos Computer AXXESS XP2-P100


x86 Architecture Multiprocessor Computers

The following x86 architecture multiprocessor systems have been tested.

ACER AcerAltos 7000/p (Pentium 133 Mhz) (2p)  (Incl. Model 1100 and 2100)

ACER AcerAltos 7000V (Pentium 133 Mhz) (2p)

ACER AcerAltos 9000 (Pentium 133 Mhz) (2p)

ACER AcerAltos 900MP (Pentium 133 Mhz) (2p)

ACER AcerAltos 950MP (Pentium 133 Mhz) (2p)

ALR Evolution Dual6/150 (2p)

ALR Evolution Dual6/200 (2p)

ALR Revolution MP P/100 (2p)

ALR Revolution MP P/90 (2p)

ALR Revolution Q-2SMP P/100 (2p)

ALR Revolution Q-4SMP P/100 (4p)

ALR Revolution Q-4SMP P/90 (4p)

ALR Revolution Q-4SMP PCI P/100 (4p)

ALR Revolution Quad6 166/512

ALR Revolution Quad6 200/256

Apricot FT//mp Pentium/133 (4p)

Apricot Shogun Pentium/133 (4p)

AST Manhattan P Series 5090 (2p)

AST Manhattan P Series 5133 (2p)

AST Manhattan S6200 (2p)

AST Manhattan S6200 LC (2p)

AST Manhattan V Series 5090 (2p)

AST Premmia GX P90

AT&T 3416 (2p)

AT&T S40 Server Pentium 100 (4p)

AT&T S40 Pentium 133 (4p)

AT&T S40 Pentium 166 (4p)

AT&T Globalyst 720/3258 (DT) (2p)

AT&T Globalyst 720/3358 (MT) (2p)

AT&T S40 Server Pentium 90 (2p)

AT&T System 3000 Model 3360 Pentium 60 (2p)

AT&T System 3000 Model 3430 Pentium 60 (2p)

AT&T System 3000 Model 3450 Pentium 133 (4p)

AT&T System 3000 Model 3455 Pentium 133 (4p)

AT&T System 3000 Model 3525 Pentium 133 (4p)

AT&T System 3000 Model 3525 Pentium 133 (8p)

AT&T System 3000 Model 3550 Pentium 133 (4p)

AT&T System 3000 Model 3550 Pentium 133 (8p)

AT&T System 3000 Model 3555 Pentium 133 (4p)

AT&T System 3000 Model 3555 Pentium 133 (8p)

AT&T WorldMark 4100 P133 (4p)

CMOS Titan (Dual Pentium Pro 200)

COMPAQ ProLiant 1500 Model 5/166 (2p)

COMPAQ ProLiant 1500R Model 5/166 (2p)

COMPAQ ProLiant 2000 Model 486/50

COMPAQ ProLiant 2000R Model 486DX/50

COMPAQ ProLiant 4000 Model 5/100

COMPAQ ProLiant 4000 Model 5/66

COMPAQ ProLiant 4000R Model 5/100

COMPAQ ProLiant 4000R Model 5/66

COMPAQ ProLiant 4500 Model 5/100 (4p)

COMPAQ ProLiant 4500 Model 5/133 (4p)

COMPAQ ProLiant 4500 Model 5/166 (4p)

COMPAQ ProLiant 4500R Model 5/100 (4p)

COMPAQ ProLiant 4500R Model 5/133 (4p)

COMPAQ ProLiant 4500R Model 5/166 (4p)

COMPAQ ProLiant 5000 Model 6/166 (4p) 8

COMPAQ ProLiant 5000R Model 6/166 (4p) 8

COMPAQ ProLiant 5000 Model 6/200 (2p) 8

COMPAQ ProLiant 5000R Model 6/200 (2p) 8

COMPAQ Systempro® Dual 486DX2/66

COMPAQ Systempro® XL 486/50

Corollary CBII/6000p

Data General AV4700 Pentium 133 (2p)

Data General AV4800 Pentium 133 (4p)

Data General AV4800 Pentium 166 (4p)

Data General AViiON AV2000 Pentium 100 (2p)

Data General AViiON AV2000 Pentium 166 (2p)

Data General AViiON AV3000 Pentium 166 (4p)

Data General AViiON AV4900 Pentium Pro 166 (4p)

Data General AViiON AV5800 Pentium 133 (4p)

Data General AViiON AV5800 Pentium 133 (8p)

Data General AViiON AV5800 Pentium 166 (4p)

Data General AViiON AV5800 Pentium 166 (8p)

Data General AViiON AV5900 Pentium Pro 166 (4p)

DELL OptiPlex DGX 5133-2

DELL OptiPlex DGX 5166-2

DELL OptiPlex DGX 590-2

DELL OptiPlex GXpro 200Mhz (2p)

DELL PowerEdge SP 5100-2

DELL PowerEdge SP 5133-2

DELL PowerEdge SP 5166-2

DELL PowerEdge SP 590-2

DELL PowerEdge XE 5100-2

DELL PowerEdge XE 5133-2

DELL PowerEdge XE 5166-2

DELL PowerEdge XE 590-2

DELL PowerEdge XL 5133-4

DELL PowerEdge XL 5166-4

DFI Landmarq P133 VPM Doubleshot (2p)

Digital Equipment Corp. Celebris XL 5133DP

Digital Equipment Corp. Celebris XL 5150DP

Digital Equipment Corp. Celebris XL 5160DP

Digital Equipment Corp. Prioris HX 5100MP/4

Digital Equipment Corp. Prioris HX 5133DP

Digital Equipment Corp. Prioris HX 5166DP

Digital Equipment Corp. Prioris XL Server 5133DP

Digital Equipment Corp. Prioris XL Server 5166DP

Digital Equipment Corp. Prioris XL Server 590DP

Digital Equipment Corp. Prioris ZX 5133MP/4

Digital Equipment Corp. Prioris ZX 5166MP/4

DTP Micro Systems POWERPRO P200d Pentium Pro 200 (2p)

DTP Micro Systems Super Micro P6DNF Pentium Pro 200 (2p)

Dynamic Decisions DYNEX EXECUTIVE Pentium 133/Dual/T2/PE

Dynamic Decisions DYNEX EXECUTIVE Pentium 150/Dual/T2/PE

Dynamic Decisions DYNEX EXECUTIVE Pentium 166/Dual/T2/PE

Dynamic Decisions DYNEX EXECUTIVE Pentium-133/Dual/T2/PE NT Server

Dynamic Decisions DYNEX EXECUTIVE Pentium-150/Dual/T2/PE NT Server

Dynamic Decisions DYNEX EXECUTIVE Pentium-166/Dual/T2/PE NT Server

Everex Step DP (2p)

Fujitsu ICL SUPERSERVER J554i (4p)

Fujitsu ICL SUPERSERVER J584i (4p)

Fujitsu ICL TEAMSERVER G582i (2p)

Hewlett-Packard NetServer 5/100 LH (2p)

Hewlett-Packard NetServer 5/100 LS (2p)

Hewlett-Packard NetServer 5/133 LS (4p)

Hewlett-Packard NetServer 5/166 LS (4p)

Hewlett-Packard NetServer 5/66 LM2

Hewlett-Packard Vectra XU 5/133C PC (2p)

Hewlett-Packard Vectra XU 5/90C PC (2p)

Hewlett-Packard Vectra XU 6/150 PC (2p)

IBM PC 365 Model 6589 PentiumPro/200 (2p)

IBM PC Server 320 Pentium/133 8640 1DS (2p)

IBM PC Server 320 Pentium/133 8640-2DO (2p)

IBM PC Server 320 Pentium/133 8640-MDS (2p)

IBM PC Server 320 Pentium/133 8640-MDV (2p)

IBM PC Server 320 Pentium/133 8640-ODV (2p)

IBM PC Server 320 Pentium/90 8640-MXT (2p)

IBM PC Server 320 Pentium/90 8640-MYR (2p)

IBM PC Server 320 Pentium/90 8640-MYT (2p)

IBM PC Server 520 Pentium/133 8641-EDL (2p)

IBM PC Server 520 Pentium/133 8641-EZS (2p)

IBM PC Server 520 Pentium/133 8641-MZV (2p)

IBM PC Server 704 Pentium Pro/166 8650-4BN (2p)

IBM PC Server 704 Pentium Pro/166 8650-7AX (4p)

IBM PC Server 720 Pentium/100 8642-2ZS (2p)

IBM PC Server 720 Pentium/100 8642-4ZS (4p)

IBM PC Server 720 Pentium/100 8642-OZO (2p)

IBM PC Server 720 Pentium/100 8642-OZO (4p)

ICL SUPERSERVER J554i (4p)

ICL SUPERSERVER J584i (4p)

ICL TEAMSERVER G582i (2p)

Intergraph ISMP22 InterServe Pentium/100MHz

Intergraph ISMP22 InterServe Pentium/90MHz

Intergraph ISMP32 InterServe Pentium/100MHz

Intergraph ISMP32 InterServe Pentium/90MHz

Intergraph ISMP6 InterServe Pentium/100MHz (6p)

Intergraph ISMP6 InterServe Pentium/133MHz (6p)

Intergraph ISMP620 InterServe Pentium Pro 150MHz (2p)

Intergraph TD 4 Personal Workstation Pentium/100MHz

Intergraph TD 5 Personal Workstation Pentium/100MHz

Intergraph TD 5 Personal Workstation Pentium/90MHz

Intergraph TD-40 Personal Workstation Pentium/100Mhz

Intergraph TD-40 Personal Workstation Pentium/133Mhz

Intergraph TD-400 Personal Workstation Pentium Pro 150MHz (2p)

Intergraph TD-400 Personal Workstation Pentium Pro 200MHz (2p)

Intergraph TDZ-400 Personal Workstation Pentium Pro 150MHz (2p)

Intergraph TDZ-400 Personal Workstation Pentium Pro 200MHz (2p)

MaxVision Symbion Pro2200 (2p)

Micron PowerServer™ SMP P266

Micron PowerServer SMP P90

Multitech ProSpec Dual Pentium 100 PCI/ISA

NCR S40 Pentium 133 (4p)

NCR S40 Pentium 166 (4p)

NCR System 3000 Model 3360 Pentium 60 (2p)

NCR System 3000 Model 3430 Pentium 60 (2p)

NCR System 3000 Model 3450 Pentium 133 (4p)

NCR System 3000 Model 3455 Pentium 133 (4p)

NCR System 3000 Model 3525 Pentium 133 (4p)

NCR System 3000 Model 3525 Pentium 133 (8p)

NCR System 3000 Model 3550 Pentium 133 (4p)

NCR System 3000 Model 3550 Pentium 133 (8p)

NCR System 3000 Model 3555 Pentium 133 (4p)

NCR System 3000 Model 3555 Pentium 133 (8p)

NCR WorldMark 4300 Pentium Pro 166 (4p)

NEC Image® P100E (2p)

NEC ProServa 133 PH (4p)

NEC ProServa SH 200 (2p)

NEC ProServa V100dp

NEC ProServa V133dp

NeTpower Sparta PentiumPro/200MHz (4p)

Olivetti LSX5050

Olivetti M6-650 DP

Olivetti SNX 200 Systema (2p)

Olivetti SNX 200/RM (2p)

Olivetti SNX 460/RS Systema 166Mhz (4p)

Olivetti Suprema M6 680-DP

Polywell Poly Dual P6/200

Poseidon MPserver P5/100 (4p)

Sequent® WinServer 5000/WS20 Pentium/66 (6p)

Sequent WinServer 5000/WS30 Pentium/100(6p)

Sequent WinServer 5000/WS40 Pentium/166(6p)

Sequent WinServer 5000/WS60 Pentium/66(16p)

Sequent WinServer 5000/WS70 Pentium/100(16p)

Sequent WinServer 5000/WS80 Pentium/166(16p)

Sequent WinServer 6000 (8p)

Sidus Dual Pentium Pro 200

Siemens-Nixdorf PCD-5T 90 DE

Siemens-Nixdorf PCE-5Smp/133 (4p)

Siemens-Nixdorf PRIMERGY 350 (2p)

Siemens-Nixdorf PRIMERGY 550

Siemens-Nixdorf PRIMERGY 750

Tricord ES3000 Pentium 100 (2p) 147

Tricord PowerFrame® DS1700/D5100

Tricord PowerFrame Enterprise Server ES/166 (6p) 147

Unisys Aquanta QR Pentium/133  (4P)

Unisys Pathway Series SFE 59010

Unisys Pathway Series SME 59010

Unisys SFE 516691 (4p)

Unisys SFE 6166151 (4p)

Unisys SFR 513391 (4p)

Unisys SMP5400 (4p)

Unisys SSE 5133101 (2p)

Unisys SVD 510071 (2p)

Unisys VX1104-1IS

Unisys VX1104-2IS

Wyse® Series 7000i model 740MP/66

Zenith Data Systems Z-SERVER EX DP66E Model 1000

Zenith Data Systems Z-SERVER EX DP66E Model 2000

Zenith Data Systems Z-SERVER EX DP66E Model 4000A

Zenith Data Systems Z-SERVER MX Dual 166


MIPS RISC Architecture Computers

The following MIPS RISC architecture systems have been tested.

DeskStation Technology Raptor 3 633

DeskStation Technology UniFlex 633

MIPS ArcSystem Magnum PC-50

MIPS Millenium PC-50

NEC Express RISCserver

NEC Image RISCstation

NEC RISCserver 10000 P-Series 250

NEC RISCserver 10000 S-Series 200

NEC RISCserver 2200

NEC RISCstation 2000 150MHz

NEC RISCstation 2200 200MHz

NeTpower FASTseries MP 150MHz

NeTpower FASTseries SMP Server 150MHz

NeTpower NeTstation 200

NeTpower NeTstation 300

NeTpower Server 1000

Siemens-Nixdorf RM200

Siemens-Nixdorf RM200-C

Siemens-Nixdorf RM400


MIPS RISC Multiprocessor Architecture Computers

The following MIPS RISC multiprocessor architecture systems have been tested.

NEC Express RISCserver MP 150MHz

NEC RISCserver 10000 P-Series 250 (2p)

NEC RISCserver 10000 S-Series 200 (2p)

NEC RISCserver 2200 (2p)

NEC RISCserver 2250 MP 200MHz

NEC RISCserver 4200 MP 200MHz (2p)

NEC RISCstation 2000 MP 150MHz

NEC RISCstation 2200 MP 200MHz

NEC RISCstation 2250 MP 200MHz

NeTpower FASTseries SMP Server 2x200MHz

NeTpower Server 2000

Siemens-Nixdorf RM300-C

Siemens-Nixdorf RM400-C

Siemens-Nixdorf RM400-T


Digital Alpha RISC Architecture Computers

The Following Digital Alpha RISC systems have been tested.

Aspen Alpine 275XS

Aspen Summit 300

Aspen Telluride 275

Aspen Timberline® 300

Carrera Cobra 300

Carrera Cobra 300 with Gamaray 4500

DCG Computers PC164-266

DCG Computers PC164-300

DCG Computers PC164-333

DCG Computers PC164-366

DCG Computers PC64-275

DCG Computers PC64-300

DeskStation Technology Raptor 3 45/275

DeskStation Technology Raptor 3 5/266

DeskStation Technology Raptor 3 5/366

DeskStation Technology UniFlex 45/275

DeskStation Technology UniFlex 5/266

DeskStation Technology UniFlex 5/366

Digital Equipment Corp. Alpha XL 233

Digital Equipment Corp. Alpha XL 266

Digital Equipment Corp. Alpha XL 300

Digital Equipment Corp. Alpha XL 366

Digital Equipment Corp. AlphaServer 1000 4/200

Digital Equipment Corp. AlphaServer 1000 4/233

Digital Equipment Corp. AlphaServer 1000 4/266

Digital Equipment Corp. AlphaServer 1000A 4/266

Digital Equipment Corp. AlphaServer 400 4/166

Digital Equipment Corp. AlphaStation 200 4/166

Digital Equipment Corp. AlphaStation 200 4/233

Digital Equipment Corp. AlphaStation 200 4/266

Digital Equipment Corp. AlphaStation 250 4/266

Digital Equipment Corp. AlphaStation 255 4/233

Digital Equipment Corp. AlphaStation 255 4/300

Digital Equipment Corp. AlphaStation 400 4/233

Digital Equipment Corp. AlphaStation 500/266

Digital Equipment Corp. AlphaStation 500/333

Digital Equipment Corp. AlphaStation 500/400

Digital Equipment Corp. AlphaStation 600 5/266

Digital Equipment Corp. AlphaStation 600 5/300

Digital Equipment Corp. AlphaStation 600 5/333

Digital Equipment Corp. DECpc 2000-300 AXP Server

Digital Equipment Corp. DECpc 2000-500 AXP Server

Digital Equipment Corp. DECpc AXP 150

Digital Equipment Corp. DECpc AXP 150 Universal Platform

Digital Equipment Corp. Multia Multi Client Workstation

Digital Equipment Corp. Multia MultiClient Desktop

EDV Quant X Series 2/275

EDV Quant X Series 2/300

EDV Quant X Series 3/266

EDV Quant X Series 3/300

EDV Quant X Series 3/333

EDV Quant X Series 3/366

MaxVision Symbion AXP164 (300Mhz)

Polywell Alpha 333


Digital Alpha RISC Multiprocessor Architecture Computers

The Following Digital Alpha RISC multiprocessor systems have been tested.

Digital Equipment Corp. 2100 Server model A500MP

Digital Equipment Corp. AlphaServer 2000 4/200

Digital Equipment Corp. AlphaServer 2000 4/275

Digital Equipment Corp. AlphaServer 2100 4/200

Digital Equipment Corp. AlphaServer 2100 4/233

Digital Equipment Corp. AlphaServer 2100 4/275

Digital Equipment Corp. AlphaServer 2100 5/250

Digital Equipment Corp. AlphaServer 2100 5/300

Digital Equipment Corp. AlphaServer 2100A 4/275

Digital Equipment Corp. AlphaServer 2100A 5/250

Digital Equipment Corp. AlphaServer 2100A 5/250 LP

Digital Equipment Corp. AlphaServer 2100A 5/300 LP

Digital Equipment Corp. AlphaServer 4100 5/300E (4p)


PowerPC Architecture Computers

The following PowerPC architecture uniprocessor systems have been tested.

Austin PowerPlay 604/100

Bull ESTRELLA DT604-100

Bull ESTRELLA DT604-133

Bull ESTRELLA MT604-100

Bull ESTRELLA MT604-133

Canon® PPC 604-100Mhz

FirePower Powerized ES3100

FirePower Powerized ES380

FirePower Powerized ES4100

IBM Personal Computer Power Series 850 (100 MHz)

IBM Personal Computer Power Series 850 (120 MHz)

IBM Personal Computer Power Series 850 (133 MHz)

IBM RISC System/6000™ 40P Series (66 MHz) System

IBM RISC System/6000 43P Series (100 MHz)

IBM RISC System/6000 43P Series (133 MHz)

IBM RISC System/6000 7024 Model E20 Server 604/100

IBM RISC System/6000 7024 Model E30 Server 604/133

IBM RISC System/6000 7025 Model F30 Server 604/133

IBM ThinkPad Power Series 820

IBM ThinkPad Power Series 850

Motorola® PowerStack RISC PC DT603-66

Motorola PowerStack RISC PC DT603E-100

Motorola PowerStack RISC PC DT604-100

Motorola PowerStack RISC PC DT604-133

Motorola PowerStack RISC PC MT603-66

Motorola PowerStack RISC PC MT603E-100

Motorola PowerStack RISC PC MT604-100

Motorola PowerStack RISC PC MT604-133

Motorola PowerStack Series E E603-66P

Motorola PowerStack Series E E604-100P

Motorola PowerStack Series E E604-133P

Motorola RISC PC Plus DTP603e-100

Motorola RISC PC Plus DTP604-100

Motorola RISC PC Plus DTP604-133

Motorola RISC PC Plus MTP 603e-100

Motorola RISC PC Plus MTP 604-100

Motorola RISC PC Plus MTP 604-133

Motorola SERIES EX 604-133

Motorola SERIES EX 604E-166

Tatung TPC-5740 (PPC 604/100)

Zenith Data Systems Z-POWER DT 604-100

Zenith Data Systems Z-POWER DT 604-133

Zenith Data Systems Z-POWER MT 604-100

Zenith Data Systems Z-POWER MT 604-133


PowerPC Multiprocessor Architecture Computers

The following PowerPC architecture uniprocessor systems have been tested.

Austin PowerPlay2 604/100 dual

Austin PowerPlay2 604/120 dual

Austin PowerPlay2 604/133 dual

Canon PW-100d

Canon PW-120d

Canon PW-130d

FirePower Powerized LX 4150/2

FirePower Powerized MX 4100/2

FirePower Powerized MX 4120/2

FirePower Powerized MX 4133/2

FirePower Powerized MX 4150/2


Processor Upgrade Products

The following Processor Upgrade Products have been tested with Windows NT. Please consult the manufacturer for information on compatibility with specific models of computers.

Cyrix CX486DRx2-20/40

Cyrix CX486DRx2-25/50

Digital Equipment Corp. DECpc XL AXP 233 Upgrade

Intel OverDrive™ 486DX-33 (66Mhz)

Kingston TurboChip 486 TC486/75

SGS-Thomsom Microelectronics ST486 DX2-66


PCMCIA Tested Systems

The following systems have been tested for PCMCIA compatibility with the Windows NT 4.0 release.

PCMCIA Tested Systems

x86 Architecture Systems

The following x86 architecture systems have been tested for PCMCIA compatibility

AST Ascentia 900N 4/100

AST Ascentia 910N 4/50

AST Ascentia 950N Pentium/75

COMPAQ Contura 430C

COMPAQ Contura 430CX

COMPAQ LTE 5000

COMPAQ LTE 5200

COMPAQ LTE 5280

COMPAQ LTE 5300

COMPAQ LTE Elite 4/50CX

COMPAQ LTE Elite 4/75CX

DELL Latitude XP 4100D

DELL Latitude XP475C

DELL Latitude XPi P100SD 2

DELL Latitude XPi P133ST 2

DELL Latitude XPi P75D

DELL Latitude XPi P75T

Digital Equipment Corp. HiNote CT475

Digital Equipment Corp. HiNote Ultra CT475

Digital Equipment Corp. HiNote Ultra II CTS 5120 3

Digital Equipment Corp. HiNote Ultra II CTS 5133 3

Digital Equipment Corp. HiNote Ultra II LTS 5133 3

Fujitsu ICL ErgoLite s75

Fujitsu ICL ErgoLite x75

Gateway 2000 COLORBOOK DX4-75

Gateway 2000 Solo P90 3,4

Hewlett-Packard OmniBook 4000CT 4/100 3

Hewlett-Packard OmniBook 5000CT Pentium 90 4,5

Hewlett-Packard OmniBook 5000CTS Pentium 90 4,5

Hewlett-Packard OmniBook 5500CT 5/120

Hewlett-Packard OmniBook 5500CT 5/120C

Hewlett-Packard OmniBook 5500CT 5/133

Hewlett-Packard OmniBook 5500CT 5/133C

IBM ThinkPad 360CE 486DX2/50

IBM ThinkPad 365XD Pentium/100 3,6

IBM ThinkPad 560 Pentium/100 3

IBM ThinkPad 701C 486DX/50 3,5

IBM ThinkPad 701C 486DX4/75 3,5

IBM ThinkPad 750 486SL/33

IBM ThinkPad 750C 486SL/33

IBM ThinkPad 750CE 486DX2/50

IBM ThinkPad 755C 486DX4/75

IBM ThinkPad 755CD 486DX4/100 7

IBM ThinkPad 755CDV 486DX4/100

IBM ThinkPad 755CDV 486DX4/75

IBM ThinkPad 755CE 486DX4/100 7

IBM ThinkPad 755CX Pentium/75 7

IBM ThinkPad 760CD Pentium/90 6,7

IBM ThinkPad 760E Pentium/120 4,7

IBM ThinkPad 760ED Pentium/120 4,7

IBM ThinkPad 760EL Pentium/120

IBM ThinkPad 760ELD Pentium/120

IBM ThinkPad 760L Pentium/90 3,6

IBM ThinkPad 760LD Pentium/90 3,6

ICL ErgoLite s75

ICL ErgoLite x75

Intergraph ISMP610 InterServe Pentium Pro 150MHz

Intergraph ISMP620 InterServe Pentium Pro 150MHz (2p)

Intergraph TD-10 Personal Workstation Pentium/75Mhz

Intergraph TD-300 Personal Workstation Pentium Pro 200MHz

Intergraph TDZ-300 Personal Workstation Pentium Pro 200MHz

Intergraph TD-40 Personal Workstation Pentium/100Mhz

Intergraph TD-40 Personal Workstation Pentium/133Mhz

Intergraph TD-400 Personal Workstation Pentium Pro 150MHz (2p)

Intergraph TD-400 Personal Workstation Pentium Pro 200MHz (2p)

Intergraph TDZ-400 Personal Workstation Pentium Pro 150MHz (2p)

Intergraph TDZ-400 Personal Workstation Pentium Pro 200MHz (2p)

NEC Versa M/75 5

NEC Versa P/75 5

Texas Instruments TravelMate TM4000M TFT

Toshiba 110CT/810

Toshiba 500CS/1.3

Toshiba 610CT 3,5

Toshiba 620CT/1.3

Toshiba Satellite 100CS/520 5

Toshiba Satellite Pro 400CDT 5

Toshiba T2150CDS/520 3,5

Toshiba T2150CDT/520 3,5

Toshiba T2400CT/320

Toshiba T3600CT/250

Toshiba T4700CT/320

Toshiba T4800CT/500

Toshiba T4900CT/810 5

Toshiba Tecra 700CT/1.2GB 3,5

Toshiba Tecra 710CT 5

Toshiba Tecra 720CDT 1.2GB 5

Zenith Data Systems Z-NOTEFLEX 486DX4/100

ZEOS Meridian 800 486DX4-100 3,5

ZEOS Meridian 850 Pentium 75 3,5

ZEOS Meridian 850 Pentium 90 3,5

Digital Alpha RISC architecture Systems

The following Digital Alpha RISC architecture systems have been tested for PCMCIA compatibility.

Digital Equipment Corp. Multia MultiClient Desktop

PowerPC architecture Systems

The following Digital Alpha RISC architecture systems have been tested for PCMCIA compatibility.

IBM ThinkPad Power Series 820

IBM ThinkPad Power Series 850


PCMCIA Add-In Adapters

The following PCMCIA add-in adapters have been tested on the indicated platforms.

PCMCIA Add-In Adapters	Bus	x86	MIPS	Alpha	PowerPC
Linksys Desktop PCMCIA Card Slots	ISA	X
Maxtor MobileMax DeskRunner	ISA	X
Eiger Labs Four Slot PCMCIA ISA Adapter	ISA	X	X	X	X
Eiger Labs Two Slot PCMCIA ISA Adapter	ISA	X	X	X	X
Adaptec™ CardPack APA-4510	ISA	X
SCM SwapBox Classic	ISA			X


SCSI Host Adapters

The following SCSI adapters have been tested on the indicated platforms with the following scanner, CD-ROM, tape, fixed and removable drives (except as noted): Hewlett-Packard® ScanJet® 4c9, NEC CDR-502  6X, Sony® CDU-76S, Hewlett-Packard SureStore 6000i, Quantum XP32150,  Iomega® Zip Drive 100.  SCSI adapters indicated as Wide SCSI were also  tested with 2gb Wide SCSI fixed drives.

SCSI Host Adapter	Bus	x86	MIPS	Alpha	PowerPC
Adaptec AHA-1510 10	ISA-16	X		X	X
Adaptec AHA-1510A 10	ISA-16	X	X	X	X
Adaptec AHA-1510B 10	ISA-16	X	X	X	X
Adaptec AHA-1520 10	ISA-16	X		X	X
Adaptec AHA-1520A 10	ISA-16	X		X	X
Adaptec AHA-1520B 10	ISA-16	X	X	X	X
Adaptec AHA-1522 10	ISA-16	X		X	X
Adaptec AHA-1522A 10	ISA-16	X	X	X	X
Adaptec AHA-1522B 10	ISA-16	X	X	X	X
Adaptec AHA-1530P 10	ISA-16	X	X	X	X
Adaptec AHA-1532P 10	ISA-16	X	X	X	X
Adaptec AHA-1535	ISA-16	X	X	X	X11
Adaptec AHA-1535A	ISA-16	X	X	X	X11
Adaptec AHA-1540B 12,13	ISA-16	X	X	X	X11
Adaptec AHA-1542B 12,13	ISA-16	X	X	X	X11
Adaptec AHA-1540C 14	ISA-16	X	X	X	X11
Adaptec AHA-1542C 14	ISA-16	X	X	X	X11
Adaptec AHA-1540CF	ISA-16	X	X	X	X11
Adaptec AHA-1542CF	ISA-16	X	X	X	X11
Adaptec AHA-1540CP	ISA-16	X	X	X	X11
Adaptec AHA-1542CP	ISA-16	X	X	X	X11
Adaptec AHA-1640 13	MCA	X
Adaptec AHA-1740 15	EISA	X	X	X
Adaptec AHA-1742 15	EISA	X	X	X
Adaptec AHA-1740A 16	EISA	X	X	X
Adaptec AHA-1742A 16	EISA	X	X	X
Adaptec AHA-2740	EISA	X	X	X
Adaptec AHA-2742	EISA	X	X	X
Adaptec AHA-2740A	EISA	X	X	X
Adaptec AHA-2742A	EISA	X	X	X
Adaptec AHA-2740AT	EISA	X	X	X
Adaptec AHA-2742AT	EISA	X	X	X
Adaptec AHA-2840	VLB	X
Adaptec AHA-2842	VLB	X
Adaptec AHA-2840A	VLB	X
Adaptec AHA-2842A	VLB	X
Adaptec AHA-2905	PCI	X	X	X	X
Adaptec AHA-2910	PCI	X
Adaptec AHA-2910A	PCI	X
Adaptec AHA-2920	PCI	X	X	X	X
Adaptec AHA-2920A	PCI	X	X	X	X
Adaptec AHA-2940	PCI	X
Adaptec AHA-2940AU	PCI	X
Adaptec AHA-2940U	PCI	X
Adaptec AHA-2940W	PCI	X
Adaptec AHA-2940UW	PCI	X
Adaptec AHA-3940	PCI	X
Adaptec AHA-3940U	PCI	X
Adaptec AHA-3940W	PCI	X
Adaptec AHA-3940UW	PCI	X
Adaptec AHA-3940UWD	PCI	X
Adaptec AVA-1502AP 10	ISA-16	X	X		X
Adaptec AVA-1502E 10	ISA-16	X	X	X	X
Adaptec AVA-1505 10	ISA-16	X	X	X	X
Adaptec AVA-1515 10	ISA-16	X	X	X	X
Adaptec AVA-2825	VLB	X
Adaptec AIC-7770 17	EMBEDDED	X18
Adaptec SlimSCSI	PCMCIA	X	X	X	X
Always IN-2000 1	ISA-16	X
AMIscsi Series 441 19	EISA	X
AMIscsi Series 48	EISA	X	X	X
AMD PC-NET SCSI	EMBEDDED	X20
BusLogic BT-445C	VLB	X
BusLogic BT-445S	VLB	X
BusLogic BT-542B	ISA-16	X	X	X	X11
BusLogic BT-545C	ISA-16	X	X	X	X11
BusLogic BT-545S	ISA-16	X	X	X	X11
BusLogic BT-640A	MCA	X
BusLogic BT-646S 21	MCA	X
BusLogic BT-742A	EISA	X	X	X
BusLogic BT-747C	EISA	X
BusLogic BT-747S	EISA	X	X	X
BusLogic BT-757C	EISA	X
BusLogic BT-946C 22	PCI	X
BusLogic BT-948	PCI	X
BusLogic BT-956C	PCI	X
BusLogic BT-958	PCI	X
BusLogic FlashPoint LT (BT-930)	PCI	X
BusLogic FlashPoint DL (BT-932)	PCI	X
BusLogic FlashPoint LW (BT-950)	PCI	X
COMPAQ Fast SCSI-2 Controller	EISA	X
COMPAQ 32-Bit Fast-Wide SCSI-2/E Controller	EMBEDDED	X23
COMPAQ 32-Bit Fast-Wide SCSI-2/P Controller	EMBEDDED	X24
DPT SmartCache Plus (PM2011b)	ISA-16	X	X	X
DPT SmartCache Plus (PM2011b with cache) 19	ISA-16	X		X
DPT SmartCache Plus (PM2012b)	EISA	X	X	X
DPT SmartCache Plus (PM2012b with cache) 19	EISA	X		X
DPT SmartCache III (PM2021)	ISA-16	X	X	X	X11
DPT SmartCache III (PM2021 with cache) 19	ISA-16	X	X	X
DPT SmartCache III (PM2022)	EISA	X	X	X
DPT SmartCache III (PM2022 with cache) 19	EISA	X	X	X
DPT SmartCache III (PM2024) 25	PCI	X	X26		X27
DPT SmartCache III (PM2024 with cache) 19,25	PCI	X	X26		X27
DPT SmartCache III (PM2122)	EISA	X	X	X
DPT SmartCache III (PM2122 with cache) 19	EISA	X	X	X
DPT SmartCache III (PM2124)	PCI	X	X		X27
DPT SmartCache III (PM2124 with cache) 19,25	PCI	X	X		X27
DPT SmartCache III (PM2124W)	PCI	X	X		X27
DPT SmartCache III (PM2124W with cache) 19,25	PCI	X	X		X27
DPT SmartCache IV (PM2041W)	ISA-16	X	X26		X11,27
DPT SmartCache IV (PM2041W with cache) 28	ISA-16	X	X26		X11,27
DPT SmartCache IV (PM2041FW)	ISA-16	X	X26		X11,27
DPT SmartCache IV (PM2041FW with cache) 28	ISA-16	X	X26		X11,27
DPT SmartCache IV (PM2042W)	EISA	X	X26
DPT SmartCache IV (PM2042W with cache) 28	EISA	X	X26
DPT SmartCache IV (PM2042FW)	EISA	X	X26
DPT SmartCache IV (PM2042FW with cache 28	EISA	X	X26
DPT SmartCache IV (PM2142W)	EISA	X	X26
DPT SmartCache IV (PM2142W with cache) 28	EISA	X	X26
DPT SmartCache IV (PM2142FW)	EISA	X	X26
DPT SmartCache IV (PM2142FW with cache) 28	EISA	X	X26
DPT SmartCache IV (PM2044W)	PCI	X	X26		X27
DPT SmartCache IV (PM2044W with cache) 28	PCI	X	X26		X27
DPT SmartCache IV (PM2144W)	PCI	X	X26		X27
DPT SmartCache IV (PM2144W with cache) 28	PCI	X	X26		X27
DPT SmartRAID (PM3021) 19,25	PCI	X	X	X	X11
DPT SmartRAID (PM3222) 19,25	EISA	X	X29	X
DPT SmartRAID (PM3224) 19,25	PCI	X	X26		X27
DPT SmartRAID (PM3224W) 19,25	PCI	X	X26		X27
DPT SmartRAID IV (PM3334W) 28	PCI	X	X26		X27
Data Technology Corp. 3290 1	EISA	X
Digital Equipment KZESC-AA (SWIKX-BA) EISA BackPlane RAID 1-CHANNEL	EISA			X
Digital Equipment KZESC-BA (SWIKX-BB) EISA BackPlane RAID 3-CHANNEL	EISA	X		X
Digital Equipment KZPAA-AA PCI-SCSI Host Bus Adapter	PCI	X		X
Digital Equipment KZPSC-AA (SWIXK-CA) PCI BackPlane RAID 1-CHANNEL	PCI			X
Digital Equipment KZPSC-BA (SWIXK-CB) PCI BackPlane RAID 3-CHANNEL	PCI	X		X
Digital Equipment KZPSM SCSI/Ethernet Controller 30	PCI	X		X
Digital Equipment KZPSA Differential SCSI Adapter 1	PCI			X
Future Domain® MCS-600	MCA	X
Future Domain MCS-700	MCA	X
Future Domain SCSI2Go	PCMCIA	X	X	X	X
Future Domain TMC-845 31,32,33	ISA-8	X
Future Domain TMC-850 31,32	ISA-8	X
Future Domain TMC-850M(ER) 32	ISA-8	X
Future Domain TMC-860 31,32	ISA-8	X
Future Domain TMC-860M 32	ISA-8	X
Future Domain TMC-885 31,32	ISA-16	X
Future Domain TMC-885M 32	ISA-16	X
Future Domain TMC-1610m	ISA-16	X		X	X
Future Domain TMC-1610mer	ISA-16	X		X	X
Future Domain TMC-1610mex	ISA-16	X		X	X
Future Domain TMC-1650	ISA-16	X		X	X
Future Domain TMC-1660	ISA-16	X		X	X
Future Domain TMC-1670	ISA-16	X		X	X
Future Domain TMC-1680	ISA-16	X		X	X
Future Domain TMC-3260 34	PCI	X	X	X	X
Future Domain TMC-7000EX	EISA	X	X	X
IBM PS/2 Microchannel SCSI Host Adapter	MCA	X35
IBM PS/2 Microchannel SCSI Host Adapter (with cache)	MCA	X35
Initio INI-6102 1	ISA-16	X
Initio INI-9100 1	PCI	X
Initio INI-9100W 1	PCI	X
Maynard 16-bit SCSI Adapter 1,21,36,37	ISA-16	X
MediaVision Pro Audio Spectrum-16 1,37,38	ISA-16	X
Mylex DAC960-3 Channel 33	EISA	X39		X
Mylex DAC960-E 33	EISA	X39		X
Mylex DAC960-P 33	PCI	X39		X
Mylex DAC960-PD 33	PCI	X39		X
Mylex DAC960-PL 33	PCI	X39		X
NCR 53C700 SCSI Adapter	EMBEDDED		X40
NCR 53C700 SCSI Adapter	MCA	X
NCR 53C710 SCSI Adapter	EISA	X
NCR 53C810 SCSI Controller	EMBEDDED	X41	X42	X43	X
NCR 53C90 SCSI Controller	EMBEDDED	X44
NCR 53C94 SCSI Controller	EMBEDDED	X45	X
NCR 8100S PCI Host Adapter Board	PCI	X	X	X	X
NCR 8150S PCI Host Adapter Board	PCI	X	X	X	X
Olivetti ESC-1 21	EISA	X
Olivetti ESC-2	EISA	X
QLogic Fast!SCSI IQ PCI	PCI	X	X	X	X
Trantor T-128 1,31,37,46	ISA-8	X
Trantor T-130B 1,31,46	ISA-8	X
UltraStor 14f 47	ISA-16	X	X	X
UltraStor 24f 48	EISA	X	X	X
UltraStor 24fa	EISA	X	X	X
UltraStor 34f	VLB	X


SCSI CD-ROM Drives

The following SCSI CD-ROM drives have been tested with the following adapters:  AHA-1542CP, AHA-2742, and AHA-2940; NCR 8100S and 8250S, and are supported on x86, MIPS, Alpha, and PowerPC platforms except as noted.  Drives have been tested for data access as well as for the audio capabilities indicated.

SCSI CD-ROM Drives	Standard (CD) Audio	Multi-Media Audio
CD-Technology CD Porta-Drive™ T-3301 53	X	X
CD-Technology CD Porta-Drive T-3401	X
CD-Technology CD Porta-Drive T-3601	X	X
COMPAQ DualSpeed CD-ROM Drive	X
Digital Equipment RRD43	X
Digital Equipment RRD44	X
Digital Equipment RRD45	X
Hewlett-Packard 4020i CD-R 50,51,56	X
Lion Optics XC-200 SI	X	X
Matsushita-Kotobuki Electronics LK-RC504AZ1	X	X
Nakamichi MBR-7 CD Changer	X	X
NEC CDR-1460A	X	X
NEC CDR-222	X	X
NEC Multispin Tower (CDR-6004)	X	X
NEC MultiSpin 3Xe (CDR-600) 51,52	X	X
NEC MultiSpin 3Xi (CDR-500) 51,52	X	X
NEC MultiSpin 3Xp (CDR-400)	X	X53
NEC MultiSpin 4Xe (CDR-601)	X	X
NEC MultiSpin 4Xi (CDR-501)	X	X
NEC MultiSpin 6Xe (CDR-602) 54,55	X	X
NEC MultiSpin 6Xi (CDR-502) 54,55	X	X
Panasonic CR-503	X	X
Panasonic CR-504	X	X
Panasonic LF-1000A	X	X
Panasonic LF-1004H	X	X
Pioneer® 604 CD Changer 53,56
Plextor 4Plex PX-43CH	X	X
Plextor 4Plex PX-45CH	X	X
Plextor 4Plex Plus PX-43CE	X	X
Plextor 4Plex Plus PX-45CE	X	X
Plextor 6PleX PX-63CS	X	X
Plextor 6PleX PX-65CS	X	X
Plextor 8Plex PX-83CS	X	X
Plextor 8Plex PX-85CS	X	X
Procom Technology MCD-DS	X	X
Smart and Friendly PD QUAD-WIN	X	X
Sony® CDU-55S	X	X
Sony CDU-76S	X	X
Sony CDU-541	X	X
Sony CDU-561	X
Sony CDU-6211	X	X
Sony CDU-7211	X	X
Sony CDU-7811	X
Sony 9020 CDR	X
Sony Spressa (CDU-920S) CD-R 50	X
Sony Spressa (CDU-9211S) 50	X
Teac® CD-40S	X	X
Texel DM-5028 49,53	X	X
Toshiba TXM-3301E 53	X	X
Toshiba XM-3301B 53	X	X
Toshiba TXM-3401E	X	X
Toshiba XM-3401B	X	X
Toshiba XM-3501B	X	X
Toshiba XM-3601	X	X
Toshiba XM-3701	X	X
Toshiba XM-4101B	X	X
Toshiba XM-5301B	X	X
Toshiba XM-5401	X	X


Non-SCSI CD-ROM Drives

The following CD-ROM drives with non-SCSI interfaces have been tested on the x86 platform.  Please see SETUP.TXT on the Windows NT 4.0 CD-ROM for additional information on these drives and the adapters on which they are supported.

Non-SCSI CD-ROM Drive	Standard (CD) Audio	Multi-Media Audio	Selection in Setup	Interface
Acer 685A CD-ROM Drive	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Acer CD645A CD-ROM Drive	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Acer CD655A CD-ROM Drive	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Acer CD665A CD-ROM Drive	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Acer CD-767E CD-ROM Drive	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Acer CD-787E CD-ROM Drive	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Acer 685A CD-ROM Drive	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Aztech CDA 268-031SE ATAPI CD-ROM Drive	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Aztech Systems CDA468-02I ATAPI CD-ROM Drive	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Chinon® CDS-5251 57	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Chinon CDS-545i	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Creative Labs Sound Blaster™ CDROM 58			Panasonic CD-ROM	Panasonic LMEP0084B
Creative Labs Sound Blaster CDROM 58			Panasonic CD-ROM	Sound Blaster Pro™
Creative Labs Sound Blaster CDROM 58			Panasonic CD-ROM	Sound Blaster 16
Creative Labs Sound Blaster CDROM 58			Panasonic CD-ROM	Sound Blaster 16 MultiCD
Creative Labs CD420E ATAPI CD-ROM Drive	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Creative Labs CR-581M ATAPI CD-ROM Drive	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Creative Labs EU2750UA ATAPI CD-ROM Drive	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Creative Labs Blaster CD 6X CD620E	X		IDE CD-ROM (ATAPI 1.2)	IDE Interface
Delta Electronics ODC 6101 ATAPI CD-ROM Drive	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Funai Electric E2650 ATAPI CD-ROM Drive	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Hitachi® CD-ROM CDR-7830 ATAPI CD-ROM Drive	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
LG Electronics GCD-R542B ATAPI CD-ROM Drive	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Lion Optics XC-200AI	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Lion Optics XC-200EI	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Mitsumi CRMC-FX001D			Mitsumi CD-ROM	Mitsumi 74-1881A
Mitsumi CRMC-FX001D			Mitsumi CD-ROM	Sound Blaster 16 MultiCD
Mitsumi CRMC-FX001D1			Mitsumi CD-ROM	Mitsumi 74-1881A
Mitsumi CRMC-FX001D1			Mitsumi CD-ROM	Sound Blaster 16 MultiCD
Mitsumi CRMC-FX001D2			Mitsumi CD-ROM	Mitsumi 74-1881A
Mitsumi CRMC-FX001D2			Mitsumi CD-ROM	Sound Blaster 16 MultiCD
Mitsumi CRMC-FX001DE 59	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Mitsumi CRMC-FXN01DE 59	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Mitsumi CRMC-FX300 60	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Mitsumi CRMC-FX400 61	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Mitsumi CRMC-FX400B	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Mitsumi CRMC-FX400D	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Mitsumi CRMC-FX810T	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
NEC CDR-1300A	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
NEC CDR-271 CD-ROM Drive	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
NEC CDR-272	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
NEC CDR-273 CD-ROM Drive	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
NEC MultiSpin 2Vi (CDR-250)	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
NEC CDR-1400	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
NEC CDR-1450	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Panasonic CR-521			Panasonic CD-ROM	Panasonic LMEP0084B
Panasonic CR-521			Panasonic CD-ROM	Sound Blaster Pro
Panasonic CR-521			Panasonic CD-ROM	Sound Blaster 16
Panasonic CR-521			Panasonic CD-ROM	Sound Blaster 16 MultiCD
Panasonic CR-523			Panasonic CD-ROM	Panasonic LMEP0084B
Panasonic CR-523			Panasonic CD-ROM	Sound Blaster Pro
Panasonic CR-523			Panasonic CD-ROM	Sound Blaster 16
Panasonic CR-523			Panasonic CD-ROM	Sound Blaster 16 MultiCD
Panasonic CR-562			Panasonic CD-ROM	Panasonic LMEP0084B
Panasonic CR-562			Panasonic CD-ROM	Sound Blaster Pro
Panasonic CR-562			Panasonic CD-ROM	Sound Blaster 16
Panasonic CR-562			Panasonic CD-ROM	Sound Blaster 16 MultiCD
Panasonic CR-563			Panasonic CD-ROM	Panasonic LMEP0084B
Panasonic CR-563			Panasonic CD-ROM	Sound Blaster Pro
Panasonic CR-563			Panasonic CD-ROM	Sound Blaster 16
Panasonic CR-563			Panasonic CD-ROM	Sound Blaster 16 MultiCD
Panasonic KXL-D740 4X with KXLC002 PC Card	X	X	Panasonic KXLC002 PC Card 1	PCMCIA Interface
Panasonic CR-571-B	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Panasonic CR-574-P08	X		IDE CD-ROM (ATAPI 1.2)	IDE Interface
Panasonic CR-581J	X		IDE CD-ROM (ATAPI 1.2)	IDE Interface
Philips® L M S CM207	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Sanyo CRD-256P	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Sony CDU31A 51	X	X	Sony CD-ROM	Sony CDB-334
Sony CDU31A 51	X	X	Sony CD-ROM	Sound Blaster 16 MultiCD
Sony CDU33A	X	X	Sony CD-ROM	Sony CDB-334
Sony CDU33A	X	X	Sony CD-ROM	Sound Blaster 16 MultiCD
Sony CDU55E	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Sony CDU76E 62	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Sony CDU77E	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Teac CD-40E	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Teac CD-50E	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Teac CD-55E	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Teac CD-58E	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Torisan (Sanyo) CDR-C3G Changer	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Torisan (Sanyo) CDR-S1G	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Torisan (Sanyo) CDR-S16	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Torisan (Sanyo) CDR-C36 Changer	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Toshiba XM-5302B	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Toshiba XM-5402B	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Toshiba XM-5522B	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface
Toshiba XM-5602B	X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface


SCSI Tape Drives

The following SCSI tape drives have been tested with the following adapters using the Windows NT Backup program: AHA-1542CP, AHA-2742, and AHA-2940; NCR 8100S and 8250S, and are supported on x86, MIPS, Alpha, and PowerPC platforms except as noted.  Drives are listed under their appropriate Tape entry in the Control Panel Tape Devices applet.

4 Millimeter DAT

    Archive® 4326NP

    Archive 4326RP

    Archive 4356XP

    ArchiveST 2000DAT (EAX4350) 63

    ArchiveST 4000DAT (4324NP)

    ArchiveST 4000DAT (4352XP)

    COMPAQ 4/16 Gigabyte TurboDAT

    COMPAQ TurboDAT Autoloader 53,56,64

    Conner 4326NP

    Conner 4326RP

    Conner 4356XP

    Conner CTD2004H-S

    Conner CTD2004R-S

    Conner CTD4004H-S

    Conner CTD4004R-S

    Conner CTD8000E-S

    Conner CTD8000H-S

    Conner CTD8000R-S

    Digital Equipment TLZ06 65

    Digital Equipment TLZ07

    Digital Equipment TLZ07-DA 64

    Digital Equipment TLZ09

    Exabyte 4200 53

    Exabyte 4200c 53,66

    Hewlett-Packard 35470a

    Hewlett-Packard 35480a

    Hewlett-Packard C1503a

    Hewlett-Packard C1504a

    Hewlett-Packard C1533-00100

    Hewlett-Packard C1533a

    Hewlett-Packard C1534-00100

    Hewlett-Packard C1536-00100

    Hewlett-Packard C1534a

    Hewlett-Packard C1536a

    Hewlett-Packard C2224c

    Hewlett-Packard C2225b

    Hewlett-Packard JetStore 2000

    Hewlett-Packard JetStore 2000e

    Hewlett-Packard JetStore 2000i

    Hewlett-Packard JetStore 5000

    Hewlett-Packard JetStore 5000e

    Hewlett-Packard JetStore 5000i

    Hewlett-Packard JetStore 6000e

    Hewlett-Packard JetStore 6000i

    Hewlett-Packard SureStore 2000e

    Hewlett-Packard SureStore 2000i

    Hewlett-Packard SureStore 5000e

    Hewlett-Packard SureStore 5000eU

    Hewlett-Packard SureStore 5000i

    Hewlett-Packard SureStore 6000e

    Hewlett-Packard SureStore 6000eU

    Hewlett-Packard SureStore 6000i

    IBM 2.0Gb 4mm Tape Drive Option (part number 55F9428)

    IBM 2.0Gb 4mm DAT 3440 001

    IBM 4/10GB 4mm DAT Drive 68

    Seagate 4320RT

    Seagate 4324RP

    Seagate 4326NP

    Seagate 4326RP

    Seagate 4356XP

    Seagate CTD2004H-S

    Seagate CTD2004R-S

    Seagate CTD4004H-S

    Seagate CTD4004R-S

    Seagate CTD8000E-S

    Seagate CTD8000H-S

    Seagate CTD8000R-S

    Sony SDT 2000 56,69,70,71

    Sony SDT 4000 53,69,70,71,72

    Sony SDT 5000 69,70,71,72

    Sony SDT 5200 69,70,71

    Sony SDT 7000

    Tecmar® DATaVault 2000

    WangDAT Model 1300XL

    WangDAT Model 3100

    WangDAT Model 3400DX

Archive 2150S, 2525S, 2750

    Archive 2150/2250 73

    Archive 2525

    Archive 2750

    Archive 2800 56

    Maynard 525Q

    Maynard 1350Q

Digital TZ86, TZ87, DLT2XXX, DLT3XXX, DLT4XXX

    Digital Equipment DLT2000 74

    Digital Equipment TZ86 75

    Digital Equipment TZ87 53,74

    Digital Equipment TZ-88

    Digital Equipment TZ-88N

    Quantum DLT 4000

Exabyte 8200 Series (SCSI-1)

    Exabyte EXB-8200 53,76

    Exabyte EXB-8200ST 53,76

    IBM 3532-023 8mm Tape Drive 76

Exabyte 8500 Series (SCSI-2)

    Bull EXB-8505XL

    Exabyte EXB-8205 69,76

    Exabyte EXB-8205ST 69,76

    Exabyte EXB-8500

    Exabyte EXB-8500ST

    Exabyte EXB-8500c

    Exabyte EXB-8500cST

    Exabyte EXB-8505

    Exabyte EXB-8505ST

    Exabyte EXB-8505XL

    IBM 5.0Gb 8mm Tape Drive Option

    IBM 3445 Model 001 5.0Gb 8mm Tape Drive

Hewlett-Packard Colorado T4000

    Hewlett-Packard Colorado T4000s 77

SCSI Mini Cartridge

    Conner CTMS 3200

    Conner CTT8000R-S

    Exabyte 2501

    Seagate CTMS 3200

    Seagate CTT8000R-S

    Tandberg TDC 3520

    Tandberg TDC 3720

Tandberg 3660, 3820, 4120, 4220, 4222

    Bull TDC4222

    Digital Equipment TZK10

    Digital Equipment TZK11

    Digital Equipment TZK12

    IBM 3450 1.2Gb Tape Drive Model 001

    Tandberg 3660

    Tandberg 3820

    Tandberg 4120

    Tandberg 4220

    Tandberg 4222

    Tecmar QICVault 4000ex

Wangtek 525, 250 drives

    Tecmar QICVault 720ex

    Tecmar QICVault 2400ex

    Tecmar QT-525ES 78

    Wangtek 5150ES

    Wangtek 5525ES 67

    Wangtek 51000ES


Other Tape Drives

The following tape drives have been tested using the Windows NT Backup program on the x86 platform.

Floppy (QIC-117) 80/3010/3020/Travan tape drives 79,80,81,82

    Archive 51250Q (SuperHornet)

    Colorado Jumbo 120

    Colorado Jumbo 250

    Conner CTM420

    Conner CTM700

    Conner CTM1360 83

    Conner CTT800

    Conner CTT3200 83

    Conner TapeStor 420

    Conner TapeStor 800

    Conner TapeStor 700/850

    Conner TapeStor 1360/1700 83

    Conner TapeStor 3200 83

    HP® Colorado Jumbo 350

    HP Colorado Jumbo 700

    HP Colorado Jumbo 1400 83

    HP Colorado T1000

    Iomega Tape 250

    Iomega Ditto Easy 3200

    Iomega Ditto Easy 800

    Seagate CTM420

    Seagate CTM700

    Seagate CTM1360 83

    Seagate CTT800

    Seagate CTT3200 83

    Seagate TapeStor 420

    Seagate TapeStor 800

    Seagate TapeStor 700/850

    Seagate TapeStor 1360/1700 83

    Seagate TapeStor 3200 83

    WangTek 3080

Floppy (QIC-117) 80/3010/3020/Travan tape Controllers

    HP Colorado FC-10 (1Mbps) 84

    HP Colorado FC-20 (2Mbps) 84

    Conner 2Mbps Controller 85

    Seagate 2Mbps Controller 85

IDE (QIC-157) Tape Drive

    Conner CTM4000

    Conner CTT8000-A

    Seagate CTM4000

    Seagate CTT8000-A


Removable Media

The following removable media has been tested.  SCSI Removable media (cartridge) drives have been tested with the following SCSI adapters: AHA-1542CP, AHA-2742, and AHA-2940; NCR 8100S and 8250S, and are supported on x86, MIPS, Alpha, and PowerPC platforms except as noted.

SCSI Removable Media

    DEC® RWZ53

    FUJITSU 250

    FUJITSU M2513 86

    Hewlett-Packard Series 6300 650/C

    Hewlett-Packard SureStore 2600 FX

    IBM 0632 Model C2*

    IBM 3 1/2-Inch 127mb Rewritable Optical Disk Drive MTA-3127 (part# 62G2908)

    Iomega Bernoulli Transportable 90 Pro

    Iomega Bernoulli Transportable 150

    Iomega Jaz

    Iomega Zip Drive 100

    Panasonic LF-1000A

    Panasonic LF-1004H

    Smart and Friendly PD QUAD-WIN

    Sony SMO-F331

    Sony SMO-F521

    Sony SMO-F531

    Sony SMO-F541-40

    Sony SMO-S511A-11

    Sony RMO-S350

    Syquest® 200

    Syquest 270E

IDE Removable Media 87

    Avatar 170

    COMPAQ LS-120 88

    Iomega ZIP 100 IDE Insider

    Syquest SQ3270A


SCSI Scanners

The following SCSI scanners have been tested with the following adapters: AHA-1542CP, AHA-2742, and AHA-2940; NCR 8100S and 8250S, and are supported on x86, Alpha, and PowerPC platforms except as noted.

HP ScanJet® IIc 89

HP ScanJet IIcx 89

HP ScanJet IIp 89

HP ScanJet 3c 89

HP ScanJet 3p 89

HP ScanJet 4c 89

HP ScanJet 4p 89,90


Hard Drives

The following hard drives have been tested.  SCSI hard drives have been tested with the following SCSI adapters: AHA-1542CP, AHA-2742, AHA-2940, and NCR 8100S, and are supported on x86, MIPS, Alpha, and PowerPC  platforms except as noted.

SCSI Hard Drives

    Box Hill ModBox 5000 10DS

    Box Hill ModBox 5000 44DS

    Quantum Capella VP31110

    Quantum Fireball II 640S

    Quantum Trailblazer® 420S

    Quantum Trailblazer 840S

    Quantum XP31070

    Quantum XP32150

    Quantum XP34300

    Seagate ST15150N Baracuda 4LP

    Seagate ST32430N

    Seagate ST32550N Baracuda 2LP

    Seagate ST51080N Decathlon

IDE Hard Drives

    Conner CFA1275A

    Conner CFS1621A

    Fujitsu M1606TA

    Fujitsu M1612TA

    Fujitsu M1614TA

    Hewlett-Packard SureStore Hard Disk 2000A, C5273A

    Hewlett-Packard SureStore Hard Disk 2000V, C5436A

    IBM TravelStar 3LP (DMCA-21080)

    IBM TravelStar 3LP (DMCA-21440)

    IBM UltraStar ES (DORS-32160)

    Maxtor 7245AT

    Maxtor 71626AP

    Maxtor 71670AP

    Maxtor 72004AP

    Maxtor 7425AV

    Maxtor 7540AV

    Maxtor 7850AV

    Quantum Fireball 540A

    Quantum Fireball 640A

    Quantum Bigfoot 1280A

    Seagate ST31270A Medalist 1270

    Seagate ST3630A

    Seagate ST31220A

    Seagate ST3660A

    Seagate ST51270A

    Seagate ST51080A

    Western Digital AC2850F

    Western Digital AC31000F

PCMCIA Hard Drives

    IBM 105 PCMCIA Hard Disk (Model 8105PA)

    Integral Peripherals Viper 105

    Integral Peripherals Viper 260

    Kingston DataPak 170

    Kingston DataPak 260

    Kingston DataPak 340

    Maxtor MobileMax 105

    Maxtor MobileMax 131

    MiniStore 131 (Model MP260P3)

    Noteworthy 260 PC Card Hard Disk Drive

    Simple Technology DATACARD 260MB


Storage Cabinets

The following peripheral storage cabinets have been tested, and are supported on x86, MIPS, Alpha, and PowerPC platforms.

Hewlett-Packard Storage System with HP EISA HBA

Hewlett-Packard Storage System with HP MCA HBA

IBM 3510 SCSI Storage Enclosure

Professional Concepts SCSI Storage Cabinet

Professional Concepts SCSI Storage Cabinet Plus

Digital Equipment StorageWorks BA-350 Deskside Expansion Unit

Digital Equipment StorageWorks BA-353 "Pizza Box" Desktop Expansion Unit


RAID Systems

The following RAID storage systems have been tested with the following SCSI adapters: AHA-1542CP, AHA-2742, and AHA-2940; NCR 8100S and 8250S, and are supported on x86, MIPS, Alpha, and PowerPC platforms except as noted.

COMPAQ Ragingsrv Raid System 92

DEC SWXRZ-Zx Raid 310 91

DEC SWXRA-Yx Raid 410 91

DEC SW800 Raid System 93

Hitachi 5700 Disk Sub-system 94

Storage Solutions, Inc. STACa-ray

Micropolis Radion LT


Video Capture Adapters

The following video capture devices have been tested on the x86, MIPS, and Alpha, and PowerPC platforms except as noted.

Creative Labs VideoSpigot for Windows 1

Video Display Support

The following display adapters have been tested on x86 architecture systems. Most common scan frequencies are supported.  Your video monitor should support the same resolutions and scan frequencies as your display adapter.  Please refer to Windows NT 4.0 Release Notes for more information on display support.

Video Display Adapter	Chipset	640x480	800x600	1024x768	1280x1024	Other
#9 VISUAL TECHNOLOGY 9FX MOTION 331 PCI	S3-765	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
#9 VISUAL TECHNOLOGY 9FX MOTION 531 PCI	S3-868	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
#9 VISUAL TECHNOLOGY 9FX MOTION 771 PCI	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k, 16.7M	D, J, K
#9 VISUAL TECHNOLOGY 9FX REALITY 332 PCI 1	S3-325	256, 32k, 16.7m	256, 32k, 16.7m	256, 32k	256	D, E
#9 VISUAL TECHNOLOGY 9FX VISION 330 PCI	S3-764	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
#9 VISUAL TECHNOLOGY GXE 64 PCI	S3-864	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
#9 VISUAL TECHNOLOGY GXE 64 PRO PCI	S3-964	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k	D, E, F, J, K
#9 VISUAL TECHNOLOGY GXE ISA 95	S3-928	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256
#9 VISUAL TECHNOLOGY GXE VLB 95	S3-928	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256
#9 VISUAL TECHNOLOGY GXE PCI 95	S3-928	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256
#9 VISUAL TECHNOLOGY IMAGINE 128 1	I128	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k,	D, E, F, J, K
#9 VISUAL TECHNOLOGY IMAGINE 128 PRO 1	I128	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k  TRUE	D, E, F, J, K, R
#9 VISUAL TECHNOLOGY IMAGINE 128 II 1	I128v2	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k,	D, E, F, J, K
ACTIX GRAPHICS ENGINE	S3-911	256	256	256
ACTIX GRAPHICS ENGINE 32 PLUS	S3-801	256, 65k	256, 65k	256
ACTIX GRAPHICS ENGINE 32 VLB	S3-805	256, 65k	256, 65k	256, 65k	256
ACTIX PROSTAR VLB	GD5426	256, 65k	256	256
ATI 8514/ULTRA	MACH8	256	256	256
ATI GRAPHICS PRO TURBO ISA	MACH64	256, 65k,  TRUE	256, 65k,  TRUE	256, 65k, TRUE	256, 65k,	D, E, N
ATI GRAPHICS PRO TURBO PCI	MACH64	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m	D, E, F, N
ATI GRAPHICS PRO TURBO VLB	MACH64	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m	D, E, F, N
ATI GRAPHICS PRO TURBO 1600 PCI	MACH64	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m	D, E, F, J, K, N
ATI GRAPHICS ULTRA	MACH8	256	256	256
ATI GRAPHICS ULTRA+ 96	MACH32	256, 65k,	256, 65k,	256, 65k	256
ATI GRAPHICS ULTRA PRO ISA 96	MACH32	256, 65k,	256, 65k,	256, 65k	256
ATI GRAPHICS ULTRA PRO EISA 96	MACH32	256, 65k, 16.7m	256, 65k, 16.7m	256, 65k	256
ATI GRAPHICS ULTRA PRO MCA 96	MACH32	256, 65k, 16.7m	256, 65k, 16.7m	256, 65k	256
ATI GRAPHICS ULTRA PRO PCI 97	MACH32	256, 65k, 16.7m	256, 65k, 16.7m	256, 65k	256
ATI GRAPHICS ULTRA PRO VLB 96	MACH32	256, 65k, 16.7m	256, 65k, 16.7m	256, 65k	256
ATI GRAPHICS VANTAGE	MACH8	256	256	256
ATI GRAPHICS WONDER ISA 96	MACH32	256, 65k,	256, 65k,	256, 65k	256
ATI GRAPHICS WONDER VLB 96	MACH32	256, 65k, 16.7m	256, 65k	256
ATI GRAPHICS XPRESSION ISA	MACH64	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
ATI GRAPHICS XPRESSION PCI	MACH64	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k	256	D, E
ATI GRAPHICS XPRESSION VLB	MACH64	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k	256	D, E
ATI WINBOOST ISA	MACH64	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
ATI WINBOOST PCI	MACH64	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k	256	D, E
ATI WINBOOST VLB	MACH64	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k	256	D, E
ATI VIDEO XPRESSION PCI	MACH64VT	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k	256	D, E
ATI WINTURBO PCI	MACH64	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k,	256	D, E
ATI WINTURBO VLB	MACH64	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k,	256	D, E
ATI WINTURBO ISA	MACH64	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
ATI XPRESSION 3D PCI	MACH64GT	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k	256	D, E
CARDEX GW143 VLB	GD5426	256, 65k	256	256	16
CARDEX GW143A VLB	GD5426	256, 65k	256	256	16
COMPAQ AVGA 1,98	AVGA	256
COMPAQ QVISION 1024/I	QV	256	256	256
COMPAQ QVISION 1024/E	QV	256	256	256
COMPAQ QVISION 1024/I (ENHANCED)	QV	256	256	256
COMPAQ QVISION 1024/E (ENHANCED)	QV	256	256	256
COMPAQ QVISION 1280/I	QV	256	256	256	256
COMPAQ QVISION 1280/E	QV	256	256	256	256
COMPAQ QVISION 1280/P 99	QV	256	256	256	256
COMPAQ QVISION 2000 PCI	ATLAS	256, 32k, 16.7m	256, 32k, 16.7m	256, 32k	256	G, H
COMPAQ QVISION 2000+ PCI	ATHENA	256, 32k, 16.7m	256, 32k, 16.7m	256, 32k	256	G, H
DELL DGX	DGX	256, 65k	256, 65k	256, 65k	256
DIAMOND MULTIMEDIA SPEEDSTAR	ET4000	256, 65k	256	256
DIAMOND MULTIMEDIA SPEEDSTAR 24X	WD90C31	256, 65k	256	256
DIAMOND MULTIMEDIA SPEEDSTAR 64 ISA	GD5434	256, 65k, TRUE	256, 65k	256, 65k	256
DIAMOND MULTIMEDIA SPEEDSTAR 64 PCI	GD5434	256, 65k, TRUE	256, 65k	256, 65k	256
DIAMOND MULTIMEDIA SPEEDSTAR PRO	GD5426	256, 65k	256	256
DIAMOND MULTIMEDIA SPEEDSTAR PRO VLB	GD5428	256, 65k	256	256
DIAMOND MULTIMEDIA SPEEDSTAR PRO 1100	GD5426	256, 65k	256	256
DIAMOND MULTIMEDIA SPEEDSTAR PRO 1100 VLB	GD5428	256, 65k	256	256
DIAMOND MULTIMEDIA SPEEDSTAR PRO SE PCI	GD5430	256, 65k	256, 65k	256, 65k	256
DIAMOND MULTIMEDIA SPEEDSTAR PRO SE VLB	GD5430	256, 65k	256, 65k	256, 65k	256
DIAMOND MULTIMEDIA SPEEDSTAR64 GRAPHICS 2120	GD5434	256, 65k, TRUE	256, 65k	256, 65k	256
DIAMOND MULTIMEDIA SPEEDSTAR64 GRAPHICS 2120XL	GD5434	256, 65k, TRUE	256, 65k	256, 65k	256
DIAMOND MULTIMEDIA SPEEDSTAR64 GRAPHICS 2200	GD5434	256, 65k, TRUE	256, 65k	256, 65k	256
DIAMOND MULTIMEDIA SPEEDSTAR64 GRAPHICS 2200XL	GD5434	256, 65k, TRUE	256, 65k	256, 65k	256
DIAMOND MULTIMEDIA STEALTH 24	S3-801	256, 65k	256, 65k	256
DIAMOND MULTIMEDIA STEALTH 24 VLB	S3-805	256, 65k	256, 65k	256
DIAMOND MULTIMEDIA STEALTH 32 PCI	ET4000W32p	256, 65k, 16.7m	256, 65k, 16.7m	256, 65k	256
DIAMOND MULTIMEDIA STEALTH 32 VLB	ET4000W32p	256, 65k, 16.7m	256, 65k, 16.7m	256, 65k	256
DIAMOND MULTIMEDIA STEALTH 64 DRAM PCI	S3-764	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 DRAM PCI	S3-864	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 DRAM VLB	S3-764	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 DRAM VLB	S3-864	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 VRAM PCI	S3-964	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k	D, E, F, J, K
DIAMOND MULTIMEDIA STEALTH 64 VRAM VLB	S3-964	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k	D, E, F, J, K
DIAMOND MULTIMEDIA STEALTH PRO	S3-928	256, 65k	256, 65k	256, 65k	256
DIAMOND MULTIMEDIA STEALTH PRO VLB	S3-928	256, 65k	256, 65k	256, 65k	256
DIAMOND MULTIMEDIA STEALTH SE VLB	S3-732	256, 65k, TRUE	256, 65k	256, 65k		D, E
DIAMOND MULTIMEDIA STEALTH SE PCI	S3-732	256, 65k, TRUE	256, 65k	256, 65k		D, E
DIAMOND MULTIMEDIA STEALTH 64 VIDEO DRAM PCI	S3-868	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 VIDEO DRAM VLB	S3-868	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 VIDEO VRAM PCI	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k, 16.7M	D, E, F, J, K
DIAMOND MULTIMEDIA STEALTH 64 VIDEO VRAM VLB	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k	D, E, F, J, K
DIAMOND MULTIMEDIA STEALTH VRAM	S3-911a	256	256	256
DIAMOND MULTIMEDIA STEALTH 3D 2000 1	S3-325	256, 32k, 16.7m	256, 32k, 16.7m	256, 32k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 GRAPHICS 2120XL PCI	S3-864	256, 65k	256, 65k	256
DIAMOND MULTIMEDIA STEALTH 64 GRAPHICS 2120XL VLB	S3-864	256, 65k	256, 65k	256
DIAMOND MULTIMEDIA STEALTH 64 GRAPHICS 2200XL PCI	S3-864	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 GRAPHICS 2200XL VLB	S3-864	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 VIDEO 2120XL PCI	S3-764	256, 65k	256, 65k	256
DIAMOND MULTIMEDIA STEALTH 64 VIDEO 2120XL VLB	S3-764	256, 65k	256, 65k	256
DIAMOND MULTIMEDIA STEALTH 64 VIDEO 2121XL PCI	S3-765	256, 65k	256, 65k	256
DIAMOND MULTIMEDIA STEALTH 64 VIDEO 2121XLe PCI	S3-765	256, 65k	256, 65k	256
DIAMOND MULTIMEDIA STEALTH 64 VIDEO 2200XL PCI	S3-764	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 VIDEO 2200XL VLB	S3-764	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 VIDEO 2201XL PCI	S3-765	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 VIDEO 2201XLe PCI	S3-765	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 VIDEO 2201TV PCI	S3-765	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 VIDEO 3200XL PCI	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 VIDEO 3200XL VLB	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 VIDEO 3240XL PCI	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 VIDEO 3240XL VLB	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 VIDEO 3400XL PCI	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k, 16.7M	D, E, F, J, K
DIAMOND MULTIMEDIA STEALTH 64 VIDEO 3400XL VLB	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k, 16.7M	D, E, F, J, K
DIAMOND MULTIMEDIA VIPER PCI 100	P9000	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	J
DIAMOND MULTIMEDIA VIPER VLB 101	P9000	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	J
DIAMOND MULTIMEDIA VIPER PRO PCI	P9100	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m	J, K
DIAMOND MULTIMEDIA VIPER PRO VLB	P9100	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m	J, K
DIAMOND MULTIMEDIA VIPER PRO VIDEO PCI	P9100	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m	J, K
DIAMOND MULTIMEDIA VIPER PRO VIDEO VLB	P9100	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m	J, K
DIAMOND MULTIMEDIA VIPER SE PCI	P9100	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m	J, K
DIAMOND MULTIMEDIA VIPER SE VLB	P9100	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m	J, K
DIGITAL EQUIPMENT CORP. PCXAG-AL PCI	S3-864	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256, 65k	D
ELSA WINNER 1000	S3-928	256, 65k	256, 65k	256
GENOA 8500VL	GD5426	256, 65k	256	256
GENOA PHANTOM 32I 8900 VLB	ET4000W32i	256, 65k, 16.7m	256, 65k	256, 65k	256
GENOA PHANTOM 32I 8900 PCI	ET4000W32p	256, 65k, 16.7m	256, 65k, 16.7m	256, 65k	256
HERCULES® DYNAMITE 128 / VIDEO PCI	ET6000	256, 65k, 16.7m	256, 65k, 16.7m	256, 65k	256
HERCULES DYNAMITE POWER VLB	ET4000W32p	256, 65k, 16.7m	256, 65k, 16.7m	256, 65k	256
HERCULES DYNAMITE POWER PCI	ET4000W32p	256, 65k, 16.7m	256, 65k, 16.7m	256, 65k	256
HERCULES DYNAMITE PRO PCI	ET4000W32i	256, 65k, 16.7m	256, 65k, 16.7m	256, 65k	256
HERCULES GRAPHITE TERMINATOR 64 PCI	S3-964	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k,	D, E, F
HERCULES GRAPHITE TERMINATOR 64 VLB	S3-964	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k,	D, E, F
HERCULES TERMINATOR 32/DRAM PCI	S3-732	256, 65k, TRUE	256, 65k	256, 65k		D, E
HERCULES TERMINATOR 64 VIDEO PCI	S3-765	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
HERCULES TERMINATOR 64/DRAM PCI	S3-764	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
HERCULES TERMINATOR PROFESSIONAL PCI	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k,	D, E, F
IBM XGA	XGA®	256		256		A, B
IBM XGA-2	XGA	256	256	256		A, B, C
LEADTEK VideoPlus T230	ET4000W32p	256, 65k, 16.7m	256, 65k, 16.7m	256, 65k	256
LEADTEK WINFAST S240V+	S3-765	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
LEADTEK WINFAST S240	S3-764	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
LEADTEK WINFAST S250	S3-868	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
LEADTEK WINFAST S430	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
LEADTEK WINFAST S500	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k,	D, E, F, J, K
LEADTEK WINFAST S510	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k,	D, E, F, J, K
MATROX IMPRESSION	ATHENA	256, 32k, 16.7m	256, 32k, 16.7m	256, 32k	256	G, H
MATROX IMPRESSION PCI	ATHENA	256, 32k, 16.7m	256, 32k, 16.7m	256, 32k	256	G, H
MATROX IMPRESSION VLB	ATHENA	256, 32k, 16.7m	256, 32k, 16.7m	256, 32k	256	G, H
MATROX IMPRESSION LITE PCI	ATLAS	256, 32k, 16.7m	256, 32k, 16.7m	256, 32k	256	G, H
MATROX IMPRESSION PLUS	ATHENA	256, 32k, 16.7m	256, 32k, 16.7m	256, 32k, 16.7M	256, 32k	G, H, I, J, K
MATROX IMPRESSION PLUS 220HZ	ATHENA	256, 32k, 16.7m	256, 32k, 16.7m	256, 32k, 16.7M	256, 32k	G, H, I, J, K
MATROX IMPRESSION PLUS 220HZ PCI	ATHENA	256, 32k, 16.7m	256, 32k, 16.7m	256, 32k, 16.7M	256, 32k	G, H, I, J, K
MATROX IMPRESSION PLUS PCI	ATHENA	256, 32k, 16.7m	256, 32k, 16.7m	256, 32k, 16.7M	256, 32k	G, H, I, J, K
MATROX IMPRESSION PLUS VLB	ATHENA	256, 32k, 16.7m	256, 32k, 16.7m	256, 32k, 16.7M	256, 32k	G, H, I, J, K
MATROX MILLENIUM PCI	STORM	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	E, F, G, H, I, J, K, R
MATROX MILLENIUM 220HZ PCI	STORM	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	E, F, G, H, I, J, K, R
MATROX ULTIMA PCI	ATLAS	256, 32k, 16.7m	256, 32k, 16.7m	256, 32k	256	G, H
MATROX ULTIMA VLB	ATLAS	256, 32k, 16.7m	256, 32k, 16.7m	256, 32k	256	G, H
MATROX ULTIMA + PCI	ATLAS	256, 32k, 16.7m	256, 32k, 16.7m	256, 32k, 16.7m	256, 32k	G, H, I, J, K
MATROX ULTIMA + VLB	ATLAS	256, 32k, 16.7m	256, 32k, 16.7m	256, 32k, 16.7m	256, 32k	G, H, I, J, K
MEDIAVISION THUNDER & LIGHTNING	GD5422	256, 65k	256	256
METHEUS PREMIER 928	S3-928	256, 65k	256, 65k	256, 65k	256, 65k
MICRONICS VL-BUS	S3-805	256, 65k	256, 65k	256
miroCRYSTAL 20SD	S3-864	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
NCR 32BLT VLB	77C32BLT	256	256	256
NCR 77C22 102	77C22	256	256
NCR 77C22E 103	77C22e	256	256	256
ORCHID FAHRENHEIT 1280	S3-924	256	256	256
ORCHID FAHRENHEIT 1280 PLUS ISA	S3-801	256, 65k	256, 65k	256
ORCHID FAHRENHEIT 1280 PLUS VLB	S3-805	256, 65k	256, 65k	256, 65k	256
ORCHID FAHRENHEIT VA	S3-801	256, 65k	256, 65k	256
ORCHID FAHRENHEIT VA/VLB	S3-805	256, 65k	256, 65k	256, 65k	256
ORCHID KELVIN 64 ISA	GD5434	256, 65k, TRUE	256, 65k	256, 65k	256
ORCHID KELVIN 64 VLB	GD5434	256, 65k, TRUE	256, 65k	256, 65k	256
ORCHID KELVIN EZ VLB	GD5430	256, 65k	256, 65k	256, 65k	256
ORCHID PRODESIGNER 2	ET4000	256	256	256
ORCHID PRODESIGNER IIS EISA	ET4000	256, 65k	256	256
ORCHID PRODESIGNER IIS ISA	ET4000	256, 65k	256	256
PARADISE WINDOWS GRAPHICS ACCELERATOR VLB	WD90C33	256, 65k	256	256
PARADISE WINDOWS GRAPHICS ACCELERATOR	WD90C31	256, 65k	256	256
PROLINK IMAGE SHARPENER	GD5446	256, 65k, TRUE	256, 65k	256, 65k	256
SIX GRAPH WIZARD 9000VL	P9000	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	J
STB SYSTEMS HORIZON+ 1.1	GD5430	256, 65k	256, 65k	256, 65k	256
STB SYSTEMS HORIZON VIDEO	GD5440	256, 65k	256, 65k	256, 65k	256
STB SYSTEMS LIGHTSPEED PCI	ET4000W32p	256, 65k, 16.7m	256, 65k, 16.7m	256, 65k	256
STB SYSTEMS LIGHTSPEED VLB	ET4000W32p	256, 65k, 16.7m	256, 65k, 16.7m	256, 65k	256
STB SYSTEMS LIGHTSPEED 128 PCI	ET6000	256, 65k, 16.7m	256, 65k, 16.7m	256, 65k	256
STB SYSTEMS NITRO PCI	GD5434	256, 65k, TRUE	256, 65k	256, 65k	256
STB SYSTEMS POWERGRAPH 64 PCI	S3-764	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
STB SYSTEMS POWERGRAPH 64 VIDEO PCI	S3-765	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
STB SYSTEMS POWERGRAPH 64 3D PCI 1	S3-325	256, 32k, 16.7m	256, 32k, 16.7m	256, 32k	256	D, E
STB SYSTEMS VELOCITY 64	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k, 16.7M	D, E, F, J, K
STB SYSTEMS VELOCITY 64 VLB	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k, 16.7M	D, E, F, J, K
TRIDENT 8900C	T8900	256	256	256
TRIDENT 9000	T9000	256
TRIDENT 9320 1	T9320	256, 65k	256, 65k	256
TRIDENT 9440 1	T9440	256, 65k, 16.7M	256, 65k	256
TRIDENT 9680 1	T9680	256, 65k, 16.7M, TRUE	256, 65k, 16.7M, TRUE	256, 65k	256	J
VIDEO LOGIC GRAPHIXSTAR 400	S3-765	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
VIDEO LOGIC GRAPHIXSTAR 600	ET6000	256, 65k, 16.7m	256, 65k, 16.7m	256, 65k	256
VIDEO LOGIC GRAPHIXSTAR 700	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k, 16.7M	D, E, F, J, K
VIDEO SEVEN™ VRAM	VIDEO7	256
VIDEO SEVEN VRAM II	VIDEO7	256	256	256
VIDEO SEVEN VRAM II ERGO	VIDEO7	256	256	256

The following display adapters have been tested on Digital Alpha architecture systems. Most common scan frequencies are supported.  Your video monitor should support the same resolutions and scan frequencies as your display adapter. Please refer to Windows NT 4.0 Release Notes for more information on display support. In order for some video cards to work in your computer, a firmware upgrade might be necessary. Please contact your specific vendor to find out which cards will work for your Alpha computer.

Video Display Adapter	Chipset	640x480	800x600	1024x768	1280x1024	Other
#9 VISUAL TECHNOLOGY 9FXMOTION 331 PCI	S3-765	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D
#9 VISUAL TECHNOLOGY 9FXMOTION 531 PCI	S3-868	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D
#9 VISUAL TECHNOLOGY 9FXMOTION 771 PCI	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k	D, E, J, K
#9 VISUAL TECHNOLOGY 9FXVISION 330 PCI	S3-764	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
#9 VISUAL TECHNOLOGY GXE 64 PCI	S3-864	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
#9 VISUAL TECHNOLOGY GXE 64 PRO PCI	S3-964	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k	D, E, F, J, K
#9 VISUAL TECHNOLOGY GXE ISA 95	S3-928	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256
#9 VISUAL TECHNOLOGY GXE PCI 95	S3-928	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256
ACTIX GRAPHICS ENGINE	S3-911	256	256	256
ACTIX GRAPHICS ENGINE 32 PLUS	S3-801	256, 65k	256, 65k	256
ATI GRAPHICS PRO TURBO ISA	MACH64	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k,	D, E
ATI GRAPHICS PRO TURBO PCI	MACH64	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k,	D, E
ATI GRAPHICS PRO TURBO 1600 PCI	MACH64	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k,	D, E, J, K
ATI GRAPHICS XPRESSION ISA	MACH64	256, 65k, TRUE	256, 65k, TRUE	256, 65k,	256	D, E
ATI GRAPHICS XPRESSION PCI	MACH64	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
ATI GRAPHICS WINBOOST ISA	MACH64	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
ATI GRAPHICS WINBOOST PCI	MACH64	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
ATI VIDEO XPRESSION PCI	MACH64VT	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
ATI WINTURBO PCI	MACH64	256, 65k, TRUE	256, 65k, TRUE	256, 65k,	256	D, E
ATI WINTURBO ISA	MACH64	256, 65k, TRUE	256, 65k, TRUE	256, 65k,	256	D, E
ATI XPRESSION 3D PCI	MACH64GT	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
COMPAQ QVISION 1024/E	QV	256	256	256
COMPAQ QVISION 1024/E (ENHANCED)	QV	256	256	256
COMPAQ QVISION 1280/E	QV	256	256	256	256
COMPAQ QVISION 2000 PCI	ATLAS	256, 32k, 16.7m	256, 32k, 16.7m	256, 32k	256	G, H
COMPAQ QVISION 2000+ PCI	ATHENA	256, 32k, 16.7m	256, 32k, 16.7m	256, 32k	256	G, H
DIAMOND MULTIMEDIA SPEEDSTAR 64 ISA 104	GD5434	256, 65k, TRUE	256, 65k	256, 65k	256
DIAMOND MULTIMEDIA SPEEDSTAR PRO SE PCI	GD5430	256, 65k	256, 65k	256, 65k	256
DIAMOND MULTIMEDIA SPEEDSTAR64 GRAPHICS 2120 104	GD5434	256, 65k, TRUE	256, 65k	256, 65k	256
DIAMOND MULTIMEDIA SPEEDSTAR64 GRAPHICS 2120XL 104	GD5434	256, 65k, TRUE	256, 65k	256, 65k	256
DIAMOND MULTIMEDIA SPEEDSTAR64 GRAPHICS 2200 104	GD5434	256, 65k, TRUE	256, 65k	256, 65k	256
DIAMOND MULTIMEDIA SPEEDSTAR64 GRAPHICS 2200XL 104	GD5434	256, 65k, TRUE	256, 65k	256, 65k	256
DIAMOND MULTIMEDIA STEALTH 24	S3-801	256, 65k	256, 65k	256
DIAMOND MULTIMEDIA STEALTH 64 DRAM PCI	S3-764	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 DRAM PCI	S3-864	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 VRAM PCI	S3-964	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k	D, E, F, J, K
DIAMOND MULTIMEDIA STEALTH PRO	S3-928	256, 65k	256, 65k	256, 65k	256
DIAMOND MULTIMEDIA STEALTH SE PCI	S3-732	256, 65k, TRUE	256, 65k	256, 65k		D
DIAMOND MULTIMEDIA STEALTH 64 VIDEO DRAM PCI	S3-868	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 VIDEO VRAM PCI	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k	D, E, F, J, K
DIAMOND MULTIMEDIA STEALTH VRAM	S3-924	256	256	256
DIAMOND MULTIMEDIA STEALTH 64 GRAPHICS 2120XL PCI	S3-864	256, 65k	256, 65k	256
DIAMOND MULTIMEDIA STEALTH 64 GRAPHICS 2200XL PCI	S3-864	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 VIDEO 2120XL PCI	S3-764	256, 65k	256, 65k	256
DIAMOND MULTIMEDIA STEALTH 64 VIDEO 2121XL PCI	S3-765	256, 65k	256, 65k	256
DIAMOND MULTIMEDIA STEALTH 64 VIDEO 2121XLe PCI	S3-765	256, 65k	256, 65k	256
DIAMOND MULTIMEDIA STEALTH 64 VIDEO 2201TV PCI	S3-765	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 VIDEO 2200XL PCI	S3-764	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 VIDEO 2201XL PCI	S3-765	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 VIDEO 2201XLe PCI	S3-765	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 VIDEO 3200XL PCI	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 VIDEO 3240XL PCI	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 VIDEO 3400XL PCI	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k,	D, E, F, J, K
DIGITAL EQUIPMENT CORP. ZLXp-E1 (8 plane option)	21030	256	256	256	256	L, P
DIGITAL EQUIPMENT CORP. ZLXp-E2 (24 plane option)	21030	TRUE	TRUE	TRUE	TRUE	M, Q
DIGITAL EQUIPMENT CORP. ZLXp-E3 (24 plane option w/24 bit Z-buffer)	21030	TRUE	TRUE	TRUE	TRUE	M, Q
DIGITAL EQUIPMENT CORP. PCXAG-AL PCI	S3-864	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D
ELSA WINNER 1000	S3-928	256, 65k	256, 65k	256
HERCULES GRAPHITE TERMINATOR 64 PCI	S3-964	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k,	D, J, K
HERCULES TERMINATOR 32/DRAM PCI	S3-732	256, 65k, TRUE	256, 65k	256, 65k		D
HERCULES TERMINATOR 64 VIDEO PCI	S3-765	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D
HERCULES TERMINATOR 64/DRAM PCI	S3-764	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D
HERCULES TERMINATOR PROFESSIONAL PCI	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k,	D, J, K
LEADTEK WINFAST S240V+	S3-765	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D
LEADTEK WINFAST S240	S3-764	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D
LEADTEK WINFAST S250	S3-868	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D
LEADTEK WINFAST S430 104	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, J
LEADTEK WINFAST S500	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k,	D, J, K
LEADTEK WINFAST S510	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k,	D, J, K
MATROX IMPRESSION PCI	ATHENA	256, 32k, 16.7m	256, 32k, 16.7m	256, 32k	256	G, H
MATROX IMPRESSION LITE PCI	ATLAS	256, 32k, 16.7m	256, 32k, 16.7m	256, 32k	256	G, H
MATROX IMPRESSION PLUS 220HZ PCI	ATHENA	256, 32k, 16.7m	256, 32k, 16.7m	256, 32k, 16.7M	256, 32k	G, H, I, J, K
MATROX IMPRESSION PLUS PCI	ATHENA	256, 32k, 16.7m	256, 32k, 16.7m	256, 32k, 16.7M	256, 32k	G, H, I, J, K
MATROX ULTIMA PCI	ATLAS	256, 32k, 16.7m	256, 32k, 16.7m	256, 32k	256	G, H
MATROX ULTIMA + PCI	ATLAS	256, 32k, 16.7m	256, 32k, 16.7m	256, 32k	256, 32k	G, H, J
MATROX MILLENIUM PCI	STORM	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	E, F, G, H, I, J, K, R
MATROX MILLENIUM 220HZ PCI	STORM	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	E, F, G, H, I, J, K, R
METHEUS PREMIER 928	S3-928	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k
ORCHID FAHRENHEIT 1280	S3-911	256	256	256
ORCHID FAHRENHEIT 1280 PLUS ISA	S3-801	256, 65k	256, 65k	256
ORCHID KELVIN 64 ISA	GD5434	256, 65k, TRUE	256, 65k	256, 65k	256
STB SYSTEMS HORIZON + 1.1	GD5430	256, 65k	256, 65k	256, 65k	256
STP SYSTEMS NITRO PCI	GD5430	256, 65k, TRUE	256, 65k	256, 65k	256
STB SYSTEMS POWERGRAPH 64 PCI	S3-764	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D
STB SYSTEMS POWERGRAPH 64 VIDEO PCI	S3-765	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D
STB SYSTEMS VELOCITY 64	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k,	D, J, K
STB SYSTEMS WIND/X	S3-924	256	256	256
VIDEO LOGIC GRAPHIXSTAR 400 105	S3-765	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D
VIDEO LOGIC GRAPHIXSTAR 700	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k,	D, J, K

The following video cards have been certified on Motorola PowerPC systems with firmware revision level 3.04. Contact your local Motorola Computer Group Sales office for more information on obtaining this firmware revision.  Most common scan frequencies are supported.  Your video monitor should support the same resolutions and scan frequencies as your display adapter. Please refer to Windows NT 4.0 Release Notes for more information on display support. In order for some video cards to work in your computer, a firmware upgrade might be necessary. For other types of PowerPC systems, please check with your system manufacturer for a list of supported video cards.

Video Display Adapter	Chipset	640x480	800x600	1024x768	1280x1024	Other
#9 VISUAL TECHNOLOGIES GXE 9FX MOTION 331	S3-765	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D
#9 VISUAL TECHNOLOGIES GXE 9FX MOTION 531	S3-868	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D
#9 VISUAL TECHNOLOGIES GXE 9FX MOTION 771	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
#9 VISUAL TECHNOLOGIES GXE ISA	S3-928	256, 65k, TRUE	256, 65k,	256, 65k	256
#9 VISUAL TECHNOLOGIES GXE PCI	S3-928	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256
#9 VISUAL TECHNOLOGIES GXE GXE 64 PCI	S3-864	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
#9 VISUAL TECHNOLOGIES GXE GXE 64 PRO PCI	S3-964	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k	D, E, F, J, K
ATI GRAPHICS PRO TURBO ISA	MACH64	256, 65k,  TRUE	256, 65k,  TRUE	256, 65k, TRUE	256, 65k,	D, E, N
ATI GRAPHICS PRO TURBO PCI	MACH64	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m	D, E, F, N
ATI GRAPHICS PRO TURBO 1600 PCI	MACH64	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m	D, E, F, J, K, N
ATI GRAPHICS XPRESSION ISA	MACH64	256, 65k,  TRUE	256, 65k, TRUE	256, 65k,	256	D, E
ATI WINBOOST ISA	MACH64	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
ATI WINTURBO PCI	MACH64	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k,	256	D, E
ATI WINTURBO ISA	MACH64	256, 65k,  TRUE	256, 65k, TRUE	256, 65k,	256	D, E
DIAMOND MULTIMEDIA SPEEDSTAR 64 PCI	GD5434	256, 65k	256, 65k	256, 65k	256
DIAMOND MULTIMEDIA STEALTH 64 DRAM PCI	S3-864	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 DRAM PCI	S3-764	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 PCI	S3-964	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k	D, E, F, J, K
DIAMOND MULTIMEDIA STEALTH SE PCI	S3-732	256, 65k, TRUE	256, 65k	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 VIDEO VRAM PCI	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k	D, E, F, J, K
DIAMOND MULTIMEDIA STEALTH 64 VIDEO DRAM PCI	S3-868	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 GRAPHICS 2120XL PCI	S3-864	256, 65k	256, 65k	256
DIAMOND MULTIMEDIA STEALTH 64 GRAPHICS 2200XL PCI	S3-864	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 VIDEO 2120XL PCI	S3-764	256, 65k	256, 65k	256
DIAMOND MULTIMEDIA STEALTH 64 VIDEO 2121XL PCI	S3-765	256, 65k	256, 65k	256
DIAMOND MULTIMEDIA STEALTH 64 VIDEO 2121XLe PCI	S3-765	256, 65k	256, 65k	256
DIAMOND MULTIMEDIA STEALTH 64 VIDEO 2200XL PCI	S3-764	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 VIDEO 2201XL PCI	S3-765	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 VIDEO 2201XLe PCI	S3-765	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 VIDEO 2201TV PCI	S3-765	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 VIDEO 3200XL PCI	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 VIDEO 3240XL PCI	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
DIAMOND MULTIMEDIA STEALTH 64 VIDEO 3400XL PCI	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k, 16.7M	D, E, F, J, K
DIAMOND MULTIMEDIA VIPER PRO PCI	P9100	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m	J, K
DIAMOND MULTIMEDIA VIPER SE PCI	P9100	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m	J, K
DIAMOND MULTIMEDIA VIPER PRO VIDEO PCI	P9100	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m	J, K
HERCULES GRAPHITE TERMINATOR 64 PCI	S3-964	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k	D, E, F
HERCULES TERMINATOR 32/DRAM PCI	S3-732	256, 65k, TRUE	256, 65k	256, 65k		D, E
HERCULES TERMINATOR 64 VIDEO PCI	S3-765	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
HERCULES TERMINATOR 64/DRAM PCI	S3-764	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
IBM Standard desktop E15 Graphics Adapter 106	S3-864	256,65k	256,65k	256
IBM Standard desktop H10 Graphics Adapter 106	P9100	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m	256	J
IBM Standard desktop S15 Graphics Adapter 106	P9100	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m	J, K
LEADTEK WINFAST s240	S3-764	256, 65k, TRUE	256, 65k	256	256	D, J
LEADTEK WINFAST s240V+	S3-765	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D
LEADTEK WINFAST s400	S3-964	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D
LEADTEK WINFAST s430	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k,	256,	D, J
LEADTEK WINFAST s500	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k	D, J, K
LEADTEK WINFAST s510	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k	D, J, K
MATROX MILLENIUM PCI	STORM	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	E, F, G, H, I, J, K, R
MATROX MILLENIUM 220HZ PCI	STORM	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	E, F, G, H, I, J, K, R
Motorola PowerStack RISC PC DT60X on-board graphics 107	GD5434	256, 65k	256, 65k	256
Motorola PowerStack RISC PC MT60X on-board graphics 107	GD5434	256, 65k	256, 65k	256
Motorola PowerStack RISC PC MTP60X on-board graphics 107	GD5436	256, 65k	256, 65k	256
Motorola PowerStack RISC PC DTP60X on-board graphics 107	GD5436	256, 65k	256, 65k	256
Powerized Graphics Adapter 107	PSIDISP	256, 32k, TRUE	256, 32k, TRUE	256, 32k	256
PROLINK Alpine 107	GD5434	256, 65k	256, 65k	256, 65k	256
PROLINK Image Sharpener	GD5446	256, 65k, TRUE	256, 65k	256, 65k	256
STB SYSTEMS POWERGRAPH 64 PCI	S3-764	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D
STB SYSTEMS POWERGRAPH 64 VIDEO PCI	S3-765	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D
STB SYSTEMS VELOCITY 64	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k, 16.7M	D, F, J, K
STB SYSTEMS NITRO PCI	GD5434	256, 65k, TRUE	256, 65k	256, 65k	256
VIDEO LOGIC GRAPHIXSTAR 400	S3-765	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D
VIDEO LOGIC GRAPHIXSTAR 700	S3-968	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k, 16.7M	D, J, K
Color Depths	Display Modes in the "Other" Column
16  =  16 colors	A 640x400x256
256  =  256 colors	B 1040x768x256
32k  =  32,768 colors	C 1104x828x256
65k   =  65,536 colors	D 1152x864x256
16.7m  =  16.7 million colors (24 bits per pixel)	E 1152x864x65k
TRUE  =  True Color(16.7m accelerated)	F 1152x864xTRUE
	G 1182x882x256
	H 1182x882x32k
	I 1182x882x16.7m
	J 1600x1200x256
	K 1600x1200x65k
	L 1024x864x256
	M 1024x864xTRUE
	N 1152x864x16.7m
	O 1152x864x16
	P 1152x900x256
	Q 1152x900xTRUE
	R 1600x1200xTRUE

Display adapters not listed above are expected to work if they use the  following supported chip sets. If the adapter is one of the internally supported chipsets select the detect option and it will install the driver.  If the adapter is not one of the supported chipset install first as Standard VGA, then select the corresponding driver from the  Display Applet in the Control Panel or choose the "Have Disk" option.

Manufacturer	x86	Alpha	PowerPC	Direct Draw	Driver	Color Depth	Maximum Resolution
#9
IMAGINE 128 1	X				N9I128	256, 65K, TRUE	1600x1200
IMAGINE 128II 1	X				N9I128v2	256, 65K, TRUE	1600x1200
ATI
8514 Ultra	X				8514A	256	1024x768
MACH 8 108	X				ATI	256	1024x768
MACH 32	X				ATI	256, 65K, 16.7M	1280x1024
MACH 64 CT™	X	X		X	ATI	256, 65K, 16.7M, TRUE	1280x1024
MACH 64 CX	X	X	X	X	ATI	256, 65K, 16.7M, TRUE	1280x1024
MACH 64 GX	X	X	X	X	ATI	256, 65K, 16.7M, TRUE	1280x1024
MACH 64 GX(rev F)	X	X	X	X	ATI	256, 65K, 16.7M, TRUE	1600x1200
MACH 64 VT	X	X		X	ATI	256, 65K, 16.7M, TRUE	1280x1024
MACH 64 GT	X	X		X	ATI	256, 65K, 16.7M, TRUE	1280x1024
CHIPS AND TECHNOLOGIES 109
65545 1	X				CHIPS	256, 65K, True	1024X768
65548 1	X				CHIPS	256, 65K, True	1024x768
65550 1	X				CHIPS	256, 65K, True	1280X1024
Cirrus Logic
5420 108	X				VGA	256, 65K	1024x768
5422 108	X				VGA	256, 65K	1024x768
5424 108	X				VGA	256, 65K	1024x768
5426 108	X				CIRRUS	256, 65K	1024x768
5428 108	X				CIRRUS	256, 65K	1024x768
5429 108	X				CIRRUS	256, 65K	1024x768
5430	X	X	X		CIRRUS	256, 65K	1280x1024
5434	X	X	X		CIRRUS	256, 65K, True	1280x1024
5436	X		X		CIRRUS	256, 65K, True	1280x1024
5440	X	X	X		CIRRUS	256, 65K,	1280x1024
5446	X	X	X		CIRRUS	256, 65K, True	1280x1024
7541	X				CIRRUS	256, 65K	1024x768
7542	X				CIRRUS	256, 65K	1024x768
7543	X				CIRRUS	256, 65K	1024x768
7548	X				CIRRUS	256, 65K	1024x768
COMPAQ
AVGA 1	X				AVGA	256	640x180
QVision 1024	X	X			QV	256	1024x768
QVision 1024enh	X	X			QV	256	1024x768
QVision 1280	X	X			QV	256	1280x1024
Dell
DGX	X				FRAMEBUF	256, 65K	1280x1024
Digital Equipment Corp.
21030		X			TGA	256, TRUE	1280x1024
FirePower
Powerized Graphics			X		PSIDISP	256, 32K, TRUE	1280x1024
Headland Technologies
Video 7	X				VGA	256	1024x768
IBM
8514/a	X				8514A	256	1024x768
XGA	X				XGA	256	1040x768
XGA-2	X				XGA	256	1104x828
Matrox
ATLAS	X	X			MGA	256, 32K, 16.7M	1600x1200
ATHENA	X	X			MGA	256, 32K, 16.7M	1600x1200
STORM	X	X	X	X	MGA	256, 32K/65K, 16.7M, TRUE	1600x1200
NEOMAGIC
2070 1	X				NEO20XX	256, 65K	1024x768
2090 1	X				NEO20XX	256, 65K, 16.7M	1024x768
NCR
NCR77C22	X				VGA	256	1024x768
NCR77C22E	X				VGA	256	1024x768
NCR BLT 32	X				VGA	256	1024x768
S3
325 1	X				S3ViRGE	256, 32K, 16.7m	1600x1200
732	X	X	X		S3	256, 65K, TRUE	1280x1024
764 108	X	X	X		S3	256, 65K, TRUE	1280x1024
765	X	X	X	X	S3	256, 65K, TRUE	1280x1024
801 110	X	X			S3	256, 32K/65K	1024x768
805 110	X				S3	256, 32K/65K	1280x1024
864	X	X	X		S3	256, 65K, TRUE	1280x1024
868	X	X	X	X	S3	256, 65K, TRUE	1280x1024
911,911a 108,111	X	X			S3	256	1024x768
924 108,111	X	X			S3	256	1024x768
928 110,112	X	X	X		S3	256, 32K/65K, TRUE	1280x1024
964 113	X	X	X		S3	256, 65k, TRUE	1600x1200
968	X	X	X	X	S3	256, 65k, 16.7M, TRUE	1600x1200
Trident
9000	X				VGA	256	1024x768
8900c	X				VGA	256	1024x768
9320 1	X				TGIUL40	256,65K	1024x768
9440 1	X				TGIUL40	256,65K, 16.7M	1024x768
9680 1	X				TGIUL40	256,65K, TRUE	1024x768
Tseng Labs
ET4000	X				VGA	256, 65k	1024x768
ET4000-W32	X				W32	256, 65k	1280x1024
ET4000-W32i	X				W32	256, 65k	1280x1024
ET4000-W32p	X				W32	256, 65k, 16.7M	1280x1024
ET6000	X			X	W32	256, 65k, 16.7M	1280x1024
Western Digital
WD90C30 108	X				VGA	256	1024x768
WD90C31 108	X				VGA	256, 65K	1024x768
WD90C33 108	X				VGA	256, 65K	1024x768
WD90C24 108	X		X		VGA	256, 65K	1024x768
WD90C24a 108	X		X		VGA	256, 65K	1024x768
Weitek
P9000 113	X				WEITEKP9	256, 65K, TRUE	1600x1200
P9100	X		X		WEITEKP9	256, 65K, 16.7M, TRUE	1600x1200


Network LAN Adapters

The following network LAN adapters have been tested on the indicated platforms.

Network LAN Adapters	Bus	x86	MIPS	Alpha	PowerPC
3Com® 3C503 EtherLink II® (Coax & TP) 114	ISA	X	X	X	X
3Com 3C503/16 EtherLink® II/16 (Coax & TP) 114	ISA	X	X	X	X
3Com 3C507 EtherLink 16 (Coax & TP) 114	ISA	X	X
3Com 3C509 EtherLink III Parallel Tasking Adapter - ISA (Coax, TP and Combo) 114	ISA	X	X	X	X
3Com 3C509B EtherLink III Parallel Tasking Adapter - ISA (Coax, TP and Combo) 114,115	ISA	X	X	X	X
3Com 3C523 EtherLink/MC (Coax & TP) 114	MCA	X
3Com 3C527 EtherLink/MC 32 Bus Mastering Adapter 1	MCA	X
3Com 3C529 EtherLink III Parallel Tasking Adapter - MCA (Coax & TP) 114	MCA	X
3Com 3C579 EtherLink III Parallel Tasking Adapter - EISA (Coax & TP) 114	EISA	X	X	X
3Com 3C589 Etherlink III PCMCIA Ethernet Adapter	PCMCIA	X
3Com 3C589B Etherlink III PCMCIA Ethernet Adapter	PCMCIA	X
3Com 3C589C Etherlink III PCMCIA Ethernet Adapter	PCMCIA	X			X
3Com 3C590 EtherLink III PCI Bus-Master Adapter 1	PCI	X
3Com 3C592 EtherLink III EISA Bus-Master Adapter 1	EISA	X
3Com 3C595 Fast EtherLink PCI Bus-Master Adapter 1,116	PCI	X
3Com 3C597 EtherLink III EISA Bus-Master Adapter 1	EISA	X
3Com 3C619 TokenLink® III 1	ISA	X
3Com 3C770 FDDILink-F for Optical, UTP & STP 1,114,117	EISA	X
3Com 3C508 Etherlink OEM adapter 1	ISA	X
3Com 3C905 Fast EtherLink XL Adapter 1	PCI	X
Accton EN2216 PCMCIA Ethernet Adapter 118	PCMCIA	X
Accton EN166X MPXII Ethernet Adapter 118	ISA	X
Advanced Micro Devices PCnet® Family Adapters	EMBEDDED	X	X	X	X
Advanced Micro Devices PCnet-ISA+ Ethernet Adapter	ISA	X	X	X	X
Advanced Micro Devices PCnet-32 VL Ethernet Adapter	VLB	X
Advanced Micro Devices PCnet-PCI Ethernet Adapter	PCI	X	X	X	X
Allied Telesyn AT1700 Series Ethernet Adapter 1	ISA	X
Allied Telesyn AT1720 Series Ethernet Adapter 1	MCA	X
Allied Telesyn AT2450 Ethernet Adapter 119	PCI	X	X	X	X
Allied Telesyn AT2560 Series PCI/100 Ethernet Adapter 1	PCI	X
Andrew ISA IIA Adapter 1	ISA	X
Cabletron F3015 FDDI Adapter 1	ISA	X
Cabletron E20XX Ethernet DNI 1	ISA	X
Cabletron E21XX Ethernet DNI 1	ISA	X
Cabletron E22XX Ethernet DNI 1	ISA	X
Cabletron T20XX 16/4 Token Ring DNI 1	ISA	X
Cabletron F30XX FDDI Adapter 1,120	MCA	X
Cabletron F70XX FDDI Adapter 1,120	EISA	X
Cogent eMASTER+ 960 PCI Ethernet Adapter 1	PCI	X
COMPAQ 32-Bit Dualspeed Token Ring Controller	EISA	X	X	X
COMPAQ 32-Bit Netflex Controller	EISA	X	X	X
COMPAQ 32-Bit Netflex Controller with Token Ring Module	EISA	X	X	X
COMPAQ Ethernet 16TP Controller	ISA	X	X	X	X
COMPAQ Ethernet LAN Card 1	PCMCIA	X
COMPAQ Integrated NetFlex-3 1	EMBEDDED	X
COMPAQ Integrated Netelligent 1	EMBEDDED	X
COMPAQ Netelligent 10/100 TX PCI UTP Adapter 1	PCI	X
COMPAQ Netelligent 10 T PCI UTP Adapter 1	PCI	X
COMPAQ NetFlex-2 ENET-TR Controller 114	EISA	X	X	X
COMPAQ NetFlex-2 TR Controller 114	EISA	X	X	X
COMPAQ NetFlex-2 DualPort TR Controller	EISA	X	X	X
COMPAQ NetFlex-2 DualPort ENET Controller 114	EISA	X	X	X
COMPAQ NetFlex-3/E 1	EISA	X
COMPAQ NetFlex-3/P 1	PCI	X
Compex ENET16-COMBO/VP PnP Ethernet Adapter 1	ISA	X
COPS LTI ISA	ISA	X
DayStar Digital LocalTalk® Adapter	ISA	X			X
DCA® IRMAtrac 16/4 Convertible Token Ring Adapter 1	ISA/MCA	X
DEC DE100 EtherWORKS LC	ISA	X	X	X
DEC DE101 EtherWORKS LC/TP	ISA	X	X	X
DEC DE200 EtherWORKS Turbo	ISA	X	X	X	X
DEC DE201 EtherWORKS Turbo/TP 114	ISA	X	X	X	X
DEC DE202 EtherWORKS Turbo TP/BNC	ISA	X	X	X	X
DEC DE422 EtherWORKS EISA TP/BNC	EISA	X	X	X
DEC DE434 PCI Ethernet Adapter	PCI	X	X	X	X
DEC DE435 PCI Ethernet Adapter	PCI	X	X	X	X
DEC DE450-CA Etherworks Turbo PCI	PCI	X	X	X	X
DEC DE500 Fast Ethernet Adapter	PCI	X	X	X	X
DEC DC21040 PCI Ethernet Controller	EMBEDDED	X		X	X
DEC FDDIcontroller/EISA(incl. CDDI)	EISA	X	X	X
DEC FDDIcontroller/PCI(incl. CDDI)	PCI	X	X	X	X
D-Link DE-650 PCMCIA Ethernet Adapter 118	PCMCIA	X
D-Link DE-220 ISA Ethernet Adapter 1	ISA	X
Fujitsu ICL EtherTeam ISA Ethernet Network Adapter 119	ISA	X
Fujitsu ICL EtherTeam PCI Ethernet Network Adapter 119	PCI	X
Hewlett-Packard J2585B DeskDirect 10/100 PCI LAN Adapter 1	PCI	X
Hewlett-Packard J2970A DeskDirect 10BaseT/2  PCI LAN Adapter 1	PCI	X
Hewlett-Packard J2973A DeskDirect 10BaseT PCI LAN Adapter 1	PCI	X
Hewlett-Packard HP J2573A 10/100VG ISA LAN Adapter 1	ISA	X
Hewlett-Packard HP J2577A 10/100VG EISA LAN Adapter 1	EISA	X
Hewlett-Packard HP J2585A 10/100VG Selectable PC LAN 1	PCI	X
Hewlett-Packard HP 27245A PC LAN Adapter/8 TP 1	ISA	X
Hewlett-Packard HP 27246A MC LAN Adapter/16 TP 1	MCA	X
Hewlett-Packard HP 27247A PC LAN Adapter/16 TP 1	ISA	X
Hewlett-Packard HP 27247B PC LAN Adapter/16 TP Plus 1	ISA	X
Hewlett-Packard HP 27250 PC LAN Adapter/8 TL 1	ISA	X
Hewlett-Packard HP 27252A PC LAN Adapter/16 TL Plus 1	ISA	X
Hewlett-Packard 10/100TX PCI Ethernet Adapter 1	PCI	X
IBM 100/10 PCI Ethernet Adapter 1	PCI	X
IBM 16/4 Token Ring ISA-16 Adapter	ISA	X	X	X	X
IBM 16/4 Token Ring II ISA Adapter	ISA	X	X	X	X121
IBM Auto 16/4 ISA Token Ring Adapter 1	ISA	X			X
IBM Auto LANStreamer™ MC 32 Adapter 1	MCA	X
IBM Ethernet Quad PeerMaster Adapter 1	MCA	X
IBM EtherStreamer MC 32 Adapter 1	MCA	X
IBM ISA Ethernet Adapter 118	ISA	X			X
IBM LAN Adapter/A for Ethernet 1	MCA	X
IBM LANStreamer MC 32 Adapter 1	MCA	X
IBM LANStreamer PCI Token Ring Adapter 1	PCI	X			X
IBM PCMCIA Ethernet Adapter II	PCMCIA	X			X
IBM Token Ring Auto 16/4 Credit Card Adapter 1,115	PCMCIA	X			X
IBM Token Ring Adapter 16/4	ISA	X	X	X	X
IBM Token Ring Adapter /A (4 Mbps)	MCA	X
IBM Token Ring Adapter 16/4 /A	MCA	X
ICL EtherTeam16i Combo Adapter 1	ISA	X
ICL EtherTeam16i Duo Adapter 1	ISA	X
ICL EtherTeam16i TP Adapter 1	ISA	X
ICL EtherTeam32 EISA Adapter 1	EISA	X
Intel 82595 Ethernet Adapter 1	EMBEDDED	X
Intel EtherExpress™ 16 MCA	MCA	X
Intel EtherExpress 16 PCLA8110	ISA	X	X	X	X
Intel EtherExpress 16C PCLA8100	ISA	X	X	X	X
Intel EtherExpress 16TP PCLA8120	ISA	X	X	X	X
Intel EtherExpress FlashC PCLA8105	ISA	X	X	X	X
Intel EtherExpress Flash32 EISA LAN Adapter 1	EISA	X
Intel EtherExpress PRO/10 ISA	ISA	X	X	X	X
Intel EtherExpress PRO/10+ ISA	ISA	X	X	X	X
Intel EtherExpress PRO/10+ ISA 1	ISA	X
Intel EtherExpress PRO/10 PCI LAN Adapter 1	PCI	X
Intel EtherExpress PRO/100B PCI LAN Adapter 1	PCI	X
Intel TokenExpress™ EISA/32 1	EISA	X
Intel TokenExpress EISA 16/4 1	EISA	X
Intel TokenExpress ISA/16S 1	ISA	X
Intel TokenExpress MCA 16/4 1	MCA	X
Kingston EtherRx PCMCIA Adapter	PCMCIA	X
LinkSys EC2T PCMCIA Ethernet Adapter 118	PCMCIA	X
Linksys Ether16 LAN Card 118	ISA	X
Linksys EtherPCI LAN Card 119	PCI	X	X	X	X
Madge Blue+ Token Ring Adapter	ISA	X	X	X	X
Madge Smart 16/4 AT Ringnode	ISA	X	X	X	X
Madge Smart 16/4 AT Plus Ringnode	ISA	X	X	X	X
Madge Smart 16/4 EISA Ringnode 114	EISA	X	X	X	X
Madge Smart 16/4 ISA Client Plus	ISA	X	X	X	X
Madge Smart 16/4 ISA Client Ringnode	ISA	X	X	X	X
Madge Smart 16/4 ISA PnP Ringnode 115	ISA	X	X	X	X
Madge Smart 16/4 PCI Ringnode	PCI	X	X	X	X
Madge Smart 16/4 PCMCIA Ringnode Token Ring Adapter	PCMCIA	X	X	X	X
Madge Smart 16/4 MC Ringnode	MCA	X	X	X	X
Madge Smart 16/4 MC32 Ringnode	MCA	X	X	X	X
Madge Smart 16/4 PC Ringnode	ISA	X	X	X	X
Madge Smart 16 Ringnode	ISA	X	X	X	X
Megahertz XJEM3288 Ethernet+Modem PCMCIA Adapter 1	PCMCIA	X
Megahertz CCEM3288 Ethernet+Modem PCMCIA Adapter 1	PCMCIA	X
Megahertz CC10BT/2 Ethernet PCMCIA Adapter 1	PCMCIA	X
Microdyne NE100 PCI Adapter 1	PCI	X
National Semiconductor InfoMover NE4100 PCMCIA Ethernet Adapter	PCMCIA	X			X
National Semiconductor DP83932 (SONIC) Motherboard Ethernet Controller on MIPS ARC/R4000™ systems 114	EMBEDDED		X
NoteWorthy Ethernet PCMCIA Adapter II (10BaseT) 118	PCMCIA	X			X
NoteWorthy Ethernet PCMCIA Adapter II (10Base2) 118	PCMCIA	X			X
NCR StarLAN 16/4 Token Ring NAU 1	ISA	X
NCR StarLAN 16/4 Token Ring NAU 1	MCA	X
NCR WaveLAN/AT 1	ISA	X
NCR WaveLAN/MC 1	MCA	X
Network Peripheral NP-AT FDDI 1	ISA	X
Network Peripherals NP-EISA/S FDDI	EISA	X	X	X
Network Peripherals NP-MCA/S FDDI	MCA	X
Network Peripherals NuCard PCI FDDI 1	PCI	X
Novell®/Eagle Technology NE1000	ISA	X
Novell/Eagle Technology NE2000 114	ISA	X	X	X	X
Novell/Eagle Technology NE3200 114	EISA	X	X	X
Olicom Ethernet ISA/IV Adapter, OC-2173 1	ISA	X
Olicom Ethernet GoCard 1	PCMCIA	X
Olicom GoCard ET/Modem 288 1	PCMCIA	X
Olicom GoCard TR 16/4 1	PCMCIA	X
Olicom GoCard TR/Modem 144 1	PCMCIA	X
Olicom Ethernet PCI/II 10/100, OC-2325 1	PCI	X
Olicom Ethernet PCI/II 10 Adapter ,OC-2185 1	PCI	X
Olicom ISA 16/4 Token Ring, OC-3118 1	ISA	X
Olicom PCI 16/4 Token Ring, OC-3136 1	PCI	X
Olicom Token-Ring,PowerMAC MCA WS, OC-3129 1	MCA	X
Olicom Token-Ring,PowerMAC EISA WS, OC-3133 1	EISA	X
Olicom Token-Ring,PowerMAC ISA WS, OC-3117 1	ISA	X
Olicom Token-Ring,PowerMAC EISA SRV, OC-3135 1	EISA	X
Ositech Jack of Diamonds Adapter 1	PCMCIA	X
Proteon ProNET 4/16 p1390 Token Ring Adapter	ISA	X	X122	X
Proteon ProNET 4/16 p1392 Token Ring Adapter	ISA	X	X122	X	X121
Proteon ProNET 4/16 p1392plus Token Ring Adapter	ISA	X	X122	X	X121
Proteon ProNET 4/16 p1892 Token Ring Adapter	MCA	X
Proteon ProNET 4/16 p1892plus Token Ring Adapter	MCA	X
Proteon ProNET 4/16 p1990 Token Ring Adapter	EISA	X		X
Proteon ProNET 4/16 p1990plus Token Ring Adapter	EISA	X		X
Racal InterLan XLerator/EB/NI6510 Adapter 1	ISA	X
Racal InterLan ES3210 1,123	EISA	X
Realtek RTL8029 PCI Ethernet Adapter 1	PCI	X
RNS 2200 PCI FDDI LAN Controller 1	PCI	X
Socket Communications Socket EA PCMCIA (NE2000 Compatible)	PCMCIA	X			X
Standard Microsystems 8013EBT EtherCard™ PLUS16	ISA	X	X	X	X
Standard Microsystems 8013EP EtherCard PLUS Elite16	ISA	X	X	X	X
Standard Microsystems 8013EP/A EtherCard PLUS Elite/A	MCA	X
Standard Microsystems 8013EPC EtherCard PLUS Elite16	ISA	X	X	X	X
Standard Microsystems 8013EW EtherCard PLUS EliteCombo	ISA	X	X	X	X
Standard Microsystems 8013EWC EtherCard PLUS EliteCombo	ISA	X	X	X	X
Standard Microsystems 8013W EtherCard PLUS Elite16T	ISA	X	X	X	X
Standard Microsystems 8013WB EtherCard PLUS	ISA	X	X	X	X
Standard Microsystems 8013WC EtherCard PLUS Elite16T	ISA	X	X	X	X
Standard Microsystems 8013WP/A EtherCard PLUS Elite10T/A	MCA	X
Standard Microsystems 8216C EtherCard Elite Ultra 1	ISA	X
Standard Microsystems 8232 EtherCard Elite 32 Ultra 1	EISA	X
Standard Microsystems 8416 Ultra PnP 1,115	ISA	X
Standard Microsystems 8432BT EtherPower PCI LAN Adapter 1	PCI	X			X
Standard Microsystems 8432T  EtherPower PCI LAN Adapter 1	PCI	X
Standard Microsystems 8434 EtherPower2 PCI Adapter 1	PCI	X
Standard Microsystems 9332DST EtherPower 10/100 PCI LAN Adapter 1	PCI	X
SVEC FD0421P EtherPlug-ISA Adapter 119	ISA	X
SVEC FDO455P EtherBoard-PCI Adapter 1	PCI	X
SysKonnect SK-51xx ISA-bus FDDI Adapter 1	ISA	X
SysKonnect SK-52xx MCA-bus FDDI Adapter 1	MCA	X
SysKonnect SK-53xx EISA-bus FDDI Adapter 1	EISA	X
SysKonnect SK-NET FDDI PCI Adapter 1	PCI	X
SysKonnect SK-NET Flash (Coax and TP) 119	ISA	X
SysKonnect SK-NET G16 Ethernet Adapter (/TP) 1	ISA	X
SysKonnect SK-NET G32+ EISA Ethernet Adapter 1	EISA	X
SysKonnect SK-NET TR4/16+ Token Ring Adapter 1	ISA	X
SysKonnect SK-NET Token Ring PCI Adapter 1	PCI	X			X
Thomas-Conrad TC4046 MCA Token Ring Adapter 1,114	MCA	X
Tulip Computer NCC-16 PNP Adapter 119	ISA	X
Ungermann-Bass® NIUpc	ISA	X	X	X
Ungermann-Bass NIUpc/EOTP	ISA	X	X	X	X
Ungermann-Bass NIUps/EOTP 114	MCA	X
Xircom Corporate Series CreditCard Ethernet 1	PCMCIA	X
Xircom Corporate Series CreditCard Ethernet IIps 1,114	PCMCIA	X
Xircom CreditCard Ethernet+Modem 28.8 1	PCMCIA	X
Xircom CreditCard Ethernet+Modem II 1	PCMCIA	X
Xircom CreditCard Token Ring IIps 1	PCMCIA	X
Xircom Pocket Ethernet II Adapter 1,124,125	PARALLEL	X
Xircom Pocket Ethernet III Adapter 1,114,124,125,126	PARALLEL	X

Please note that Microsoft does not recommend using any 8-bit network adapter with the Windows NT platform.  These adapters have lower performance and are generally no longer available for purchase.  They are included because a driver exists for them and companies sometimes need to run older hardware before migrating to newer equipment.


ISDN Adapters

The following ISDN adapters have been tested for use with Remote Access Service, and are supported on the indicated platforms.

ISDN Adapters	Bus	X86	MIPS	Alpha	PowerPC	Primary Rate (PRI)	Primary Rate (BRI)
Digiboard DataFire 4 ST	ISA	X	X	X	X		X
Digiboard DataFire ST	ISA	X	X	X	X		X
Digiboard DataFire U	ISA	X	X	X	X		X
Digiboard PC IMAC ISA	ISA	X	X	X	X		X
Digiboard PC IMAC/4	ISA	X	X	X	X		X
Eicon Diva	ISA	X	X	X	X		X
Eicon Diva PCMCIA	PCMCIA	X	X	X	X		X
Eicon Diva PRO	ISA	X	X	X	X		X
Eicon EiconCard C21	ISA	X	X	X	X		X
Eicon EiconCard S51/S50	ISA	X	X	X	X		X
Eicon ISDN-P S2M	ISA	X	X	X	X	X
Eicon ISDN Quadro	ISA	X	X	X	X		X
Eicon ISDN SCOM	ISA	X	X	X	X		X
MicroGate SyncLink WAN Adapter 127	ISA	X				X	X
Niwat NiRAS AT/SD Network Adapter 127	ISA	X				X	X
US Robotics Allegra BRI Adapter for NT	ISA	X					X


Network WAN Adapters

The following network WAN adapters have been tested for use with Remote Access Service, and are supported on the indicated platforms.

Network WAN Adapters	Bus	x86	MIPS	Alpha	PowerPC	Provisioning			Routing Services
Digiboard SyncPort	ISA	X				A,B			A,B
Digiboard SyncPort PCI	PCI	X				A,B			A,B
Eicon DualPort Network Adapter/PC 2MB	ISA	X	X	X	X	A,B			A,B
Eicon EiconCard C21	ISA	X	X	X	X	A,B			A,B
Eicon EiconCard HSI/PC 1MB	ISA	X	X	X	X	A,B			A,B
Eicon EiconCard S51/S50	ISA	X	X	X	X	A,B			A,B
Eicon MultiPort Network Adapter/PC 2MB	ISA	X	X	X	X	A,B			A,B
MicroGate SyncLink WAN Adapter 127	ISA	X				A,B,C			A,B
Niwat NiRAS AT/SD Network Adapter 127	ISA	X				A,B,C			A,B
U.S Robotics Allegra 56k Frame Relay Adapter	ISA	X				B			A,B,C
U.S Robotics Allegra T1 Frame Relay Adapter	ISA	X				B			A,B,C
Provisioning	Routing Services
A- X.25	A - TCP/IP
B- Frame Relay	B - IPX
C - Switched56	C - NetBEUI


Network ATM Adapters

The following network ATM adapters have been tested on the indicated platforms.

Network ATM Adapters	Bus	x86	MIPS	Alpha	PowerPC
Adaptec LANE ATM/25 PCI Adapter	PCI	X
Adaptec LANE ATM/155 PCI Adapter	PCI	X
Madge Collage 25Mb ATM Adapter	PCI	X
Madge Collage 155Mb ATM adapter	PCI	X


Uninterruptible Power Supplies

The following Uninterruptible Power Supplies have been tested, and are supported on x86, MIPS, Alpha, and PowerPC platforms except as noted.

Uninterruptible Power Supplies	Manufacturer's Cable Part #	Power Failure Signal	Low Battery Signal	Remote UPS Shutdown
American Power Conversion Back-UPS 400	AP940-0020B	Positive	Positive	Positive
American Power Conversion Back-UPS 450	AP940-0020B	Positive	Positive	Positive
American Power Conversion Back-UPS 600	AP940-0020B	Positive	Positive	Positive
American Power Conversion Back-UPS 900	AP940-0020B	Positive	Positive	Positive
American Power Conversion Back-UPS 1250	AP940-0020B	Positive	Positive	Positive
American Power Conversion Matrix-UPS 3000	AP940-0020B	Positive	Positive	Positive
American Power Conversion Matrix-UPS 5000	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 250	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 250I	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 400	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 400I	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 450	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 600	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 600RM	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 600XL	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 700	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 700I	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 700RM	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 700RMI	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 700XL	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 700XLI	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 900	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 900XL	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 1000	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 1000I	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 1000RM	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 1000RMI	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 1000XL	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 1000XLI	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 1250	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 1250RM	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 1400	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 1400I	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 1400RM	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 1400RMI	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 2000	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 2000RM	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 2200	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 2200I	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 2200RM	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 2200RMI	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 2200XL	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 2200XLI	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 3000	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 3000I	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS 3000RM	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS VS420	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS VS420I	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS VS650	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS VS650I	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS VS1000	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS VS1000I	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS VS1400	AP940-0020B	Positive	Positive	Positive
American Power Conversion Smart-UPS VS1400I	AP940-0020B	Positive	Positive	Positive
Best Power Technology FERRUPS FE500VA	BIK008L/BAA-0162	Positive	Positive	Positive
Best Power Technology FERRUPS FE700VA	BIK008L/BAA-0162	Positive	Positive	Positive
Best Power Technology FERRUPS FE850VA	BIK008L/BAA-0162	Positive	Positive	Positive
Best Power Technology FERRUPS FE1.15KVA	BIK008L/BAA-0162	Positive	Positive	Positive
Best Power Technology FERRUPS FE1.4KVA	BIK008L/BAA-0162	Positive	Positive	Positive
Best Power Technology FERRUPS FE1.8KVA	BIK008L/BAA-0162	Positive	Positive	Positive
Best Power Technology FERRUPS FE2.1KVA	BIK008L/BAA-0162	Positive	Positive	Positive
Best Power Technology FERRUPS FE3.1KVA	BIK008L/BAA-0162	Positive	Positive	Positive
Best Power Technology FERRUPS FE4.3KVA	BIK008L/BAA-0162	Positive	Positive	Positive
Best Power Technology FERRUPS FE5.3KVA	BIK008L/BAA-0162	Positive	Positive	Positive
Best Power Technology FERRUPS FE7KVA	BIK008L/BAA-0162	Positive	Positive	Positive
Best Power Technology FERRUPS FE10KVA	BIK008L/BAA-0162	Positive	Positive	Positive
Best Power Technology FERRUPS FE12.5KVA	BIK008L/BAA-0162	Positive	Positive	Positive
Best Power Technology FERRUPS FE18KVA	BIK008L/BAA-0162	Positive	Positive	Positive
Best Power Technology Fortress LI 360B/D	BIK009L/INT-0023	Positive	Positive	Positive
Best Power Technology Fortress LI 460B/D	BIK009L/INT-0023	Positive	Positive	Positive
Best Power Technology Fortress LI 660B/D	BIK009L/INT-0023	Positive	Positive	Positive
Best Power Technology Fortress LI 950B/D	BIK009L/INT-0023	Positive	Positive	Positive
Best Power Technology Fortress LI 1020B/D	BIK009L/INT-0023	Positive	Positive	Positive
Best Power Technology Fortress LI 1420B/D	BIK009L/INT-0023	Positive	Positive	Positive
Best Power Technology Fortress LI 1.3KB/D	BIK009L/INT-0023	Positive	Positive	Positive
Best Power Technology Fortress LI 1.7KF/FX™	BIK009L/INT-0023	Positive	Positive	Positive
Best Power Technology Fortress LI 1.7KG/GX	BIK009L/INT-0023	Positive	Positive	Positive
Best Power Technology Fortress LI 1.7KJX	BIK009L/INT-0023	Positive	Positive	Positive
Best Power Technology Fortress LI 2KF/G/H/J	BIK009L/INT-0023	Positive	Positive	Positive
Best Power Technology Fortress LI 2.5KP/PX	BIK009L/INT-0023	Positive	Positive	Positive
Best Power Technology Fortress LI 3KL/LX	BIK009L/INT-0023	Positive	Positive	Positive
Best Power Technology Fortress LI 3KN/NX	BIK009L/INT-0023	Positive	Positive	Positive
Best Power Technology Fortress LI 3KQ/QX	BIK009L/INT-0023	Positive	Positive	Positive
Best Power Technology Fortress LI 3KR/RX	BIK009L/INT-0023	Positive	Positive	Positive
Best Power Technology Fortress LI 3KS/SX	BIK009L/INT-0023	Positive	Positive	Positive
Best Power Technology Fortress LI 3KS	BIK009L/INT-0023	Positive	Positive	Positive


Multimedia Audio Adapters

The following multimedia audio adapters have been tested, and are supported on the indicated platorms.

Multimedia Audio Adapter	x86	MIPS	Alpha	PowerPC
COMPAQ Business Audio	X
Creative Labs Sound Blaster 1.x	X	X	X	X
Creative Labs Sound Blaster 16	X	X	X	X
Creative Labs Sound Blaster 16 PnP 1,128	X	X	X	X
Creative Labs Sound Blaster 32 129	X	X	X	X
Creative Labs Sound Blaster 32 PnP 1,128,129	X	X	X	X
Creative Labs Sound Blaster AWE32 129	X	X	X	X
Creative Labs Sound Blaster AWE32 PnP 1,128,129,130	X	X	X	X
Creative Labs Sound Blaster Pro	X	X	X	X
ESS™ 1688 1,128	X
ESS 1788 1,128	X
ESS 688 1,128	X
IBM Mwave™ for Thinkpad  1,128	X
IBM PowerPC Audio				X
Media Vision™ Pro Audio Spectrum 16 131	X	X	X	X
Media Vision Pro Audio Studio 131	X	X	X	X
Media Vision Thunder Board 132	X	X	X	X
Microsoft Windows Sound System	X	X	X	X
MIPS ARCsystem 100/150 Sound		X
NEC Sound System		X


Modems

The following modems support data transfer capabilities in Windows NT and are supported on the x86, MIPS, Alpha and PowerPC platforms except as noted.

3x 396D

3x 514D

3x Wysiwyf 296D

3x Wysiwyf 296DBX

3x Wysiwyf 396DBX

3x Wysiwyf 396DP

3x Wysiwyf 396DS

3x Wysiwyf 496D

3x Wysiwyf 496DB

3x Wysiwyf 514D

3x Wysiwyf 514DB

3x Wysiwyf 514DBX

3x Wysiwyf 514DP

3x Wysiwyf 514DPX

3x Wysiwyf 514DS

3x Wysiwyf 514DSX

3x Wysiwyf 628D

3x Wysiwyf 628DB

3x Wysiwyf 628DBX

3x Wysiwyf 628DP

3x Wysiwyf 628DPX

3x Wysiwyf 628DS

3x Wysiwyf 628DSX

Aceex DM-1414P

Aceex DM-1414PC

Aceex DM-1414V

Aceex DM-1414VH

Aceex DM-2400E

Aceex DM-2400H

Aceex DM-2400V

Aceex DM-2814 & DM-1414VH

Aceex DM-2814PC

Aceex DM-2814V

Aceex DM-2814VH

Aceex DM-9624E

Aceex DM-9624H

Aceex DM-9624PC

Aceex DM-9624V

Adtech Comm-Panion Pocket 14

AJ 1445/1446

AJ 2423

AJ 9636

Alltron AL-SW28800 Modem

Anchor Datacomm SXPro 144 External Data Fax Modem

Anchor Datacomm SXPro 288 External Data Fax Modem

Andest Rocket

Angia 14.4 PCMCIA (FAX-PCM2-NL)

Angia 14.4 PCMCIA (PCM144)

Angia DataStart for COMPAQLTE

Angia Safejack 28.8

Angia Safejack Terbo 19200 Data Fax

Apex Data PCMCIA 144

Apex Data-Fax PCA-1414 PCMCIA Modem

Apex Data-Fax PCR-1414

Apex V.34 Cellular PCMCIA

Archtek Smartlink 14.4

Archtek SmartLink 1414 AV

Archtek SmartLink Modem 1414BCV-BCL

Archtek SmartLink Modem 2834A

Archtek SmartLink Modem 2834A-1

Archtek SmartLink Modem 2834BA

Archtek SmartLink Modem 3334BT

Archtek SmartLink Modem V32Te

ARN ARNDX-MC2

ARN ARNDX-NOTA

ARN ARNDX-PC

ARN DX

ARN DX PC & ARN DX MC2

ARN DX+ PC & ARN DX+ MC2

ARN Generique

ARNIS MC2 ISDN Sync. PPP

ARNIS MC2 ISDN V.120

ARNIS MC2 ISDN V.14 57,6Kps

ARNIS MC2 ISDN X.25 Transparent

ARNIS PC ISDN Sync. PPP

ARNIS PC ISDN V.120

ARNIS PC ISDN V.14 57,6Kbps

ARNIS PC ISDN X.25 Transparent

ARNIS-DX PC ISDN Sync. PPP

ARNIS-DX PC ISDN V.120

ARNIS-DX PC ISDN V.14 57,6Kbps

ARNIS-DX PC ISDN X.25 Transparent

ARNIS-MD PC

ARNIS-MD PC ISDN Sync. PPP

ARNIS-MD PC ISDN V.120

ARNIS-MD PC ISDN V.14 57,6Kbps

ARNIS-MD PC ISDN X.25 Transparent

Askey 1428VQC-R  133

Askey 28.8, V.34 Data Fax Modem

AST 14.4D-14.4F Data Fax PCMCIA

AST Advantage 14.4 Modem

AST Advantage 14.4 Modem+Speakerphone

AST EXCA™ 24-96 Data Fax PCMCIA

AST PNB 24D-96F Data Fax PCMCIA

AT&T 2224 CEO

AT&T 3825 Plus  133

AT&T 4024

AT&T Comsphere 3800 Series

AT&T Comsphere 3810

AT&T Comsphere 3810 Plus

AT&T Comsphere 3810 Plus 288

AT&T Comsphere 3811

AT&T Comsphere 3820

AT&T Comsphere 3820 Plus

AT&T Comsphere 3830

AT&T Dataport

AT&T DataPort 14.4-FAX External

AT&T DataPort 14.4-FAX Internal

AT&T DataPort 2001

AT&T Dataport 288

AT&T DataPort Express External

AT&T DataPort Express Internal

AT&T DSP-based

AT&T KeepInTouch Card

AT&T KeepInTouch Express Card

AT&T KeepInTouch Express PCMCIA

AT&T Paradyne PCMCIA

ATI 14400 ETC-E

ATI 14400 ETC-EXPRESS

ATI 14400 ETC-I

ATI 19200 ETC-E

ATI 19200 ETC-I

ATI 2400 etc/e

ATI 9600 etc/e

ATI 9600 ETC-E

ATTEL MX 144_14400bps

ATTEL MX 144_9600bps

ATTEL MX 96xxx

Avtek CD900

Avtek CD930

AXOS Computer Formel 14.4fax

AXOS Computer Formel 2496fax

Aztech PB144AMSP

Banksia MX-6 V.32bis

Banksia XM124/R FAXMODEM- AUS

Bausch Datacom 1414AV Terbo

Bausch Datacom CN-9642 SAM

Bausch Datacom euro Scout

Best Data Smart One 1442F (FT

Best Data Smart One 1442F Modem

Best Data Smart One 1442FX (FTX

Best Data Smart One 1442FX Modem

Best Data Smart One 2400B Modem

Best Data Smart One 2400X Modem

Best Data Smart One 2834F Modem

Best Data Smart One 2834FX Modem

Best Data Smart One 9624FQ Modem

Best Data Smart One 9648FX Modem

Blatzheim GM 144 Vbis+FAX

Blatzheim GM 144H Vbis+FAX

Blatzheim GM 24 Vbis+Fax

Blatzheim GM 288 Vbis+fax

Blatzheim GM-144HVbis+Fax-1

Blatzheim GM-144Vbis+-1

Blatzheim StarLine 19k2

Boca Modem V.Fast Class

Boca Research 14.4 Kbps Multimedia FDV14I

Boca Research 14.4 Kbps V.32BIS M1440E

Boca Research 14.4 Kbps V.32BIS M1440I

Boca Research 14.4 Kbps V.32BIS M1440IW

Boca Research 14.4 Kbps V.32BIS M144IW

Boca Research 14.4 Kbps V.32BIS PCMCIA

Boca Research 28.8 Kbps V.34 MV.34I

Boca Research 28.8 V.Fast MV24KE

Boca Research 28.8 V.Fast MV28KI

Boca Research Bocamodem 14.4kbps V.32bis Data-Fax

Boca Research Bocamodem 1440E

Boca Research Complete Ofc Communicator 14.4 Data-Fax

BocaModem 14.4Kbps V.32bis PCMCIA

Bocamodem M1440 Alt

Calcom 1442F Modem

Cardinal 14400

Cardinal 14400 bps Internal Data-Fax

Cardinal 14400 Internal

Cardinal 2400e

Cardinal 9600

Cardinal MVP144IV2  133

Cardinal MVP288C2  133

Cardinal MVP288I2  133

Cardinal MVP288IS  133

Cardinal MVP288IV  133

Cardinal MVP288IV2  133

Cardinal MVP288XV  133

CDC 6436

CDC 6438

Cirrus Data Fax Voice MDK1414EC2

Codex 2264

Codex 3220

Codex 3220 Plus

Codex 3260

Codex 3260 Fast

Codex 3261

Codex 3261 Fast

Codex 3262

Codex 3262 Fast

Codex 3263

Codex 3263 Fast

Codex 3265

Codex 3265 Fast

Codex 326x

Codex 326x FAST

Codex V.34R

COM1 MC214 Data Fax

COM1 MC215

COM1 MC216

COM1 MC217 V32bis Voice PCMCIA

COM1 MV129

COM1 MV214

COM1 MV215

COM1 MV216

COM1 MV219

COM1 PCMCIA AJ 1448 V32bis Fax-Modem

COM1 PCMCIA S214 V22bis Fax-Modem

COM1 PCMCIA S217 V32bis Fax-Modem

COM1 PCMCIA S218 V34 Fax-Modem

COM1 PCMCIA SLIM144 Fax-Modem

COM1 PCMCIA SLIMFAXII Fax-Modem

COM1 PCMCIA SLIMV34 Fax-Modem

COM1 SA MC214 2400

COM1 SA MC214 Data-Fax

COM1 SA MC216

COM1 SA MC216 14.4

COM1 SA MC217 14.4

COM1 SA MC217 V32bis Voice

COM1 SA MC218 V.34 PCMCIA

COM1 SA MV129

COM1 SA MV129 V22bis Data-Fax

COM1 SA MV216

COM1 SA MV216 SA V32bis Data-Fax

ComCom SPIRIT II

ComCom SPIRIT III

ComCom SPIRIT Rocket V.34

ComCom SPIRIT Rocket V.Fast

ComCom SPIRIT Swift

ComCom Spirit TERBO

Communicate Atlas GSM

Communicate Atlas GSM Plus

Communicate Atlas GSM Prima

Communicate Atlas Ranger

Communicate Connexion 1440

Communicate Connexion 1440C

Communicate Connexion 2496

Communicate Connexion 2880

Communicate Connexion 2880C

Communicate Connexion GSM

Communicate Liberty GSM

Communicate Liberty GSM Prima

Communicate Liberty PhoenixAlltron AL-SW14400 Modem

COMPAQ 144 Data+Fax Modem Series 570

COMPAQ 2400 PCMCIA

COMPAQ 288 Data+Fax Modem Series 571

COMPAQ 288 PCMCIA Modem

COMPAQ Enhanced 144 Data+Fax

COMPAQ Enhanced 2400 Data+Fax

COMPAQ Enhanced 9600 Data

COMPAQ Enhanced 9600 Data+Fax

COMPAQ Enhanced 9600 Modem

COMPAQ Global 28.8 Telephony Modem (PCMCIA)

COMPAQ International 2400 Data

COMPAQ PCMCIA 144

COMPAQ PCMCIA 2400-9600

COMPAQ Presario 144 Data+Fax+Voice

COMPAQ Presario 24-96 Data+Fax+Voice

COMPAQ Presario Int'l 24-96 Data+Fax+Voice

COMPAQ SpeedPAQ 144

COMPAQ SpeedPaq 144 Enhanced COM

COMPAQ SpeedPAQ 144 PCMCIA

COMPAQ SpeedPaq 144-I

COMPAQ SpeedPaq 144-P

COMPAQ SpeedPaq 19.2 Kbps PCMCIA Modem

COMPAQ SpeedPaq 192 PCMCIA Modem

COMPAQ SpeedPaq 192S PCMCIA Modem

COMPAQ SpeedPaq 288 Telephony Modem (PCMCIA)

Computer Periph. CPI Viva Modem 24

Computer Periph. Viva 14.4 Data Fax

Computer Periph. Viva 14.4 Data FAX Internal

Computer Periph. Viva 14.4 Data FAX PCMCIA

Computer Periph. Viva 14.4 FAX-P Pocket

Computer Periph. Viva 14.4i Data FAX

Computer Periph. Viva 2400 Data-Fax External

Computer Periph. Viva 2400 Data-Fax Internal

Computer Periph. Viva 2442if

Computer Periph. Viva 2496p Pocket

Computer Periph. Viva 24i

Computer Periph. Viva 28.8

Computer Periph. Viva 300-1200-2400

Computer Periph. Viva Hookup 2400

Computer Periph. Viva Hookup 2400SE

Computer Periph. Viva Message Center

Connectware® PhoneWorks 28.8 To Go!

CPV Delta 14.4 extern

CPV Delta 2.400 extern

CPV Delta 28.8 extern

CPV Delta V.34

CPV MC 218 Modem Card 28.8

CPV Pico T 14.4 Fax extern

CPV Sirius I PCMCIA

CPV Sirius II PCMCIA

Creative Labs Modem Blaster 14.4 PCMCIA

Creative Labs Modem Blaster 19.2

Creative Labs Modem Blaster 28.8 PCMCIA

Creatix 14.4

Creatix 14.4 PCMCIA

Creatix LC144

Creatix LC144i

Creatix LC144VF

Creatix LC144VF Firmware 1.41

Creatix LC144VF Firmware 1.5

Creatix LC144VF Firmware 1.61

Creatix LC144VFi

Creatix LC288 V.34 Firmware 1.10a

Creatix LC288FC

Creatix LC288FC Firmware 0.51

Creatix LC288FC Firmware 1.0

Creatix LC288FV.34i

Creatix LC288VFV.34

Creatix LC288VFV.34i

Creatix PC144SF

Creatix SG144 Firmware 1.6

Creatix SG144 Firmware 1.61

Creatix SG144i

Creatix SR2496

CTK SHORTY 144 SL

CXR Telcom 1445

Data Race RediCARD Data 14.4 Fax 9600

Data Race RediCARD Data 2400 Fax 9600

DATACONSYST DAC124

Dataflex Rapier+ V32Bis

DataRace RediModem V.32bis

Datatrek 2424AMH

Datatrek Elite 624D

Datatrek V.32

DEC 14.4 Data FAX PCMCIA

DEC 28.8 Data FAX PCMCIA

Diamond Multimedia Supra 288i SP

Diamond Multimedia Supra 336i JP

Diamond Multimedia Supra 336i SP

Diamond Multimedia Supra 336i SVD

Diamond Multimedia SupraExpress 288 PnP Japan

Diamond Multimedia SupraExpress 288i Multi-National

Diamond Multimedia SupraExpress 288i Multinational

Diamond Multimedia SupraExpress 288i PnP

Diamond Multimedia SupraExpress 288i PnP Japan

Diamond Multimedia SupraExpress 288i SP

Diamond Multimedia SupraExpress 336 PnP

Diamond Multimedia SupraExpress 336i Multinational

Diamond Multimedia SupraExpress 336i PnP

Diamond Multimedia SupraFAXModem 288 German

Diamond Multimedia SupraFAXModem 288(336)

Diamond Multimedia SupraFAXModem 288i (336)

Diamond Multimedia SupraSonic 288V+

Diamond Multimedia SupraSonic 336V+

Diamond Supra 288iSP  133

Digicom 9624AR External

Digicom 9624AR+ External

Digicom 9624E External

Digicom 9624E+ External

Digicom 9624LE External

Digicom 9624LE+ External

Digicom 9624LR External

Digicom 9624LR+ External

Digicom 9624PC+ Internal

Digicom CCM 44 F

Digicom CCM 44 P

Digicom CCM 44 P

Digicom Connection 144+ Internal

Digicom Connection 144+FAX Internal

Digicom Connection 144DF Internal

Digicom Connection 96+ Internal

Digicom Connection Pro 19.2 Internal

Digicom FaxModem 1442PC Internal

Digicom Scout

Digicom Scout 14400 PCMCIA Fax Modem

Digicom Scout Classic 144 External

Digicom Scout External

Digicom Scout Internal

Digicom Scout Plus

Digicom Scout Plus External

Digicom Scout Plus Internal

Digicom Scout Plus Terbo External

Digicom SNM 46 F

Digicom SNM 46 SR

Digicom SNM28

Digital Pathways Defender 1000 with Hayes® Optima 96

Digitan 14400 bps Internal Data-Fax

Digitan 28.8

Digitan 28.8

Digitan 28.8 DSVD Data Fax Voice

Digitan DS144FVM 14.4 Fax-Data-Voice Modem

Digitan DS288F 28.8 Fax-Data Modem

Digitan DS288FVM 28.8 Fax-Data-Voice Modem

Discovery & Victory 28.8K modem

Discovery 1414 CX

Discovery 1414 HX

Discovery 1414 VIP

Discovery 1442 AM  1414 AX security

Discovery 1942 AM  1914 AX V32terbo-security

Discovery 2400 A

Discovery 2400 AM with MNP® & V.42(bis)

Discovery 2400 C

Discovery 2400 C with Send Only Fax support

Discovery 2400 CM or QM with MNP

Discovery 2400 CM or QM with MNP & V.42(bis)

Discovery 2400 H

Discovery 2400 H with Send Only Fax support

Discovery 2400 HM

Discovery 2400 P

Discovery 2400 P with Send Only Fax support

Discovery 2400 PM

Discovery 2400 V

Discovery 2400 VM

Discovery 2496 CX

Discovery 2496 HX

Discovery 2496 PX

Discovery 2814 CX

Discovery 2814 HX

Discovery 9632 AM or AX with V32bis

Discovery 9632 AX or AX with V32

Discovery Victory 14400 E

Discovery Victory 14400 I

Discovery Victory 2400 E

Discovery Victory 2400 I with jumper-selection

Discovery Victory 2423 E

Discovery Victory 2423 I with jumper-selection

DP Defender 1000D Hayes Ultra

Dr. Neuhaus Fury 14400 TI®

Dr. Neuhaus Fury 14400 TI SL-II

Dr. Neuhaus Fury 19.2 TI

Dr. Neuhaus Fury 19.2 TI V.32ter

Dr. Neuhaus Fury 19200 TI

Dr. Neuhaus Fury 2403 TI

Dr. Neuhaus Fury Card 14.4

Dr. Neuhaus FURY CARD 14.4 PCMCIA V.32bis

Dr. Neuhaus FURY CARD 19.2 PCMCIA V.32ter

Dr. Neuhaus Fury Card 24

Dr. Neuhaus Fury Card 2400

Dr. Neuhaus GIPSY CARD PCMCIA V.32 GSM

Dr. Neuhaus Niccy 3000 TI

Dr. Neuhaus Smarty 14.4 TI

Dr. Neuhaus Smarty 144 TI

Dr. Neuhaus Smarty 14400 TI

Dr. Neuhaus Smarty 19.2 TI

Dr. Neuhaus SMARTY 19.2 TI V.32ter

Dr. Neuhaus Smarty 19200

Dr. Neuhaus Smarty 19200 TI

Dr. Neuhaus Smarty 24 PC

Dr. Neuhaus Smarty 24 TI

Dr. Neuhaus SMARTY 24 TI, 24 PC V.22bis

DSI 9624E

DSI 9624LE Plus

Dynalink 1414 VE

Dynalink 1414 VH

Dynalink 1414 VQC

Dynalink 1414 VQE

Dynalink 1414 VQH

Dynalink 2400 MH

Dynalink 2400 MP

Dynalink 2400 VH

Dynalink 2400 VP

Dynalink 9624 AH

Dynalink 9624 VAH

Dynalink 9624 VAP

Dynalink 9624 VQE

Dynalink 9624 VQH

Dynalink 9624 VQP

Dynalink EVQ 1414

Dynalink IVQ 1414

Dynalink V9624 VQE

Easytel TeleWell Internal TW-2814Si Data-Fax Modem

Easytel Well External AT-1414SAM Data-Fax Modem

Easytel Well External AT-2814SAM Data-Fax Modem

Easytel Well External XT-1414SAM Data-Fax Modem

Easytel Well External XT-2814SAM Data-Fax Modem

Easytel Well Internal AT-1414PCM Data-Fax Modem

Easytel Well Internal AT-1414PCV Data-Fax Modem

EEH Elink 29-3 analog

EEH Elink 29-3 ISDN

EEH Elink 301

EEH Elink 310

EEH Elink 32

EEH Elink 32-3 analog

EEH Elink 32-3 ISDN

Eiger 14.4 Data Fax PCMCIA

Eiger 144 PCMCIA

Eiger EFX-2880NA V.34 Fax Modem

Eiger EFX-2880P 28.8 Data Fax Cell PCMCIA

Eiger EFX-288E V.34 Fax Modem

ELISA 144

Elproma Electr. MOD144

Elproma Electr. MOD144i

Elproma Electr. MOD288

Elproma Electr. MOD288i

ELSA GmbH ELISA 144

ELSA GmbH ELISA 144V

ELSA GmbH MicroLink 14.4 T - TM - TL

ELSA GmbH MicroLink 14.4MC

ELSA GmbH MicroLink 14.4PC

ELSA GmbH MicroLink 14.4TL

ELSA GmbH MicroLink 14.4TQ

ELSA GmbH MicroLink 14.4TQV

ELSA GmbH MicroLink 2440T

ELSA GmbH MicroLink 2440TR

ELSA GmbH MicroLink 2460MC

ELSA GmbH MicroLink 2460PC

ELSA GmbH MicroLink 2460TL

ELSA GmbH MicroLink 24oooTL

ELSA GmbH MicroLink 28.8TQ

ELSA GmbH MicroLink 28.8TQV

ELSA GmbH MicroLink 288ooTL

ELSA GmbH MicroLink ISDN TD

ELSA GmbH MicroLink ISDN TL

ELSA GmbH MicroLink ISDN TL PRO

ELSA GmbH ZIFF 144

ELSA MicroLink 14.4 PC

ELSA MicroLink 14.4 T

ELSA MicroLink 14.4 TL

ELSA MicroLink 14.4 TM

ELSA MicroLink 14.4MC

ELSA MicroLink 2440T

ELSA MicroLink 2440TR

ELSA MicroLink 2460MC

ELSA MicroLink 2460PC

ELSA MicroLink 2460TL

ELSA MicroLink 288ooTL

ELSA MicroLink ISDN/TL

ELSA ZIFF 144

Epson® Data Fax 24-96

Ericsson 14.4CC PCMCIA

Ericsson AS 2314C

Ericsson AS 2319TZ

Ericsson AS SBN 1496A

Ericsson AS SBN 2314C

Ericsson AS SBN 2319C

Ericsson AS ZAT 14.4 14.4-7

Ericsson AS ZAT19.2 19.2-7

Ericsson SBN and ZAT models

Ericsson V.34CC PCMCIA

Ericsson V.34CC PCMCIA Analogue Cellular

Ericsson V.34DT

Ericsson V.34TZ Pocket Modem®

Ericsson V.34TZ Pocket Modem Analogue Cellular

E-Tech Bullet 100E 28.8 V.34 Data Fax

E-Tech Bullet C1414CX 14.4 Data Fax PCMCIA

E-Tech Bullet E1414MX

E-Tech Bullet E288MX

E-Tech Bullet PC1414UX 14.4 Data Fax

E-Tech Bullet PC288MX 28.8 V.34 Data Fax

E-Tech C1414AX FAX PCMCIA

E-Tech C1414AX PCMCIA

E-Tech E9696M

E-Tech P1496MX FAX

E-Tech Ufomate P1414MX

E-Tech Ufomate P1496MX

ETech UFOMATE P1496MX

Evercom 24

Evercom 24E

Evercom 24E+

Exar Internal 24-96 Fax

Exar ROHM Card 24-96 Data-Fax

EXP 1414CL Fax-Data PCMCIA

EXP 14400-14400 Fax-Data PCMCIA

EXP 144i Fax-Data PCMCIA

EXP 28.8i Fax-Data PCMCIA

EXP 9600-2400 Fax-Data PCMCIA

EXP 9600-9600 Fax-Data PCMCIA

EXP Basic-LX PCMCIA

EXP Computer ThinFax 1414i

EXP Computer ThinFax 288i

EXP ThinFax 288i, ThinFax 1414i, ThinFax 288c  133

EXP ThinFax Basic Fax-Data PCMCIA

EYP Telecom. BV32B

EYP Telecom. MicroV32B

EYP Telecom. MV32 Plus

EYP Telecom. MV32B#

EYP Telecom. MVMNP

EYP Telecom. MVMUL

EYP Telecom. PCMNP

EYP Telecom. PCMUL

EYP Telecom. PCVOX

Fastcomm MonoFRAD

Galaxy Apollo®

Galaxy UFO

Garnet GTM288PC3 V.34   133

Garnet Systems GTM288PC3  133

Gateway 2000 2400-9600 Internal

Gateway 2000 2400-9600 PCMCIA

Gateway 2000 Internal

Gateway 2000 Internal Alt

Gateway 2000 Nomad 14400

Gateway 2000 PCMCIA

Gateway 2000 TelePath

Gateway 2000 Telepath 14.4-14.4 PCMCIA

Gateway 2000 Telepath 14.4-14.4 XJack PCMCIA

Gateway 2000 Telepath II 14400 Internal

Gateway 2000 Telepath II 28.8 Data Fax Voice

GENER GE925

GENER Generique 14400

Generic 144 PCMCIA modem

GENFAX 14400

Global Village PowerPort Gold PC Card

Global Village TelePort Platinum

GVC External 28800 Fax Modem

GVC External Fax Modem 9648

GVC External Fax Modem 9696

GVC External Super Modem 2400

GVC Fax Modem 14400 V.42bis-MNP5

GVC FM14400

GVC Internal FAX Modem F-1114HV-R2

GVC PCMCIA Faxmodem FM144-144V(P)

GVC PCMCIA Faxmodem PFM-964824

GVC SM2400

GVC SM96

GVC V.32 9600 Modem

Haeussler H-144

Hayes Accura 144 + FAX144

Hayes Accura 14400

Hayes Accura 144B + FAX144

Hayes Accura 24 EC + FAX96

Hayes Accura 2400

Hayes Accura 24B EC + FAX96

Hayes Accura 288 V.34 + FAX

Hayes Accura 288 V.FC + FAX

Hayes Accura 28800

Hayes Accura 96 + FAX96

Hayes Accura 96B + FAX96

Hayes Optima 144

Hayes Optima 144 + FAX144

Hayes Optima 144 + FAX144 PCMCIA

Hayes Optima 144 + FAX144 Pocket Edition

Hayes Optima 14400

Hayes Optima 144B + FAX144

Hayes Optima 24

Hayes Optima 24 + FAX96

Hayes Optima 24 + FAX96 PCMCIA

Hayes Optima 24B + FAX96

Hayes Optima 288 V.34 + FAX

Hayes Optima 288 V.34 + FAX PCMCIA

Hayes Optima 288 V.34-V.FC + FAX + Voice

Hayes Optima 288 V.FC + FAX

Hayes Optima 288 V.FC + FAX (UK)

Hayes Optima 28800

Hayes Optima 288B V.FC + FAX

Hayes Optima 96

Hayes Optima 96 + FAX96

Hayes Optima 9600

Hayes Optima 96B + FAX96

Hayes Optima PCMCIA 14400

Hayes Pocket Modem 2400

Hayes Smartmodem™ 1200

Hayes Smartmodem 1200B

Hayes Smartmodem 2400™

Hayes Smartmodem 9600

Hayes Ultra 14400

Hayes Ultra 24 Smartmodem 2400 + Express 96

Hayes Ultra 9600

Hayes V-series Smartmodem 9600

Hayes V-series Ultra Smartmodem 14400

Hayes V-series Ultra Smartmodem 9600

Hidem 14400/FAX

Hidem 2442P/FAX

Hidem Tech. 1200

Hidem Tech. 1200BS

Hidem Tech. 14400DLX

Hidem Tech. 14400FAX

Hidem Tech. 14400I DLX

Hidem Tech. 14400I FAX

Hidem Tech. 14400P FAX

Hidem Tech. 2400

Hidem Tech. 2400CD

Hidem Tech. 2400DLX

Hidem Tech. 2400H

Hidem Tech. 2400P

Hidem Tech. 2442FAX

Hidem Tech. 2442I FAX

Hidem Tech. 2442P FAX

Hidem Tech. 9600DLX

Hidem Tech. 9600I DLX

Hidem Tech. Prodem 2400M

Hidem Tech. Vida 2400SNI

Hidem Tech. Vida 2442FAX

Hotline Handy 144 CC

Hotline Handy 9672 CC

Hotline Handy V.34CC

IBM 14400 PCMCIA

IBM 2400

IBM 2400-9600 Data FAX

IBM Thinkpad 28.8 Mwave Data Fax  1,128

ICO ALPHA Speed 14.4

ICO DAGO Speed

ICO Escom Black Power Modem 14.4

ICO NYTECH 14.4

ICO SIMBA 14.4

ICO TELEJET 14400

ICO Telejet 14400

Infotel 1414VQE

Infotel 1414VQE External

Infotel 1414VQH

Infotel 1414VQP

Infotel 1428VQE

Infotel 1428VQH-R

Infotel 144I

Infotel 2400 SF

Infotel 2400 SM-24N-S

Infotel 2400P

Infotel 9624H-S

Infotel 9624P

INSYS Onbit 144 Fax

INSYS Onbit 144 Fax Plusversion

INSYS Onbit 288 Fax

INSYS Onbit 288 Plusversion Fax

INSYS Onbit 288FAX

INSYS Onbit 288FAX mit Display

INSYS Onbit 9624 Fax

INSYS PC Steckarte 288

INSYS PC Steckkarte 144

INSYS PC Steckkarte 144 BA

InteCom® InteCom

Intel 14.4EX

Intel 14400 PCMCIA

Intel 14400EX

Intel 2400 PCMCIA

Intel 2400e V.42bis Modem

Intel 9600EX

Intel Cellular Faxmodem 14.4 PCMCIA

Intel Faxmodem 14.4 PCMCIA (MBFM6830)

Intel Faxmodem 14.4 PCMCIA (MBFM6831)

Intel Faxmodem 144-144e

Intel Faxmodem 144-144i

Intel Faxmodem 24-96 PCMCIA

Intel Faxmodem 24-96i

Intel Faxmodem 24v-96e

Intel Faxmodem 24v-96i

Intel Faxmodem 9600 PCMCIA (MBFM6820)

Intel Faxmodem 9600 PCMCIA (MBFM6821)

Intel Faxmodem 96-96e

Intel Faxmodem 96-96i

Intel International Faxmodem 14.4 PCMCIA

Intel International Faxmodem 24-96 PCMCIA

Intel SatisFaxtion®

Intel SatisFAXtion Classic

Intel SatisFAXtion Modem 100

Intel SatisFAXtion Modem 200

Intel SatisFAXtion Modem 300

Intel SatisFAXtion Modem 400

Intel SatisFAXtion Modem 400e

Intertex IX33 28.8

Intertex IX33 ext 14.4

Intertex IX33 intern 14.4

Intertex IX33 PCMCIA

Intertex IX33 PCMCIA28.8

Intertex IX33 voice 14.4

Intertex IX34 extern

Intertex IX34 intern

Intertex IX34 PCMCIA

Intertex IX34 voice

ke WorldBlazer

Kingston DataRex 14.4 PCMCIA

Kingston DataRex PCMCIA 144

KORTEX Int'l 14400 Externe

KORTEX Int'l 14400 Interne

KORTEX Int'l 14400 PCMCIA

KORTEX Int'l 2400 et MINITEL FAX Externe

KORTEX Int'l 2400 et MINITEL FAX Interne

KORTEX Int'l 2400 PCMCIA

KORTEX Int'l 28800 Externe

KORTEX Int'l 28800 Interne

KORTEX Int'l 28800 PCMCIA

KORTEX Int'l KX PRO 144

KORTEX Int'l KX PRO 144 BOX

KORTEX Int'l KX PRO 144 Box Pocket

KORTEX Int'l KX PRO 144 CARTES

KORTEX Int'l KX PRO 144 PCMCIA

KORTEX Int'l KX PRO 144 POCKET

KORTEX Int'l KX PRO 2400

KORTEX Int'l KX PRO 2400 & KX TEL FAX Box Pocket

KORTEX Int'l KX PRO 2400 & KX TEL FAX Carte

KORTEX Int'l KX PRO 2400 LECAM Box Pocket

KORTEX Int'l KX PRO 2400 LECAM Carte

KORTEX Int'l KX PRO 2400 PCMCIA

KORTEX Int'l KX PRO 288 & KX PRO NUMERIS 288

KORTEX Int'l KX PRO 288 Box Pocket

KORTEX Int'l KX PRO 288 PCMCIA

KORTEX Int'l KX PRO 9600

KORTEX Int'l KX PRO NUMERIS 144 RTC  Carte

KORTEX Int'l KX PRO NUMERIS Modem 144

KORTEX Int'l KX PRO NUMERIS Modem 288

KORTEX Int'l KX PRO NUMERIS PAD

KORTEX Int'l KX TEL FAX PS

KORTEX Int'l KXPOCKET 9600

KORTEX Int'l NFX 144 CARTES

KORTEX Int'l NFX 144 POCKET

KORTEX Int'l NOVAFAX 144 Box Pocket

KORTEX Int'l NOVAFAX 144 Carte

KORTEX Int'l NOVAFAX 144 PCMCIA

KORTEX Int'l NOVAFAX 2400 Box Pocket

KORTEX Int'l NOVAFAX 2400 Carte

KORTEX Int'l NOVAFAX 2400 PCMCIA

KORTEX Int'l NOVAFAX 288 Box Pocket

KORTEX Int'l NOVAFAX 288 Carte

KORTEX Int'l NOVAFAX 288 PCMCIA

KORTEX Int'l NUMERIS 144 Externe

KORTEX Int'l NUMERIS 144 Interne

KORTEX Int'l NUMERIS 288 Externe

KORTEX Int'l NUMERIS 288 Interne

KORTEX Int'l NUMERIS Externe

KORTEX Int'l NUMERIS Interne

LASAT Commun. CREDIT 144

LASAT Commun. CREDIT 288

LASAT Commun. PCM144 Fax

LASAT Commun. Unique 144

LASAT Commun. Unique 24/96

LASAT Commun. Unique 288

LASAT CREDIT 144

LASAT CREDIT 288

LASAT PCM144 Fax

LASAT Unique 144

LASAT unique 24-96

LASAT unique 640i - HDLC

LASAT unique 640i - Short hold

LASAT unique 640i - V.110

LASAT unique 640i - V.120

LASAT unique 640i - X.25

LASAT unique 640i - X.75

LASAT unique SAFIRE 144

LASAT unique SAFIRE 288

LCE  124

LCE  124 V23

LCE  144P

LCE  MINI 126

LCE  Minimodem 23

LCE  NUMERIS

LCE 124

LCE 124 V23

LCE 126P

LCE 132P

LCE 144P

LCE MINI 126

LCE Minimodem 23

LCE NUMERIS

LIGHTFAX 1440LC

LOGEM 914

LOGEM 928

Logicode 14.4 Data-Fax External

Logicode 14.4 Data-Fax Internal 1414HV

Logicode 14.4 Data-Fax-Voice External

Logicode 14.4 Data-Fax-Voice Internal

Logicode 14.4 Data-Fax-Voice PCMCIA

Logicode 28.8

Logicode 9624 Data-Fax External

Logicode 9624 Data-Fax Internal

Longshine 14.4K 9600 bps External Modem Fax

M. Bullet 100E V.34

M. Bullet E1414MX

M. Bullet ModemMan

M. Bullet ModemMan V.terbo

M. Bullet PC1414MX

M. Bullet PC192MX V.terbo

M. Bullet PCMCIA 1414M

M. CashCom

M. SpiderMan

Macronix 1200 bps

Macronix 14.4 Data FAX PCMCIA

Macronix Maxlite Fax 9696

Macronix VOMAX 2000

Maestro 144FMEI

Maestro RC224FMI

MagicRam 144 International Data Fax Modem

MagicRam 288 International Data Fax Modem

MagicRam Mercury 9624 Voice-Fax

Martignoni Elec. Bullet 100E V.34

Martignoni Elec. Bullet E1414MX

Martignoni Elec. Bullet ModemMan

Martignoni Elec. Bullet ModemMan Plus

Martignoni Elec. Bullet ModemMan V.terbo

Martignoni Elec. Bullet PC1414MX

Martignoni Elec. Bullet PC192MX

Martignoni Elec. Bullet PCMCIA 1414M

Martignoni Elec. CashCom

Martignoni Elec. SpiderMan

Megahertz Alternative

Megahertz C5144 for COMPAQ LTE

Megahertz C596FM

Megahertz C596FM for COMPAQLTE

Megahertz C6144

Megahertz C696FM

Megahertz CC2144 V.32bis PCMCIA Modem

Megahertz CC3144 or CC4144 PCMCIA

Megahertz CC3144 V.32bis PCMCIA Modem

Megahertz CC324FM V.22bis PCMCIA Modem

Megahertz CC396FM PCMCIA Modem

Megahertz CC4144 V.32bis PCMCIA Modem

Megahertz EM1144-T PCMCIA Modem+Net Card

Megahertz P2144 AA Batteries

Megahertz P2144 Pkt Faxmodem

Megahertz P2144 V.32bis Pocket Modem

Megahertz P224FMV

Megahertz P296FMV

Megahertz P296FMV AA Batteries

Megahertz PCMCIA Modem

Megahertz T3144

Megahertz T3144 for Toshiba

Megahertz T396FM

Megahertz T396FM for Toshiba

Megahertz TX3144

Megahertz XJ1144 V.32bis PCMCIA Modem

Megahertz XJ124FM V.22bis PCMCIA Modem

Megahertz XJ196FM PCMCIA Modem

Megahertz XJ2144 V.32bis PCMCIA Modem

Megahertz XJ2288 PCMCIA Modem

Megahertz XJack PCMCIA 144

Megahertz XJack PCMCIA 288

Megahertz XJ-CC4288 Modem

Megahertz XJ-CC4288 Modem

Megahertz Z3144

Megahertz Z3144 for Zenith

Megahertz Z396FM

Megahertz Z396FM for Zenith

Megahertz Z5144

Megahertz Z596FM

Metricom Wireless 9600

Microcom® DeskPorte

Microcom DeskPorte 28.8P

Microcom DeskPorte 28.8P Parallel

Microcom DeskPorte ES 14.4

Microcom DeskPorte FAST

Microcom DeskPorte FAST EP 28.8

Microcom DeskPorte FAST EP 28.8 Parallel

Microcom DeskPorte FAST ES 28.8

MicroCom DeskPorte FAST ES28.8

Microcom DeskPorte FAST Parallel

MicroCom DeskPorte V.34

Microcom MicroPorte 4232bis

MicroCom QX 4232bis

Microcom TravelCard 28.8P

Microcom TravelCard 28.8P Serial

MicroCom TravelCard 288 PCMCIA

Microcom TravelCard FAST

Microcom TravelCard FAST Serial

Microcom TravelPorte

Microcom TravelPorte FAST

Microcom TravelPorte FAST Parallel

MicroComQX 4232HS

MicroGate MG144

MicroGate MG96

MicroPorte 1042

Mitsubishi® 14.4 PCMCIA

Modem Blaster 144 PCMCIA

Motorola 3260

Motorola 3260 FAST

Motorola CELLect 1+

Motorola CELLect 1+ PCS

Motorola CELLect 144

Motorola CELLect 144 PC Card

Motorola CELLect 2

Motorola CELLect 3

Motorola Codex 3265

Motorola Codex 3265FAST

Motorola Codex 3265FAST (V.34)

Motorola Codex 3266

Motorola Codex 3266FAST

Motorola Codex 3266FAST (V.34)

Motorola Codex 3267

Motorola Codex 3267FAST

Motorola Codex 3267FAST (V.34)

Motorola Codex 3268

Motorola Codex 3268FAST

Motorola Codex 3268FAST (V.34)

Motorola FasTalk 32x

Motorola FasTalk FAX32bx

Motorola FasTalk II

Motorola HMTA 200

Motorola HMTA 200 (ISDN)

Motorola Lifestyle 14.4 PC Card

Motorola Lifestyle 28.8 External

Motorola Lifestyle 28.8 V.34

Motorola OnlineSURFR 28.8 Internal Plug & Play

Motorola PCTA120

Motorola Power 28.8 V.34

Motorola Power 288

Motorola Power Series PCMCIA

Motorola TA110 - TA120

Motorola TA210

Motorola V.34R

Motorola V3225

Motorola V3227

Motorola V3229

Motorola V3257

Motorola V3400

Motorola VoiceSURFR 28.8 Internal Plug & Play

Multi-Tech MT932

Multi-Tech MultiModem 224

Multi-Tech MultiModem MT1432

Multi-Tech MultiModem MT1432BA

Multi-Tech MultiModem MT1432BC

Multi-Tech MultiModem MT1432BG

Multi-Tech MultiModem MT1432LT

Multi-Tech MultiModem MT1432MG

Multi-Tech MultiModem MT1432MU

Multi-Tech MultiModem MT1432ZDX

Multi-Tech MultiModem MT1932BA

Multi-Tech MultiModem MT1932BL

Multi-Tech MultiModem MT1932PCS

Multi-Tech MultiModem MT1932ZDX

Multi-Tech MultiModem MT1932ZPX

Multi-Tech MultiModem MT224BA

Multi-Tech MultiModem MT224BAF

Multi-Tech MultiModem MT2834

Multi-Tech MultiModem MT2834BA

Multi-Tech MultiModem MT2834BL

Multi-Tech MultiModem MT2834LT PCMCIA V.34

Multi-Tech MultiModem MT2834PCS

Multi-Tech MultiModem MT2834ZDX

Multi-Tech MultiModem MT932

Multi-Tech MultiModem MT932BA

Multi-Tech MultiModem MT932EA

Multi-Tech MultiModem MT932EAB

NEC 14.4 Data/Fax PCMCIA

NEC 14.4 Kbps Data-Fax Card

NEC 9635E Plus

NEC PC-9801N-J01

NEC PC-9801N-J05

NEC PC-9801N-J06

NEC PC-9821CB-B04

NEC PC-CM250

Netcomm Pocket M/F 2400-AUS

Netcomm Pocket Rocket PA- AUS

Netcomm Smartmodem E7F

New Media 14.4 DataFax

New Media 144 PCMCIA

Newlink TOP 32

Newlink TOP 34

Nissei FM2814 and FM1414  133

Nokia® 14.4 PCMCIA

Nokia Cellular Data Card DTP-2

NoteWorthy 14400 PCMCIA

Noteworthy 28.8

Noteworthy NW144CR Cellular PCMCIA

Noteworthy T144NW PCMCIA

Noteworthy T144NWX PCMCIA

Noteworthy T24NW PCMCIA

Novalink Novamodem 28.8 and NTT Thundercard AVF 28.8  133

NovaLink Tech. Novamodem 14.4 Data-Fax-Voice

NovaLink Tech. Novamodem 28.8 Data-Fax-Voice

NovaLink Tech. Novapak 14.4-32 Data-Fax-Voice-Pager

NovaLink Tech. Novapak 28.8 Data-Fax-Voice-Pager

NSC TYIN2000

Octocom 8324

Octocom 8396

Olicom ET-Modem GoCard  133

Olicom TR-Modem GoCard  133

OPTION 2496 Fax Data modem

OPTION GSM Ready PC Card V.32bis

OPTION GSM Ready PC Card V.34

OPTION Internal V.32bis

Option International GSM / POTS DATA/FAX  133

OPTION PCMCIA V.22bis

OPTION PCMCIA V.32bis

OPTION Rosita II Fax Data modem

OPTION Rosita V.34

OPTION UNIQUE V.32bis

P.N.B AMAZONE 2400

P.N.B Amazone Pocket

P.N.B Baby RIO

P.N.B Baby RIO 14400

P.N.B Baby Samantha

P.N.B Compouce TT2324

P.N.B Niagara 2400 MNP5

P.N.B PCMCIA Rio V.32bis

P.N.B PCMCIA Rio V.34

P.N.B RIO Grande PCMCIA

P.N.B RIO PC V32bis

P.N.B Rio Pocket Voice V.32bis

P.N.B Rio Pocket Voice V.34

P.N.B RIO Voice PCMCIA

P.N.B Samantha PCMCIA

Pace Linnet 32 Plus fx

Pace Linnet 34fx & Microlin fx 34 Internal Modem

Pace Linnet 34fx Ext & Microlin fx 34 Pocket Modem

Pace Linnet Message Desk

Pace Linnet VFC

Pace Microlin fx 32 Plus Internal Modem

Pace Microlin fx 32 Plus Pocket Modem

Pace Microlin fx NB 32 Plus PCMCIA Modem

Pace Microlin NB 34 PCMCIA Modem

Pace MobiFax 144

Pace Ultralink 32 Plus

Packard Bell 14.4AM(SP) Modem-Soundcard

Packard Bell 24DBF Data Fax Modem

Packard Bell F-114 Modem Fax

PC Tel Brahma  133

PCSI Ubiquity  133

PDI-1000

Phoebe Micro 14.4 Data Fax 1414VQH

Phoebe Micro 33.6 Data Fax 1433VQH

PIAL FAXMOD PC

Piiceon   14.4 Data 14.4 Fax

Piiceon   Dispatcher 14.4 for LTE and Contura

Piiceon   Dispatcher 14.4 for Toshiba

Piiceon   Dispatcher 14.4 PCMCIA

Piiceon   Dispatcher Modem

Piiceon   Dispatcher V.34 for LTE and Contura

Practical Peripherals 14400FX

Practical Peripherals 14400MT

Practical Peripherals 14400SA

Practical Peripherals 2400

Practical Peripherals 2400 Pkt

Practical Peripherals 2400MNP

Practical Peripherals 2400SA

Practical Peripherals 9600FX

Practical Peripherals 9600SA

Practical Peripherals PC144HC

Practical Peripherals PC144LCD

Practical Peripherals PC144MT

Practical Peripherals PC144T2-EZ PCMCIA

Practical Peripherals PC288HC V.34

Practical Peripherals PC288HC VFC

Practical Peripherals PC288LCD VFC

Practical Peripherals PC288MT

Practical Peripherals PC288MT II V.34

Practical Peripherals PC288MT VFC

Practical Peripherals PC288SA

Practical Peripherals PC288SA VFC

Practical Peripherals PC288T2-EZ PCMCIA

Practical Peripherals PM14400FX

Practical Peripherals PM14400FX MT

Practical Peripherals PM14400FX PKT

Practical Peripherals PM14400FX PS-2

Practical Peripherals PM14400FXSA

Practical Peripherals PM144HC II

Practical Peripherals PM144MT II

Practical Peripherals PM2400

Practical Peripherals PM2400 PS-2

Practical Peripherals PM2400EFX

Practical Peripherals PM2400EFX SA

Practical Peripherals PM2400FX

Practical Peripherals PM2400FX96SA

Practical Peripherals PM2400FXMT

Practical Peripherals PM2400SA

Practical Peripherals PM288HC II V.34

Practical Peripherals PM288HCII VFC

Practical Peripherals PM288MT II V.34

Practical Peripherals PM288MTII VFC

Practical Peripherals PM288PKT

Practical Peripherals PM288PKT VFC

Practical Peripherals PM9600

Practical Peripherals PM9600 V.32-V.42bis

Practical Peripherals PM9600FX

Practical Peripherals PM9600FX MT

Practical Peripherals PM9600HC II

Practical Peripherals PM9600MT II

Practical Peripherals PM9600SA

Practical Peripherals PractiCARD 144

Practical ProClass 144 PCMCIA

Premax 28.8

Prometheus 14.4 Modem

Prometheus CyberPhone PC144ev

Prometheus CyberPhone PC144evsp

Prometheus CyberPhone PC144iv

Prometheus CyberPhone PC144ivsp

Prometheus CyberPort PC144e

Prometheus CyberPort PC144i

Prometheus CyberStereo PC144iva

Prometheus CyberStereo PC144ivspa

Psion Dacom Gold V.32 PCMCIA Card

Psion Dacom PDM 50F

PSION Gold Card V34 PCMCIA  133

Puredata SatisFAXtion Modem 200

Puredata SatisFAXtion Modem 400

Puredata SatisFAXtion Modem 400e

Quantum Data Systems  Active 144UF Plus External  133

Quantum Data Systems  Active 288UB Internal, Active 288UF External  133

Quantum Data Systems Active 144UB Plus Internal  133

QUATERNAIRE V32.BIS

Racal ALM 3226

Racal GSM w/ Hayes Ultra

Racal Racal GSM with Hayes Optima 96

Racal RMD 2412

Racal RMD 2412/2

Racal RMD 2422

Racal RMD 3221

Racal RMD 3222

Racal RMD 3223

Racal RMD 3226

Racal RMD 9632PA

Racal RMD 9642PA

Racal-Airtech SAFEDial V.34

Rockwell 14400 bps Data-Fax

Rockwell 14400 bps Internal Data-Fax

Rockwell V.32bis RCV144ACF DP PnP CK2  133

SAT 14402

SBN 2314C

SD ACM400 w/ AT&T 3820

SEMAFOR 1496A

SEMAFOR 2324C

Semiconductor Sierra 14.4 Data Fax Voice SQ3230

Sierra 28.8 PnP Data-Fax-Voice SpeakerPhone  133

Simple Technology 14.4 Communicator  133

Simple Technology 28.8 Communicator  133

Simplemodem 144f

Simplemodem 144fi

Simplemodem 144ve

Simplemodem 144vi

Simplemodem 288f V.34

Simplemodem 288f V.FC

Simplemodem 288fi V.34

Simplemodem 288ve

Simplemodem 288vi

Simplemodem 96f

SMART Modular ST 1414 Cell PCMCIA

SMART Modular ST 1414 PCMCIA

SMART Modular ST 2814 V.34 PCMCIA

SMART Modular ST 9624 PCMCIA

SMART Modular ST 9624E PCMCIA

Smartlink Pocket 2400

Smartlink V32Bis/Fax

Sonix Commun. Canzona

Sonix Commun. Volante

Sonix Commun. Volante Fast

Sord Data/Fax/Voice PCMCIA

Sound Expression SE34SRS  133

Spectrum Envoy (14400 bps)

Spectrum Envoy (2400 bps)

Spectrum Envoy (9600 bps)

Sportster 14400 Fax PC  133

Supra COM CARD 144 PCMCIA

Supra COMcard 144 Data Fax PCMCIA

Supra Fax Modem 288

Supra Fax Modem 288 internal

Supra Fax Modem 9624 Internal

Supra Fax Modem Plus

Supra Fax Modem V32

Supra Fax Modem V32bis

Supra SupraExpress 144 Plus

Supra SupraExpress 144i PnP

Supra SupraFAXModem 144i

Supra SupraFAXModem 144LC

Supra SupraFAXModem 288

Supra SupraFAXModem 288i

Supra SupraFAXModem 288i PnP

Supra SupraFAXModem V.32

Supra SupraFAXModem V.32bis

Supra SupraFAXModem V.32bis or 144i

SupraModem 2400

Sysnet SMF-04

Sysnet SMF34.Fax V.22bisFaxCell

Sysnet SMF-36

Sysnet SMF36.Fax V.32bisFaxCell

Sysnet SMF-38.Fax V.34

Sysnet SMF44.Fax V.22bisFaxCell

Sysnet SMF71.Fax V.32bisFaxCell

Sysnet TOMMY V.32bis Fax

Taicom 1442 PC

TDK DF1414

TDK DF1414 14400 Data + Fax Modem

TDK DF1414B/M

TDK DF2496

TDK DF2496 2400 Data + 9600 Fax Modem

TDK DF2496B/M

TDK DF2814B V.FC

TDK DF2814B V.FC Serial

TDK DF2814V V.34

TDK DF2814V V.34 Serial

Telebit® Fastblazer 8840

Telebit QBlazer

Telebit QBlazer Plus

Telebit T1000

Telebit T1500

Telebit T1600

Telebit T2000

Telebit T2500

Telebit T3000

Telebit TrailBlazer Plus

Telebit TrailBlazer Plus 2400

Telebit V.34  28800

Telebit WorldBlazer

Telebit WorldBlazer-Rackmount

Telejet 14400

Telelink Cardline V32bis

Telelink IMS-08 Faxline+

Telelink IMS08

Telelink SAFEline

Telelink Swissmod III FAST

Telelink Swissmod III SWITCH

Texas Instruments TravelMate 14400 Data

Texas Instruments TravelMate 2400 Send Fax Modem

TKR SlimLine 144

TKR TerboLine 19k2

Tornado 2400

Tornado 96

Tornado FM 144 E

Tornado FM 144 H

Tornado FM 288 e

Tornado FM 288 h

Tornado FM14400

Toshiba BC 14.400 Fax-Data PCMCIA

Toshiba SLIM ASYNC

Toshiba SLIM FAX / 2400

Toshiba SLIM SYNC

Toshiba T144D-F

Toshiba T144PF4 PCMCIA

Toshiba T24D-F

Toshiba T24DX

Toshiba T24M

Toshiba T24SL PCMCIA

Toshiba TPCV32BF PCMCIA

Toshiba UK Advanced PCMCIA

Turbomodem  14.4 Data FAX Modem

Turbomodem  Plus FM-144VR-1

U.S. Robotics 288 PCMCIA

U.S. Robotics Courier 14

U.S. Robotics Courier 16

U.S. Robotics Courier 2400

U.S. Robotics Courier 2400 V42bis

U.S. Robotics Courier 2400 V42bis PC

U.S. Robotics Courier 28.8 Dual Standard Data-Fax PCMCIA

U.S. Robotics Courier 9600 HST

U.S. Robotics Courier 9600 HST PC

U.S. Robotics Courier 9600 V32

U.S. Robotics Courier 9600 V32 PC

U.S. Robotics Courier Dual

U.S. Robotics Courier Dual Standard V.34 Ready FAX

U.S. Robotics Courier HST

U.S. Robotics Courier HST Dual Standard Fax+ASL

U.S. Robotics Courier HST Dual Standard Fax+ASL+Cell

U.S. Robotics Courier HST Dual Standard V.32bis+ASL

U.S. Robotics Courier I-Modem ISDN & V.34

U.S. Robotics Courier Terbo Dual Standard Fax

U.S. Robotics Courier Terbo V32bis Fax

U.S. Robotics Courier V.32bis

U.S. Robotics Courier V.34 Data Fax Modem

U.S. Robotics Courier V.Everything External

U.S. Robotics Courier V.Everything Internal

U.S. Robotics Courier V.Everything PCMCIA

U.S. Robotics Courier V32bis with ASL

U.S. Robotics Courier V32bis-V42bis

U.S. Robotics General

U.S. Robotics Sportster 1200

U.S. Robotics Sportster 14400

U.S. Robotics Sportster 14400 FAX

U.S. Robotics Sportster 14400 FAX PC

U.S. Robotics Sportster 14400 PCMCIA

U.S. Robotics Sportster 14400 V.42bis

U.S. Robotics Sportster 14400 V.42bis PC

U.S. Robotics Sportster 2400

U.S. Robotics Sportster 2400 PC

U.S. Robotics Sportster 2400 V.42bis

U.S. Robotics Sportster 2400 V.42bis FAX

U.S. Robotics Sportster 2400 V.42bis FAX PC

U.S. Robotics Sportster 2400 V.42bis PC

U.S. Robotics Sportster 28800 External

U.S. Robotics Sportster 28800 Internal

U.S. Robotics Sportster 28800 PCMCIA

U.S. Robotics Sportster 28800 V34

U.S. Robotics Sportster 28800 VFC

U.S. Robotics Sportster 28800-33600 Internal

U.S. Robotics Sportster 9600

U.S. Robotics Sportster 9600 FAX PC

U.S. Robotics Sportster 9600 V.42bis

U.S. Robotics Sportster 9600 V.42bis PC

U.S. Robotics Total Control Quad V.34 card

U.S. Robotics V32bis Quad Digital

U.S. Robotics Worldport 1200 (Touchbase Systems)

U.S. Robotics Worldport 14400

U.S. Robotics Worldport 14400

U.S. Robotics Worldport 14400 FAX

U.S. Robotics Worldport 14400 PCMCIA

U.S. Robotics Worldport 16800 Dual Standard Fax

U.S. Robotics Worldport 2400 (EXAR)

U.S. Robotics Worldport 2400 V.42bis (EXAR)

U.S. Robotics Worldport 2400 V.42bis FAX (EXAR)

U.S. Robotics Worldport 2496 PCMCIA

U.S. Robotics Worldport 2496 V.42bis FAX

U.S. Robotics Worldport 2496itd V.42bis FAX

U.S. Robotics Worldport 9600 MNP 5

U.S. Robotics Worldport 9600 V.42bis

U.S. Robotics Worldport 9696 V.42bis FAX

U.S. Robotics Worldport Lite 14400

U.S. Robotics Worldport Lite 2400

UCOM FASTLINK 144

UCOM TRAVELLER 144

UDS Motorola CELLect 144

UDS Motorola FasTalk II

UDS Motorola FasTalk V.32/42b

UDS Motorola FasTalk V32- SWE

UDS Motorola V.3225

UDS Motorola V.3227

UDS Motorola V.3229

UDS Motorola V.3400

UFOMATE P1496MX

USR Courier V.32bis

Ven-Tel 14400 Fax

Ven-Tel 14400 Fax Internal

Ven-Tel 9600 Plus Fax Modem

Ven-Tel 9600 Plus II

Ven-Tel 9600 Plus II Fax Modem

Ven-Tel ECV 32bis II

Ven-Tel PCM14400 Fax Modem

Ven-Tel PCM9600 Fax Modem

Ven-Tel Pocket 24 V.42bis FAX

Victory 1414 VIP

Victory 14400 E (AT&T chipset)

Victory 14400 E (Rockwell chipset)

Victory 2400 I

Victory 2423 I

Victory 28800 E

Victory 28800 I

ViVa 144 Fax

Western Datacom Worldcom

Winbook 14.4 Data FAX

WOERLEIN DATAPHON

WOERLEIN DATAPHON MIT DISPLAY

WOERLTRONIC dataphon M 144 fax

WOERLTRONIC dataphon M 24,96 Fax

WOERLTRONIC dataphon M 288 fax

WOERLTRONIC dataphon SK 24,96 fax Steckkarte

WOERLTRONIC dataphon SK 288 fax Steckkarte

WOERLTRONIC dataphon SK 288 Steckkarte

WOERLTRONIC dataphon VC 144

WOERLTRONIC Little dataphon 144  fax

WOERLTRONIC Little dataphon 288  fax

WOERLTRONIC SK 144 BA Steckkarte

WOERLTRONIC SK 144 Voice Steckkarte

Xircom CEM2 CreditCard Ethernet+Modem II

Xircom CreditCard Modem 28.8  133

Xircom CreditCard Modem 28.8 CM28

Xircom CreditCard Modem 28.8 CM28 RevB Cell

Xircom Ethernet+Modem (CEM 28.8)

Xircom Ethernet+Modem PCMCIA

Xircom PEM

Yoriko 144ET

Zenith Z-Note 14.4 Data-Fax

Zoltrix 14.4

Zoltrix 14.4 Data FAX Modem

Zoltrix 28.8

Zoom 2400 V.42bis

Zoom AFX

Zoom Fax Modem V.34X Model 470

Zoom FC 9624

Zoom FC 9624V

Zoom FX 9624

Zoom FX 9624V

Zoom HC 2400

Zoom PCMCIA 14.4C

Zoom PCMCIA LC

Zoom PKT 14.4

Zoom V.34I

Zoom V.34X

Zoom VFDI

Zoom VFDX

Zoom VFP 14.4V

Zoom VFP 19.2

Zoom VFP 24K

Zoom VFP 28.8

Zoom VFP 28.8 internal

Zoom VFP V.32bis

Zoom VFX 14.4V

Zoom VFX 19.2

Zoom VFX 24K

Zoom VFX 28.8

Zoom VFX or VFP V.32bis

Zoom VFX V.32bis

Zoom VP V.32

Zoom VP V.32bis

Zoom VX V.32

Zoom VX V.32bis

Zypcom Z32b-PX Pocket

Zypcom Z32b-SX

Zypcom Z32t-SX

Zypcom Z34-SX

ZyXEL async PPP  to sync HDLC - 64k0, Elite 2864I ISDN v2.x

ZyXEL async SLIP to sync HDLC - 64k0, Elite 2864I ISDN v2.x

ZyXEL FAX into DRAM, Elite 2864  POTS v1.x

ZyXEL FAX into DRAM, Elite 2864I ISDN v2.x

ZyXEL FAX to PRINTER (HP DJ-500), Elite 2864I ISDN v2.x

ZyXEL Fax U-1496B

ZyXEL Fax U-1496B Plus

ZyXEL Fax U-1496E Plus

ZyXEL Fax U-1496P

ZyXEL Fax U-1496RE

ZyXEL Fax U-1496RE Plus

ZyXEL Fax Voice U-1496 Plus

ZyXEL Fax Voice U-1496E

ZyXEL ISDN Elite 2864I

ZyXEL ISDN Omni TA128

ZyXEL ISDN V.110 19k2, Elite 2864I ISDN v2.x

ZyXEL ISDN V.110 38k4, Elite 2864I ISDN v2.x

ZyXEL ISDN V.110 57k6 (for Japan only), Elite 2864I ISDN v2.x

ZyXEL ISDN V.120 64k0, Elite 2864I ISDN v1.x

ZyXEL ISDN V.120 64k0, Elite 2864I ISDN v2.x

ZyXEL ISDN X.75  64k0, Elite 2864I ISDN v1.x

ZyXEL ISDN X.75  64k0, Elite 2864I ISDN v2.x

ZyXEL ISDN X.75 CCB 128k0, Elite 2864I ISDN v2.x

ZyXEL ISDN X.75 MLP 128k0, Elite 2864I ISDN v2.x

ZyXEL MODEM Elite 2864

ZyXEL MODEM Omni 288S

ZyXEL MODEM V.34 28k8, Elite 2864I ISDN v2.x

ZyXEL SPEECH v2.x connection (over ab-Adapter), Elite 2864I ISDN v2.x

ZyXEL T-Online Service (for Germany only), Elite 2864I ISDN

ZyXeL U-1496

ZyXeL U-1496+

ZyXEL U-1496A

ZyXEL U-1496A Plus

ZyXeL U-1496B

ZyXeL U-1496B+

ZyXeL U-1496E

ZyXeL U-1496E+

ZyXEL U-1496EA

ZyXEL U-1496EA Plus

ZyXEL U-1496EG

ZyXEL U-1496EG Plus

ZyXEL U-1496G Plus

ZyXeL U-1496P

ZyXEL U-1496R

ZyXEL U-1496R Plus

ZyXEL U-1496RN

ZyXEL U-1496RN plus

ZyXEL U-1496S

ZyXEL U-1496S+

ZyXEL U-1496SN

ZyXEL U-1496SN Plus


Hardware Security Hosts

The following hardware security hosts have been tested for use with Remote Access Service, and are supported on x86, MIPS, and Alpha, and PowerPC platforms except as noted.

Digital Pathways Defender 1000D

Racal Gaurdata GSM

Security Dynamics ACM400


Multi-port Serial Adapters

The following multi-port serial adapters have been tested for use with Remote Access Service, and are supported on x86, MIPS, Alpha platforms, and PowerPC Platforms except as noted.

Comtrol RocketPort 8 1,134

Consensys ChiliPORTS/16 RAS Adapter 1

DigiBoard 2Port

DigiBoard 4Port

DigiBoard 8Port

DigiBoard CX Adapter

DigiBoard DigiCHANNEL PC/X Host Adapter for ISA bus 135

DigiBoard EPC Adapter

DigiBoard PC/2e (8K) Adapter

DigiBoard PC/4e Adapter

DigiBoard PC/4e (8K) Adapter

DigiBoard PC/8e Adapter

DigiBoard PC/8e (8K) Adapter

DigiBoard PC/8i Adapter

DigiBoard PC/16e Adapter

DigiBoard PC/16i Adapter

DigiBoard PC/Xem Adapter


Third Party Remote Access Servers

The following third party remote access servers have been tested for use with Remote Access Service on the Windows NT 4.0 Workstation.  See Remote Access readme file (rasread.txt) for details on third party product versions supported.

Shiva LAN Rover

Telebit NetBlazer

Cisco

3Com/Centrum AccessBuilder


Keyboards

Any keyboard 100% compatible with those listed below.

101/102-key

IBM AT (84-key) 136


Pointing Devices

Any pointing devices 100% compatible with those listed below.

Logitech Mouse, all versions

Microsoft Mouse, all versions


Printers

Drivers are included for the following printers, and are supported on x86, MIPS, Alpha, and PowerPC platforms except as noted.

AGFA-AccuSetSF v52.3

AGFA-AccuSet 800

AGFA-AccuSet 800SF v52.3

AGFA-AccuSet 800SF v2013.108

AGFA-AccuSet 1000

AGFA-AccuSet 1000SF v52.3

AGFA-AccuSet 1000SF v2013.108

AGFA-AccuSet 1500

AGFA-AccuSet 1500SF v2013.108

AGFA-Avantra 20 v2013.108

AGFA-Avantra 20SF v2013.108

AGFA-Avantra 25 v2013.108

AGFA-Avantra 25SF v2013.108

AGFA-Avantra 36SF v2013.108

AGFA-Avantra 44 v2013.108

AGFA-Avantra 44SF v2013.108

AGFA-Elan 500

AGFA-Elan 500SF v2013.108

AGFA-ProSet 9400

AGFA-ProSet 9400 v52.3

AGFA-ProSet 9400SF v52.3

AGFA-ProSet 9400SF v2013.108

AGFA-ProSet 9550

AGFA-ProSet 9550 v52.3

AGFA-ProSet 9550SF v52.3

AGFA-ProSet 9550SF v2013.108

AGFA-ProSet 9600 v52.3

AGFA-ProSet 9600SF v52.3

AGFA-ProSet 9700 v52.3

AGFA-ProSet 9700SF v52.3

AGFA-ProSet 9800

AGFA-ProSet 9800 v52.3

AGFA-ProSet 9800SF v52.3

AGFA-ProSet 9800SF v2013.108

AGFA-ProSet 9836

AGFA-ProSet 9836SF v52.3

AGFA-ProSet 9836SF v2013.108

AGFA-SelectSet 5000

AGFA-SelectSet 5000 v52.3

AGFA-SelectSet 5000SF v52.3

AGFA-SelectSet 5000SF v2013.108

AGFA-SelectSet 7000

AGFA-SelectSet 7000 v52.3

AGFA-SelectSet 7000SF v52.3

AGFA-SelectSet 7000SF v2013.108

AGFA-SelectSet Avantra 20

AGFA-SelectSet Avantra 25

AGFA-SelectSet Avantra 36

AGFA-SelectSet Avantra 44

AGFA-StudioSet 2000 v49.3 v52.3

AGFA-StudioSet 2000SF v52.3

Apple® Color LaserWriter® 12/600

Apple® LaserWriter 12/640 PS

Apple LaserWriter 16/600 PS

Apple LaserWriter II NT v47.0

Apple LaserWriter II NTX v47.0

Apple LaserWriter II NTX v51.8

Apple LaserWriter II NTX-J v50®.5

Apple LaserWriter IIf v2010.113

Apple LaserWriter IIg v2010.113

Apple LaserWriter Plus v38.0

Apple LaserWriter Plus v42.2

Apple LaserWriter Pro 600

Apple LaserWriter Pro 630

Apple LaserWriter Pro 810

Apple LaserWriter Select™ 360

Apple LaserWriter v23.0

Apple Personal LaserWriter NTR v2010.129

LaserWriter Personal NT v51.8

APS-PS PIP with APS-6-108 v49.3 or 52.2

APS-PS PIP with APS-6-80 v49.3 or 52.2

APS-PS PIP with LZR 1200 v49.3 or 52.2

APS-PS PIP with LZR 2600 v49.3 or 52.2

AST TurboLaser-PS v47.0

AT&T 470/475

AT&T 473/478

Brother HJ-100

Brother HJ-100i

Brother HJ-770

Brother HL-10DV

Brother HL-10h

Brother HL-10V

Brother HL-1260

Brother HL-4

Brother HL-4V

Brother HL-4Ve

Brother HL-630

Brother HL-660

Brother HL-6V

Brother HL-8

Brother HL-8D

Brother HL-8e

Brother HL-8V

Brother M-1309

Brother M-1324

Brother M-1809

Brother M-1818

Brother M-1824L

Brother M-1909

Brother M-1918

Brother M-1924L

Bull Compuprint PageMaster 1025

Bull Compuprint PageMaster 413

Bull Compuprint PageMaster 815

Bull Compuprint PageMaster 825

Bull Compuprint PM 100

Bull Compuprint PM 200

Bull Compuprint PM 201

Bull Compuprint PM 300 (B/W)

Bull Compuprint PM 300 (Color)

C-Itoh 8510

Canon Bubble-Jet BJ-10e

Canon Bubble-Jet BJ-10ex

Canon Bubble-Jet BJ-10sx

Canon Bubble-Jet BJ-20

Canon Bubble-Jet BJ-30

Canon Bubble-Jet BJ-100

Canon Bubble-Jet BJ-130

Canon Bubble-Jet BJ-130e

Canon Bubble-Jet BJ-200

Canon Bubble-Jet BJ-200e

Canon Bubble-Jet BJ-200ex

Canon Bubble-Jet BJ-230

Canon Bubble-Jet BJ-300

Canon Bubble-Jet BJ-330

Canon Bubble-Jet BJC-70

Canon Bubble-Jet BJC-210

Canon Bubble-Jet BJC-600

Canon Bubble-Jet BJC-600e

Canon Bubble-Jet BJC-800

Canon Bubble-Jet BJC-4000

Canon Bubble-Jet BJC-4100

Canon C LBP® 360 PS

Canon LBP-4

Canon LBP-4 PS-2 v51.4

Canon LBP-4 Lite

Canon LBP-4 Lite PS-2 v51.4

Canon LBP-4 Plus

Canon LBP-4 Plus PS-2 v51.4

Canon LBP-4i

Canon LBP-4sx

Canon LBP-4U

Canon LBP-8 II

Canon LBP-8 IIR

Canon LBP-8 IIT

Canon LBP-8 III

Canon LBP-8III PS-1 v51.4

Canon LBP-8 III Plus

Canon LBP-8III Plus PS-1 v51.4

Canon LBP-8 IIIR

Canon LBP-8IIIR PS-1 v51.4

Canon LBP-8 IIIT

Canon LBP-8IIIT PS-1 v51.4

Canon LBP-8 IV

Canon LBP-8sx

Canon LBP-430

Canon LBP-860

Canon LBP-1260

Canon LBP-1260 PS

Canon LBP-1260 Plus

Canon LBP-1260 Plus PS

Canon LBP-1260C

Canon LBP-1260C PS

Canon PS-IPU Color Laser Copier v52.3

Canon PS-IPU Kanji Color Laser Copier v52.3

Citizen 120D

Citizen 120D+

Citizen 124D

Citizen 180D

Citizen 200GX

Citizen 200GX/15

Citizen 224

Citizen ABC ESC/P 2

Citizen GSX-130

Citizen GSX-140

Citizen GSX-140+

Citizen GSX-145

Citizen GSX-220 ESC/P 2

Citizen GSX-230

Citizen GSX-240 ESC/P 2

Citizen GSX 240 Scalable Font

Citizen HSP-500

Citizen HSP-550

Citizen PN48

Citizen Prodot 24

Citizen Prodot 9

Citizen Prodot 9x

Citizen PROjet

Citizen PROjet II

Citizen ProLaser 6000

Citizen Swift 9

Citizen Swift 9x

Citizen Swift 24

Citizen Swift 24e

Citizen Swift 24x

Citizen Swift 200

Citizen Swift 240 ESC/P 2

Citizen Swift 240 Scalable Font

ColorAge ColorQ

COMPAQ PageMarq 15

COMPAQ PAGEMARQ 15 v2012.015

COMPAQ PageMarq 20

COMPAQ PAGEMARQ 20 v2012.015

Dataproducts JOLT PS

Dataproducts LZR 855 v1.0

Dataproducts LZR 960 v2010.106

Dataproducts LZR 965 v2011.113

Dataproducts LZR 1260 v47.0

Dataproducts LZR 1560 v2010.127

Dataproducts LZR 1580 v2011.113

Dataproducts LZR 2080 v2011.113

Dataproducts LZR-2665 v46.2

Dataproducts Typhoon 8 PS

Dataproducts Typhoon 8PM PS

Dataproducts Typhoon 16 PS

Dataproducts Typhoon 20 PS

Dataproducts Typhoon 30 PS

Dataproducts Typhoon 40 PS

Dataproducts Typhoon 60 PS

Diconix 150 Plus

Digital Colormate PS v51.9

Digital DECcolorwriter 120ic

Digital DECcolorwriter 520ic

Digital DECcolorwriter 1000 17

Digital DECcolorwriter 1000 39

Digital DEClaser 1100 (LJ)

Digital DEClaser 1100

Digital DEClaser 1150 v51.4

Digital DEClaser 1152  17 fonts

Digital DEClaser 1152  43 fonts

Digital DEClaser 1800 (PCL®)

Digital DEClaser 2100

Digital DEClaser 2100plus (LJ)

Digital DEClaser 2150 plus v51.4

Digital DEClaser 2150 v51.4

Digital DEClaser 2200

Digital DEClaser 2200plus (LJ)

Digital DEClaser 2250 plus v51.4

Digital DEClaser 2250 v51.4

Digital DEClaser 3200 (LJ)

Digital DEClaser 3200

Digital DEClaser 3250 v47

Digital DEClaser 3500

Digital DEClaser 3500 (PCL)

Digital DEClaser 5100

Digital DEClaser 5100 (PCL)

Digital DECmultiJET 1000

Digital DECmultiJET 1500

Digital DECmultiJET 2000

Digital DECwriter 65

Digital DECwriter 95

Digital DECwriter 100i

Digital DECwriter 110i

Digital DECwriter 195

Digital DECwriter 500i

Digital LA70

Digital LA75 Plus

Digital LA75

Digital LA310

Digital LA324

Digital LA424

Digital LN03R ScriptPrinter

Digital PrintServer 17/600

Digital PrintServer 17 12mb/L2

Digital PrintServer 17 v48.3

Digital PrintServer 20 v48.3

Digital PrintServer 32 Kanji v48.3

Digital PrintServer 32 v48.3

Digital PrintServer 40 Plus Kanji v48.3

Digital PrintServer 40 Plus v48.3

Digital turbo PrintServer 20

Digital turbo PrintServer 20 Kanji v48.3

Epson ActionLaser 1000

Epson ActionLaser 1500

Epson ActionLaser 1600

Epson ActionLaser II

Epson AP-3250 ESC/P 2

Epson AP-3250 Scalable Font

Epson AP-3260 ESC/P 2

Epson AP-5000 ESC/P 2

Epson AP-5000 Scalable Font

Epson AP-5000+ ESC/P 2

Epson AP-5500 ESC/P 2

Epson AP-5500 Scalable Font

Epson AP-5500+ ESC/P 2

Epson Compatible 24 Pin

Epson Compatible 9 Pin

Epson DFX-5000

Epson DFX-5000+

Epson DFX-8000

Epson DLQ-2000

Epson EPL-3000

Epson EPL-4000

Epson EPL-4200

Epson EPL-4300

Epson EPL-5000

Epson EPL-5200

Epson EPL-5200+

Epson EPL-5600

Epson EPL-6000

Epson EPL-7000

Epson EPL-7100

EPSON EPL-7500 v52.3

Epson EPL-8000

Epson EPL-8100

Epson EPL-9000

Epson EX-1000

Epson EX-800

Epson FX-100

Epson FX-100+

Epson FX-1000

Epson FX-105

Epson FX-1050

Epson FX-185

Epson FX-2170

Epson FX-286

Epson FX-286e

Epson FX-80

Epson FX-80+

Epson FX-800

Epson FX-85

Epson FX-850

Epson FX-86e

Epson GQ-3500

Epson JX-80

Epson L-1000

Epson L-750

EPSON LP-3000PS F2 v52.3

EPSON LP-3000PS F5 v52.3

Epson LQ-100 ESC/P 2

Epson LQ-100 Scalable Font

Epson LQ-1000

Epson LQ-1010

Epson LQ-1050

Epson LQ-1060

Epson LQ-1070 ESC/P 2

Epson LQ-1070 Scalable Font

Epson LQ-1070+ ESC/P 2

Epson LQ-1170 ESC/P 2

Epson LQ-1170 Scalable Font

Epson LQ-150 ESC/P 2

Epson LQ-1500

Epson LQ-200

Epson LQ-2500

Epson LQ-2550

Epson LQ-400

Epson LQ-450

Epson LQ-500

Epson LQ-510

Epson LQ-550

Epson LQ-570 ESC/P 2

Epson LQ-570 Scalable Font

Epson LQ-570+ ESC/P 2

Epson LQ-800

Epson LQ-850

Epson LQ-850+

Epson LQ-860

Epson LQ-870 ESC/P 2

Epson LQ-870 Scalable Font

Epson LQ-950

Epson LX-300

Epson LX-1050

Epson LX-400

Epson LX-80

Epson LX-86

Epson LX-800

Epson LX-810

Epson LX-850

Epson LX-850+

Epson MX-100

Epson MX-80 F/T

Epson MX-80

EPSON PostScript® CARD v52.5

Epson RX-100

Epson RX-100+

Epson RX-80

Epson RX-80 F/T

Epson RX-80 F/T+

Epson SQ-1170 ESC/P 2

Epson SQ-1170 Scalable Font

Epson SQ-2000

Epson SQ-2500

Epson SQ-2550

Epson SQ-850

Epson SQ-870 ESC/P 2

Epson SQ-870 Scalable Font

Epson Stylus 1000 ESC/P 2

Epson Stylus 300 ESC/P 2

Epson Stylus 400 ESC/P 2

Epson Stylus 800 ESC/P 2

Epson Stylus 800+ ESC/P 2

Epson Stylus COLOR ESC/P 2

Epson Stylus Pro ESC/P 2

Epson Stylus Pro XL ESC/P 2

Epson T-1000

Epson T-750

Fujitsu Breeze 100

Fujitsu Breeze 200

Fujitsu DL 900

Fujitsu DL 1100 Colour

Fujitsu DL 1100

Fujitsu DL 1150

Fujitsu DL 1200

Fujitsu DL 1250

Fujitsu DL 2400

Fujitsu DL 2600

Fujitsu DL 3300

Fujitsu DL 3350

Fujitsu DL 3400

Fujitsu DL 3450

Fujitsu DL 3600

Fujitsu DL 4400

Fujitsu DL 4600

Fujitsu DL 5600

Fujitsu DX 2100

Fujitsu DX 2200

Fujitsu DX 2300

Fujitsu DX 2400

Fujitsu RX7100PS v50.3

GCC BLP Elite v52.3

GCC BLP II v52.3

GCC BLP IIS v52.3

GCC Business LaserPrinter v49.2

GCC Business LaserPrinter v51.4

GCC ColorTone v2.1

GCC Elite 600 v1.1

GCC SelectPress 600 v2.3

GCC SelectPress 1200 v2.3

Generic / Text Only

Generic IBM Graphics 9pin

Generic IBM Graphics 9pin wide

Gestetner GLP800-Scout v52.3

Hewlett-Packard HP-GL®/2 Plotter

HP 7550 Plus

HP Color LaserJet®

HP Color LaserJet PS

HP Color LaserJet 5

HP Color LaserJet 5M

HP Color LaserJet 5/5M PS

HP CopyJet

HP CopyJet M/PS

HP DesignJet 200 (C3180A)

HP DesignJet 200 (C3181A)

HP DesignJet 220 (D/A1)

HP DesignJet 220 (E/A0)

HP DesignJet 230 (D/A1)

HP DesignJet 230 (E/A0)

HP DesignJet 250C (D/A1)

HP DesignJet 250C (E/A0)

HP DesignJet 330 (D/A1)

HP DesignJet 330 (E/A0)

HP DesignJet 350C (D/A1)

HP DesignJet 350C (E/A0)

HP DesignJet 600 (C2847A)

HP DesignJet 600 (C2848A)

HP DesignJet 650C (C2858A)

HP DesignJet 650C (C2858B)

HP DesignJet 650C (C2859A)

HP DesignJet 650C (C2859B)

HP DesignJet 650C v2013.109

HP DesignJet 750C (D/A1) Color

HP DesignJet 750C (E/A0) Color

HP DesignJet 750C (D/A1) Mono

HP DesignJet 750C (E/A0) Mono

HP DesignJet 750C/PS

HP DesignJet 755CM

HP DesignJet 755CM 600 dpi Mono

HP DesignJet 755CM/PS

HP DesignJet (C3180A)

HP DeskJet® 1200C

HP DeskJet 1200C/PS

HP DeskJet 1600C

HP DeskJet 1600CM/PS

HP DeskJet 310

HP DeskJet 320

HP DeskJet 340

HP DeskJet 340 (Monochrome)

HP DeskJet 500

HP DeskJet 500C

HP DeskJet 510

HP DeskJet 520

HP DeskJet 540

HP DeskJet 540 (Monochrome)

HP DeskJet 550C

HP DeskJet 560C

HP DeskJet 600

HP DeskJet 600 (Monochrome)

HP DeskJet 660C

HP DeskJet 850C

HP DeskJet 855C

HP DeskJet Plus

HP DeskJet Portable

HP DeskJet

HP DraftMaster RX/MX

HP DraftMaster SX

HP DraftPro® Plus (C3170A)

HP DraftPro Plus (C3171A)

HP LaserJet 2000

HP LaserJet 4

HP LaserJet 4M

HP LaserJet 4/4M PS

HP LaserJet 4/4M PS (300 dpi)

HP LaserJet 4 Plus

HP LaserJet 4M Plus

HP LaserJet 4/4M Plus PS 300

HP LaserJet 4/4M Plus PS 600

HP LaserJet 4L

HP LaserJet 4ML

HP LaserJet 4L/4ML PostScript

HP LaserJet 4P

HP LaserJet 4MP

HP LaserJet 4P/4MP PS

HP LaserJet 4P/4MP PS (300 dpi)

HP LaserJet 4Si

HP LaserJet 4Si MX

HP LaserJet 4Si/4Si MX PS

HP LaserJet 4Si/4Si MX PS (300 dpi)

HP LaserJet 4V

HP LaserJet 4MV

HP LaserJet 4V/4MV PostScript

HP LaserJet 5

HP LaserJet 5M

HP LaserJet 5N

HP LaserJet 5/5M PostScript

HP LaserJet 5L

HP LaserJet 5P

HP LaserJet 5MP

HP LaserJet 5P/5MP PostScript

HP LaserJet 5Si

HP LaserJet 5Si MX

HP LaserJet 5Si/5Si MX PS

HP LaserJet 500+

HP LaserJet IID PostScript Cartridge v52.2

HP LaserJet IID

HP LaserJet III PostScript Cartridge v52.2

HP LaserJet III PostScript Plus v2010.118

HP LaserJet III

HP LaserJet IIID PostScript Cartridge v52.2

HP LaserJet IIID PostScript Plus v2010.118

HP LaserJet IIID

HP LaserJet IIIP PostScript Cartridge v52.2

HP LaserJet IIIP PostScript Plus v2010.118

HP LaserJet IIIP

HP LaserJet IIISi PostScript v52.3

HP LaserJet IIISi

HP LaserJet IIP

HP LaserJet IIP Plus

HP LaserJet IIP PostScript Cartridge v52.2

HP LaserJet

HP LaserJet Plus

HP LaserJet Series II

Adobe® LaserJet II Cartridge v52.3

HP OfficeJet

HP PaintJet® XL 300

HP PaintJet XL

HP PaintJet XL300 v2011.112

HP PaintJet

HP QuietJet® Plus

HP QuietJet

HP ThinkJet® (2225 C-D)

IBM 2390 PS/1

IBM 2380 Plus

IBM 2390 Plus

IBM 2391 Plus

IBM 4019 LaserPrinter

IBM 4019 LaserPrinter PS17

IBM 4019 LaserPrinter PS39

IBM 4029 LaserPrinter

IBM 4029 LaserPrinter PS17

IBM 4029 LaserPrinter PS39

IBM 4037 5E

IBM 4039 LaserPrinter

IBM 4039 LaserPrinter PS

IBM 4039 LaserPrinter Plus

IBM 4039 LaserPrinter plus PS

IBM 4070 IJ

IBM 4079 Color Jetprinter PS

IBM 4216-020 v47.0

IBM 4216-030 v50.5

IBM ExecJet® 4072

IBM ExecJet 4076 II

IBM Graphics

IBM Personal Page Printer II-31

IBM Personal Printer II 2380

IBM Personal Printer II 2381

IBM Personal Printer II 2390

IBM Personal Printer II 2391

IBM Portable 5183

IBM Proprinter®

IBM Proprinter II

IBM Proprinter III

IBM Proprinter X24

IBM Proprinter X24e

IBM Proprinter XL II

IBM Proprinter XL III

IBM Proprinter XL

IBM Proprinter XL24

IBM Proprinter XL24e

IBM PS/1 2205

IBM QuickWriter® 5204

IBM QuietWriter® III

Kodak® ColorEase PS Printer

Kodak EktaPlus 7016

KODAK XLS 8600 PS v2014.105

Apricot Laser

Kyocera® F-800

Kyocera F-800A

Kyocera F-820

Kyocera F-1000

Kyocera F-1000A

Kyocera F-1010

Kyocera F-1200S

Kyocera F-1800

Kyocera F-1800A

Kyocera F-2000A

Kyocera F-2010

Kyocera F-2200

Kyocera F-2200S

Kyocera F-3000

Kyocera F-3000A

Kyocera F-3010

Kyocera F-3300

Kyocera F-5000

Kyocera FS-400 / FS-400A

Kyocera FS-400 (KPDL)

Kyocera FS-400A (KPDL)

Kyocera FS-850 / FS-850A

Kyocera FS-850 (KPDL)

Kyocera FS-1500 / FS-1500A

Kyocera FS-1500 (KPDL)

Kyocera FS-1500A (KPDL)

Kyocera FS-1550 / FS-1550A

Kyocera FS-1550 (KPDL)

Kyocera FS-1550A (KPDL)

Kyocera FS-1550+

Kyocera FS-1550+ (KPDL)

Kyocera FS-1600

Kyocera FS-1600 (KPDL)

Kyocera FS-1600 (KPDL-2)

Kyocera FS-1600A

Kyocera FS-1600A (KPDL)

Kyocera FS-1600A (KPDL-2)

Kyocera FS-1600+

Kyocera FS-1600+ (KPDL-2)

Kyocera FS-1700

Kyocera FS-1700 (KPDL)

Kyocera FS-1700 (KPDL-2)

Kyocera FS-3400 / FS-3400A

Kyocera FS-3400 (KPDL)

Kyocera FS-3400A (KPDL)

Kyocera FS-3400+

Kyocera FS-3400+ (KPDL)

Kyocera FS-3500 / FS-3500A

Kyocera FS-3500 (KPDL)

Kyocera FS-3500A (KPDL)

Kyocera FS-3600

Kyocera FS-3600 (KPDL)

Kyocera FS-3600 (KPDL-2)

Kyocera FS-3600A

Kyocera FS-3600A (KPDL)

Kyocera FS-3600A (KPDL-2)

Kyocera FS-3600+

Kyocera FS-3600+ (KPDL-2)

Kyocera FS-3700

Kyocera FS-3700 (KPDL)

Kyocera FS-3700 (KPDL-2)

Kyocera FS-5500 / FS-5500A

Kyocera FS-5500 (KPDL)

Kyocera FS-5500A (KPDL)

Kyocera FS-6500

Kyocera FS-6500 (KPDL)

Kyocera FS-6500+

Kyocera FS-6500+ (KPDL)

Kyocera LS-6550

Kyocera P-2000 (KPDL)

Kyocera Q-8010 (KPDL)

LaserMaster Unity 1200XL v47.0

Unity 1800PM-R

Unity 1800XL

Unity 1800XL-O

Lexmark 2380 Plus

Lexmark 2381 Plus

Lexmark 2390 Plus

Lexmark 2391 Plus

Lexmark 4039 Plus PS

Lexmark 4039 LaserPrinter Plus

Lexmark Color 4079 plus PS

Lexmark ExecJet IIc

Lexmark Optra

Lexmark Optra PS

Lexmark Optra Plus

Lexmark Optra Plus PS

Lexmark Optra L Series

Lexmark Optra L Series PS

Lexmark Optra L Plus Series

Lexmark Optra L Plus Series PS

Lexmark Optra R Series

Lexmark Optra R Series PS

Lexmark Optra R Plus Series

Lexmark Optra R Plus Series PS

Lexmark Optra C

Lexmark Optra C PS

Lexmark Optra E

Lexmark Optra Ep

Lexmark Optra Ep PS

Lexmark Optra N

Lexmark Optra N PS

Lexmark ValueWriter 300

Lexmark ValueWriter 600

Linotronic™ 100 v42.5

Linotronic 200 v49.3

Linotronic 230 v49.3

Linotronic 230 v52.3

Linotronic 260 v52.3

Linotronic 300 v47.1

Linotronic 300 v49.3

Linotronic 300 v52.3

Linotronic 330 v52.3

Linotronic 330-RIP 30 v52.3

Linotronic 500 v49.3

Linotronic 500 v52.3

Linotronic 530 v52.3

Linotronic 530-RIP 30 v52.3

Linotronic 630 v52.3

Linotronic 830 v52.3

Linotronic 930 v52.3

Linotronic Pr60 v52.3

HerkulesPMv2013

Quasar v2013

Mannesmann Tally® MT 82

Mannesmann Tally MT 90

Mannesmann Tally MT 91

Mannesmann Tally MT 92

Mannesmann Tally MT 92C

Mannesmann Tally MT 93

Mannesmann Tally MT 94

Mannesmann Tally MT 98/99

Mannesmann Tally MT 130/24

Mannesmann Tally MT 131/24

Mannesmann Tally MT 150/24

Mannesmann Tally MT 151/24

Mannesmann Tally MT 230/24

Mannesmann Tally MT 330

Mannesmann Tally MT 350

Mannesmann Tally MT 360

Mannesmann Tally MT 730/735

Mannesmann Tally MT 904 Plus

Mannesmann Tally MT 908

Mannesmann Tally T9005 Plus

Mannesmann Tally T7010

Mannesmann Tally T7018

Mannesmann Tally T7040 (Colour)

Mannesmann Tally T7040 (Mono)

Mannesmann Tally T9008

Mannesmann Tally T9017

Windows 3.1 Compatible Fax Driver

Microtek TrueLaser

Minolta SP 3000

Minolta SP 3500

Monotype® ImageMaster 1200 v52.3

Monotype Imagesetter v52.2

Colormate PS v51.9

NEC Colormate PS/40 v51.9

NEC Colormate PS/80 v51.9

NEC Jetmate 400

NEC Jetmate 800

NEC Pinwriter CP6

NEC Pinwriter CP7

NEC Pinwriter P20

NEC Pinwriter P2200

NEC Pinwriter P2plus

NEC Pinwriter P30

NEC Pinwriter P3200

NEC Pinwriter P3300

NEC Pinwriter P5200

NEC Pinwriter P5300

NEC Pinwriter P5XL

NEC Pinwriter P6

NEC Pinwriter P60

NEC Pinwriter P6200

NEC Pinwriter P6300

NEC Pinwriter P6plus

NEC Pinwriter P7

NEC Pinwriter P70

NEC Pinwriter P7plus

NEC Pinwriter P90

NEC Pinwriter P9300

NEC Pinwriter P9XL

NEC SilentWriter® 95 v2010.119

NEC Silentwriter 95 v2011.111

NEC Silentwriter 97 v2011.111

NEC Silentwriter 1097 PS

NEC Silentwriter LC 860 Plus

NEC Silentwriter LC 860

NEC Silentwriter LC890 v47.0

NEC Silentwriter LC890XL v50.5

NEC Silentwriter S102

NEC Silentwriter2 290 v52.0

NEC Silentwriter2 90 v52.2

NEC Silentwriter2 990 v52.3

OceColor G5241 PS

OceColor G5242 PostScript Printer v50.3

OKI MICROLINE 801PS+F v52.3

Oki ML 182 Elite (IBM)

Oki ML 192 Elite (IBM)

Oki ML 193 Elite (IBM)

Oki ML 280 Elite (IBM)

Oki ML 320 Elite (IBM)

Oki ML 321 Elite (IBM)

Oki ML 3410 Elite (IBM)

Oki ML 380 Elite

Oki ML 390 Elite

Oki ML 391 Elite

Oki ML 393 Elite

Oki ML 393C Elite

Oki ML 590

Oki ML 591

OKI OJ-300C

Oki OL-1200ex

OKI OL-400

Oki OL-410

Oki OL-410ex

Oki OL410e v2014.105

Oki OL-600ex

Oki OL-610ex

OKI OL-800/840

Oki OL-810

Oki OL-810ex

Oki OL-870

Oki OL830-PS v52.5

Oki OL840-PS v51.8

Oki OL850-PS v52.5

Oki OL870-PS v2013.108

Okidata® LaserLine 6

Okidata ML 192 Plus

Okidata ML 192

Okidata ML 192-IBM

Okidata ML 193 Plus

Okidata ML 193

Okidata ML 193-IBM

Okidata ML 292-IBM

Okidata ML 293-IBM

Okidata ML 320

Okidata ML 320-IBM

Okidata ML 321

Okidata ML 321-IBM

Okidata ML 380

Okidata ML 390 Plus

Okidata ML 390

Okidata ML 391 Plus

Okidata ML 391

Okidata ML 393 Plus

Okidata ML 393

Okidata ML 393C Plus

Okidata ML 393C

Okidata ML 92-IBM

Okidata ML 93-IBM

Okidata OL-1200

Okidata OL-400

Okidata OL-410e

Okidata OL-600e

Okidata OL-610e

Okidata OL-800

Okidata OL-810

Okidata OL-810e

Hermes H 606 PS (13 Fonts)

Hermes H 606 PS (35 fonts)

Hermes H 606

Olivetti DM 109

Olivetti DM 124 C

Olivetti DM 124 L

Olivetti DM 124

Olivetti DM 309 L

Olivetti DM 309 S

Olivetti DM 309 SL

Olivetti DM 309

Olivetti DM 324 L

Olivetti DM 324 S

Olivetti DM 324 SL

Olivetti DM 324

Olivetti DM 600 S

Olivetti DM 600

Olivetti DM 624

Olivetti ETV 5000

Olivetti JP 150

Olivetti JP 150 WS

Olivetti JP 250

Olivetti JP 350

Olivetti JP 350S

Olivetti JP 360 (Color)

Olivetti JP 360 (Monochrome)

Olivetti JP 450 (Color)

Olivetti JP 450 (Monochrome)

Olivetti JP 50

Olivetti PG 108

Olivetti PG 208 M2

Olivetti PG 306 PS (13 Fonts)

Olivetti PG 306 PS (35 Fonts)

Olivetti PG 306

Olivetti PG 308 HS PostScript

Olivetti PG 308 HS

Olivetti PG 308

Olivetti PG 404

Olivetti PG 408

Triumph® Adler SDR 7706 PS13

Triumph Adler SDR 7706 PS35

Triumph Adler SDR 7706

Panasonic KX-P1081

Panasonic KX-P1123

Panasonic KX-P1124

Panasonic KX-P1124i

Panasonic KX-P1180

Panasonic KX-P1624

Panasonic KX-P1695

Panasonic KX-P2123

Panasonic KX-P2124

Panasonic KX-P2180

Panasonic KX-P2624

Panasonic KX-P3134

Panasonic KX-P3634

Panasonic KX-P4410

Panasonic KX-P4420

Panasonic KX-P4430

Panasonic KX-P4440

Panasonic KX-P4450

Panasonic KX-P4450i

Panasonic KX-P4451

Panasonic KX-P4455 v51.4

Panasonic KX-P5400 v2013.112

Panasonic KX-P5410 v2013.110

QMS® 420 Print System v2011.22 r15

QMS 860 Print System v2011.22 r15

QMS 860+ Level 2

QMS 1060 Print System

QMS 1660 Print System

QMS 1660E Print System

QMS 1725 Print System

QMS 2025 Print System

QMS 2425 Print System

QMS 3225 Print System

QMS 3825 Print System

QMS 4525 Level 2

QMS 4525 Print System

QMS ColorScript 100 Mod 30si

QMS ColorScript 100 Model 10 v50.3

QMS ColorScript 100 Model 20 v50.3

QMS ColorScript 100 Model 30 v50.3

QMS ColorScript 100 v49.4

QMS ColorScript 210 v2011.22

QMS ColorScript 230 v2011.22

QMS ColorScript 1000 Level 1

QMS ColorScript 1000 Level 2

QMS magicolor CX

QMS magicolor LX

QMS magicolor plus Level 2

QMS PS Jet Plus v46.1

QMS PS Jet v46.1

QMS-PS® 410 v52.4

QMS-PS 800 Plus v46.1

QMS-PS 800 v46.1

QMS-PS 810 Turbo v. 51.7

QMS-PS 810 v47.0

QMS-PS 815 MR v52.4

QMS-PS 815 v52.4

QMS-PS 820 Turbo v51.7

QMS-PS 820 v51.7

QMS-PS 825 MR v52.4

QMS-PS 825 v52.4

QMS-PS 1700 v52.4

QMS-PS 2000 v52.4

QMS-PS 2200 v51.0 or 52.3

QMS-PS 2210 v51.0 or 52.3

QMS-PS 2220 v51.0 or 52.3

QuadLaser I

Qume ScripTEN v47.0

Radio Shack JP500

Radio Shack JP1000 (Color)

Radio Shack JP1000 (Mono)

Ricoh LP-1200

Ricoh PC Laser 6000-PS v50.5

Royal CJP 450

Schlumberger 5232 Color PostScript Printer v50.3

IRIS® Ink Jet

Dolev PSM v2013.104

Scitex Dolev PSM L2

Scitex Dolev400 PSM L2

ColorPoint 820 PS USA

ColorPoint 830 PS USA

ColorPoint 835 PS USA

Seiko ColorPoint PS Model 04

Seiko ColorPoint PS Model 14

Seiko ColorPoint2 PSF™

Seiko Professional ColorPoint 8BPP

Seikosha LT-20

Seikosha SL-80 IP

Seikosha SL-92 Plus

Seikosha SL-92

Seikosha SP-1900

Seikosha SP-1900+

Seikosha SP-2000

Seikosha SP-2400

Seikosha SP-2415

SEIKOSHA SpeedJET 200

Sharp JX-9300

Sharp JX-9460

Sharp JX-9460 PS

Sharp JX-9500

Sharp JX-9500 PS

Sharp JX-9500E

Sharp JX-9500H

Sharp JX-9600

Sharp JX-9600 PS

Sharp JX-9660

Sharp JX-9660 PS

Sharp JX-9700

Sharp JX-9700E

Sharp JX-9700E PS

Shinko Color CHC-746PSJ PostScript Printer v52.2

Star FR-10

Star FR-15

Star LaserPrinter 4 III

Star LaserPrinter 4

Star LaserPrinter 5 EX

Star LaserPrinter 5

Star LaserPrinter 8 DB

Star LaserPrinter 8 DX

Star LaserPrinter 8 II

Star LaserPrinter 8 III

Star LaserPrinter 8

Star LC-10

Star LC-10 Colour

Star LC-100 Colour

Star LC-15

Star LC-20

Star LC-200

Star LC24-10

Star LC24-100

Star LC24-15

Star LC24-20

Star LC24-200

Star LC24-200 Colour

Star NB24-10

Star NB24-15

Star NL-10

Star NX-1000 Rainbow

Star NX-1000

Star NX-1001

Star NX-1020 Rainbow

Star NX-1500

Star NX-2400

Star NX-2410

Star NX-2415

Star NX-2420 Rainbow

Star NX-2420

Star NX-2430

Star SJ-48

Star XB-2410

Star XB-2415

Star XB-2420

Star XB-2425

Star XB24-10

Star XB24-15

Star XB24-200

Star XB24-250

Star XR-1000

Star XR-1020

Star XR-1500

Star XR-1520

Star ZA-200

Star ZA-250

Tandy® LP-1000

Tegra Genesis

Tektronix® Phaser™ 140

Tektronix Phaser 200e with 17 fonts v2011.108(3)

Tektronix Phaser 200e with 39 fonts v2011.108(3)

Tektronix Phaser 200i v2011.108(3)

Tektronix Phaser 200J

Tektronix Phaser 220e with 17 fonts

Tektronix Phaser 220e with 39 fonts

Tektronix Phaser 220i

Tektronix Phaser 220J

Tektronix Phaser 240 with 17 fonts

Tektronix Phaser 240 with 39 fonts

Tektronix Phaser 240J

Tektronix Phaser 300i

Tektronix Phaser 300J

Tektronix Phaser 340

Tektronix Phaser 340 600 dpi

Tektronix Phaser 440

Tektronix Phaser 480

Tektronix Phaser 480J

Tektronix Phaser 540

Tektronix Phaser 550

Tektronix Phaser 550J

Tektronix Phaser 550 1200 dpi

Tektronix Phaser 550J 1200 dpi

Tektronix Phaser II PX

Tektronix Phaser II PXe v2010.128 with 17 fonts

Tektronix Phaser II PXe v2010.128 with 39 fonts

Tektronix Phaser II PXi v2010.116

Tektronix Phaser II PXi v2011.108

Tektronix Phaser II PXiJ v2011.108

Tektronix Phaser III PXi v2010.116

Tektronix Phaser III PXi v2011.108

Tektronix Phaser III PXiJ v2011.108

Tektronix Phaser IISD v2011.108

Tektronix Phaser IISDJ

Tektronix Phaser IISDX

Tektronix Phaser PX

Tektronix Phaser PXi

TI 2115 13 fonts v47.0

TI 2115 35 fonts v47.0

TI 850/855

TI microMarc Advanced Mono

TI microMarc Color

TI microLaser PS17 v.52.1

TI microLaser PS35 v.52.1

TI microLaser XL PS17 v.52.1

TI microLaser XL PS35 v.52.1

TI microLaser6 Turbo v2010.119

TI microLaser9 Turbo v2010.119

TI microLaser16 Turbo v2010.119

TI microLaser 600

TI microLaser 600 2014.107 PS23

TI microLaser Pro 2014.107 23

TI microLaser Pro E 2014.107 23

TI microLaser Pro 300 2014 PS23

TI microLaser Pro 600 2013 PS23

TI microLaser Pro 600 2014 PS23

TI microLaser Pro 600 2013 PS65

TI microLaser Pro 600 2014 PS65

TI microLaser Pro/8 2015

TI microLaser PowerPro 2014 67

TI microLaser PowerPro 2014.107

TI microLaser PowerPro/12 2015

TI OmniLaser™ 2108 v45.0

TI Omnilaser 2115 v47.0

Toshiba GX-400

Toshiba PageLaser12

UNISYS AP9210 17 Fonts v52.1

UNISYS AP9210 39 Fonts v52.1

Unisys AP9210

Unisys AP9415 v47.0

Varityper VT-600P v48.0

Varityper VT-600W v48.0

Varityper 4000-L300 v52.3

Varityper 4000-L330 v52.3

Varityper 4000-L500 v52.3

Varityper 4000-L530 v52.3

Varityper 4000-5100A v52.3

Varityper 4000-5300A v52.3

Varityper 4000-5300B v52.3

Varityper 4000-5300C v52.3

Varityper 4000-5330A v52.3

Varityper 4000-5330B v52.3

Varityper 4000-5330C v52.3

Varityper 4000-5300EA v52.3

Varityper 4000-5300EB v52.3

Varityper 4000-5300EC v52.3

Varityper 4000-5500A v52.3

Varityper 4000-5500B v52.3

Varityper 4000-5500C v52.3

Varityper 4000-5510A

Varityper 4000-5630A v52.3

Varityper 4000-5630B v52.3

Varityper 4200B-P v49.3 or 52.2

Varityper 4300P v49.3 or 52.2

Varityper 4990T v52.3

Varityper VT4990 v52.3

Varityper 5100E v52.3

Varityper Series 4000-5300 v49.3 or 52.2

Varityper Series 4000-5330 v49.3 or 52.2

Varityper Series 4000-5500 v52.2

Varityper 5510 v52.3

Varityper 5660 v52.3

Varityper 5860 v52.3

Varityper 5960E v52.3

Varityper 6000 v52.3

Varityper 6990 v52.3

Wang® LCS15 FontPlus

Wang LCS15

Wang LDP8

Accel-a-Writer 8200 v2014.103

Xerox® 4505

Xerox 4505 PS

Xerox DocuPrint 4508

Xerox 4510

Xerox 4510 PS

Xerox DocuPrint 4517

Xerox 4517 PostScript Level 2

Xerox 4520

Xerox 4520 PS

Xerox 4700 II PS

Xerox 4900 PostScript

XPrint 4915 PostScript

XPrint 4920/4925 PostScript

Xerox DocuPrint 350HC v1.3.9

Xerox DocuPrint 390 v1.3.9

Xerox DocuPrint 390HC v1.3.9

Xerox DocuPrint 4635 v1.3.9

Xerox DocuTech 90 PS2

Xerox DocuTech 135 PS2

Xerox DocuTech 6135 (01.02.00)

Xerox DCS20 v3.0ER2.26

Xerox DCS35 v3.0ER2.26

Xerox 4215/MRP2 v2013.109

Xerox 4219/MRP2 v2013.109

Xerox 4220/MRP v2015.108

Xerox 4230/MRP v2015.108

Xerox MajestiK with Cyclone RIP

Xerox MajestiK with DocuPress RIP

Xerox MajestiK with Fiery XJ RIP

Xerox MajestiK with Splash RIP

Xerox Regal with Cyclone RIP

Xerox Regal with DocuPress RIP

Xerox Regal with Fiery XJ RIP

Xerox Regal with Splash RIP


Windows NT 3.51 Tested x86 Architecture Uniprocessor Computers

The following x86 architecture uniprocessor systems have been tested with Windows NT 3.51 only, but are expected to run Windows NT 4.0.

3D Microcomputer BONDWELL CDFX5100

3D Microcomputer BONDWELL CDFX5120

3D Microcomputer BONDWELL CDFX5133

3D Microcomputer BONDWELL CDFX5150

3D Microcomputer BONDWELL CDFX5166

3D Microcomputer BONDWELL CDFX575

3D Microcomputer BONDWELL CDFX5900

3D Microcomputer IPC-CDFX5100

3D Microcomputer IPC-CDFX5120

3D Microcomputer IPC-CDFX5133

3D Microcomputer IPC-CDFX5150

3D Microcomputer IPC-CDFX5166

3D Microcomputer IPC-CDFX575

3D Microcomputer IPC-CDFX5900

Absolute Computer 486/66 EISA CD SERVER

AC Data Systems DX4/100 PCI

AC Data Systems P100 PCI

ACD OPTIMA 486 DX 33 VL

ACD OPTIMA VLB 486SX-33

ACER 17000 SMP (Model AA17853N)

ACER AcerAcros (DX2/66 Mhz)

ACER AcerAcros (DX4/100 Mhz)

ACER AcerAcros (Pentium 133 Mhz)

ACER AcerAcros (Pentium 90Mhz)

ACER AcerAcros 486 (DX2/66)

ACER AcerAcros 486 (DX4/100)

ACER AcerAcros 486DX2/66 (Desktop)

ACER AcerAcros 600  (DX2/66 Mhz)

ACER AcerAcros 600 (DX4/100)

ACER AcerAcros 800 (Pentium 100 Mhz)

ACER AcerAcros 800 (Pentium 120 Mhz)

ACER AcerAcros 800 (Pentium 133Mhz)

ACER AcerAcros 850 (Pentium 133 Mhz)

ACER AcerAcros 850 (Pentium 90Mhz)

ACER AcerAltos 150Client (Pentium 100Mhz)

ACER AcerAltos 150Client (Pentium 120Mhz)

ACER AcerAltos 150Client (Pentium 133 Mhz)

ACER AcerAltos 150Client (Pentium 75Mhz)

ACER AcerAltos 150Client (Pentium 90Mhz)

ACER AcerAltos 300 Pentium 100

ACER AcerAltos 300 Pentium 120

ACER AcerAltos 300 Pentium 133

ACER AcerAltos 300 Pentium 75

ACER AcerAltos 300 Pentium 90

ACER AcerAltos 6030 (486DX2/66, Desktop)

ACER AcerAltos 6030 (Pentium/60, Desktop)

ACER AcerAltos 6031 (486DX2/66, Mini-tower)

ACER AcerAltos 6031 (Pentium/60, Mini-Tower)

ACER AcerAltos 6031 (Pentium/90, Desktop)

ACER AcerAltos 6031 (Pentium/90, Mini-Tower)

ACER AcerAltos 6051 (486DX2/66)

ACER AcerAltos 6051 (486DX4/100)

ACER AcerAltos 6051-8 (Pentium/60, Mini-Tower)

ACER AcerAltos 6051-C (Pentium/90, Mini-Tower)

ACER AcerAltos 700/e (486DX2/66)

ACER AcerAltos 700/e (486DX4/100)

ACER AcerAltos 700/e (Pentium/100)

ACER AcerAltos 700/e (Pentium/60, Mini-Tower)

ACER AcerAltos 700/e (Pentium/90, Mini-Tower)

ACER AcerAltos 700/i (486DX2/66, Desktop)

ACER AcerAltos 700/i (DX2/66, Mini-Tower)

ACER AcerAltos 700/i (Pentium/60, Desktop)

ACER AcerAltos 700/i (Pentium/60, Mini-Tower)

ACER AcerAltos 700/i (Pentium/90, Desktop)

ACER AcerAltos 700/i (Pentium/90, Mini-Tower)

ACER AcerAltos 7000 (486DX2/66)

ACER AcerAltos 7000 (Model F566TU) (1p)

ACER AcerAltos 7000 (Model F590TU)

ACER AcerAltos 7000 (Model FT00TU)

ACER AcerAltos 7000 (Model FT66TU)

ACER AcerAltos 7000 (Pentium/100)

ACER AcerAltos 7000 (Pentium/60)

ACER AcerAltos 7000 (Pentium/90)

ACER AcerAltos 7000/p Model 1100,2100 (Pentium/100)

ACER AcerAltos 7000/v (Pentium/100)

ACER AcerAltos 7055 (Pentium/100)

ACER AcerAltos 7055-8 (Pentium/60, Tower)

ACER AcerAltos 7055-C (Pentium/90, Tower)

ACER AcerAltos 750 (Pentium 100 Mhz)

ACER AcerAltos 750 (Pentium 120 Mhz)

ACER AcerAltos 750 (Pentium 133 Mhz)

ACER AcerAltos 750 (Pentium 75 Mhz)

ACER AcerAltos 750 (Pentium 90 Mhz)

ACER AcerAltos 7800 (Pentium 100 Mhz)

ACER AcerAltos 7800 (Pentium 120 Mhz)

ACER AcerAltos 7800 (Pentium 133 Mhz)

ACER AcerAltos 7800 (Pentium 75 Mhz)

ACER AcerAltos 7800 (Pentium 90 Mhz)

ACER AcerAltos 800 Model AA868C

ACER AcerAltos 900 (486DX2/66, Desktop)

ACER AcerAltos 900 (486DX2/66, Mini-Tower)

ACER AcerAltos 900 (Pentium/60, Desktop)

ACER AcerAltos 900 (Pentium/60, Mini-Tower)

ACER AcerAltos 900 (Pentium/90, Desktop)

ACER AcerAltos 900 (Pentium/90, Mini-Tower)

ACER AcerAltos 900/M (Pentium 100 MHz)

ACER AcerAltos 900/M (Pentium 120 MHz)

ACER AcerAltos 900/M (Pentium 133 MHz)

ACER AcerAltos 900/M (Pentium 75 MHz)

ACER AcerAltos 900/M (Pentium 90 MHz)

ACER AcerAltos 9000 (486DX2/66)

ACER AcerAltos 9000 (486DX4/100)

ACER AcerAltos 9000 (Pentium 75MHz)

ACER AcerAltos 9000 (Pentium/100)

ACER AcerAltos 9000 (Pentium/60, Desktop/Mini-Tower/Tower)

ACER AcerAltos 9000 (Pentium/90, Desktop/Mini-Tower/Tower)

ACER AcerAltos 900MP (Pentium/100) (1p)

ACER AcerAltos 950MP (Pentium/100) (1p)

ACER AcerAltos Personal W/S (Pentium 100 Mhz)

ACER AcerAltos Personal W/S (Pentium 120 Mhz)

ACER AcerAltos Personal W/S (Pentium 133 Mhz)

ACER AcerAltos Personal W/S (Pentium 75 Mhz)

ACER AcerAltos Personal W/S (Pentium 90 Mhz)

ACER AcerAltos Uno (Pentium 100Mhz)

ACER AcerAltos Uno (Pentium 120Mhz)

ACER AcerAltos Uno (Pentium 133 Mhz)

ACER AcerAltos Uno (Pentium 75Mhz)

ACER AcerAltos Uno (Pentium 90Mhz)

ACER AcerAspire 2000D Pentium 100

ACER AcerAspire 2000D Pentium 133

ACER AcerAspire 2000D Pentium 166

ACER AcerAspire 2000T Pentium 100

ACER AcerAspire 2000T Pentium 133

ACER AcerAspire 2000T Pentium 166

ACER AcerAspire P100

ACER AcerAspire P120

ACER AcerAspire P133

ACER AcerAspire P166

ACER AcerAspire P75

ACER AcerEntra (AMD486/75)

ACER AcerEntra 3000 Pentium 100

ACER AcerEntra 3000 Pentium 120

ACER AcerEntra 3000 Pentium 133

ACER AcerEntra 3000 Pentium 166

ACER AcerEntra 3000 Pentium 75

ACER AcerMate 433sp (486SX/33)

ACER AcerMate 466d (Model MT66D3)

ACER AcerMate 466dp (486DX2/66)

ACER AcerMate 486 (DX2/66 Mhz)

ACER AcerMate 486 (DX4/100 Mhz)

ACER AcerMate 486/g (DX2/66 Mhz)

ACER AcerMate 486/g (DX4/100 Mhz)

ACER AcerMate 600 (486DX2/66Mhz)

ACER AcerMate 600 (486DX4-100Mhz)

ACER AcerMate 800 (Pentium 100 MHz)

ACER AcerMate 800 (Pentium 120 MHz)

ACER AcerMate 800 (Pentium 133 Mhz)

ACER AcerMate 850 (Pentium 133 Mhz)

ACER AcerMate 850 (Pentium 90Mhz)

ACER AcerMate 910 Pentium 100

ACER AcerMate 910 Pentium 120

ACER AcerMate 910 Pentium 133

ACER AcerMate 910 Pentium 166

ACER AcerMate 910 Pentium 75

ACER AcerMate 920 Pentium 100

ACER AcerMate 920 Pentium 120

ACER AcerMate 920 Pentium 133

ACER AcerMate 920 Pentium 166

ACER AcerMate 920 Pentium 75

ACER AcerMate 930 Pentium 100

ACER AcerMate 930 Pentium 120

ACER AcerMate 930 Pentium 133

ACER AcerMate 930 Pentium 166

ACER AcerMate 930 Pentium 75

ACER AcerNote 950 (Pentium 75 Mhz)

ACER AcerNote 951 (Pentium 75 Mhz)

ACER AcerNote 952 (Pentium 75 Mhz)

ACER AcerNote 953 (Pentium 75 Mhz)

ACER AcerNote 954 (Pentium 75 Mhz)

ACER AcerNote 955 (Pentium 75 Mhz)

ACER AcerNote 956 (Pentium 75 Mhz)

ACER AcerNote 957 (Pentium 75 Mhz)

ACER AcerNote 958 (Pentium 75 Mhz)

ACER AcerNote 959 (Pentium 75 Mhz)

ACER AcerNote Pro 950 (Pentium 75 Mhz)

ACER AcerNote Pro 951 (Pentium 75 Mhz)

ACER AcerNote Pro 952 (Pentium 75 Mhz)

ACER AcerNote Pro 953 (Pentium 75 Mhz)

ACER AcerNote Pro 954 (Pentium 75 Mhz)

ACER AcerNote Pro 955 (Pentium 75 Mhz)

ACER AcerNote Pro 956 (Pentium 75 Mhz)

ACER AcerNote Pro 957 (Pentium 75 Mhz)

ACER AcerNote Pro 958 (Pentium 75 Mhz)

ACER AcerNote Pro 959 (Pentium 75 Mhz)

ACER AcerPower (DX2/66 Mhz)

ACER AcerPower (DX4/100 Mhz)

ACER AcerPower (Pentium 133 Mhz)

ACER AcerPower (Pentium 90Mhz)

ACER AcerPower /M (486DX2/66)

ACER AcerPower /M (486DX4/100)

ACER AcerPower /M (Pentium/100)

ACER AcerPower /M (Pentium/60, Mini-Tower)

ACER AcerPower /M (Pentium/90, Mini-Tower)

ACER AcerPower /M Ultima (Pentium 133 Mhz)

ACER AcerPower 2000D Pentium 100

ACER AcerPower 2000D Pentium 120

ACER AcerPower 2000D Pentium 133

ACER AcerPower 2000D Pentium 166

ACER AcerPower 2000D Pentium 75

ACER AcerPower 2000T Pentium 100

ACER AcerPower 2000T Pentium 120

ACER AcerPower 2000T Pentium 133

ACER AcerPower 2000T Pentium 166

ACER AcerPower 2000T Pentium 75

ACER AcerPower 400de (Model PT100E)

ACER AcerPower 433sp (486SX/33)

ACER AcerPower 466d (486DX2/66, Desktop)

ACER AcerPower 466de (486DX2/66)

ACER AcerPower 466dp (486DX2/66)

ACER AcerPower 466dvp (486DX2/66, Desktop)

ACER AcerPower 466dvp (486DX2/66, Minitower)

ACER AcerPower 486 (DX2/66 Mhz)

ACER AcerPower 486 (DX4/100 Mhz)

ACER AcerPower 486vp (486DX2/66)

ACER AcerPower 486vp (486DX4/100)

ACER AcerPower 486vp (486DX4/100, Minitower)

ACER AcerPower 5000 Pentium 100

ACER AcerPower 5000 Pentium 120

ACER AcerPower 5000 Pentium 133

ACER AcerPower 5000 Pentium 166

ACER AcerPower 5000 Pentium 75

ACER AcerPower 500h (Pentium/100, Mini-Tower)

ACER AcerPower 500p (Pentium/100)

ACER AcerPower 5010 (486DX2/66, Desktop)

ACER AcerPower 5010 (486DX4/100, Desktop)

ACER AcerPower 5011 (486DX4/100, Minitower)

ACER AcerPower 5100LA

ACER AcerPower 5120LA

ACER AcerPower 5133hd

ACER AcerPower 5133LA

ACER AcerPower 5166LA

ACER AcerPower 560e (Pentium/60)

ACER AcerPower 566e (Pentium/66)

ACER AcerPower 566p (Pentium/66)

ACER AcerPower 566pt (Model P560M)

ACER AcerPower 566tu (Model P560TU)

ACER AcerPower 575h (Pentium/75)

ACER AcerPower 575LA

ACER AcerPower 575p (Pentium/75)

ACER AcerPower 590e (Model P590E)

ACER AcerPower 590h (Pentium/90)

ACER AcerPower 590hd

ACER AcerPower 590p (Pentium/90)

ACER AcerPower 800 (Pentium 133 Mhz)

ACER AcerPower 800 (Pentium 90Mhz)

ACER AcerPower 9000 (Model P560E)

ACER AcerPower 9000 (Model P566E)

ACER AcerPower 9000 (Model P590E)

ACER AcerPower 9000 (Model PT100E)

ACER AcerPower 9000 (Model PT66E)

ACER AcerPower 9000 5100HV

ACER AcerPower 9000 5120HV

ACER AcerPower 9000 575HV

ACER AcerPower 9000 Series Model 9813N

ACER AcerPower P100

ACER AcerPower P120

ACER AcerPower P133

ACER AcerPower P133p

ACER AcerPower P166

ACER AcerPower P75

ACER AcerPower P90p

ACER AcerPower/M (Pentium 100Mhz)

ACER AcerPower/M (Pentium 120Mhz)

ACER AcerPower/M (Pentium 75Mhz)

ACER AcerPower/M (Pentium 90Mhz)

ACER AcerPower/M (Pentium133 MHz)

ACER AcerPower/M Accura (Pentium 100 MHz)

ACER AcerPower/M Accura (Pentium 120 MHz)

ACER AcerPower/M Accura (Pentium 133 MHz)

ACER AcerPower/M Accura (Pentium 75 Mhz)

ACER AcerPower/M Accura (Pentium 90 MHz)

ACER AcerPower/M Ultima (Pentium 100Mhz)

ACER AcerPower/M Ultima (Pentium 120Mhz)

ACER AcerPower/M Ultima (Pentium 75Mhz)

ACER AcerPower/M Ultima (Pentium 90Mhz)

ACER AcerPower/V (Pentium 133 Mhz)

ACER AcerPower/V (Pentium 90Mhz)

ACER AcerPowerLC 5100

ACER AcerPowerLC 5120

ACER AcerPowerLC 5133

ACER Aspire 5100SV

ACER Aspire 5120SV

ACER Aspire 575SV

ACER Aspire Pentium 100

ACER Aspire Pentium 120

ACER Aspire Pentium 133

ACER Aspire Pentium 166

ACER Aspire Pentium 75

ACER LN5C (Pentium 100 Mhz)

ACER LN5C (Pentium 120 Mhz)

ACER LN5C (Pentium 133 Mhz)

ACER LN5C (Pentium 75 Mhz)

ACER LN5C (Pentium 90 Mhz)

ACMA 486/66

ACMA 486/66-2 TI-VLB

ACMA IPOWER-F PCI PENTIUM 150

ACMA IPOWER-TY PCI PENTIUM 150

ACMA P66

ACMA P90

ACMA PCI Pentium -120

ACMA PCI Pentium -133

ACMA PCI Pentium -90

ACMA POWER-E PCI Pentium 100

ACMA POWER-E PCI Pentium 120

ACMA POWER-E PCI Pentium 133

ACMA POWER-E PCI Pentium 90

ACMA POWER-F PCI Pentium -100

ACMA POWER-F PCI Pentium -120

ACMA POWER-F PCI Pentium -133

ACMA POWER-F PCI Pentium -90

ACMA POWER-Z PCI Pentium -90

ACMA POWER-Z PCI Pentium 100

ACMA POWER-Z PCI Pentium 120

ACMA POWER-Z PCI Pentium 133

Actebis TARGA II 486DX2-66 PCI

Actebis TARGA II 486DX2-66 VL

Actebis TARGA II 486DX4-100 PCI

Actebis TARGA II Premium Pentium-100

Actebis TARGA II Premium Pentium-120

Actebis TARGA II Premium Pentium-90

Actebis Targa II Premium-120

Actech ACTion 486-33 PCI

Actech ACTion 486DX-33 GREEN VLB

Actech ACTion 486DX-50 GREEN VLB

Actech ACTion 486DX-50 PCI

Actech ACTion 486DX/2-66 GREEN VLB

Actech ACTion 486DX/2-66 PCI

Actech ACTion 486DX/4-100 GREEN VLB

Actech ACTion EISA 486DX-50

Actech ACTion EISA 486DX/2-66

Actech ACTion P60 Pentium PCI

Actech ACTion Systems P90 Pentium

ADD-X CYCLONE

ADD-X DIXIE ORION 2

ADD-X EOLE

ADD-X TYPHON 60

ADD-X TYPHON 90

ADD-X XENON 2

ADD-X ZEPHYR

ADS 466 PCI/VESA/ISA

ADS 466 STN

ADS 466C TFT

ADS 560 PCI/VESA/ISA

ADS 566 PCI/VESA/ISA

ADS 575 PCI/VESA/ISA

ADS ADA 466 EISA/VESA

ADS ADA 466 ISA/VESA

ADS INTEGRATION SERIES 486 VESA

ADS IS PENTIUM 60 VESA

ADS PRO 486 EISA+VESA

ADS PRO 486 PCI

ADS PRO 586 EV PENTIUM

ADS PRO 586 PENTIUM

ADS PRO SERIES 486 VESA

ADS PRO SERIES 590

Advance Interface Express Micro 486DX2-66

Advance Interface Express Micro 486DX4-100

Advance Interface Express Micro Pentium 60

Advance Interface Express Micro Pentium 66

Advance Interface Express Micro Pentium 90

Advanced Computer Enhancements ACE TURBO P100

Advanced Computer Enhancements ACE TURBO P120

Advanced Computer Enhancements ACE TURBO P133

Advanced Computer Enhancements ACE TURBO P150

Advanced Computer Enhancements ACE TURBO P166

Akhter Group  S486SXL-40

Alaris CIAN Intel DX2/66

Alaris CIAN P590

Alaris LEOPARD VIP  AMD 486DX2/v80

Alaris LEOPARD VIP  AMD 486DX4/100

Alaris LEOPARD VIP  BL/100

Alaris LEOPARD VIP  CYRIX DX2/v66

Alaris LEOPARD VIP  Intel DX2/66

Alaris LEOPARD VIP  v80

Alaris LEOPARD VIP Intel DX4100

Alaris Nx586VL

Alfa DELTACOM PCI/VLB 486

ALR Classic Xe (1p)

ALR Evolution IV 4/33s

ALR Evolution IV 4/66d

ALR Evolution IV 4E/33s

ALR Evolution IV 4E/66d

ALR Evolution IV ST 4/33s

ALR Evolution IV ST 4/66d

ALR Evolution IV ST 4/DX4

ALR Evolution V ST/100

ALR Evolution V ST/133

ALR Evolution V ST/60 VL

ALR Evolution V ST/66 PCI

ALR Evolution V ST/66 VL

ALR Evolution V ST/75

ALR Evolution V ST/90

ALR Evolution V STe

ALR Evolution V STe/100

ALR Evolution V X/66 PCI

ALR Evolution V X/90

ALR Evolution V-Q/120

ALR Evolution V-Q/60 137

ALR Evolution V-Q/66 137

ALR Evolution V/66

ALR Evolution VQ-90 137

ALR Evolution X 4/33s

ALR Evolution X 4/66d

ALR Evolution X 4/DX4

ALR Evolution X/120

ALR Evolution X/75

ALR Evolution X/90

ALR Flyer SD32 4/66d

ALR Optima 590

ALR OPTIMA SL 575 (PCI/ISA)

ALR POWERPRO SMP 4/33

ALR POWERPRO/MC SMP 4/50D

ALR PROVEISA LT 4/66d

ALR PROVEISA LT 4/DX4

ALR PROVEISA SMP 4/66D

ALR Revolution MP P/60

ALR Revolution MP P/66

ALR Revolution MP P/90 (1p) 137

ALR Revolution Q-4SMP P/100 (1p) 137

ALR Revolution Q-4SMP P/90 (1p) 137

ALR Revolution Q-4SMP PCI P/100 (1p)

ALR Revolution Q-4SMP PCI P/90 (1p)

Altima Systems Virage

Altima Systems Virage-II

AMAX 486/66 VESAmax Power Station

Amax Engineering 486DX2/66 PowerStation

Amax Engineering IMPE PCI Pentium 100

Amax Engineering IMPE PCI Pentium 120

Amax Engineering IMPE PCI Pentium 133

Amax Engineering IMPE PCI Pentium 90

Amax Engineering IMPF PCI Pentium -100

Amax Engineering IMPF PCI Pentium -120

Amax Engineering IMPF PCI Pentium -133

Amax Engineering IMPF PCI Pentium -90

Amax Engineering IMPZ  PCI Pentium 100

Amax Engineering IMPZ  PCI Pentium 120

Amax Engineering IMPZ  PCI Pentium 133

Amax Engineering IMPZ  PCI Pentium 90

Amax Engineering P6 PowerStation

Amax Engineering P9 PowerStation

Amax Engineering PCI Pentium -120

Amax Engineering PCI Pentium -133

Amax Engineering PCI Pentium -90

Ambra D4100BL

Ambra D466E/VL

Ambra DP60/PCI

Ambra DP60E/VL 138

Ambra DP66E/VL

Ambra T4100BL

Ambra TP60E/VL 138

American Multisystems InfoGOLD P60NT

AmiTech MM 200

AmiTech MM 400 VL

AmiTech MM 420 VL

AmPAQ DaVinci PCI466S

AmPAQ DaVinci Pentium PCI60S

AmPAQ DaVinci VLB433D

AmPAQ DaVinci VLB466D

AMS PowerCD™ P90

AMS SoundPro P54 Pentium 90

AOX mcmaster 486250

Apricot FT//ex 486DX2/66

Apricot FT//ex Pentium 90

Apricot LS-Pro 486DX2/66

Apricot LS-Pro 486DX4/100

Apricot XEN-PC 486

Apricot XEN-PC 486DX4/100

Apricot XEN-PC 560

Apricot XEN-PC 590

Apricot XEN-PCm 590

ARCHE Artec Green 486DX2/66

Area Electronics AES-486AM 486DX2-66

Area Electronics AES-486AM DX4 100 Mini Tower (incl. Desktop and Full Tower Models)

Area Electronics AES-486PSI66

Area Electronics AES-5486AL DX4-100MHz

Area Electronics AES-560GPIP Pentium 60 ISA/PCI

Area Electronics AES-560PA

Area Electronics AES-590AP

Area Electronics AES-590AP PENTIUM 100 Mini Tower (incl. Full Tower Model)

Area Electronics AES-590AP PENTIUM 120 Mini Tower (incl. Desktop and Full Tower Models)

Area Electronics AES-590AT

Area Electronics AES-590ATEP133

Area Electronics AES-590AVS P5-166

Area Electronics AES-590DP Pentium 90 EISA/PCI

Area Electronics AES-590DX Pentium 200

Area Electronics AES-590GPIP Pentium 90 ISA/PCI

Area Electronics AES-590MTP133

Area Electronics AES-590PSI

Area Electronics AES-590PSX133

Ares 486-33 VLB

Ariel 486DX2-66EVS

Ariel 486DX2-66VLS3

Ariel Atlas 90 Pentium PS Workstation

ASEM 410M

ASEM 433M

ASEM 450M

ASEM 466M

ASEM 486CS100

ASEM 486CS66

ASEM 486CS66E (AMD)

ASEM 486CS80E (AMD)

ASEM 486CX100

ASEM 486CX66

ASEM 486CX66E (AMD)

ASEM 486CX80E (AMD)

ASEM 486DM-100 (incl. DP and DE Models)

ASEM 486DM-33 (incl DP and DE Models)

ASEM 486DM-33E (incl. DP and DE Models)

ASEM 486DM-40E (incl. DP and DE Models)

ASEM 486DM-50 (incl DP and DE Models)

ASEM 486DM-50E (incl. DP and DE Models)

ASEM 486DM-66 (incl. DP and DE Models)

ASEM 486DM-S50 (incl. DP and DE Models)

ASEM 486DM100

ASEM 486DM100E (AMD)

ASEM 486DM66

ASEM 486DM66E (AMD)

ASEM 486DM66E (Cyrix V)

ASEM 486DM66E (Cyrix)

ASEM 486DM75

ASEM 486DM80E (AMD)

ASEM 486DM80E (Cyrix V)

ASEM 486DP100

ASEM 486DP100E (AMD)

ASEM 486DP66

ASEM 486DP66E (AMD)

ASEM 486DP66E (Cyrix V)

ASEM 486DP66E (Cyrix)

ASEM 486DP75

ASEM 486DP80E (AMD)

ASEM 486DP80E (Cyrix V)

ASEM 486DX-33 ELP

ASEM 486DX-33 Mini

ASEM 486DX-33 Mini 72P

ASEM 486DX-33 Tower

ASEM 486DX-33E Mini

ASEM 486DX2-50 ELP

ASEM 486DX2-50 Mini

ASEM 486DX2-50 Mini 72P

ASEM 486DX2-50 Tower

ASEM 486DX2-50E ELP

ASEM 486DX2-50E Mini

ASEM 486DX2-66 ELP

ASEM 486DX2-66 Mini

ASEM 486DX2-66 Mini 72P

ASEM 486DX2-66 Tower

ASEM 486DX4-100 Mini

ASEM 486SX-25 ELP

ASEM 486SX-25 Mini

ASEM 486SX-33 ELP

ASEM 486SX-33 Mini

ASEM 486SX-33 Tower

ASEM 486VM100

ASEM 486VM100E (AMD)

ASEM 486VM66

ASEM 486VM66E (AMD)

ASEM 486VM66E (Cyrix V)

ASEM 486VM66E (Cyrix)

ASEM 486VM75

ASEM 486VM80E (AMD)

ASEM 486VM80E (Cyrix V)

ASEM 486VP100

ASEM 486VP100E (AMD)

ASEM 486VP66

ASEM 486VP66E (AMD)

ASEM 486VP66E (Cyrix V)

ASEM 486VP66E (Cyrix)

ASEM 486VP75

ASEM 486VP80E (AMD)

ASEM 486VP80E (Cyrix V)

ASEM 560M

ASEM 590M

ASEM 590P

ASEM DM-S33 (incl. DP and DE Models)

ASEM LT433C Notebook

ASEM LT453C Notebook

ASEM LT473C Notebook

ASEM LT845 Sub-Notebook

ASEM Platinum DM90

ASEM Platinum DP90

ASEM Platinum NS100

ASEM Platinum NS75

ASEM Platinum NS90

ASEM Platinum NX100

ASEM Platinum NX75

ASEM Platinum NX90

ASEM Platinum RS100

ASEM Platinum RS75

ASEM Platinum RS90

ASEM Platinum RX100

ASEM Platinum RX75

ASEM Platinum RX90

ASEM Plato P54C

ASEM PRO-SERVER 5/60

ASEM SMP50P

Aspect SMART WEAPONS 486DX-33 PCI/VL

Aspect SMART WEAPONS 486DX-40 PCI/VL

Aspect SMART WEAPONS 486DX2 PCI/EISA 66

Aspect SMART WEAPONS 486DX2-66 PCI

Aspect SMART WEAPONS 486DX2-66 PCI/VL

Aspect SMART WEAPONS 486DX2-66 VL

Aspect SMART WEAPONS 486DX4-100 PCI/VL

Aspect SMART WEAPONS 486SX-33 PCI/VL

Aspect SMART WEAPONS 486SX-33 VL

Aspect SMART WEAPONS PENTIUM 60 PCI

Aspect SMART WEAPONS PENTIUM 66 PCI

Aspect SMART WEAPONS PENTIUM PCI/VL 90

Aspect SMART WEAPONS PENTIUM-90 PCI

Aspect SMART WEAPONS PENTIUM-90 PCI/EISA

Aspect SMART WEOPONS PENTIUM 60 PCI/EISA

Aspect Viking 486DX-33 PCI

Aspect Viking 486DX-33 VL

Aspect Viking 486DX-40 PCI

Aspect Viking 486DX-40 VL

Aspect Viking 486DX2-66 PCI

Aspect Viking 486DX2-66 VL

Aspect Viking 486DX2-80 VL

Aspect Viking 486DX4-100 PCI

Aspect Viking 486DX4-100 VL

Aspect Viking 486SX-33 PCI

Aspect Viking 486SX-33 VL

Aspect Viking 486SX2-50 PCI

Aspect Viking 486SX2-50 VL

Aspect Viking 486SX2-80 PCI

Aspect Voyager Pentium-100 PCI

Aspect Voyager Pentium-100 PCI/EISA

Aspect Voyager Pentium-60 PCI

Aspect Voyager Pentium-66 PCI

Aspect Voyager Pentium-75 PCI

Aspect Voyager Pentium-75 PCI/EISA

Aspect Voyager Pentium-90 PCI

Aspect Voyager Pentium-90 PCI/EISA

AST Ascentia 900N 4/50

AST Ascentia 900N 4/75

AST Ascentia 950N Pentium/90

AST Bravo LC 4/100t 139

AST Bravo LC 4/66

AST Bravo LC 5100

AST Bravo LC 5133

AST Bravo LC 5166

AST Bravo MS 4/50

AST Bravo MS 4/66

AST Bravo MS 4/66d

AST Bravo MS P/100

AST Bravo MS P/133

AST Bravo MS P/60

AST Bravo MS P/75

AST Bravo MS-T 5100

AST Bravo MS-T 5133

AST Bravo MS-T 5166

AST Bravo MS-T P/120

AST Bravo MT P/60

AST Manhattan G Series 590

AST Manhattan P Series 5090 (1p)

AST Manhattan P Series 5100 (1p)

AST Manhattan P Series 5133

AST Manhattan V Series 5100 (1p)

AST Manhatten G 5/60

AST Premium II 386/33 Model 213V

AST Premium II 486/33

AST Premium SE 4/33 Model 333

AST Premium SE 486/33

AST Premmia GX P/100

AST Premmia GX P/133

AST Premmia GX P/133 scsi/n

AST Premmia GX P/90 (1p)

AST Premmia MX 4/100t

AT&T 3406

AT&T 3416

AT&T Globalyst 250

AT&T Globalyst 330 (Desktop) DX2-66

AT&T Globalyst 330 (Desktop) Pentium 60

AT&T Globalyst 330 (Desktop) SX2-50

AT&T Globalyst 360 (Mini-Tower) DX2-66

AT&T Globalyst 360 (Mini-Tower) Pentium 60

AT&T Globalyst 360 (Mini-Tower) SX2-50

AT&T Globalyst 510 (3228) 486 ISA

AT&T Globalyst 515 (3232) 486 ISA

AT&T Globalyst 525 (3253) 486 ISA/VL

AT&T Globalyst 575 (3347) 486 ISA/PCI

AT&T Globalyst 580 (3252) Pentium ISA/PCI

AT&T Globalyst 600 (3356) Pentium ISA/PCI

AT&T Globalyst 620 (3248) ISA/PCI

AT&T Globalyst 630 (3348) ISA/PCI

AT&T Globalyst 720/3258 (DT)

AT&T Globalyst 730/3358 (MT)

AT&T Globalyst S10 Server Pentium 60

AT&T Globalyst S10 Server Pentium 75

AT&T Globalyst S10 Server Pentium 90

AT&T Globalyst S40 Pentium 133

AT&T Globalyst S40 Server Pentium 100

AT&T Safari 3151 (200)

AT&T System 3000 Model 3314

AT&T System 3000 Model 3360 Pentium 60

AT&T System 3000 Model 3410

AT&T System 3000 Model 3416XL Pentium 60

AT&T System 3000 Model 3416XL Pentium 90

AT&T System 3000 Model 3430 Pentium 60

AT&T System 3000 Model 3431 Pentium 90

AT&T System 3000 Model 3445

AT&T System 3000 Model 3450 Pentium 66

AT&T System 3000 Model 3455 Pentium 90

AT&T System 3000 Model 3525 Pentium 66

AT&T System 3000 Model 3525 Pentium 90

AT&T System 3000 Model 3550 486DX/50

AT&T System 3000 Model 3555 Pentium 66

AT&T System 3000 Model 3555 Pentium 90

Athena SERVER 486DX2/66 HQ

Atima 486FG

Atima 586MFG-66

Atima 586SLB-90

Atima 586SLB/MIO-90

Austin 486DLC

Austin Business Audio DX4 100 Color Notebook

Austin Business Audio DX4 100 TFT Notebook

Austin Business Audio DX4 75 Color Notebook

Austin Business Audio DX4 75 TFT Notebook

Austin Edge CD 133

Austin Edge XP 100

Austin Power System 60

Austin Power System 90

Austin Premier 486DX33 PCI

Austin Radiance-R400 Pentium 100

Austin Radiance-R500 Pentium 133

AutoCont AC Profi 90

Award Software PowerBIOS 486/66M

Axik Ace Power 486DX2-66VG2/Green

Axik Ace Power AP5-I/P P75

Axik Ace Power P5-EP P90

Axik Ace Power P5-I/P P90

BAJTEX S.A. i486DX2/66MHz

Baylor College of Medicine Pentium 133

BB Data AB Grizzly 266 Alfredo

BB Data AB Grizzly P66 Batman

BB Data AB Grizzly S33 Alfredo

Beyond 2000 Systems STRATUS NT 90

Bizcom TS30P Pentium 75 Laptop

Bizcom TS30P Pentium 90 Laptop

Black Cat 486/66 VL

Boffin Tower Pentium Server

BROTHER BCR3486

BROTHER BCR4486

BROTHER BCR4486/PCI

BROTHER BCR4486/VIP

BROTHER BCR4486DL

BROTHER BCR4586

BROTHER BCR4586/PCI

BROTHER BCR4586P

BROTHER BCR4P54C-I

BROTHER BCR4P54C/PCI

BROTHER BCR5486

BROTHER BCR5486/PCI

BROTHER BCR5486/VIP

BROTHER BCR5586

BROTHER BCR5586/PCI

BROTHER BCR5586P

BROTHER BCR5P54C-I

BROTHER BCR5P54C/PCI

BROTHER BCR7486

BROTHER BCR7586/PCI

BROTHER BCR8486

BROTHER BCR8486/PCI

BROTHER BCR8486/VIP

BROTHER BCR8586

BROTHER BCR8586/PCI

BROTHER BCR8586P

BROTHER BCR8P54C-I

BROTHER BCR8P54C/PCI

BROTHER BCS4486

BROTHER BCS5486

BROTHER BCS8486

Burgoyne Rocket 60

C&S Computer AMICS EISA VLB IV (486DX2-66)

C&S Computer AMICS P5 Pentium VLB 60

C&S Computer AMICS Pentium EISA PCI 60

Caliber SMART WEAPONS 486DX-33 PCI

Caliber SMART WEAPONS 486DX-33 VL

Caliber SMART WEAPONS 486DX-40 VL

Caliber SMART WEAPONS 486DX2-66 PCI

Caliber SMART WEAPONS 486DX2-66 VL

Caliber SMART WEAPONS 486DX4-100 VL

Caliber SMART WEAPONS 486SX-33 PCI

Caliber SMART WEAPONS 486SX-33 PCI/VL

Caliber SMART WEAPONS 486SX-33 VL

Caliber SMART WEAPONS DX-33 PCI/VL

Caliber SMART WEAPONS DX-40 PCI/VL

Caliber SMART WEAPONS DX2-66  PCI/VL

Caliber SMART WEAPONS DX4-100 PCI/VL

Caliber SMART WEAPONS PENTIUM 60 PCI

Caliber SMART WEAPONS PENTIUM 60 PCI/EISA

Caliber SMART WEAPONS PENTIUM 66 PCI

Caliber SMART WEAPONS PENTIUM PCI/EISA 66

Caliber SMART WEAPONS PENTIUM PCI/VL 90

Caliber SMART WEAPONS PENTIUM-90 PCI

Caliber SMART WEAPONS PENTIUM-90 PCI/EISA

Caliber Viking 486DX-33 PCI

Caliber Viking 486DX-33 VL

Caliber Viking 486DX-40 PCI

Caliber Viking 486DX-40 VL

Caliber Viking 486DX2-66 PCI

Caliber Viking 486DX2-66 VL

Caliber Viking 486DX2-80 PCI

Caliber Viking 486DX2-80 VL

Caliber Viking 486DX4-100 PCI

Caliber Viking 486DX4-100 VL

Caliber Viking 486SX-33 PCI

Caliber Viking 486SX-33 VL

Caliber Viking 486SX2-50 PCI

Caliber Viking 486SX2-50 VL

Caliber Voyager Pentium-100 PCI

Caliber Voyager Pentium-100 PCI/EISA

Caliber Voyager Pentium-60 PCI

Caliber Voyager Pentium-66 PCI

Caliber Voyager Pentium-75 PCI

Caliber Voyager Pentium-75 PCI/EISA

Caliber Voyager Pentium-90 PCI

Caliber Voyager Pentium-90 PCI/EISA

Can - Am CAT-586-075

Can - Am CAT-586-100

Canon INNOVA MT 9320

Canon Innova MT7000

Canon Innova MT7010

Canon Innova MT7020

Canon Innova MT7030

Canon Innova MT7040

Canon Innova MT9100

Canon Innova MT9110

Canon Innova MT9120

Canon Innova MT9130

Canon INNOVA MT9160

Canon Innova MT9300

Canon Innova MT9310

Canon INNOVA MT9600

Canon Innova Pro 5100SD

Canon Innova Pro 5400ST

Cascade PCI-60S

Cascade PCI-Pentium-60

Cascade VLB-66

CELEM 486DX/33 C (ISA)

CELEM 486DX/33 VL (VESA)

CELEM 486DX2/66 (VL+ISA)

CELEM 486DX2/66 DC (EISA+VESA)

CELEM 586/60 (PCI+ISA)

CELEM 586/66 (PCI+EISA)

CELEM 586/75 (PCI+ISA)

CELEM 586/90 (PCI+EISA)

CELEM 586/90 (PCI+ISA)

CELEM DX4/100 (VL+ISA)

CENSUS 4D266AGVL DT (incl. MT, IT, FT Models)

CENSUS 4D266DGVL DT (incl. MT, IT, FT Models)

CENSUS 4D4100AGVL DT (incl. MT, IT, FT Models)

CENSUS P90AGPCI DT (incl. MT, IT, FT Models)

Centerprise CI/LEO P90

Centis PowerTech  P60-G5

Centis PowerTech model P60-G3

Centis PowerTech P120-1G2

Centis Profi model 466-G5

Centis ProfiLite 433-G4

Centis ProfiLite 466-G3

Centis ProfiLite model 466-G8

Certified Data Pentium-100 MST

Certified Data Pentium-133 MST

Certified Data Pentium-75 MTG

Certified Data Pentium-75 MTI

Certified Data Pentium-90 MST

Chicony Electronics CH-1451A

Chicony Electronics CH-471A

Chicony Electronics CH-471B

Chicony Electronics CH-498B

Chicony Electronics CH-881A

Chicony Electronics CH-890A

Cincinnati Milicron Acramatic 2100 CNC

Cinet ET-100

Cinet FSE-100

Cinet HI-100

Cinet HI-200/486

Cinet HI-250/P

Cinet LS-100

Cinet MP-100

Cinet NB-200

Cinet PPE-200

Cinet PPI-100

Cinet PPI-200

Cinet PPI-300

Cinet VL-100

Cinet VL-200

CLEVER BUSINESS STAR AT486DX2/66 VESA/ISA

CMC P5100PDT

CMC P590PDT

CMOS Acrobat (Pentium 100)

CMOS Mountain (Pentium 150)

Comark 486-33 Workstation

Comark Industrial Workstation 63-04897-002 PCI Pentium 90

Comark Pentium-60/VL

Comark Pentium/PCI 100

Comark Pentium/PCI 90

Comark VL-Pentium-66

Comark VL-Pentium-66 CIDE

COMPAQ Contura 400C

COMPAQ Contura 410

COMPAQ Contura 420C

COMPAQ Contura 420CX

COMPAQ Deskpro 386®/25e

COMPAQ Deskpro 386/33®

COMPAQ Deskpro 386™/33L

COMPAQ Deskpro 486/33i

COMPAQ Deskpro 486/33M

COMPAQ Deskpro 66M

COMPAQ Deskpro DPXE 560

COMPAQ Deskpro XL 466

COMPAQ Deskpro XL 566

COMPAQ LTE 5100

COMPAQ LTE Elite 4/75C

COMPAQ LTE Elite 4/75CXL

COMPAQ LTE Lite 4/25C

COMPAQ Presario 660

COMPAQ Presario 700 CDS

COMPAQ Presario 7222ES

COMPAQ Presario 954

COMPAQ Presario CDS 633

COMPAQ Presario CDS 982

COMPAQ ProLiant 1000 Model 5/60

COMPAQ ProLiant 1500 Model 5/100

COMPAQ ProLiant 1500 Model 5/120

COMPAQ ProLiant 1500 Model 5/75

COMPAQ ProLiant 1500R Model 5/100

COMPAQ ProLiant 4000 Model 5/166

COMPAQ ProLiant 4500 Model 5/100

COMPAQ ProLinea 3/25s

COMPAQ ProLinea 4/50

COMPAQ ProLinea 4/66

COMPAQ ProLinea 6150e 140

COMPAQ ProLinea MT 4/66

COMPAQ ProSignia 300 Model 5/75

COMPAQ ProSignia 300 Model 5/90

COMPAQ ProSignia 486DX/33

COMPAQ ProSignia 486DX2/66

COMPAQ ProSignia 5/60

COMPAQ ProSignia 500 5/120

COMPAQ ProSignia 500 Model 5/90

COMPAQ ProSignia VS 486DX/33

COMPAQ ProSignia VS 486DX2/66

COMPAQ ProSignia VS 486SX/33

COMPAQ Systempro/LT™ 486DX2/50

COMPAQ Systempro/LT 486DX2/66

COMPAQ Systempro/LT 486DX33

COMPAQ Systempro/LT 486SX/25

Compu Partner Pentium 60

Compu Partner Pentium 90

CompuAdd 466/DX2

CompuAdd 486-33DLC

CompuAdd C133p

CompuAdd C4100 D

CompuAdd C466D

CompuAdd CompuPartner Pentium 90

CompuAdd CP100p DT (incl. MT and TWR models)

CompuAdd CP100p LPX

CompuAdd CP90p DT (incl. MT and TWR models)

CompuAdd CP90p LPX

COMPUCON 486DX/33 EISA+VESA

COMPUCON 486DX/33 PCI+ISA/GREEN

COMPUCON 486DX/33 PCI+VESA+ISA

COMPUCON 486DX/33 VESA/GREEN

COMPUCON 486DX/33SP PCI+EISA+ISA

COMPUCON 486DX/40 VESA/GREEN

COMPUCON 486DX/50 EISA+VESA

COMPUCON 486DX/50 VESA/GREEN

COMPUCON 486DX/50SP PCI+VESA+ISA

COMPUCON 486DX2/50 EISA+VESA

COMPUCON 486DX2/50 PCI+ISA

COMPUCON 486DX2/50 PCI+ISA/GREEN

COMPUCON 486DX2/50 PCI+VESA+ISA

COMPUCON 486DX2/50 VESA/GREEN

COMPUCON 486DX2/50SP PCI+VESA+ISA

COMPUCON 486DX2/66 EISA+VESA

COMPUCON 486DX2/66 GX4

COMPUCON 486DX2/66 PCI+ISA/GREEN

COMPUCON 486DX2/66 PCI+VESA+ISA

COMPUCON 486DX2/66 VESA/GREEN

COMPUCON 486DX2/66SP PCI+VESA+ISA

COMPUCON 486DX266 PCI+ISA

COMPUCON 486DX33 PCI+ISA

COMPUCON 486DX4/100 PCI+ISA/GREEN

COMPUCON 486DX4/100 PCI+VESA+ISA

COMPUCON 486DX4/100 VESA/GREEN

COMPUCON 486DX4/100SP PCI+VESA+ISA

COMPUCON 486DX4/75 PCI+VESA+ISA

COMPUCON 486DX4/75 VESA/GREEN

COMPUCON 486SX/25 EISA+VESA

COMPUCON 486SX/25 PCI+ISA

COMPUCON 486SX/25 PCI+ISA/GREEN

COMPUCON 486SX/25 PCI+VESA+ISA

COMPUCON 486SX/25 VESA/GREEN

COMPUCON 486SX/25SP PCI+VESA+ISA

COMPUCON 486SX/33 EISA+VESA

COMPUCON 486SX/33 PCI+ISA

COMPUCON 486SX/33 PCI+ISA/GREEN

COMPUCON 486SX/33 PCI+VESA+ISA

COMPUCON 486SX/33 VESA/GREEN

COMPUCON 486SX/33SP PCI+VESA+ISA

COMPUCON DX266VB

COMPUCON DX33G

COMPUCON PCI/IP-60

COMPUCON Pentium /75N PCI+ISA

COMPUCON Pentium/100N PCI+EISA

COMPUCON Pentium/100N PCI+ISA

COMPUCON Pentium/100S PCI+EISA

COMPUCON Pentium/100TP PCI+ISA

COMPUCON Pentium/100TPX PCI+ISA+MEDIA

COMPUCON Pentium/60 PCI+EISA

COMPUCON Pentium/60 PCI+ISA

COMPUCON Pentium/66 PCI+EISA

COMPUCON Pentium/66 PCI+ISA

COMPUCON Pentium/75N PCI+EISA

COMPUCON Pentium/75TP PCI+ISA

COMPUCON Pentium/75TPX PCI+ISA+MEDIA

COMPUCON Pentium/90N PCI+EISA

COMPUCON Pentium/90N PCI+ISA

COMPUCON Pentium/90TP PCI+ISA

COMPUCON Pentium/90TPX PCI+ISA+MEDIA

COMPUCON Pentium100/S PCI+ISA

COMPUCON Pentium75/S PCI+EISA

COMPUCON Pentium75/S PCI+ISA

COMPUCON Pentium90/S PCI+EISA

COMPUCON Pentium90/S PCI+ISA

Compudata Premarius Pentium 133

Computer Dealers Source ISA-VESA 486DX2-66MHZ

Computer Network Design Pelican 100

Computer Resources PRECISION 486/40 VL

Computer Resources PRECISION PENTIUM

Computer Sales Prof. 486DX2/66

Computer Services USA COMPSTAR/66 PENTIUM

Computer Stockroom Delta Micro Systems Gold Line P575i

Computer Systems Resouces 486DX-50 16M WS

Computer Systems Resources 486DX2-66WS16M

Computrade Express 486-50/VLB

Computrend PREMIO 219F-P100

Computrend PREMIO 219F-P120

Computrend PREMIO 219F-P133

Computrend PREMIO 4145

Computrend PREMIO 486 PCI AL2 486DX2/66

Computrend PREMIO 486DX2-66

Computrend PREMIO 5124

Computrend PREMIO HX 6x120

Computrend PREMIO HX 6x150+

Computrend PREMIO Pentium PCI 66

Computrend PREMIO Pentium PCI 90

Computrend PREMIO VX Pentium 133

Computrend PREMIO VX Pentium 200

Comtrade EISA GigaByte Ultima 486DX2-66

Continental Resources XPR4D2/66BS-VLZ

Continental Resources XPR586/90BS-PCI/3M®

Corbey NetSurfer MM Pentium 90

Corbey Shadow Server

Corbey Shadow WG Server Pentium 90

Crescent AMI VLB III 486-66VL

Crystal Group ATL-4VD33

Crystal Group ATL-4VD66

CSS Labs MaxFrame 2000-462OPTIVL

CSS Labs MaxFrame 3000-462OPTIVL

CSS Labs MaxSys 462MTEVL Minitower

CSS Labs MaxSys 462REVL Rackmount

CSS Labs MaxSys 462TEVL Tower

CSS Labs Preferred 462GAVLESP (Inc. Full, Mid and Tower models)

CSS Labs Preferred 462MGEVLESP (Inc. Full, Mid and Tower Models)

CSS Labs Preferred Tower 4/100 PCI/VL ESP  (incl. Mid Tower, Mid Desktop and Full Desktop)

CSS Labs Preferred Tower 5/120 PCI ESP  (incl. Mid Tower, Mid Desktop and Full Desktop)

CSS Labs ProRack E 4/100 PCI ESP (incl. T and M models)

CSS Labs ProRack E 5/120 PCI ESP (incl. T and M models)

CTM Fontek 486DX-33 VL

CTM Fontek 486DX2-50 VL

CTM Fontek 486DX2-66 VL

CTM Fontek 486DX4-100 VL

CTM Fontek PENTIUM 90

CTM PENTIUM 90

CTM Polaris 486DX-33 VESA

CTM Polaris 486DX2-50 VESA

CTM Polaris 486DX2-66 VESA

CTM Pronic 486DX-33 VESA

CTM Pronic 486DX2-50 VESA

CTM Pronic 486DX2-66 VESA

CUBE D4120 ATX

CUBE PowerStation P100

CUBE PowerStation P120

CUBE PowerStation P75

CUBE PowerStation P90

Cubix BC 5090SE

Cubix BC 5120SE

Custom Micro Pentium 100

Custom Micro Pentium 133

Custom Micro Pentium 166

Cybermax AMD486DX2-66

CyberMax Computer P5/66

CyberMax Computer P5/90

Cyrix 6x86 P150 PC

Daewoo VESA PENTIUM(60)

Daewoo Winpro™ 486 Vesa Green/2900G(DX2-50)

Daewoo Winpro 486DLC-40

Daewoo Winpro 486DX250 Green Deskop

Daewoo Winpro 486DX250 Vesa

Daewoo Winpro 486DX266 Vesa Green System/2800

Dakota Computer GreenExplorer SL5100

Dakota Computer GreenExplorer SL5133

Dakota Computer GreenHunter  D5133iPCI Triton

Dakota Computer GreenHunter D5100iPCI Trition

Dakota Computer GreenHunter D5120iPCI Triton

Dakota Computer GreenHunter D590iPCI Triton

Dakota Computer GreenRanger M5100iPCI Triton

Dakota Computer GreenRanger M5120iPCI Triton

Dakota Computer GreenRanger M5133iPCI Triton

Dakota Computer GreenRanger M590iPCI Triton

Dakota Computer GreenTrapper B5100iPCI Triton

Dakota Computer GreenTrapper B5120iPCI Triton

Dakota Computer GreenTrapper B5133iPCI Trtion

Dakota Computer GreenTrapper B590iPCI Trtion

Dakota Computer PCI 486DX4/100MHz

Danjen 486-50VL(Inc. Lunch Box, Mini, Mid,and Full Tower)

Dassault AT CUSTOMER ACTIVATED TERMINAL D633

Data General P60/TE2 Pentium Tower

Data General P90/TE2

Data General P90MT

Data Stor 486 P66

Data Stor 486-33-8

Data Stor 486-66V

Data Stor ECS 90

Data Stor ECSP66

Data Stor P5-66 Intel

Data Stor P90

Datacom Technology  PC 586-100/16MB

Datacom Technology  PC 586-120/16MB

Datacom Technology  PC 586-133/16MB

Datacom Technology  PC 586-75/16MB

DataExpert P5i-120-PCI

DataExpert P5i-133-PCI

DataExpert P5i-90-PCI

DATAFILEN PROFF 486DX2-66

DATAFILEN PROFF 586-60MHz

DATAFILEN PROFF 586-90MHz

Debis Deskside 5/60

Debis Desktop 486DX2/66

Debis Desktop M75

Debis Twintower Pentium 90

DELL 325 NC Notebook

DELL 466 MXN

DELL Dimension 4100/DM

DELL Dimension XPS 4100

DELL Dimension XPS 450V

DELL Dimension XPS P60

DELL Latitude XP 475D

DELL Latitude XP4100C

DELL Latitude XP4100CX

DELL Latitude XPi P120ST

DELL Latitude XPi P90D

DELL NetPlex 433sP

DELL OmniPlex 433

DELL OmniPlex 433s

DELL OmniPlex 450

DELL OmniPlex 466

DELL OmniPlex 5100

DELL OptiPlex 4100 MXe

DELL OptiPlex 4100/MXN

DELL OptiPlex 425s/MXV

DELL OptiPlex 433s MXN

DELL OptiPlex 450 MXN

DELL OptiPlex 450/MXV

DELL OptiPlex 450s MXN

DELL OptiPlex 5133/GXM

DELL OptiPlex 560

DELL OptiPlex 590/XMN

DELL OptiPlex DGX 5100

DELL OptiPlex DGX 5120

DELL OptiPlex DGX 5133

DELL OptiPlex DGX 590

DELL Optiplex GL 5120

DELL Optiplex GL 5133

DELL OptiPlex GL+ 5120

DELL OptiPlex GL+ 5133

DELL OptiPlex GL+ 575

DELL OptiPlex GL+ 590

DELL Optiplex GM 5120

DELL Optiplex GM 5133

DELL OptiPlex GM+ 575

DELL Optiplex GMT 120

DELL Optiplex GMT 5133

DELL Optiplex GXL 5133

DELL Optiplex GXL 5200

DELL OptiPlex GXM 5100

DELL Optiplex GXM 5133

DELL OptiPlex GXM 5200

DELL OptiPlex GXMT 5120

DELL OptiPlex GXMT 5133

DELL OptiPlex GXMT 5200

DELL OptiPlex GXMT 575

DELL OptiPlex GXMT 590

DELL OptiPlex P60-L

DELL OptiPlex XL 5120

DELL OptiPlex XL590

DELL OptiPlex XM 5100

DELL OptiPlex XM 5133

DELL OptiPlex XM 575

DELL OptiPlex XMT 5100

DELL PowerEdge SP 466

DELL PowerEdge SP 590-2 (1p)

DELL PowerLine System 433E

DELL PowerLine System 433SE

DELL PowerLine System 450DE/2 DGX

DELL PowerLine System 486D/50

Delphi Comet 466NT model 400

Delta Micro Systems Gold Line 4D33V

DELTACOM EISA/VLB 486

DELTACOM Pentium PCI

DELTACOM Super Server

DELTACOM VL Bus 486

DFI CCV 486DX2-66

DFI D486CCI-33C

DFI D486CCI-40A

DFI D486ICP-66

DFI D486ICP-66 (with AMD486DX2/66)

DFI D486P-PRO-x50-AMD

DFI D486V-PRO

DFI DP5-PRO-66 Intel

DFI DP5-PRO90

DFI DP586-PRO90

DFI E586IPE-60I

DFI G466EVA

DFI G466EVAx50I

DFI G486ECV

DFI G486ECV-33

DFI G486EVA-33I

DFI G486EVA-40AMD

DFI G486EVA-50AMD

DFI G486EVA-66AMD

DFI G486EVA/E-AIO-66I

DFI G486EVB-66

DFI G486VPA DX4-100

DFI G486VPC AMD 5x86 133

DFI G486VPC Cyrix 5x86 120

DFI G486VVP

DFI G586ICA-P100

DFI G586IPB/W P133

DFI G586IPC 166

DFI G586IPC Cyrix 6x86 133

DFI G586IPV P166

DFI G586OPA-P90I

DFI G586VPM P100

DFI P486-PRO 486DX-33

DFI P586OP-60

Diamond DT 486DX Versa (AMD DX/40)

Diamond DT 486DX Versa (DX2/66)

Digital Equipment Corp. Celebris 4100

Digital Equipment Corp. Celebris 466

Digital Equipment Corp. Celebris 560

Digital Equipment Corp. Celebris 575

Digital Equipment Corp. Celebris XL 4100

Digital Equipment Corp. DECpc 433

Digital Equipment Corp. DECpc 433dx DT

Digital Equipment Corp. DECpc 433T

Digital Equipment Corp. DECpc 466 ST

Digital Equipment Corp. DECpc LPx 560

Digital Equipment Corp. DECpc LPx+ 450d2

Digital Equipment Corp. DECpc LPx+ 450sx

Digital Equipment Corp. DECpc XL 466d2

Digital Equipment Corp. DECpc XL Server 4100

Digital Equipment Corp. DECpc XL Server 466d2

Digital Equipment Corp. DECpc XL Server 560

Digital Equipment Corp. DECpc XL Server 590

Digital Equipment Corp. DECstation® 425c

Digital Equipment Corp. HiNote 433

Digital Equipment Corp. HiNote CS450

Digital Equipment Corp. HiNote Ultra 433

Digital Equipment Corp. HiNote Ultra CS450

Digital Equipment Corp. HiNote VP CSS 5100

Digital Equipment Corp. HiNote VP CSS 575

Digital Equipment Corp. HiNote VP CTS 5100

Digital Equipment Corp. Prioris HX 5100MP

Digital Equipment Corp. Prioris HX 5133

Digital Equipment Corp. Prioris HX 5166

Digital Equipment Corp. Prioris HX 590

Digital Equipment Corp. Prioris LX 466 Server

Digital Equipment Corp. Prioris LX 5120

Digital Equipment Corp. Prioris LX 5150

Digital Equipment Corp. Prioris LX 575 Server

Digital Equipment Corp. Prioris LX 590 Server

Digital Equipment Corp. Prioris XL Server 4100

Digital Equipment Corp. Prioris XL Server 466d2

Digital Equipment Corp. Prioris XL Server 5100

Digital Equipment Corp. Prioris XL Server 5133

Digital Equipment Corp. Prioris XL Server 5166

Digital Equipment Corp. Prioris XL Server 560

Digital Equipment Corp. Prioris XL Server 575

Digital Equipment Corp. Prioris XL Server 590

Digital Equipment Corp. Prioris ZX 5133MP

Digital Equipment Corp. Prioris ZX 5166MP

Digital Equipment Corp. Venturis 466

Digital Equipment Corp. Venturis 560

Digital Equipment Corp. Venturis FP 590

Digital Equipment Corp. Venturis FP i450s2

Digital Equipment Corp. Venturis FP i466

Digital Equipment Corp. Venturis i450s2

Digital Equipment Corp. Venturis i466

DTK FEAT-39 DX4-100

DTK FEAT-39D

DTK FEAT-39M

DTK FEAT-39T

DTK QUIN-02 Pentium 60

DTK QUIN-02 Pentium 66

DTK QUIN-32 Pentium 60

DTK QUIN-33 Pentium 60

DTK QUIN-33 Pentium 90

DTK QUIN-34 Pentium 60

DTK QUIN-34 Pentium 66

DTK QUIN-35 Pentium 120

DTK QUIN-35 Pentium 90

DTK QUIN-36 Pentium 100

DTK QUIN-36 Pentium 133

DTK QUIN-52 Pentium 90

DTK QUIN-54 Pentium 120

DTK QUIN-54 Pentium 133

DTK QUIN-54 Pentium 166

DTK QUIN-54 Pentium 75

DTK QUIN-55 Pentium 180

DTK QUIN-55 Pentium 200

DTK QUIN-61 Pentium 100

DTK QUIN-61 Pentium 133

DTK QUIN-63 Pentium 100

DTK QUIN-63 Pentium 120

DTK QUIN-63 Pentium 150

DTK QUIN-63 Pentium 166

DTK QUIN-63 Pentium 180

DTK QUIN-63 Pentium 200

DTK QUIN-63 Pentium 75

DTK QUIN-63 Pentium 90

DTK QUIN-63 Pentium133

DTK QUIN-64 Pentium 100

DTK QUIN-64 Pentium 133

DTK QUIN-64 Pentium 166

DTP Micro Systems POWERPRO 486DX-2/66

DTP Micro Systems POWERPRO P120S

DTP Micro Systems POWERPRO P150S

DTP Micro Systems POWERPRO P166S

DTP Micro Systems POWERPRO P166T2

DTP Micro Systems POWERPRO P90A

DTP Micro Systems POWERPRO P90I

Dunn Computer Corporation Pentium 133

Duracom 486/66DX2-CCV

Duracom DESKSAVER DX2/66

Duracom G486/66DX2-EVB

Duracom G486/66DX2-VVP

Duracom Pentium/66-ipe

DVM-Service A.O. DVM-Machine 5P6

DVM-Service A.O. DVM-Machine MXi-5P Direct P60

DVM-Service A.O. DVM-Machine VERTEX-Lite P60

DVM-Service A.O. MX-Maestro 486DX2-66

DVM-Service A.O. VERTEX-Lite P66

Dyna Micro GEMLIGHT VL486G/DX4

Dyna Micro SUPER P54VLPCI

Dynamic Decisions DYNEX EXECUTIVE 486-33 ISA/PCI

Dynamic Decisions DYNEX EXECUTIVE 486-33 SP3G

Dynamic Decisions DYNEX EXECUTIVE 486-33 VL/EISA

Dynamic Decisions DYNEX EXECUTIVE 486-33 VL/ISA

Dynamic Decisions DYNEX EXECUTIVE 486-33D SV2GX4

Dynamic Decisions DYNEX EXECUTIVE 486-66 DX2 PCI

Dynamic Decisions DYNEX EXECUTIVE 486-66 DX2 SV2GX4

Dynamic Decisions DYNEX EXECUTIVE 486-66 SP3G

Dynamic Decisions DYNEX EXECUTIVE 486-66 VL/EISA

Dynamic Decisions DYNEX EXECUTIVE 586-60 MP3

Dynamic Decisions DYNEX EXECUTIVE 586-66 ISA/PCI

Dynamic Decisions DYNEX EXECUTIVE 586-66 SP4

Dynamic Decisions DYNEX EXECUTIVE 586-90 4SP4

Dynamic Decisions DYNEX EXECUTIVE 586-90 EISA/PCI

Dynamic Decisions DYNEX EXECUTIVE ISA-486-33 SV2G

Dynamic Decisions DYNEX EXECUTIVE ISA-486-33 SV2G GREEN

Dynamic Decisions DYNEX EXECUTIVE ISA-486-33 SX GREEN VL

Dynamic Decisions DYNEX EXECUTIVE ISA-486-50 SV2

Dynamic Decisions DYNEX EXECUTIVE ISA-486-50 VL

Dynamic Decisions DYNEX EXECUTIVE ISA-486-66 DX2 GREEN VL

Dynamic Decisions DYNEX EXECUTIVE ISA-486-66D2 SV2

Dynamic Decisions DYNEX ISA-486-33 PCI GREEN

Dynamic Decisions DYNEX PROFESSIONAL 486-33 GREEN VL ISA

Dynamic Decisions DYNEX PROFESSIONAL 486-33DX VL/EISA E3

Dynamic Decisions DYNEX PROFESSIONAL 486-50DX VL/EISA E4

Dynamic Decisions DYNEX PROFESSIONAL 486-66 VL/ISA

ECE DATA i486™/VLB-GREEN

Edge Technology EDGE-PCI P60

Elitegroup DT-486PCG 486DX4-100

Elitegroup DT-486PFG 486DX4-100

Elitegroup MM402 486DX2-80

Elitegroup MT-PTI120

Elitegroup MT-PTS100

Elonex PC-466/R

Elonex PC-466/VL

Eltech Model 4660VB

Eltech P54C-90P

EMS Fargo P5133SN

Epson ActionPC 3000

Epson ActionPC 5000

Epson ActionPC 5500

Epson ActionPC 6000

Epson ActionPC 7300

Epson ActionPC 7300 AMD DX4/100

Epson ActionPC 8600

Epson ActionTower 8200

Epson ActionTower 8600

Epson Endeavor P60

Epson Endeavor WG 4DX2/50

Epson Equity 4DX/33

Epson Equity 4SX/25

Epson PowerSpan 486DX2/66

Epson PowerSpan P90

Epson Progression 4DX2/50

Ergo PowerBrick 100

Ergo PowerBrick 33

Ergo PowerBrick 66

ERIDAN Onyx DE433

ERIDAN Onyx DE466

ERIDAN Onyx DVL4-100

Everex Step DP (1p)

Everex Step Premier/2200 Pentium 166

Everex Step Pro Series Pentium 133

Everex Step SP/2000A Pentium 120

Everex Step SP/2002A Pentium 166

Everex Step SPII/2000A Pentium 133

Everex Step SPT/2200 Pentium 166

Everex Tempo 486/33

Everex Tempo 486/33E

Everex Tempo PCI/486DX4/100

Everex Tempo Plus 2002 Pentium 166

Everex Tempo Station P75

Everex Tempo VLG 486DX4/100

Evesham Micros Premier PCI 486DX2-66 /340

Evesham Micros VALE™ PLATINUM P90

Expo-Tech  486DM-66 (incl. DP and DE Models)

Expo-Tech 410M

Expo-Tech 433M

Expo-Tech 450M

Expo-Tech 486DM-100 (incl. DP and DE Models)

Expo-Tech 486DM-33 (incl DP and DE Models)

Expo-Tech 486DM-33E (incl. DP and DE Models)

Expo-Tech 486DM-40E (incl. DP and DE Models)

Expo-Tech 486DM-50 (incl DP and DE Models)

Expo-Tech 486DM-50E (incl. DP and DE Models)

Expo-Tech 486DM-S50 (incl. DP and DE Models)

Expo-Tech 486DX-33 ELP

Expo-Tech 486DX-33 Mini

Expo-Tech 486DX-33 Mini 72P

Expo-Tech 486DX-33 Tower

Expo-Tech 486DX-33E Mini

Expo-Tech 486DX2-50 ELP

Expo-Tech 486DX2-50 Mini

Expo-Tech 486DX2-50 Mini 72P

Expo-Tech 486DX2-50 Tower

Expo-Tech 486DX2-50E ELP

Expo-Tech 486DX2-50E Mini

Expo-Tech 486DX2-66 ELP

Expo-Tech 486DX2-66 Mini

Expo-Tech 486DX2-66 Mini 72P

Expo-Tech 486DX2-66 Tower

Expo-Tech 486DX4-100 Mini

Expo-Tech 486SX-25 ELP

Expo-Tech 486SX-25 Mini

Expo-Tech 486SX-33 ELP

Expo-Tech 486SX-33 Mini

Expo-Tech 486SX-33 Mini 72P

Expo-Tech 486SX-33 Tower

Expo-Tech DM-S33 (incl. DP and DE Models)

Expo-Tech Pentium 566M

Expo-Tech Platinum DM90

Expo-Tech Platinum DP90

Expo-Tech Plato P54C

Expo-Tech SMP50P

Fast 486DY66S520

First 486-GAC-2

First 486-GACV-2

First 486-GAV

First 486-GIO-VP

First 486-PAK3

First 486-PIO2 486DX4-100

First 486-PVT-IO 486DX2-66

First 486-PVT2 486DX2-66

First 486-PVT2 486DX2/66

First 486-VIP-IO

First 486-VIP-IO2

First COUGAR625

First COUGAR661

First COUGAR675

First CUB671

First FIC PM-900

First LEO 486-DBA 486DX/33

First LEO 486-DBA 486DX2/66

First LEO 486-GIO-VT2

First LEO 486-GVT2

First LEO 486-PAA 486DX4/100

First LEO 486-PVT

First LEO 486-PVT-IO 486DX2-66

First LEO 486-VIP

First LEO 486PIO3 486DX4-100

First LEO ARIES_3P

First LEO CWD5751X Pentium 100

First LEO PA-1000T Pentium 66

First LEO PA-2000 Pentium 66

First LEO PA-2005

First LEO PA-2100 Pentium 100

First LEO PA-2100 Pentium 75

First LEO PA2002 Pentium 100

First LEO PA2003 Pentium 100

First LEO PAC-2000 Pentium 100

First LEO PAC2002 Pentium 100

First LEO PDA2000 Pentium 100

First LEO PSK-2000 Pentium 100

First LEO PT-2000 Pentium 100

First LEO PT2200 Pentium 100

First LEO PTK2100 Pentium 133

First LEO TITAN132

First LEO TITEN222

First LEO TITEN332

First PA-1000 Pentium 60

First PA-2000

First PAK2100

First PREDATOR 654 Pentium 90

First PT-2000 Pentium 100

First PT-2003

First PT2200 Pentium 100

Forte Company DELTA 4.0 486SX/40 LB

Forte Company DELTA 486/33M

Forte Company DELTA 486DX/50

Forte Company DELTA 486DX2/66

Forte Company EPSILON 7.5 586/75

Forte Company EPSILON 9.0 586/90

Forte Company GAMMA DX 386DX/40

Fountain Technology 486DX2/66

Fountain Technology 486DX4/100

Fountain Technology P5/66

Fountain Technology P5/90

Freetech 586F52X Pentium 100

Freetech 586F56X Pentium 120

Freetech 586F62 Pentium 100

Freetech F38X-486VESA

Freetech F39X-486VESA

Fujitech 486DX2/66-EVL

Fujitech 486DX2/66-VL

Fujitech 486DX4/100-VL

Fujitech 486DX4/100-VL2

Fujitech i486DX2/66-VLG

Fujitech P5/90 PCI

Fujitsu ICIM DRS3000 DX-40Mhz

Fujitsu ICIM DRS3000 DX2-66Mhz

Fujitsu ICIM LEO 486DX-40Mhz

Fujitsu ICIM LEO 486DX2-66Mhz

Fujitsu ICIM LEO 486SX-33Mhz

Fujitsu ICL ErgoLite s90CD

Fujitsu ICL ErgoPRO D5/60 P

Fujitsu ICL ErgoPRO D5/90 P

Fujitsu ICL ErgoPRO e440/66

Fujitsu ICL ErgoPRO s450/100

Fujitsu ICL ErgoPRO x450/90

Fujitsu ICL Indiana M1008

Fujitsu ICL Indiana M1310

Fujitsu ICL SUPERSERVER K430i

Fujitsu ICL TEAMSERVER C450i

Fujitsu ICL TEAMSERVER E180i

Fujitsu ICL TEAMSERVER E380i

Fujitsu ICL TEAMSERVER E430i

Fujitsu ICL TEAMSERVER E480i

Fujitsu ICL TEAMSERVER F450i

Fujitsu ICL TEAMSERVER F530i

Fujitsu ICL TEAMSERVER H180i

Fujitsu ICL TEAMSERVER H430i

Fujitsu ICL TEAMSERVER H530i

Fujitsu ICL ValuePlus DL/100d i

Fujitsu ICL ValuePlus DL/66d i

Fujitsu ICL ValuePlus MD™/66

Fujitsu ICL ValuePlus MD/P60

Fujitsu S-3000

Fujitsu S-500

Fujitsu S-5000MP

Fujitsu S-510

FutureTech 486DX2-66 VLB

Gateway 2000 386/33c

Gateway 2000 486DX2/50E

Gateway 2000 486DX2/50V

Gateway 2000 486DX2/66V Desktop

Gateway 2000 486DX2/66V Tower

Gateway 2000 4DX/33

Gateway 2000 4SX/25

Gateway 2000 COLORBOOK 486SX-33

Gateway 2000 Handbook 486-50

Gateway 2000 Liberty 2000 486DX4-100

Gateway 2000 P5-133

Gateway 2000 P5-60

GCH AEGIS 466

GCH AEGIS 466D2V

GCH Aegis 466ES

GCH EasyData GD600

GCH EasyDate 466HI VL

GCH EiSYS Ei600 Series

GEKKO Power+ Energia 90 (Pentium)

GEKKO Power+ Manager

GEKKO Power+ Nirvana

GEMLIGHT GEMMA-9IH Pentium 100

GEMLIGHT GEMMA-9IH Pentium 120

GEMLIGHT GEMMA-9IH Pentium 133

GEMLIGHT GEMMA-9IH Pentium 150

GEMLIGHT GEMMA-9IH Pentium 166

Genitech Capricorn HF60 E/PCI P5

Genitech Steller Orion 2 System

GES Singapore DATAMINI POWERPRO 100

GES Singapore DATAMINI POWERPRO 120

GES Singapore DATAMINI POWERPRO 75

GES Singapore DATAMINI POWERPRO 90

Getek PCI PENTIUM

GMX ESA-MB 486DX2/66

GoldStar GS450DT

GoldStar GS466DT

GoldStar GS486ID50L

GoldStar GS486ID66L

Government Micro Resources Rembrandt Master Series 2000 IE Pentium 90

Government Micro Resources Rembrandt Master Series 2000 IZ Pentium 100

Government Micro Resources Rembrandt Master Series 2000 IZ Pentium 120

Government Micro Resources Rembrandt Master Series 2000 IZ Pentium 133

Government Micro Resources Rembrandt Master Series 2000 IZ Pentium 90

Greff Direct P90

GRiD® 486ei-25 SVR

GRiD 486ei-33

GST/Microcity APOGEE 8000PT P100

GST/Microcity APOGEE 8000PT/LS Pentium 120

GVH Desktop 486/66 PCIL

GVH TOWER PENTIUM 90 PCI

H.D.Microsystèmes AX7 486 DX-33

H.D.Microsystèmes AX7 486 DX-50

H.D.Microsystèmes AX7 486 DX2-50

H.D.Microsystèmes AX7 486 DX2-66

H.D.Microsystèmes AX7 486 DX2-66 EISA

H.D.Microsystèmes AX7 486 DX2-80

H.D.Microsystèmes AX7 486 DX4-100

H.D.Microsystèmes AX7 Pentium 60 PCI

H.D.Microsystèmes AX7 Pentium 90 PCI

Hancke & Peter 486 DX4-100 VL/ISA Professional

Hancke & Peter 486-66 EISA/VL Professional

Hancke & Peter 486-66 PCI Professional

Hancke & Peter 486-66 VLG Professional

Hancke & Peter Pentium 100 PCI Professional

Hancke & Peter Pentium 66 EISA/PCI Professional

Hancke & Peter Pentium 75 PCI Professional

Hancke & Peter Pentium 90 PCI Professional

HARPO 433S-FIRMA

HARPO 4DX FIRMA

HARPO NT 486DX2

Harris 486DX2/66 VESA

Harris Pentium/66 PCI

Hertz P100e

Hewitt Rand HRP5100

Hewlett-Packard NetServer 4/100 LC

Hewlett-Packard NetServer 4/100 LF

Hewlett-Packard NetServer 4/66 LC

Hewlett-Packard NetServer 4/66 LF

Hewlett-Packard NetServer 4d/66 LE

Hewlett-Packard NetServer 4d/66 LM

Hewlett-Packard NetServer 5/100 LM

Hewlett-Packard NetServer 5/100 LS

Hewlett-Packard NetServer 5/166 LC

Hewlett-Packard NetServer 5/60 LM

Hewlett-Packard NetServer 5/66 LM

Hewlett-Packard NetServer 5/75 LC

Hewlett-Packard NetServer 5/75 LH

Hewlett-Packard NetServer 5/90 LM

Hewlett-Packard Omnibook 4000C 4/50

Hewlett-Packard OmniBook 5500 5/100

Hewlett-Packard OmniBook 5500 5/120

Hewlett-Packard OmniBook 5500 5/133

Hewlett-Packard OmniBook 5500CT 5/100C

Hewlett-Packard OmniBook 5500CT 5/120C

Hewlett-Packard OmniBook 5500CT 5/133C

Hewlett-Packard Vectra 486/33N

Hewlett-Packard Vectra 486/33T

Hewlett-Packard Vectra 486/50U

Hewlett-Packard Vectra 486/66U

Hewlett-Packard Vectra 486S/20

Hewlett-Packard Vectra M2 4/66 PC

Hewlett-Packard Vectra N2 4/100i PC

Hewlett-Packard Vectra N2 4/66i PC

Hewlett-Packard Vectra VE 4/100 PC

Hewlett-Packard Vectra VE 4/50 PC

Hewlett-Packard Vectra VE 4/66 PC

Hewlett-Packard Vectra VE 5/75 PC

Hewlett-Packard Vectra VE 5/90 PC

Hewlett-Packard Vectra VL 5/75 Series 3 PC

Hewlett-Packard Vectra VL 5/90 Series 3 PC

Hewlett-Packard Vectra XM 5/120 Series 3 PC

Hewlett-Packard Vectra XM 5/133 Series 4 PC

Hewlett-Packard Vectra XM 5/75 Series 3 PC

Hewlett-Packard Vectra XM 5/90 Series 3 PC

Hewlett-Packard Vectra XM2 4/100 PC

Hewlett-Packard Vectra XM2 4/66 i PC

Hewlett-Packard Vectra XU 5/90C PC (1p)

Hi-Link MIROX A100 STATION

Hi-Link MIROX A120 STATION

Hi-Link MIROX A133 STATION

Hi-Link MIROX A150 SERVER

Hi-Link MIROX A90 STATION

Hi-Link MIROX P100 STATION

Hi-Link MIROX P120 SERVER

Hi-Tech USA 386-DX40/128K ISA

Hi-Tech USA 486DX-33/128K VLB

Hi-Tech USA 486DX2-50/256K

Hi-Tech USA 486DX2-66/256K PCI-VLB

Hi-Tech USA 486DX2-66C/128K VLB

Hi-Tech USA 486DX2-80/128K VLB

Hi-Tech USA 486DX2-80/256K VLB

Hi-Tech USA 486DX266 VLB SYSTEM

Hi-Tech USA 486DX33 VLB SYSTEM

Hi-Tech USA 486DX4-100/256K VLB

Hi-Tech USA 486DX4-100A/256K VLB

Hi-Tech USA ASUS P5-100/256K PCI

Hi-Tech USA Genoa 486DX2-66/256k VLB

Hi-Tech USA INTEL P5-100/256K PCI/TRITON

Hi-Tech USA P5-60/256K PCI-VLB

Hi-Tech USA P5-66/256k PCI/VLB

Hi-Tech USA P5-66/256K VLB

Hi-Tech USA P5-75/256K PCI/VLB USA

Hi-Tech USA P5-75/256K VLB/PCI TAIWAN

Hi-Tech USA P5-90/256K VLB/PCI TAIWAN

Hi-Tech USA PENTIUM-90/256K PCI-VLB

HiQuality Systems HIQ D66 SVL

HiQuality Systems HIQ P66 PCI

HiQuality Systems HIQ P90 PCI

HM Systems Minstrel XPeco Elite 486DX4-100

HM Systems Minstrel XPentium P90

HM Systems Minstrel XPentium Server P90

Hypertec HyperFormance Series 5 & Series 10 Desktop/Minitower Pentium 166

Hypertec HyperFormance Series 5 & Series 10 Slimline Pentium 166

HYPERTEC SYSTEMS CIARA Discovery

IBM Aptiva 2144-M70

IBM Aptiva 2144-M71

IBM PC 130 6271 486DX4/100

IBM PC 130 Model 6271 486DX2/66

IBM PC 140 Model 6260 Pentium/100

IBM PC 140 Model 6260 Pentium/75

IBM PC 150 6271 486DX4/100

IBM PC 330 6581 486DX4/100 with AMD processor

IBM PC 330 Model 6571 486DX/33

IBM PC 330 Model 6571 486DX2/50

IBM PC 330 Model 6571 486DX2/66

IBM PC 330 Model 6571 486DX4/100

IBM PC 330 Model 6571 486DX4/100 with AMD processor

IBM PC 330 Model 6573 486DX2/66

IBM PC 330 Model 6573 486DX4/100

IBM PC 330 Model 6576 Pentium/120

IBM PC 330 Model 6576 Pentium/133

IBM PC 330 Model 6576 Pentium/150

IBM PC 330 Model 6576 Pentium/166

IBM PC 330 Model 6576 Pentium/75

IBM PC 340 Model 6560 Pentium/100

IBM PC 340 Model 6560 Pentium/133

IBM PC 350 Model 6581 486DX/33

IBM PC 350 Model 6581 486DX2/50

IBM PC 350 Model 6581 486DX2/66

IBM PC 350 Model 6581 486DX4/100

IBM PC 350 Model 6583 486DX2/66

IBM PC 350 Model 6583 486DX4/100

IBM PC 350 Model 6586 Pentium/120

IBM PC 350 Model 6586 Pentium/133

IBM PC 350 Model 6586 Pentium/150

IBM PC 350 Model 6586 Pentium/166

IBM PC 350 Model 6586 Pentium/75

IBM PC 360 Model 6598 PentiumPro/150 140

IBM PC 730 Model 6875 Pentium/120

IBM PC 730 Model 6875 Pentium/133

IBM PC 730 Model 6875 Pentium/75

IBM PC 730 Model 6876 Pentium/100

IBM PC 730 Model 6876 Pentium/120

IBM PC 730 Model 6876 Pentium/133

IBM PC 730 Model 6876 Pentium/90

IBM PC 730 Model 6877 Pentium/150

IBM PC 750 Model 6885 Pentium/120

IBM PC 750 Model 6885 Pentium/133

IBM PC 750 Model 6885 Pentium/75

IBM PC 750 Model 6886 Pentium/100

IBM PC 750 Model 6886 Pentium/120

IBM PC 750 Model 6886 Pentium/133

IBM PC 750 Model 6886 Pentium/90

IBM PC 750 Model 6887 Pentium/150

IBM PC Server 310 Pentium/133 8639-MDT

IBM PC Server 310 Pentium/133 8639-ODO

IBM PC Server 310 Pentium/133 8639-ODT

IBM PC Server 310 Pentium/75 8639-0XT

IBM PC Server 310 Pentium/75 8639-MXT

IBM PC Server 320 Pentium/133 8640-1DS (1p)

IBM PC Server 320 Pentium/133 8640-2DO (1p)

IBM PC Server 320 Pentium/133 8640-ODV (1p)

IBM PC Server 320 Pentium/75 8640-MX0 (1p)

IBM PC Server 320 Pentium/75 8640-MXT (1p)

IBM PC Server 320 Pentium/90 8640-0Y0 (1p)

IBM PC Server 320 Pentium/90 8640-0YT (1p)

IBM PC Server 320 Pentium/90 8640-1Y0 (1p)

IBM PC Server 320 Pentium/90 8640-1YT (1p)

IBM PC Server 320 Pentium/90 8640-MY0 (1p)

IBM PC Server 320 Pentium/90 8640-MYR (1p)

IBM PC Server 320 Pentium/90 8640-MYT (1p)

IBM PC Server 520 Pentium/100 8641-EZ1 (1p)

IBM PC Server 520 Pentium/100 8641-EZE (1p)

IBM PC Server 520 Pentium/100 8641-EZO (1p)

IBM PC Server 520 Pentium/100 8641-EZS (1p)

IBM PC Server 520 Pentium/100 8641-EZV (1p)

IBM PC Server 520 Pentium/133 8641-EDA (1p)

IBM PC Server 520 Pentium/133 8641-EDG (1p)

IBM PC Server 520 Pentium/133 8641-EDL

IBM PC Server 720 Penitum/166 8642-OE1 (1p)

IBM PC Server 720 Pentium/133 8642-2DS (1p)

IBM PC Server 720 Pentium/133 8642-ODN (1p)

IBM PC Server 720 Pentium/166 8642-2E1 (1p)

IBM PC Server 720 Pentium/90 8642-0Z0 (1p)

IBM PC Server 720 Pentium/90 8642-1Z0 (1p)

IBM PS/1 2155-xxx 486DX/33

IBM PS/1 2155-xxx 486DX2/50

IBM PS/1 2168-xxx 486DX/33

IBM PS/1 2168-xxx 486DX2/50

IBM PS/1000

IBM PS/2 Model 50/50Z System Board Upgrade 486SLC2/50

IBM PS/2 Model 53 9553-xxx 486SLC2/50 141

IBM PS/2 Model 56 9556-xxx 486SLC2/50

IBM PS/2 Model 57 9557-xxx 486SLC2/50

IBM PS/2 Model 70 8570-xxx 386DX/25

IBM PS/2 Model 70 8570-xxx 486DX/25

IBM PS/2 Model 76 9576-xxx 486DX2/66

IBM PS/2 Model 76 9576-xxx 486SX/33

IBM PS/2 Model 76i 9576-xxx 486DX2/50 141

IBM PS/2 Model 76s 9576-xxx 486DX2/50 141

IBM PS/2 Model 77 9577-xxx 486DX2/66

IBM PS/2 Model 77 9577-xxx 486SX/33

IBM PS/2 Model 77i 9577-xxx 486DX2/50 141

IBM PS/2 Model 77s 9577-xxx 486DX2/50 141

IBM PS/2 Model 80 8580-xxx 386DX/25

IBM PS/2 Model 90 XP 486 8590-0J* 486DX/25

IBM PS/2 Model 90 XP 486 8590-0L* 486DX2/50

IBM PS/2 Model 90 XP 486 9590-0L* 486DX2/50

IBM PS/2 Model 95 486 XP 8595-xxx with IBM PS/2 90MHz Processor Upgrade Option with Pentium Technology

IBM PS/2 Model 95 486 XP 9595-xxx with IBM PS/2 90MHz Processor Upgrade Option with Pentium Technology

IBM PS/2 Model 95 XP 486 8595-0J* 486DX/25

IBM PS/2 Model 95 XP 486 8595-xxx with Enhanced 486DX2/66 processor upgrade

IBM PS/2 Model 95 XP 486 8595-xxx with processor upgrade with Pentium Technology

IBM PS/2 Model 95 XP 486 9595-xxx with Enhanced 486DX2/66 processor upgrade

IBM PS/2 Model 95 XP 486 9595-xxx with processor upgrade with Pentium Technology

IBM PS/2 Server 85 433 9585-0K*

IBM PS/2 Server 85 466 9585-0N*

IBM PS/2 Server 95 566 9595-0QT

IBM PS/2 Server 95 Array 466 9595-3N* 142

IBM PS/2 Ultimedia™ DV M57 9557-xxx 486SLC2/50

IBM PS/2 Ultimedia M57 9557-xxx 486SLC2/50

IBM PS/2 Ultimedia M77 9577-xxx 486DX2/66

IBM PS/2 Ultimedia M77 9577-xxx 486SX/33

IBM PS/ValuePoint 433DX/S 6472-xxx

IBM PS/ValuePoint 433SX/D 6384-Kxx

IBM PS/ValuePoint 433SX/S 6382-Kxx

IBM PS/ValuePoint P60/D

IBM ThinkPad 345C

IBM ThinkPad 360CS 486SX/33 143

IBM ThinkPad 370C

IBM ThinkPad 755C 486DX2/50 143

ICD Compatibles ICD P5-90

ICL ErgoLite s90CD

ICL ErgoPRO D4/33d

ICL ErgoPRO D4/50 V

ICL ErgoPRO D4/50de P

ICL ErgoPRO D4/66d

ICL ErgoPRO D4/66d P

ICL ErgoPRO D5/60

ICL ErgoPRO D5/60 P

ICL ErgoPRO D5/90 P

ICL ErgoPRO e440/66

ICL ErgoPRO E5/60

ICL ErgoPRO s450/100

ICL ErgoPRO x450/90

ICL Indiana M1008

ICL Indiana M1310

ICL SUPERSERVER K430i

ICL System Platform FX486/33

ICL TEAMSERVER C450i

ICL TEAMSERVER E180i

ICL TEAMSERVER E380i

ICL TEAMSERVER E430i

ICL TEAMSERVER E480i

ICL TEAMSERVER F450i

ICL TEAMSERVER F530i

ICL TEAMSERVER H180i

ICL TEAMSERVER H430i

ICL TEAMSERVER H530i

ICL ValuePlus DL/100d i

ICL ValuePlus DL/66d i

ICL ValuePlus MD/66

ICL ValuePlus MD/P60

ICRDA A100NTSDH2.0

ICRDA A100NTSDS1.0

ICRDA P100NT-ID S1.0

ICRDA P100NTIDW850

ICRDA P100NTSAS1.0

ICRDA P100NTSDH2.0

ICRDA P100NTSDS1.0

ICRDA P133NT-SA H2.0

ICRDA P133NTIDS1.0

ICRDA P133NTIDW850

ICRDA P133NTSDH2.0

ICRDA P133NTSDS1.0

ICRDA P166NTIDS1.0

ICRDA P166NTIDW850

Image 486DX/50 EISA

ImAtrex Predator Series ProV 90

Innovax Aurora 486DX/33

Innovax Aurora 486DX2/66

Insight 60MHz-PCI

Insight 66 MHz EISA/VESA 486DX2

Intecolor WS-3006

Intecolor WS-3106

Integrated ISG Marbles P90

Intelicom 486DX/33 EISA

Intelicom 486DX/33 ISA

Intelicom 486DX/33 VESA EISA

Intelicom 486DX/33 VLB

Intelicom 486DX/50 EISA

Intelicom 486DX/50 ISA

Intelicom 486DX/50 VESA EISA

Intelicom 486DX/50 VLB

Intelicom 486DX2/50 EISA

Intelicom 486DX2/50 ISA

Intelicom 486DX2/50 VESA EISA

Intelicom 486DX2/50 VLB

Intelicom 486DX2/66 EISA

Intelicom 486DX2/66 ISA

Intelicom 486DX2/66 VESA EISA

Intelicom 486DX2/66 VLB

Intelicom 486DX4/100 VESA

Intelicom PENTIUM/60 PCI

Intelicom PENTIUM/66 PCI

Intelligent Decisions APEX  586/90

Intelligent Decisions APOLLO P90

Intelligent Decisions BACH 486DX2-66

Intelligent Decisions CHOPIN 486DX2-66

Intelligent Decisions ULTRA 586/75

Intellimedia IntelliView 210

Intellimedia MPS-110 486DX2/66

INTERCOMP Bridge™ FULLNOTE DX2/50

INTERCOMP Digit 486DX/33 VLB

INTERCOMP Digit 486DX2/50 VLB

INTERCOMP Digit 486DX2/66

INTERCOMP Digit 486DX2/66 VLB

INTERCOMP Digit DX2/50 VLB

INTERCOMP Digit DX4/100

INTERCOMP Entry DX-33

INTERCOMP Entry SX-25

INTERCOMP Explorer DX/100

INTERCOMP Explorer DX2/66

INTERCOMP IDAS 8000

INTERCOMP IDAS 8000/H

INTERCOMP IDAS 8000/H Pentium 66

INTERCOMP IDAS 8000/P 60

INTERCOMP IDAS 8000/P 90

INTERCOMP IDAS 9000 Pentium 90

INTERCOMP Master DX2/50 PCI

INTERCOMP Master DX2/80 PCI

INTERCOMP Master DX4/100 PCI

INTERCOMP Master EISA DX/33

INTERCOMP Master EISA DX2/66

INTERCOMP Master PENTIUM 90 PCI

INTERCOMP Master PENTIUM/66

INTERCOMP Target EN DX/33

INTERCOMP Target EN DX/33 VLB

INTERCOMP Target EN DX2/50 PCI

INTERCOMP Target EN DX2/66

INTERCOMP Target EN DX2/66 VLB

INTERCOMP Target EN DX2/80 PCI

INTERCOMP Target EN DX4/100 PCI

INTERCOMP Target EN Pentium 90 PCI

Interface Electronic 486DX2/66

Interface Electronic System X EISA

Intergraph TD-300 Personal Workstation Pentium Pro 150MHz 140

Intergraph TDZ-300 Personal Workstation Pentium Pro 150MHz 140

International Data 500 6x86 P150 Desktop

International Instrumentation BLUE MAX 486DX4-100

International Instrumentation BLUE MAX P-60 PCI

International Instrumentation BLUE MAX P54-100m

Investronica INVES BS-486 VL

Investronica INVES BS-486 VS

Investronica INVES BS-486VT+

Investronica INVES IFS-1000

Investronica INVES IFS-900

Investronica INVES MP-900 XM UniProcessor

Investronica INVES WS-1000

Investronica INVES WS-900 EVL

INWAR S.A. AS5PCI

INWAR S.A. WS4VL

Iolair Engineering Engineering SVO-2

Iolair Engineering Silicon Valley Online SVO-1

IPC DYNASTY HE (GREEN) 486DX-33

IPC DYNASTY HE (GREEN) 486DX2-50

IPC DYNASTY HE (GREEN) 486DX2-66

IPC DYNASTY HE (GREEN) 486SX-25

IPC DYNASTY HE (GREEN) 486SX-33

IPC DYNASTY HE 486DX-33

IPC DYNASTY HE 486DX2-50

IPC DYNASTY HE 486DX2-66

IPC DYNASTY HE 486SX-25

IPC DYNASTY HE 486SX-33

IPC DYNASTY SE 486DX-33C

IPC DYNASTY SE 486DX2-66C PCI

IPC DYNASTY SE P5-60C

IPC DYNASTY SE P5-90C

IPC DYNASTY SEL 486DX-33C

IPC DYNASTY SEL 486DX2-66C

IPC DYNASTY SEL P5-60C

IPC DYNASTY SEL P5-66C

IPC DYNASTY SEL P5-90C

IPC FAMILYMAGIC 486/66

IPC VALUEMAGIC 486DX-33

IPC VALUEMAGIC 486DX2-50

IPC VALUEMAGIC 486DX2-66

IPC VALUEMAGIC 486SX-25

IPC VALUEMAGIC 486SX-33

IPC VALUEMAGIC P5-60C

IPC VALUEMAGIC P5-66C

IPC VALUEMAGIC P5-90C

Ipex 486DX-33 Green Centra 1000 ISA/VESA/PCI

Ipex 486DX-33 Green Centra 2000 ISA/VESA/PCI

Ipex 486DX-33 Green Centra 5000 ISA/VESA/PCI

Ipex 486DX-33 Green Desktop ISA/VESA

Ipex 486DX-33 Green Desktop ISA/VESA/PCI

Ipex 486DX-33 Green Mini Tower ISA/VESA/PCI

Ipex 486DX-33 Green Ultimate ISA/VESA/PCI

Ipex 486DX2-66 Centra 1000 ISA/VESA

Ipex 486DX2-66 Centra 2000 ISA/VESA

Ipex 486DX2-66 Centra 5000 ISA/VESA

Ipex 486DX2-66 Green Centra 1000 ISA/VESA/PCI

Ipex 486DX2-66 Green Centra 2000 ISA/VESA/PCI

Ipex 486DX2-66 Green Centra 5000 ISA/VESA/PCI

Ipex 486DX2-66 Green Desktop ISA/VESA

Ipex 486DX2-66 Green Desktop ISA/VESA/PCI

Ipex 486DX2-66 Green Mini Tower ISA/VESA

Ipex 486DX2-66 Green Mini Tower ISA/VESA/PCI

Ipex 486DX2-66 Green Ulti-mate ISA/VESA

Ipex 486DX2-66 Green Ultimate ISA/VESA/PCI

Ipex 486DX2-66 Slimline ISA/VESA

Ipex 486DX33 Green Centra 1000 ISA/VESA

Ipex 486DX33 Green Centra 2000 ISA/VESA

Ipex 486DX33 Green Centra 5000 ISA/VESA

Ipex 486DX33 Green Mini Tower ISA/VESA

Ipex 486DX33 Green Slimline ISA/VESA

Ipex 486DX33 Green Ulti-mate ISA/VESA

Ipex 486DX4-100 Green Centra 1000 ISA/VESA

Ipex 486DX4-100 Green Centra 1000 ISA/VESA/PCI

Ipex 486DX4-100 Green Centra 2000 ISA/VESA

Ipex 486DX4-100 Green Centra 2000 ISA/VESA/PCI

Ipex 486DX4-100 Green Centra 5000 ISA/VESA

Ipex 486DX4-100 Green Centra 5000 ISA/VESA/PCI

Ipex 486DX4-100 Green Desktop ISA/VESA

Ipex 486DX4-100 Green Desktop ISA/VESA/PCI

Ipex 486DX4-100 Green Mini Tower ISA/VESA

Ipex 486DX4-100 Green Mini Tower ISA/VESA/PCI

Ipex 486DX4-100 Green Ultimate ISA/VESA

Ipex 486DX4-100 Green Ultimate ISA/VESA/PCI

Ipex 486SX-33 Green Centra 1000 ISA/VESA

Ipex 486SX-33 Green Centra 2000 ISA/VESA

Ipex 486SX-33 Green Centra 5000 ISA/VESA

Ipex 486SX-33 Green Desktop ISA/VESA

Ipex 486SX-33 Green Mini Tower ISA/VESA

Ipex 486SX-33 Green Ultimate ISA/VESA

Ipex 486SX2-50 Green Centra 1000 ISA/VESA

Ipex 486SX2-50 Green Centra 2000 ISA/VESA

Ipex 486SX2-50 Green Centra 5000 ISA/VESA

Ipex 486SX2-50 Green Desktop ISA/VESA

Ipex 486SX2-50 Green Mini Tower ISA/VESA

Ipex 486SX2-50 Green Ultimate ISA/VESA

Ipex DX4/100-NB9400

Ipex Pentium 133/T Desktop ISA/PCI

Ipex Pentium/100S2 Centra 1000 ISA/PCI

Ipex Pentium/100S2 Centra 2000 ISA/PCI

Ipex Pentium/100S2 Centra 5000 ISA/PCI

Ipex Pentium/100S2 Desktop ISA/PCI

Ipex Pentium/100S2 Ultimate ISA/PCI

Ipex Pentium/100T Centra 1000 ISA/PCI

Ipex Pentium/100T Centra 2000 ISA/PCI

Ipex Pentium/100T Centra 5000 ISA/PCI

Ipex Pentium/100T Desktop ISA/PCI

Ipex Pentium/100T Ultimate ISA/PCI

Ipex Pentium/120  Green Desk Top ISA/PCI

Ipex Pentium/120 Green Centra 1000 ISA/PCI

Ipex Pentium/120 Green Centra 2000 ISA/PCI

Ipex Pentium/120 Green Centra 5000 ISA/PCI

Ipex Pentium/120 Green Ultimate ISA/PCI

Ipex Pentium/120S2 Centra 1000 ISA/PCI

Ipex Pentium/120S2 Centra 2000 ISA/PCI

Ipex Pentium/120S2 Centra 5000 ISA/PCI

Ipex Pentium/120S2 Desktop ISA/PCI

Ipex Pentium/120S2 Ultimate ISA/PCI

Ipex Pentium/120T Centra 1000 ISA/PCI

Ipex Pentium/120T Centra 2000 ISA/PCI

Ipex Pentium/120T Centra 5000 ISA/PCI

Ipex Pentium/120T Desktop ISA/PCI

Ipex Pentium/120T Ultimate ISA/PCI

Ipex Pentium/133S2 Centra 1000 ISA/PCI

Ipex Pentium/133S2 Centra 2000 ISA/PCI

Ipex Pentium/133S2 Centra 5000 ISA/PCI

Ipex Pentium/133S2 Desktop ISA/PCI

Ipex Pentium/133S2 Ultimate ISA/PCI

Ipex Pentium/133T Centra 1000 ISA/PCI

Ipex Pentium/133T Centra 2000 ISA/PCI

Ipex Pentium/133T Centra 5000 ISA/PCI

Ipex Pentium/133T Ultimate ISA/PCI

Ipex Pentium/150S1 Centra 1000 ISA/PCI

Ipex Pentium/150S1 Centra 2000 ISA/PCI

Ipex Pentium/150S1 Centra 5000 ISA/PCI

Ipex Pentium/150S1 Desktop ISA/PCI

Ipex Pentium/150S1 Ultimate ISA/PCI

Ipex Pentium/60 Centra 1000 EISA/PCI

Ipex Pentium/60 Centra 1000 ISA/PCI

Ipex Pentium/60 Centra 2000 EISA/PCI

Ipex Pentium/60 Centra 2000 ISA/PCI

Ipex Pentium/60 Centra 5000 EISA/PCI

Ipex Pentium/60 Centra 5000 ISA/PCI

Ipex Pentium/60 Desk Top EISA/PCI

Ipex Pentium/60 Desk Top ISA/PCI

Ipex Pentium/60 Mini Tower EISA/PCI

Ipex Pentium/60 Mini Tower ISA/PCI

Ipex Pentium/60 Slimline 1000 EISA/PCI

Ipex Pentium/60 Slimline ISA/PCI

Ipex Pentium/60 Ulti-mate EISA/PCI

Ipex Pentium/60 Ulti-mate ISA/PCI

Ipex Pentium/66 Centra 1000 EISA/PCI

Ipex Pentium/66 Centra 1000 ISA/PCI

Ipex Pentium/66 Centra 2000 EISA/PCI

Ipex Pentium/66 Centra 2000 ISA/PCI

Ipex Pentium/66 Centra 5000 EISA/PCI

Ipex Pentium/66 Centra 5000 ISA/PCI

Ipex Pentium/66 Desk Top EISA/PCI

Ipex Pentium/66 Desk Top ISA/PCI

Ipex Pentium/66 Mini Tower EISA/PCI

Ipex Pentium/66 Mini Tower ISA/PCI

Ipex Pentium/66 Slimline EISA/PCI

Ipex Pentium/66 Slimline ISA/PCI

Ipex Pentium/66 Ulti-mate EISA/PCI

Ipex Pentium/66 Ulti-mate ISA/PCI

Ipex Pentium/75 Green Centra 1000 ISA/PCI

Ipex Pentium/75 Green Centra 2000 ISA/PCI

Ipex Pentium/75 Green Centra 5000 ISA/PCI

Ipex Pentium/75 Green Desk Top PCI/ISA

Ipex Pentium/75 Green Ultimate ISA/PCI

Ipex Pentium/75-NOTEBOOK5200

Ipex Pentium/75-NOTEBOOK86

Ipex Pentium/90 Centra 1000 EISA/PCI

Ipex Pentium/90 Centra 2000 EISA/PCI

Ipex Pentium/90 Centra 5000 EISA/PCI

Ipex Pentium/90 Desk Top EISA/PCI

Ipex Pentium/90 Green Centra 1000 ISA/PCI

Ipex Pentium/90 Green Centra 2000 ISA/PCI

Ipex Pentium/90 Green Centra 5000 ISA/PCI

Ipex Pentium/90 Green Desk Top PCI/ISA

Ipex Pentium/90 Green Ultimate ISA/PCI

Ipex Pentium/90 Mini Tower EISA/PCI

Ipex Pentium/90 Ultimate EISA/PCI

ITG NT 486DX-50

ITG NT Pentium/60

J&L ChatExpress-P100Z

J&L ChatExpress-P120Z

J&L ChatExpress-P133Z

JAI PC 845-66-32VL

JAI PC 852/PENTIUM-66/64 BR

JM Computer PERCOMP M507NT

JTT ADAX Delta Pentium 75

JTT ADAX Omega Pentium 75

JV R-STYLE MARSHALL LT 4/66-AS

JV R-STYLE MARSHALL LT 5/60-AM

JV R-STYLE MARSHALL-PCI/ISA-PENTIUM/90

JV R-STYLE Proxima FC 4/100-EU

JV R-STYLE Proxima FC 4/66-EU

JV R-STYLE Proxima FC 5/100-AS

JV R-STYLE Proxima FC 5/60-IN

JV R-STYLE Proxima FC 5/75-AS

JV R-STYLE Proxima FC 5/90-AS

JV R-STYLE Proxima GS™ 4/100-EU

JV R-STYLE Proxima GS 4/66-EU

JV R-STYLE Proxima GS 5/100-AS

JV R-STYLE Proxima GS 5/60-IN

JV R-STYLE Proxima GS 5/75-AS

JV R-STYLE Proxima GS 5/90-AS

JV R-STYLE Proxima MC 4/100-EU

JV R-STYLE Proxima MC 4/66-EU

JV R-STYLE Proxima MC 5/100-AS

JV R-STYLE Proxima MC 5/60-IN

JV R-STYLE Proxima MC 5/75-AS

JV R-STYLE Proxima MC 5/90-AS

JV R-STYLE Proxima NS 4/100-AP

JV R-STYLE Proxima NS 4/66-AP

Kraftway GEG Express 56De

Kraftway GEG Express 56Dp

Kraftway GEG Express 59De

Kraftway GEG Express 59Dp

Kraftway GEG Presige 56Di-ALI

Kraftway GEG Prestige® 41Dp

Kraftway GEG Prestige 41Dv

Kraftway GEG Prestige 45D2v

Kraftway GEG Prestige 45Dv

Kraftway GEG Prestige 46Dv

Kraftway GEG Prestige 56Di

Kraftway GEG Prestige 56Ds

Kraftway GEG Prestige 56Ds P60

Kraftway GEG Prestige 56Ds P90

Kraftway GEG Prestige 59Di

LANIX BRAIN 486DX2-66

LANIX BRAIN 486DX2-80

LANIX BRAIN PENTIUM 60

LANIX MART 486DX2-50

LANIX MART 486DX2-66

LANIX MART 486SX-25

LANIX MART 486SX-33

LASER 410M

LASER 433M

LASER 450M

LASER 486CS100

LASER 486CS66

LASER 486CS66E (AMD)

LASER 486CS80E (AMD)

LASER 486CX100

LASER 486CX66

LASER 486CX66E (AMD)

LASER 486CX80E (AMD)

LASER 486DM-100 (incl. DP and DE Models)

LASER 486DM-33 (incl DP and DE Models)

LASER 486DM-33E (incl. DP and DE Models)

LASER 486DM-40E (incl. DP and DE Models)

LASER 486DM-50 (incl DP and DE Models)

LASER 486DM-50E (incl. DP and DE Models)

LASER 486DM-66 (incl. DP and DE Models)

LASER 486DM-S50 (incl. DP and DE Models)

LASER 486DM100

LASER 486DM100E (AMD)

LASER 486DM66

LASER 486DM66E (AMD)

LASER 486DM66E (Cyrix V)

LASER 486DM66E (Cyrix)

LASER 486DM75

LASER 486DM80E (AMD)

LASER 486DM80E (Cyrix V)

LASER 486DP100

LASER 486DP100E (AMD)

LASER 486DP66

LASER 486DP66E (AMD)

LASER 486DP66E (Cyrix V)

LASER 486DP66E (Cyrix)

LASER 486DP75

LASER 486DP80E (AMD)

LASER 486DP80E (Cyrix V)

LASER 486DX-33 ELP

LASER 486DX-33 Mini

LASER 486DX-33 Mini 72P

LASER 486DX-33 Tower

LASER 486DX-33E Mini

LASER 486DX2-50 ELP

LASER 486DX2-50 Mini

LASER 486DX2-50 Mini 72P

LASER 486DX2-50 Tower

LASER 486DX2-50E ELP

LASER 486DX2-50E Mini

LASER 486DX2-66 ELP

LASER 486DX2-66 Mini

LASER 486DX2-66 Mini 72P

LASER 486DX2-66 Tower

LASER 486DX4-100 Mini

LASER 486SX-25 ELP

LASER 486SX-25 Mini

LASER 486SX-33 ELP

LASER 486SX-33 Mini

LASER 486SX-33 Tower

LASER 486VM100

LASER 486VM100E (AMD)

LASER 486VM66

LASER 486VM66E (AMD)

LASER 486VM66E (Cyrix V)

LASER 486VM66E (Cyrix)

LASER 486VM75

LASER 486VM80E (AMD)

LASER 486VM80E (Cyrix V)

LASER 486VP100

LASER 486VP100E (AMD)

LASER 486VP66

LASER 486VP66E (AMD)

LASER 486VP66E (Cyrix V)

LASER 486VP66E (Cyrix)

LASER 486VP75

LASER 486VP80E (AMD)

LASER 486VP80E (Cyrix V)

LASER 590M

LASER 590P

LASER 86SX-33 Mini 72P

LASER DM-S33 (incl. DP and DE Models)

LASER LT453C Notebook

LASER LT473C Notebook

LASER LT845 Sub-Notebook

LASER Pentium 566M

LASER Platinum DM90

LASER Platinum DP90

LASER Platinum NS100

LASER Platinum NS75

LASER Platinum NS90

LASER Platinum NX100

LASER Platinum NX75

LASER Platinum NX90

LASER Platinum RS100

LASER Platinum RS75

LASER Platinum RS90

LASER Platinum RX100

LASER Platinum RX75

LASER Platinum RX90

LASER Plato P54C

LASER SMP50P

Leading Edge® DT4000 DX-33

Leading Edge DT4000 DX2-50

Leading Edge DT4000 DX2-66

Leading Edge DT4000 SX-33

Leading Edge Fortiva 5000, model 5900

Leading Edge Fortiva Series 3000

Leading Edge Fortiva Series 6000 Model 6900

Leading Edge Fortiva Series 6000/Pentium 75

Leading Edge Fortive series 4000

Leading Edge MT4000 Cyrix DX2-50

Leading Edge MT4000 DX-33

Leading Edge MT4000 DX2-66

Leading Edge MT4000 SX-33

Leading Edge SL4000 DX-33

Leading Edge SL4000 DX2-50

Leading Edge SL4000 DX2-66

Leading Edge SL4000 SX-33

Leading Edge Valiance DT 4000

Leading Edge WinPro 486e/DX-33

Leading Edge WinPro 486e/DX2-50

Leading Edge WinPro 486e/DX2-66

Leading Edge WinPro 486e/SX-25

Leading Edge WinPro D DLC/40

Leading Edge WinTower 486 DX-33

Leading Edge WinTower 486 DX2-50

Leading Edge WinTower 486 DX2-66

Leading Edge WinTower 486 SX-25

Leading Edge WinTower Cyrix DX2-50

Legacy 486DLC-33 SYSTEM

Liuski G-MD266D-34-8

Liuski G-MP60F-34-8

LMC, Inc. DX2/66 Roadrunner

LMC, Inc. P90 Triton

LMC, Inc. Pentium 90 Batman

LMC, Inc. Roadrunner 486/100

Mantech Solutions INSYNC P2000 Pentium 133

Mantech Solutions INSYNC PT200 Pentium 100

Mantech Solutions INSYNC PVT-IO 486DX4/100

Master Cascade P90

Master PENTIUM/60  PCI

Maximus 486-50MHz Maxi-CAD

Maximus P5-90 PCI/ISA

MaxVision Symbion 5

MaxVision Symbion 5100 Series P133

MaxVision Symbion 6 Single Processor

MEDICAT-SYSTEM DATACOM 486 DX266 Vesa Tower Green

Memory and More PDS ELITRA PENT-90 VIP

Memory and More PDS NETSTATION PENT-90 PCI

Memory and More PDS SLIMLINE 486-66

Metro Computers Pentium 60

Micro Express ME 486DX2/66

Micro Express Notebook Computer 486DX2/66

Microbits 4980 486DX4-100 Desktop

Microbits 4980 DX2-66 Desktop

Microbits 4980 DX2-66 Mini Tower

Microbits 4980 DX2-66 Tower

Microbits 4980 DX4-100 Mini Tower

Microbits 4980 DX4-100 Tower

Microbits 8810 486DX2-66 Mini Tower

Microbits 8810 486DX2-66 Tower

Microbits EISA/PCI Pentium

Microbits FR5v Pentium 66MHz Desktop

Microbits FR5v Pentium 66MHz Mini Tower

Microbits FR5v Pentium 66MHz Tower

Microbits GA586ID Pentium 90MHz Desktop

Microbits GA586ID Pentium 90MHz Mini Tower

Microbits GA586ID Pentium 90MHz Top 101 Tower

Microbits GA586ID Pentium 90MHz Top 1022 Tower

Microbits GA586IP Pentium 90MHz Desktop

Microbits GA586IP Pentium 90MHz Mini Tower

Microbits GA586IP Pentium 90MHz Tower

Microbits Me5PI-s

Microbits NETWIN2 Pentium 90 Desktop

Microbits NETWIN2 Pentium 90MHz Mini Tower

Microbits NETWIN2 Pentium 90MHz Top 101 Tower

Microbits NETWIN2 Pentium 90MHz Top 1022 Tower

Microbits SI54P Pentium 90MHz Desktop

Microbits SI54P Pentium 90MHz Mini Tower

Microbits SI54P Pentium 90MHz Tower

Microbits SI5PI Pentium 66MHz Desktop

Microbits SI5PI Pentium 66MHz Mini Tower

Microbits SI5PI Pentium 66MHz Tower

Microbits UM8810 486DX2-66 Desktop

Microbits VESA/ISA PT586V Pentium

Microlink OFFICE CLASSIC DX2-66 VL

Microlink OFFICE CLASSIC DX2-80 PCI

Microlink OFFICE CLASSIC DX2-80 VL

Microlink OFFICE CLASSIC DX4-100 PCI

Microlink OFFICE CLASSIC DX4-100 VL

Microlink OFFICE PENTIUM 60 PCI

Microlink OFFICE PENTIUM 75 PCI

Microlink OFFICE PENTIUM 90 PCI

Microlink Office Plus 486DX2/66

Microlink OFFICE PLUS P5-75 PCI

Microlink OFFICE PLUS P5-90 PCI

Micron 4100 VL Magnum

Micron 486PCI WINSTATION CD

Micron Magnum DX280 PCI

Micron Millennia Transport P120

Micron P100PCI PowerStation Si

Micron P5PCI Platinum CD

Micron P5PCI PowerStation CD

Micron P66PCI PowerServer

Micron P75 PowerStation

Micron P90PCI PowerStation

Micron P90PCI PowerStation Si

Micron PowerServer P90

Micron PowerServer SMP P133

Microniche MIS Computer Systems M466EV

Microniche MIS Computer Systems M466VL

Microniche MIS Computer Systems M560P

Microniche MIS Computer Systems M560PE

Microniche MIS Computer Systems M590P

Microniche MIS Computer Systems M590PE

Microtec MYTHUS 486DX2/50

Microtec MYTHUS 486DX2/66

Microtec MYTHUS D4100

Microtech MTECH 486SP3-D100

Microtech MTECH 486SP3-D66

Microtech MTECH SI54P-P75

Microtech MTECH SI54P-P90

Microtech MTECH VI16G-P90

Midgards Micro Pentium 90 VLB/PCI

Midwest Micro Elite Cx486DX2-50

MIKROLOG OY OSBORNE MULTIMEDIA P100

MIKROLOG OY OSBORNE OFFICE P75

MIKROLOG OY OSBORNE POWER P133

MIKROLOG OY OSBORNE PRO P100

MIND 200x-460

MIND 200x-464

MIND 303x-460

MIND 303x-463

MIND 303x-464

MIND 303x-596

MIND 304x-460

MIND 306Ax-463

MIND 306Ax-464

MIND 306x-460

MIND 306x-461 SERVER

MIND 306x-463

MIND 306x-463 SERVER

MIND 306x-464

MIND 306x-464 SERVER

MIND 306x-465

MIND 400x-460

MIND 486DX/33 EISA

MIND 486DX/33 VLB

MIND 486DX/40 EISA

MIND 486DX/40 VLB

MIND 486DX2/50 VLB

MIND 486DX2/66 EISA

MIND 486DX2/66 VLB

MIND 486DX2/66 VLB ALI

MIND 486DX4/100

MIND 507x-596

MIND 510x-596

MIND Pentium 60 PCI/EISA

MIND Pentium 60 VLB

MIND Pentium 66 PCI/EISA

MIND ULTIMATE 602-133

MIND ULTIMATE 602-90

MIND ULTIMATE C166 HX-ATX

MIND ULTIMATE C166 VX

MIND ULTIMATE P100

MIND ULTIMATE P100 HX

MIND ULTIMATE P120

MIND ULTIMATE P133

MIND ULTIMATE P133 HX

MIND ULTIMATE P166

MIND ULTIMATE P166 HX

MIND ULTIMATE P166 HX-A

MIND ULTIMATE P75

MIND ULTIMATE P75 HX

MIND ULTIMATE P90

MIND VALUE 507

MIND VALUE 509

MIND VALUE 510

MIND VALUE 520

MIND VALUE 533

MIND VALUE 602-133

MIND VALUE 602-90

Minitronics MINTEC 486DX-33 VL/16

Minitronics MINTEC 486DX2-66 VL/16

Minitronics MINTEC 486DX2-66 VLB

Minitronics MINTEC Pentium 90 PCI

MiTAC 4021GC/T

MiTAC 4022GC

MiTAC 5080i

MiTAC 75 Series Pentium 150

MiTAC 75 Series Pentium 166

MiTAC 85 Series Pentium 150

MiTAC 85 Series Pentium 166

MiTAC DM4077C

MiTAC DM4500A

MiTAC DM5500C

MiTAC DV4033D

MiTAC DV4033H

MiTAC DV4050D

MiTAC DV4050H

MiTAC DV4077C

MiTAC DV4077D

MiTAC DV4080D

MiTAC DV4080H

MiTAC DV4450D

MiTAC DV4466D

MiTAC DV4466H

MiTAC DV4500A

MiTAC DV4533A

MiTAC DV4550A

MiTAC DV4566A

MiTAC DV4580A

MiTAC DV4599A

MiTAC DV5500C

MiTAC DV5560C

MiTAC DV5566C

MiTAC MD70  Series Pentium 166

MiTAC MD70 Series Pentium 150

MiTAC MSC-252 Pentium 90

MiTAC MSC242 486DX4/100

MiTAC MSC246 486DX4/100

MiTAC MT80 Pentium 150

MiTAC MT80 Pentium 166

MiTAC MT90 Pentium 150

MiTAC MT90 Pentium 166

MiTAC TF5500C

MiTAC TF5560C

MiTAC TF5566C

MiTAC TM4033D

MiTAC TM4033H

MiTAC TM4050D

MiTAC TM4050H

MiTAC TM4080D

MiTAC TM4080H

MiTAC TM4450D

MiTAC TM4466D

MiTAC TM4466H

MiTAC TM4500A

MiTAC TM4533A

MiTAC TM4550A

MiTAC TM4566A

MiTAC TM4580A

MiTAC TM4599A

MiTAC TM5500C

MiTAC TM5560C

MiTAC TM5566C

Mitsuba M-South Series 560 Model AP5MP3-5A

Mitsuba M-South Series 566 Model 5A

Mitsuba M-South Series 590

Mitsuba M-South Series 590 Model 5A

Mitsuba M-South Series 590 Model 5B

Mitsuba PREMIER SQ595-100

Mitsuba PREMIER SQ595-120

Mitsuba PREMIER SQ595-166

Mitsuba PREMIER SQ595-200

Modular MS/16+

Modular MSM Pentium 90/b

Modular MST/32 66 Mhz

Modular Server Module 450

Modular Server Module 466

Modular Server Module Pentium

Monydata Modula 200 / 80

Monydata Modula 300 / 90

Monydata Station 486 / 80

Monydata Station 486 / 90

MPC Technology CD Book 800 486DX4/100

MultiSource Value Pentium 133

Multitech OCS 486DX2-66 ISA/VLB

Multitech OCS PENTIUM 60 PCI/ISA

Multitech ProSpec 486DX2-66 ISA/VLB

Multitech ProSpec PENTIUM 60 PCI/ISA

Multitech ProSpec PENTIUM 90 EISA /PCI

Multitech ProSpec PENTIUM 90 ISA/PCI

Mustek MECER 5486-PI

Mustek MECER 5P54C

Mustek MECER3486-VL

Mustek MECER486DL

Mustek MECER7486-PCI

Mustek MECER7486-PI

Mustek MECER7486-VIP

Mustek MECER7486-VL

Mustek MECER7586

Mustek MECER7586-PCI

Mustek MECER7P54C

Mustek MECER7P54C-PCI

Mustek MECER7P54C/I

Mustek MECER8586/PCI

Mustek MECER940

MYNIX MYCOMP Pentium Vantage 166

NCR System 3000 Model 3314

NCR System 3000 Model 3360 Pentium 60

NCR System 3000 Model 3410

NCR System 3000 Model 3430 Pentium 60

NCR System 3000 Model 3431 Pentium 90

NCR System 3000 Model 3445

NCR System 3000 Model 3525 Pentium 66

NCR System 3000 Model 3525 Pentium 90

NCR System 3000 Model 3550 486DX/50

NCR System 3000 Model 3555 Pentium 66

NCR System 3000 Model 3555 Pentium 90

NEC Express 4100ST

NEC Express/II P60ST

NEC Image 4100es

NEC Image 466

NEC Image P100E (1p)

NEC Image P90

NEC Image P90D

NEC PowerMate 466D

NEC PowerMate 466es

NEC PowerMate 486/33e

NEC PowerMate P120

NEC PowerMate P133

NEC PowerMate P166

NEC PowerMate V100

NEC PowerMate V100e

NEC PowerMate V133

NEC PowerMate V4100

NEC PowerMate V466

NEC PowerMate V75

NEC PowerMate V75e

NEC PowerMate V90

NEC PowerMate VP75

NEC ProServa PH133-NR

NEC ProServa V133

NEC Ready 466D

NEC Ready 466es

NEC Ready 5010

NEC Ready 7510

NEC Ready 7520

NEC Ready 7525

NEC Ready 9010

NEC Ready 9510

NEC Ready 9515

NEC Ready 9520

NEC Ready 9530

NEC Ready 9542

NEC Versa 2000C/75

NEC Versa 2000D/75

NEC Versa 4000D/90

NEC Versa 4050C/90

NEC Versa 4050H/90

NEC Versa 4080H/120

NEC Versa 6000/100

NEC Versa 6000/133

NEC Versa E

NEC Versa M/100HC

NEC Versa S/50C

NEC Versa V/75C

NET NETstation 486DX4-100PCI

NETiS 486DX/33 PCI

NETiS 486DX/33 VL

NETiS 486DX/40 PCI

NETiS 486DX/50 VL

NETiS 486DX2/50

NETiS 486DX2/50 PCI

NETiS 486DX2/50 VL

NETiS 486DX2/66 PCI

NETiS 486DX2/66 VL

NETiS 486DX4/100 VL

NETiS 486SX/33 VL

NETiS AMD 486DX 40 VL

NETiS AMD 486DX2/50

NETiS AMD 486DX2/50 PCI

NETiS N4100P

NETiS N4100V

NETiS N466P

NETiS N466V

NETiS N480P

NETiS N480V

NETiS N5100

NETiS N5120

NETiS N5120-PDS

NETiS N575

NETiS Pentium 60 PCI

NETiS Pentium 66 PCI

NETiS Pentium 90

NETiS Pentium 90 PCI

Network Connection Triumph M2

Network Connection Triumph M2V

Network Connection Triumph T3000

Network Connection Triumph T4000

Network Connection Triumph TNX

Network Data AB JUNIPER 6X86 P120+/100

Network Data AB JUNIPER 6X86 P150+/120

Network Data AB JUNIPER 6X86 P166+/133

Network Data AB Magenta - Pentium 100

Network Data AB Magenta - Pentium 120

Network Data AB Magenta - Pentium 133

Network Data AB Magenta - Pentium 150

Network Data AB Magenta - Pentium 166

Network Data AB Sienna - Pentium 100

Network Data AB Sienna - Pentium 120

Network Data AB Sienna - Pentium 133

Network Data AB Sienna - Pentium 166

Network Data AB Sienna - Pentium 75

New Technologies WINMAX PLUS 486DX2-66

New World Technologies NWT-P133-PCI

Nienschaunz Favourite Entry Server 466P

Nienschaunz Favourite Giant 590P

Nienschaunz Favourite Giant 592EP

Nienschaunz Favourite Graphics Station 566P

Nienschaunz Favourite Server 590P

Nienschaunz Favourite Server M566PE

Nienschaunz Professional 4100VP

NONOLET CHAMPION II 486DX2/66

NONOLET SA486PCI-SX2/50-IDE

Northern Micro P5ED Pentium 90

Northern Micro P5I Pentium 90

Northgate Elegance 333

Northgate Elegance 433i

Northgate Pentium Series II Pentium 90

Northgate Phoenix Series P Pentium 133

Northgate Series IIa Pentium 133

Northgate Zxportable III

Northwest Micro OfficePRO-G 486DX/33

Northwest Micro OfficePRO-G 486DX2/66

Northwest Micro OfficePRO-GP 486DX/33

Northwest Micro OfficePRO-GP 486DX2/66

OA Comp Inc. Winstorm Server P100

OKI if 486VX550D

OKI if Server 466/SL

OKI if Server 566/SL

OKI if Station 425/DL

OKI if Station 433/DE

OKI if Station 466/DE

OKI if Station 560/DE

Olidata MDS P-100/B

Olidata MDS P-120/C

Olidata MDS P-75/B

Olidata MDS P-90/B

Olidata MDS-P60/A

Olidata MDS-P90/A

Olivetti LSX5010

Olivetti LSX5015

Olivetti LSX5025 E

Olivetti M4-40

Olivetti M4-422

Olivetti M4-452

Olivetti M4-464

Olivetti M4-484

Olivetti M4-60

Olivetti M4-82

Olivetti M400-40

Olivetti M400-60

Olivetti M6-440

Olivetti M6-540

Olivetti M6-620

Olivetti M6-640

Olivetti M6-650

Olivetti M6-670

Olivetti M6-770

Olivetti M6-860

Olivetti M6-880

Olivetti Modulo M4-100

Olivetti Modulo M4-120L

Olivetti Modulo M4-133

Olivetti Modulo M4-P100

Olivetti Modulo M4-P100S

Olivetti Modulo M4-P133S

Olivetti Modulo M4-P75

Olivetti Modulo M4-P75i

Olivetti Modulo M4-P75S

Olivetti Modulo M4-P90i

Olivetti Modulo P-100-L

Olivetti SNX 140 Systema

Olivetti SNX 140/R Systema

Olivetti SNX 140/S Systema Pentium 100

Olivetti SNX 160 Systema

Olivetti SNX 160/R Systema

Olivetti SNX140/S Systema Pentium 166

Olivetti Suprema M6-680

Olympia Olystar 400D-66 EISA

Omni Tech 5000

Omni Tech 5100

Omni Tech 5200 Pentium 75

Omni Tech 5300 Pentium 90

Omni Tech 8600 486DX2-66

Omni Tech 8900 486DX4-100

Omni Tech OTC-5400 Pentium 100

Omni Tech OTC-5500 Pentium 120

Omni Tech OTC-5600 Pentium 133

Omni Tech OTC-5700 Pentium 150

Omni Tech OTC-5800 Pentium 166

Optima OCT 486DX/33 VL Green Desktop

Optima OCT 486DX/4 100 PCI Local Bus

Optima OCT 486DX/4 100 Vesa  Local Bus

Optima OCT 486DX2-66 Notebook TFT

Optima OCT 486DX2-66 VL/PCI/ISA Desktop Green

Optima OCT 486DX2/50 VL Desktop Green

Optima OCT 486DX2/50 VL Mini Tower Green

Optima OCT 486DX2/50 VL Slimeline WorkStation Green

Optima OCT 486DX2/50 VL Tower Green

Optima OCT 486DX2/66 PCI Desktop

Optima OCT 486DX2/66 PCI Mini Tower

Optima OCT 486DX2/66 PCI Slimline WorkStation

Optima OCT 486DX2/66 PCI Tower

Optima OCT 486DX2/66 VL

Optima OCT 486DX2/66 VL Green Desktop

Optima OCT 486DX2/66 VL Mini Tower Green

Optima OCT 486DX2/66 VL Slimline WorkStation Green

Optima OCT 486DX2/66 VL Tower Green

Optima OCT 486DX33 PCI Desktop

Optima OCT 486DX33 PCI Mini Tower

Optima OCT 486DX33 PCI Slimline WorkStation

Optima OCT 486DX33 PCI Tower

Optima OCT 486DX33 VL Mini Tower Green

Optima OCT 486DX33 VL Slimline WorkStation Green

Optima OCT 486DX33 VL Tower Green

Optima OCT 486DX4/100 VL Desktop

Optima OCT 486SX2-50 Notebook Mono

Optima OCT 486SX2-50 VL/PCI/ISA Desktop green

Optima OCT 486SX33 PCI Bus Desktop

Optima OCT 486SX33 PCI Mini Tower

Optima OCT 486SX33 PCI Slimline WorkStation

Optima OCT 486SX33 PCI Tower

Optima OCT 486SX33 VL

Optima OCT DX2/66 VL/PCI/ISA Mini Tower Green

Optima OCT DX2/66 VL/PCI/ISA Slimline Workstation Green

Optima OCT DX2/66 VL/PCI/ISA Tower Green

Optima OCT DX4-100 Notebook DSTN

Optima OCT DX4/100 VL Mini Tower Green

Optima OCT DX4/100 VL Slimline Workstation Green

Optima OCT DX4/100 VL Tower Green

Optima OCT DX4/100 VL/PCI/ISA Mini Tower Green

Optima OCT DX4/100 VL/PCI/ISA Slimline Workstation Green

Optima OCT DX4/100 VL/PCI/ISA Tower Green

Optima OCT DX4100 VL Desktop Green

Optima OCT DX4100 VL/PCI/ISA Bus Desktop Green

Optima OCT Pentium 60 EISA/PCI Desktop

Optima OCT Pentium 60 PCI Desktop

Optima OCT Pentium 60 PCI Tower

Optima OCT Pentium 60 PCI/EISA Tower

Optima OCT Pentium 66 EISA/PCI Desktop

Optima OCT Pentium 66 PCI Desktop

Optima OCT Pentium 66 PCI MXpress

Optima OCT Pentium 66 PCI Tower

Optima OCT Pentium 66 PCI/EISA Tower

Optima OCT Pentium 90 EISA/PCI Bus Desktop

Optima OCT PENTIUM 90 PCI Tower

Optima OCT Pentium 90 PCI/EISA Tower

Optima OCT SX2/50 VL/PCI/ISA Mini Tower Green

Optima OCT SX2/50 VL/PCI/ISA Slimline Workstation Green

Optima OCT SX2/50 VL/PCI/ISA Tower Green

Optima Pentium 90 PCI Desktop

Optima Sprinter 486DX2/50 VL Desktop Green

Optima Sprinter 486DX2/50 VL Mini Tower Green

Optima Sprinter 486DX2/50 VL Slimline WorkStation Green

Optima Sprinter 486DX2/50 VL Tower Green

Optima Sprinter 486DX2/66 PCI Desktop

Optima Sprinter 486DX2/66 PCI Mini Tower

Optima Sprinter 486DX2/66 PCI Slimline WorkStation

Optima Sprinter 486DX2/66 PCI Tower

Optima Sprinter 486DX2/66 VL

Optima Sprinter 486DX2/66 VL Desktop Green

Optima Sprinter 486DX2/66 VL Mini Tower Green

Optima Sprinter 486DX2/66 VL Slimline WorkStation  Green

Optima Sprinter 486DX2/66 VL Tower Green

Optima Sprinter 486DX33 PCI Desktop

Optima Sprinter 486DX33 PCI Mini Tower

Optima Sprinter 486DX33 PCI Slimline WorkStation

Optima Sprinter 486DX33 PCI Tower

Optima Sprinter 486DX33 VL Desktop Green

Optima Sprinter 486DX33 VL Mini Tower Green

Optima Sprinter 486DX33 VL Slimline WorkStation Green

Optima Sprinter 486DX33 VL Tower Green

Optima Sprinter 486SX33 PCI Desktop

Optima Sprinter 486SX33 PCI Mini Tower

Optima Sprinter 486SX33 PCI Slimline WorkStation

Optima Sprinter 486SX33 PCI Tower

Optima Sprinter 486SX33 Vesa Local Bus

Optima Sprinter DX2/66 VL/PCI/ISA Desktop Green

Optima Sprinter DX2/66 VL/PCI/ISA Mini Tower Green

Optima Sprinter DX2/66 VL/PCI/ISA Slimline Workstation Green

Optima Sprinter DX2/66 VL/PCI/ISA Tower Green

Optima Sprinter DX4/100 VL Desktop Green

Optima Sprinter DX4/100 VL Mini Tower Green

Optima Sprinter DX4/100 VL Slimline WorkStation Green

Optima Sprinter DX4/100 VL Tower Green

Optima Sprinter P560 PCI

Optima Sprinter P566 PCI ISA

Optima Sprinter Pentium 60 PCI Desktop

Optima Sprinter Pentium 60 PCI Tower

Optima Sprinter Pentium 60 PCI/EISA Desktop

Optima Sprinter Pentium 60 PCI/EISA Tower

Optima Sprinter Pentium 66 PCI Desktop

Optima Sprinter Pentium 66 PCI MXpress

Optima Sprinter Pentium 66 PCI Tower

Optima Sprinter Pentium 66 PCI/EISA Desktop

Optima Sprinter Pentium 66 PCI/EISA Tower

Optima Sprinter Pentium 90 PCI/EISA Desktop

Optima Sprinter Pentium 90 PCI/EISA Tower

Optima Sprinter SX2/50 VL/PCI/ISA Desktop Green

Optima Sprinter SX2/50 VL/PCI/ISA Mini Tower Green

Optima Sprinter SX2/50 VL/PCI/ISA Slimline Workstation Green

Optima Sprinter SX2/50 VL/PCI/ISA Tower Green

Optima Xpress/ MX PENTIUM 60 EISA

Optima Xpress/ MX PENTIUM 66 EISA

Optimus SA XPRESS MX 5EP90s

Osborne DX4-100

Osborne Gold 100

Osborne Gold 54C

Osborne LP4D-33

Osborne LP4D-50

Osborne LP4D-50A

Osborne LP4D-66

Osborne LP4D-66A

Osborne LP4S-33

Osborne LP4S-50

Osborne MT4D-66E

Osborne MT5D-60P

Osborne MT5D-66P

Osborne Pentium 90

Osborne Wedgetail 1

OsZ Gold 486DX2-66

OsZ Platinum (Pentium 90)

Packard Bell 430ES-DX334

Packard Bell 430ES-SX254

Packard Bell 486MT250 AUS

Packard Bell 486SX170 AUS (incl. 486SXMM AUS)

Packard Bell A400

Packard Bell A430

Packard Bell A440

Packard Bell ALG115

Packard Bell ALG1166

Packard Bell ALG207 (incl ALG233)

Packard Bell ALG2276MT

Packard Bell ALG747MT

Packard Bell ALLURA25

Packard Bell AX 120CD

Packard Bell AX 121CD

Packard Bell AX 122CDT

Packard Bell AX 43CD

Packard Bell AX 45CDT

Packard Bell AX 46CD

Packard Bell AX 47CD

Packard Bell AX 48CD

Packard Bell AX 49CDT

Packard Bell AX 51CDT

Packard Bell AX1033

Packard Bell AX105 (incl. AX106)

Packard Bell AX1066

Packard Bell AX2005+MM (incl. AX2005MM, AX2005MMH Models)

Packard Bell AX2007MM

Packard Bell AX2008MM MT

Packard Bell AX2033MT

Packard Bell AX2047MM

Packard Bell AX205 (incl. AX230)

Packard Bell AX2066 (incl. AX2066+MT,  AX2066MT Models)

Packard Bell AX2077+MT (inc. AX2077MT, AX2078+ Models)

Packard Bell AX410E

Packard Bell AX410H

Packard Bell AX410WG

Packard Bell AX4500 (incl. AX4700MM)

Packard Bell AX450G

Packard Bell AX533H

Packard Bell AX533H (incl. AX533J)

Packard Bell AX533J

Packard Bell AX630+MT(incl. AX630MT, AX635+MT, AX535MT Models)

Packard Bell Axcel 105

Packard Bell Axcel 1066

Packard Bell Axcel 130

Packard Bell Axcel 2005

Packard Bell Axcel 2033 Minitower

Packard Bell Axcel 205

Packard Bell Axcel 205 (incl Axcel 230)

Packard Bell Axcel 2066 Minitower

Packard Bell Axcel 230

Packard Bell Axcel 630 Minitower

Packard Bell BC425

Packard Bell BLG2133MT

Packard Bell BLG2276MT

Packard Bell BLG233

Packard Bell CAX1033

Packard Bell CAX105 (incl CAX106)

Packard Bell CAX1066 (incl. CAX2066, CAX2066+ Models)

Packard Bell CAX2005+HMM (incl. CAX2005MM)

Packard Bell CAX205 (incl. CAX230, CAX630 Models)

Packard Bell CAX4500 (incl. CAX4700MM)

Packard Bell CF110

Packard Bell CF1137

Packard Bell CF1177 (incl. CF1178)

Packard Bell CF200 (incl. CF204)

Packard Bell CF2020+

Packard Bell CF2068 (incl CF2386, CF2386+, CD2387 Models)

Packard Bell CF4800 (incl. CF4900MM)

Packard Bell CF715

Packard Bell CLG1133 (incl. CLG1134 ELITE)

Packard Bell CLG115 (incl. CLG115+)

Packard Bell CLG1166 (incl. CLG1166+, CLG1176 Models)

Packard Bell CLG1910SMM (incl CLG2000MM)

Packard Bell CLG2016MM (incl. CLG2035MM)

Packard Bell CLG2075 MM

Packard Bell CLG2133

Packard Bell CLG2176 ELITE (incl. CLG2276, CLG2276+ Models)

Packard Bell CLG233 (incl. CLG233+, CLG234 ELITE,CLG236 Models)

Packard Bell CLG33D SUPR (incl. CLG33T SUPR)

Packard Bell CLG5000 (incl. CLG5200MM)

Packard Bell CLG695 SUPR (incl. CLG725 SUP)

Packard Bell CLG747F

Packard Bell CLG780 SUPR (incl. CLG790 SUP)

Packard Bell CLG896 SUP

Packard Bell CPB1020MM

Packard Bell CPB1030MM

Packard Bell CPB1060MT

Packard Bell CPM1950 (incl. CPM1950+MM, CPM2050MM Models)

Packard Bell CPM1984MM

Packard Bell CPM633

Packard Bell CPM67

Packard Bell CPM733

Packard Bell CPM766

Packard Bell D1725+MM (incl. D1725MM)

Packard Bell DMM 70

Packard Bell DPM 6800CD

Packard Bell Executive 466

Packard Bell Executive LX 1001

Packard Bell Executive LX 1001CD

Packard Bell Executive LX 1001CDT

Packard Bell Executive LX 1001T

Packard Bell Executive LX 1002CD

Packard Bell Executive LX 1002CDT

Packard Bell Executive LX 1331

Packard Bell Executive LX 1331CD

Packard Bell Executive LX 1331CDT

Packard Bell Executive LX 1331T

Packard Bell Executive LX 1332CD

Packard Bell Executive LX 1332CDT

Packard Bell Executive LX 1501

Packard Bell Executive LX 1501CD

Packard Bell Executive LX 1501CDT

Packard Bell Executive LX 1501T

Packard Bell Executive LX 1502CD

Packard Bell Executive LX 1502CDT

Packard Bell Executive LX 1661

Packard Bell Executive LX 1661CD

Packard Bell Executive LX 1661CDT

Packard Bell Executive LX 1661T

Packard Bell Executive LX 1662CD

Packard Bell Executive LX 1662CDT

Packard Bell Executive LX 752

Packard Bell Executive LX 753

Packard Bell Executive LX 756CD

Packard Bell F 101CD

Packard Bell F 102CD

Packard Bell F 103CD

Packard Bell F 111CDT

Packard Bell F 15

Packard Bell F 53CD

Packard Bell F 54CD

Packard Bell F 55CDT

Packard Bell F 55CDT Plus

Packard Bell F 56CD

Packard Bell F 57CD

Packard Bell F 57CDT

Packard Bell F 58CD

Packard Bell F 59CDT

Packard Bell F1066 (incl. F1177, F1177+ Models)

Packard Bell F107 (incl. F107 Plus)

Packard Bell F1135 (incl. F1137)

Packard Bell F1150

Packard Bell F200 (incl. F204, F205, F250 Models)

Packard Bell F2030MM

Packard Bell F2040MM (incl. F2048MM, F2049MM Models)

Packard Bell F2067MM (incl. F2068MM)

Packard Bell F2133MT (incl. F2233MT)

Packard Bell F2280MT (incl. F2386+, , F2386MT Models)

Packard Bell F2376 (incl. F2376F) F2386+, F2280MT, F2386MT Mod)

Packard Bell F4800 (incl. F4900MM)

Packard Bell F486DX/DH

Packard Bell F486DX/DH (incl. F486DX/DJ, F486DX/DJ-W Models)

Packard Bell F486DX/DJ

Packard Bell F486DX/DJ-W

Packard Bell F486SX-WG

Packard Bell F486SX/BE

Packard Bell F486SX/BH2

Packard Bell F715MT

Packard Bell FIDX2-504 TWR (incl. FIDX2-504 4X4)

Packard Bell Force 1066

Packard Bell Force 107

Packard Bell Force 1135 (incl. Force 1137)

Packard Bell Force 200

Packard Bell Force 200 (incl. Force 250)

Packard Bell Force 2040 Minitower

Packard Bell Force 2233 Minitower

Packard Bell Force 2376

Packard Bell Force 2376F

Packard Bell Force 2386 Minitower

Packard Bell Force 250

Packard Bell Force 386

Packard Bell Force 715 Minitower

Packard Bell Force 715 Mintower

Packard Bell GP321DX2-508 TWR

Packard Bell L430G

Packard Bell L430WG

Packard Bell L435E Elite

Packard Bell L435E2 Elite

Packard Bell LC321DX2-504 4X4

Packard Bell Legend 102 Elite

Packard Bell Legend 102H

Packard Bell Legend 1133 (incl. Legend 1134 Elite)

Packard Bell Legend 1135 (incl. Legend 1136)

Packard Bell Legend 115

Packard Bell Legend 1166

Packard Bell Legend 1176

Packard Bell Legend 120 (incl Legend 125)

Packard Bell Legend 127

Packard Bell Legend 128

Packard Bell Legend 135H

Packard Bell Legend 140

Packard Bell Legend 1900

Packard Bell Legend 1910

Packard Bell Legend 2000

Packard Bell Legend 207

Packard Bell Legend 207 (incl. Legend 233)

Packard Bell Legend 2133 Minitower (incl Legend 2135 Minitower)

Packard Bell Legend 2176 Elite MT

Packard Bell Legend 2266 Minitower

Packard Bell Legend 2270 Minitower

Packard Bell Legend 2276 Minitower

Packard Bell Legend 2300 Minitower

Packard Bell Legend 233

Packard Bell Legend 234 Elite

Packard Bell Legend 234 Elite (incl. Legend 245)

Packard Bell Legend 245

Packard Bell Legend 66D Supreme

Packard Bell Legend 66T Supreme

Packard Bell Legend 695 Supreme

Packard Bell Legend 747 Minitower

Packard Bell Legend 747 Minitower (incl Legend 780 Minitower)

Packard Bell Legend 780 Supreme

Packard Bell Legend 840 Minitower

Packard Bell Legend 840 Minitower (incl. Legend 845 Minitower)

Packard Bell Legend 845 Minitower

Packard Bell Legend 848 Minitower

Packard Bell LG 100CD

Packard Bell LG 104CD SUP

Packard Bell LG 105CD

Packard Bell LG 110CDT

Packard Bell LG 11CD

Packard Bell LG 12CD

Packard Bell LG 14CDT

Packard Bell LG 18CD

Packard Bell LG 200CD

Packard Bell LG 205CD

Packard Bell LG 20CD

Packard Bell LG 210CDT

Packard Bell LG 21CD

Packard Bell LG 22CD

Packard Bell LG 23CD

Packard Bell LG 24CD

Packard Bell LG 25CDT

Packard Bell LG 26CDT

Packard Bell LG 27CDT

Packard Bell LG 28CDT

Packard Bell LG 29TV

Packard Bell LG 30CD SUP

Packard Bell LG 34CD SUP

Packard Bell LG 35CD SUP

Packard Bell LG 38CD SUP

Packard Bell LG 39CD

Packard Bell LG 42CD

Packard Bell LG 5

Packard Bell LG 61CD

Packard Bell LG 62CDT

Packard Bell LG 63CDT

Packard Bell LG 64TV

Packard Bell LG 9CD

Packard Bell LG101H (incl. LG115, LG115 PLUS, LG120 Models)

Packard Bell LG1050 (incl. LG1140)

Packard Bell LG1133 (incl. LG1134 ELITE, LG1135, LG1136 Models)

Packard Bell LG1150 (incl. LG1155MT, LG1156 Models)

Packard Bell LG1166 (incl. LG1166+, LG1166A Models)

Packard Bell LG1170 (incl. LG1170MT, LG1170C, LG1176 Models)

Packard Bell LG1333

Packard Bell LG145 (incl LG207, LG230E, LG233, LG233+ Models)

Packard Bell LG1900MM (incl. LG1910SMM)

Packard Bell LG1956SUP MM

Packard Bell LG1966SUPMM

Packard Bell LG2000E+MM (incl LG2000EMM)

Packard Bell LG2000MM (incl. LG2000+MM)

Packard Bell LG2009+MM (incl. LG2009MM, LG2012MM Models)

Packard Bell LG2016MM (incl. LG2033MM, LG2035MM Models)

Packard Bell LG2037MM (incl. LG2040MM, LG2078MM MT Models)

Packard Bell LG2038E MM (incl LG2045MM, LG2059MM Models)

Packard Bell LG2050MM

Packard Bell LG2064MM (incl. LG2066MM,LG2068MM,LG2069MM Models)

Packard Bell LG2070MM (incl. LG2075MM)

Packard Bell LG2133 (incl. LG2135MT)

Packard Bell LG2150MM

Packard Bell LG2176EMT (incl. LG2177EMT)

Packard Bell LG2266MT

Packard Bell LG2270MT (incl. LG2271MT)

Packard Bell LG2276+MT (incl. LG2276MT, LG2276MTC Models)

Packard Bell LG2280MT (incl. LG2280MTC)

Packard Bell LG2300MM (incl. LG23040)

Packard Bell LG234 ELITE (incl. LG245)

Packard Bell LG25TVSUPMM

Packard Bell LG33T SUPR

Packard Bell LG430WG Elite

Packard Bell LG445E2 Elite

Packard Bell LG445G Elite

Packard Bell LG445G2 Elite

Packard Bell LG5000 (incl. LG5200MM)

Packard Bell LG5900SUPMM

Packard Bell LG635J

Packard Bell LG635J (incl. LG660H)

Packard Bell LG660H

Packard Bell LG66D SUPR (incl. LG66T, LG896SUP Models)

Packard Bell LG695 SUPR

Packard Bell LG747DMT (incl . LG747F, LG747 MT, LG749MT)

Packard Bell LG760 Supreme

Packard Bell LG780 SUPR (incl. LG790SUP)

Packard Bell LG810MT (incl. LG840MT, LG843+MT, LG843MT Models)

Packard Bell LG845MT (incl. LG845MTH, LG 848MT, LG855MT Models)

Packard Bell LG855MTH (incl. LG860MT, LG933MT S Models)

Packard Bell LG885SUP

Packard Bell M PM65

Packard Bell MF 2133S MT (incl MF 2233S)

Packard Bell MF1066S

Packard Bell MF1137S

Packard Bell MLG1136 (incl.MLG1136S)

Packard Bell MLG115

Packard Bell MLG1166 (incl MLG1166S)

Packard Bell MLG207 (incl. MLG233)

Packard Bell MLG2276MT

Packard Bell MLG747MT

Packard Bell MPB1120SH

Packard Bell MPB400

Packard Bell MPB430

Packard Bell MPB440

Packard Bell PackMate 733 C MT

Packard Bell PB 1110

Packard Bell PB 1120

Packard Bell PB 1150

Packard Bell PB 11CD

Packard Bell PB 1555CD

Packard Bell PB 209

Packard Bell PB 20CD

Packard Bell PB 20CD+

Packard Bell PB 25 (incl PB26CD)

Packard Bell PB 28CDT

Packard Bell PB1020MM

Packard Bell PB1030MM (incl. PB1520MM)

Packard Bell PB1103 AUS (incl. PB104 AUS, 1108 AUS Models)

Packard Bell PB1108HMM (incl. PB1110MM AU)

Packard Bell PB1120 (incl. PB1120H+)

Packard Bell PB1150+MM (incl. PB1150MM)

Packard Bell PB2002MM (incl. PB2008MM)

Packard Bell PB2011MM (incl. PB2034MM)

Packard Bell PB208CD

Packard Bell PB2555CD

Packard Bell PB410SX/25

Packard Bell PB410SX/33

Packard Bell PB4200

Packard Bell PB420DX/33

Packard Bell PB420DX2/66

Packard Bell PB420SX/33

Packard Bell PB430DX/25

Packard Bell PB430DX/33

Packard Bell PB430DX2/50

Packard Bell PB430DX2/66

Packard Bell PB430SX/25

Packard Bell PB430SX/33

Packard Bell PB450DX/33

Packard Bell PB450DX2/50

Packard Bell PB450DX2/66

Packard Bell PB450SX/25

Packard Bell PB450SX/33

Packard Bell PB486DX2/50A

Packard Bell PB486SX/33A

Packard Bell PB486T66

Packard Bell PB520R

Packard Bell PB527-60

Packard Bell PB550

Packard Bell PB566

Packard Bell PB609H (incl. PB610, PB610 W/PRINT, PB610H Models)

Packard Bell PB7622MT

Packard Bell PLT50 - Pentium 150

Packard Bell PM 2050

Packard Bell PM 27

Packard Bell PM 3900G

Packard Bell PM 48CD

Packard Bell PM 4CD

Packard Bell PM 50CD (incl. PM 52CD)

Packard Bell PM 66CD

Packard Bell PM 67

Packard Bell PM 74CD

Packard Bell PM M65

Packard Bell PM1950+MM (incl. PM2050MMC)

Packard Bell PM1950MM

Packard Bell PM1981MM

Packard Bell PM1988MM (incl. 1990MMC)

Packard Bell PM486DX/33X

Packard Bell PM486DX33X

Packard Bell PM486DX33Y

Packard Bell PM486SX/25W

Packard Bell PM486SX25U

Packard Bell PM486SX25U2

Packard Bell PM486SX25X

Packard Bell PM5900GMM

Packard Bell PM733MTC (incl. PM750C)

Packard Bell PM76

Packard Bell PM766MTC

Packard Bell PM850C

Packard Bell PM966

Panasonic CF-21P/75M

Panasonic CF-41 / 100M 144

Panasonic CF-41 / 50M 144

Panasonic CF-41 / 75M

Panasonic CF-41 / Pentium 75

Panasonic CF-41 / Pentium 90

Patriot 486/66dx2 VLB Desktop

PC Direct 560Si Pentium 100

PC Direct 560Ti Pentium 75

PC Direct Discovery 540

PC Expanders VANGUARD 486DX ISA/VESA 33Mhz

PC Expanders VANGUARD PENTIUM VESA/PCI 90Mhz

PC Tech 486DX2/66 (AMD) VL

PC Tech 486DX33 (AMD) VL

PC Tech 486VL33

PC Tech VLB 486DX-4/100

PC Tech VLB 486DX2/66

Peacock Challenger 600 Pentium 100

Peacock CTM 8564

Peacock Performance 120

Peacock Performance 486-100

Peacock Performance Pentium 90

Peacock Professional Performance 90

Peacock Professional plus

Peacock Server Model SSE 8364

Peacock SSE 8364

Peacock Take Pentium 75

Perpetual Systems P7100DN Pentium 75

PEX 410M

PEX 433M

PEX 450M

PEX 466M

PEX 486DM-100 (incl. DP and DE Models)

PEX 486DM-33 (incl DP and DE Models)

PEX 486DM-33E (incl. DP and DE Models)

PEX 486DM-40E (incl. DP and DE Models)

PEX 486DM-50 (incl DP and DE Models)

PEX 486DM-50E (incl. DP and DE Models)

PEX 486DM-66 (incl. DP and DE Models)

PEX 486DM-S50 (incl. DP and DE Models)

PEX 486DX-33 ELP

PEX 486DX-33 Mini

PEX 486DX-33 Mini 72P

PEX 486DX-33 Tower

PEX 486DX-33E Mini

PEX 486DX2-50 ELP

PEX 486DX2-50 Mini

PEX 486DX2-50 Mini 72P

PEX 486DX2-50 Tower

PEX 486DX2-50E ELP

PEX 486DX2-50E Mini

PEX 486DX2-66 ELP

PEX 486DX2-66 Mini

PEX 486DX2-66 Mini 72P

PEX 486DX2-66 Tower

PEX 486DX4-100 Mini

PEX 486SX-25 ELP

PEX 486SX-25 Mini

PEX 486SX-33 ELP

PEX 486SX-33 Mini

PEX 486SX-33 Tower

PEX 560M

PEX DM-S33 (incl. DP and DE Models)

PEX LT433C Notebook

PEX Platinum DM90

PEX Platinum DP90

PEX Plato P54C

PEX SMP50P

Pionex 486DX2-66

Pionex 486DX4-100

Pionex P5/66

Pionex P5/90

Polaris 486DX4-100 VL

Polaris Pentium 90

Poly 486-50E

Poly 486SX-25Y

Poly 586EP2

Polywell 590 Dual EP (1p)

Polywell 590P8

Polywell 590T1

Polywell Poly 133T3

Polywell Poly 133T8

Polywell Poly 486EISA-100

Polywell Poly 590P1

Polywell Poly 590P5

Polywell Poly 590VP

Porchester SKAI EISA DX2-66

Porchester SKAI PCI DX2-66

Porchester SKAI PCI DX4-100

Porchester SKAI PCI PENTIUM-60

Porchester SKAI VLB DX2-66

Porchester SKAI VLB PENTIUM-60

Porchester SKAI VLB/G DX2-66

Positivo Informatica POS AT (AMD5x86/133)

Positivo Informatica POS AT PENTIUM 100

Positivo Informatica POS AT PENTIUM 133

Positivo Informatica POS AT PENTIUM 166

POWER DESK 486/33

POWER DESK EISA/ISA/VESA

POWER DESK GREEN

POWER DESK PCI Pentium

Powerland POWER PENTIUM-60 PCI

Powerland POWER PENTIUM-75 PCI

Powerland POWER PENTIUM-90 PCI

Powerland POWER2 486DX2/66

Powerland POWER2 486DX2/66 PCI

Powerland POWER2 486DX2/66 VLB

Powerland POWER2 486DX4/100

Precision 486/66 VL-Bus

Precision Concepts Corp. Professional I Pentium 120

Precision Concepts Corp. Professional II Pentium 120

Precision Pentium Eisa-Vesa

Primax COBRA III PCI PENTIUM 66

Primax COBRA III PCI PENTIUM 90

Primax Cobra P90

Primax Executive P90

Primax PANTHER II VIP

Primax Panther P90

Primax Select P90

Pro Log PIP5/760 Pentium PCI/ISA System

Professional 486DX4-100 VL

Professional Concepts Beeker 4-33/VL2

Professional Concepts Beeker 6900

Professional Concepts Marauder 5100/AS

Professional Concepts Marauder 5100/AT

Professional Concepts Marauder 5100/GB

Professional Concepts Marauder 5100/MT

Professional Concepts Quinn 4-33/VLE

Professional Concepts Quinn 4-66/VLE

Professional Concepts Saavij 4-100/VL3 Model G

Professional Concepts Saavij 4-33/VL3

Professional Concepts Saavij 4-33/VL3 Model E

Professional Concepts Saavij 4-50/VL3

Professional Concepts Saavij 4-66/VL3 Model E

Professional Concepts Saavij 4-66/VL3 Model S

Professional Pentium 90

Progress Systems Inc. Ideal Pentium 90

ProSpec 486DX-33 ISA/VLB

ProSpec 486DX-50 EISA/VLB

ProSpec PENTIUM 60 EISA/PCI

ProSys Ultra P200 PCI

Protech 486-66Mhz ISA/VL

Protech Netset 486DX4-100 PCI

Protech NetSet 486DX4-100 VLB

Protech Netset P5 PCI 60

Protech Pentium PCI/ISA

QTech 486 DX2/66

Quantex 486DX2/66

Quantex 486DX4/100

Quantex P5/66

Quantex P5/90

Quattro Prompt486/66 VL

Quattro Prompt586

Radisys EPC-7

Radisys EPC-8

RDIpc Systeme Pentium-90

Reason Technology 4 LX Plus 486DX2/66

Reason Technology Square 4LX W32i Mitsumi FX001D

Reason Technology Square 4LX/AIO

Reason Technology Square 5 P/I-60

Reason Technology Square 5 P/I-90

Reason Technology Square 5 TR/A 120

Reason Technology Square 5VL

Repco Data PCI48SG4

Repco Data Pentium/I

Repco Data R33VLB486

Repco Data R50VLB486

Repco Data R66VLB486

Reply PS/2 Model 50/50SX Power Board Upgrade 486DX4/100

Reply PS/2 Model 50/50SX System Board Upgrade 486SLC2/50

Reply PS/2 Model 55/55SX Power Board Upgrade 486DX

Reply PS/2 Model 56/57 PowerBoard Upgrade 486DX4-100

Reply PS/2 Model 60/80 System Board Upgrade 486DX2/66

Reply PS/2 Model 70 PowerBoard Upgrade 486DX4/100

Reply PS/2 Model 70 System Board Upgrade 486DX2/66

Research Machines RM D Series PC-466

Research Machines SYSTEMBASE

Robotech Cobra P90

Robotech Cobra RS 486DX2-66

Rolta ROLTASTATION 486 66 MHz ISA- VESA

Rolta STATION 486/66 ENGG.

Rosh Tech Pentium DX-66 ABA

Rosh Tech Pentium DX-90 ABA

Samsung MagicPower Pro 610 200 Mhz

Samsung P5 Workstation

Samsung SPC5800N

Samsung SPC7600P VW234L

Samsung SPC7600P VW242H

Samsung SPC8500P Pentium/90

Samsung SPC8500PA Pentium/133

Samsung SWS 520/133 Personal Workstation

Samsung SWS 520/90

Samsung SWS610 200 Mhz

Sanyo MBC-20CV

Sanyo Winkey (486DX4-100MHz)

Sanyo Winkey (Pentium 90MHz)

Sanyo Winkey-L (486SX 33MHz)

SCA Professional 486DX4-100 PCI

SCA Professional EISA 486

SCA Professional Pentium 66 EISA/PCI

SCA Professional Pentium 90 EISA/PCI

Seanix ASI 9000 9512AS08G

Seanix ASI 9000 9512DS16H

Seanix ASI 9000 9513AS16H

Seanix ASI 9000 9515DS16H

Seanix ASI 9000 9575AA08F

Seanix ASI 9000 9575AS08F

Seanix ASI 9000 9575DS08F

Seanix ASI 9000 9599AS08G

Seanix ASI 9000 9D266AV08C

Seanix ASI 9000 9D266IV08C

Seanix ASI 9000 9D280AV08C

Seanix ASI 9000 9D499AV08D

Seanix ASI 9000 9D499IO16C

Seanix ASI 9000 9P512AS16G

Seanix ASI 9000 9P512LI16G

Seanix ASI 9000 9P513AS16G

Seanix ASI 9000 9P515LI16G

Seanix ASI 9000 9P560IO08B

Seanix ASI 9000 9P575AV8E

Seanix ASI 9000 9P575BV08E

Seanix ASI 9000 9P575LI08E

Seanix ASI 9000 9P590IO16C

Seanix ASI 9000 9P599AS08G

Seanix ASI 9000 9P599BS08G

Seanix ASI 9000 9P599IO16C

Seanix ASI 9000 9V90AIV16E

Seanix ASI 9000 EFAR 486DX2-66

Seanix ASI 9000 P5PCI-VL

Seanix ASI 9000 PREMIERE PENTIUM PCI-60

Seanix ASI 9000 YUKON 486DX-33

Seanix ASI 9000 YUKON 486DX2-66

Seanix ASI 9000 YUKON 486DX4-100

Seanix ASI 9000 YUKON S801 486DX2-50

Seanix ASI9000 9D499LC08E

Seanix ASI9000 9P575IO08E

Seanix ASI9000 9P575LV16E

Seanix ASI9000 9P590LV08E

Seanix ASI9000 9P599LS08G

Seanix ASI9000 9P599LV16E

Seanix SONORA S512CA08F

Seanix SONORA S512CA16F

Seanix SONORA S513CA16F

Seanix SONORA S513CA16G

Seanix SONORA S575AA08F

Seanix SONORA S575CA16F

Seanix SONORA S575CS08F

Seanix SONORA S575CS16F

Seanix SONORA S599CA08F

Seanix SONORA S599CA16F

Seanix SONORA SD499LC08D

Seanix SONORA SP575AP08D

Seanix SONORA SP575LN08D

Seanix SONORA SP599AV08F

Seanix SONORA SP599LO08F

Serius Systems Technology 486/66 EISA

Shi-Tec 486CS100

Shi-Tec 486CS66

Shi-Tec 486CS66E (AMD)

Shi-Tec 486CS80E (AMD)

Shi-Tec 486CX100

Shi-Tec 486CX66

Shi-Tec 486CX66E (AMD)

Shi-Tec 486CX80E (AMD)

Shi-Tec 486DM100

Shi-Tec 486DM100E (AMD)

Shi-Tec 486DM66

Shi-Tec 486DM66E (AMD)

Shi-Tec 486DM66E (Cyrix V)

Shi-Tec 486DM66E (Cyrix)

Shi-Tec 486DM75

Shi-Tec 486DM80E (AMD)

Shi-Tec 486DM80E (Cyrix V)

Shi-Tec 486DP100

Shi-Tec 486DP100E (AMD)

Shi-Tec 486DP66

Shi-Tec 486DP66E (AMD)

Shi-Tec 486DP66E (Cyrix V)

Shi-Tec 486DP66E (Cyrix)

Shi-Tec 486DP75

Shi-Tec 486DP80E (AMD)

Shi-Tec 486DP80E (Cyrix V)

Shi-Tec 486VM100

Shi-Tec 486VM100E (AMD)

Shi-Tec 486VM66

Shi-Tec 486VM66E (AMD)

Shi-Tec 486VM66E (Cyrix V)

Shi-Tec 486VM66E (Cyrix)

Shi-Tec 486VM75

Shi-Tec 486VM80E (AMD)

Shi-Tec 486VM80E (Cyrix V)

Shi-Tec 486VP100

Shi-Tec 486VP100E (AMD)

Shi-Tec 486VP66

Shi-Tec 486VP66E (AMD)

Shi-Tec 486VP66E (Cyrix V)

Shi-Tec 486VP66E (Cyrix)

Shi-Tec 486VP75

Shi-Tec 486VP80E (AMD)

Shi-Tec 486VP80E (Cyrix V)

Shi-Tec 590M

Shi-Tec 590P

Shi-Tec LT433C Notebook

Shi-Tec LT453C Notebook

Shi-Tec LT473C Notebook

Shi-Tec LT845 Sub-Notebook

Shi-Tec Platinum NS100

Shi-Tec Platinum NS75

Shi-Tec Platinum NS90

Shi-Tec Platinum NX100

Shi-Tec Platinum NX75

Shi-Tec Platinum NX90

Shi-Tec Platinum RS100

Shi-Tec Platinum RS75

Shi-Tec Platinum RS90

Shi-Tec Platinum RX100

Shi-Tec Platinum RX75

Shi-Tec Platinum RX90

Shuttle HOT-407 EISA/VESA/DX2-66

Shuttle HOT-409 VLB/DX2-50

Shuttle HOT-409 VLB/DX2-66

Shuttle HOT-419 DX-50

Shuttle HOT-419 DX2-50

Shuttle HOT-419 DX2-80

Shuttle HOT-419 DX4-100

Shuttle HOT-419 VLB/DX2-66

Shuttle HOT-428 PCI/VESA/ISA

Shuttle HOT-433 486-66/ISA/PCI

Shuttle HOT-433 DX2-80/ISA/PCI

Shuttle HOT-433 ISA/PCI/DX4-100

Shuttle HOT-503 PENTIUM/60

Shuttle HOT-503 PENTIUM/66

Shuttle HOT-523 PCI/PENTIUM/60

Shuttle HOT-523 PCI/PENTIUM/66

Shuttle HOT-523 PENTIUM/60/VESA/ISA/PCI

Shuttle HOT-523 PENTIUM/66/VESA/ISA/PCI

Shuttle HOT-528 EISA/PCI PENTIUM/60

Shuttle HOT-539 PENTIUM 133/PCI

Shuttle HOT-539 PENTIUM/P100/PCI

Shuttle HOT-539 PENTIUM/P120/PCI

Shuttle HOT-541 PENTIUM 90

Shuttle HOT-541 PENTIUM PCI/100

Shuttle HOT-541 PENTIUM PCI/120

Shuttle HOT-543 P100/VESA/ISA/PCI

Shuttle HOT-543 VESA/ISA/PCI/P90

Shuttle HOT-549 P90/VESA/ISA/PCI

Sidus SCI9100EP/SQ595

Siemens-Nixdorf PCD-4H

Siemens-Nixdorf PCD-4H VL

Siemens-Nixdorf PCD-4H/100 PCI

Siemens-Nixdorf PCD-4H/66 PCI

Siemens-Nixdorf PCD-4L

Siemens-Nixdorf PCD-4L VL

Siemens-Nixdorf PCD-4L/100 PCI

Siemens-Nixdorf PCD-4L/66 PCI

Siemens-Nixdorf PCD-4ND

Siemens-Nixdorf PCD-5H

Siemens-Nixdorf PCD-5H/100

Siemens-Nixdorf PCD-5H/75

Siemens-Nixdorf PCD-5H/90

Siemens-Nixdorf PCD-5L/75

Siemens-Nixdorf PCD-5ND

Siemens-Nixdorf PCD-5T 90 E

Siemens-Nixdorf PCD-5T/PCI 60E

Siemens-Nixdorf PCD-5TG 75

Siemens-Nixdorf PCE-5S/100

Siemens-Nixdorf PCE-5S/60

Siemens-Nixdorf PCE-5Smp/100 (1p)

Siemens-Nixdorf PCE-5Smp/90 (1p)

Siemens-Nixdorf SCENIC 4H

Siemens-Nixdorf SCENIC 4T

Siemens-Nixdorf SCENIC 4T VL

Siemens-Nixdorf SCENIC 5H 133 PCI

Siemens-Nixdorf SCENIC 5H 60 PCI

Siemens-Nixdorf SCENIC 5T 100 PCI

Siemens-Nixdorf SCENIC 5T 133 PCI

Siemens-Nixdorf SCENIC 5T 60 PCI

Siemens-Nixdorf SCENIC 5T 90 PCI

Siemens-Nixdorf SCENIC MOBILE 700 Pentium 100

Sirex PowerMaster GA66VL

Sirex PowerMaster P100 PCI

Sirex PowerMaster P60 PCI

Sirex PowerMaster P75 PCI

Sirex PowerMaster P90 PCI

Sirex SpeedMaster 66 PCI

Sirex WorkMaster 100 VL

Sirex WorkMaster 50 VL

Sirex WorkMaster 66 VL

Sirex WorkMaster AMD 100 VL

SKAI AXIOM 486DX-33

SKAI AXIOM 486DX2-66

SKAI AXIOM DX2 66 VLB/EIDE

SKAI AXIOM PENT-75 PCI/EIDE

SKAI AXIOM PENT-90 PCI/EIDE

SKAI PCI 486DX2-66

SKAI SPECTRUM 486SX-33

Softlet Standard 486DX2-66 VL/PCI

Softlet Standard Pentium 60/PCI

Softlet Standard Pentium 90/PCI I/O

Software Surgery SSI\P-90-G

Source Technology P90

SPC™ TRADING AB SPC P-90 Ergoline

SRC Systems 486 VL

SRC Systems 486 VL Plus

SRC Systems 486DX2/66 Workstation

SRC Systems 486DX2/80 Workstation

SRC Systems 486DX4/100 Dual Scan Color Notebook

SRC Systems 486DX4/100 Workstation

SRC Systems DX2/50 Dual Scan Color Notebook

SRC Systems Pentium 120 Tri

SRC Systems Pentium 133 Tri

SRC Systems Pentium 75 Tri

SRC Systems Pentium 90

SRC Systems Pentium 90 Tri

SRC Systems Pentium 90S

SRC Systems Pentium PCI

STD CompuPartner P100

STD GOLD 560D

STD PLATINUM 590D

STI XL COMPUTING\HETRA 205P-75

STS Tecom Gmbh STS-486DX/PCIG

STS Tecom Gmbh STS-486SL/40

STS Tecom Gmbh STS-P5/66IS

STS Tecom Gmbh STS-P54/90IS

SUPERCOM 3/486

Supra 3600 Pentium 60 Notebook

Supra 486DX-33 VESA/ISA

Supra 486DX2-66 VESA/ISA

Supra 486DX4-100 VESA/ISA

Supra 486SX-33 VESA/ISA

Supra 9200 i486DX2-66 NOTEBOOK

Supra 9600 Pentium 75 Notebook

Supra c486DX2-66 PCI/VESA

Supra i486DX2-66 PCI/VESA/ISA

Supra Pentium 100 PCI/ISA NP4

Supra Pentium 60 PCI/ISA

Supra Pentium 60 VESA/ISA

Supra Pentium 75 PCI/ISA NP4

Supra Pentium 75 PCI/ISA TP4

Supra Pentium 90 PCI/EISA

Supra Pentium 90 PCI/ISA TP4

Svensk LAPLINE 3600

Swan 486DX2/66 EISA-DB

Swan Mini P133 PCI/ISA

Swan Mini P133 PCI/ISA, SCSI

Swan P75 PCI/ISA

Syncomp Mega 486DX2/EISA

Syncomp Mega 486DX250/EISA

Syncomp Mega 486DX250/VLB

Syncomp Mega 486DX250/VLPCI

Syncomp Mega 486DX266/VLB

Syncomp Mega 486DX266/VLG

Syncomp Mega 486DX266/VLPCI

Syncomp Mega 486DX4100/VLB

Syncomp Mega 486DX4100/VLPCI

Syncomp Mega 486SX33/VLB

Syncomp Mega 486SX33/VLPCI

Syncomp Mega PENTIUM 66EISA/PCI

Syncomp Mega PENTIUM 75/PCI

Syncomp Mega PENTIUM 90 PCI/EISA

Syncomp Mega PENTIUM 90/PCI

Syncomp Megaframe PENTIUM 75/PCI

Syncomp Megaframe PENTIUM 90 PCI/EISA

Syncomp Microstar 486DX250/VLB

Syncomp Microstar 486DX266/VLB

Syncomp Microstar 486DX4100/VLB

Syncomp Microstar 486SX33/VLB

Syncomp Mini 486DX2/EISA

Syncomp Mini 486DX250/EISA

Syncomp Mini 486DX250/VLB

Syncomp Mini 486DX250/VLPCI

Syncomp Mini 486DX266/PCI PC

Syncomp Mini 486DX266/VLB

Syncomp Mini 486DX266/VLPCI

Syncomp Mini 486DX4100/VLB

Syncomp Mini 486DX4100/VLPCI

Syncomp Mini 486SX33/EISA PC

Syncomp Mini 486SX33/PCI PC

Syncomp Mini 486SX33/VLB

Syncomp Mini 486SX33/VLPCI

Syncomp Mini PENTIUM 66 EISA/PCI

Syncomp Mini PENTIUM 75/PCI

Syncomp Mini PENTIUM 90 PCI/EISA

Syncomp Mini PENTIUM 90/PCI

Synnex LEMEL 586PC - Pentium 100

Sys Business 4/100AM

Sys Business P133 TA

Sys Performance P120T "G" Series

Sys Performance P133 ATE/P

Sys Performance P133 T T68 Series

Sys Performance P133 TA

Sys Performance P133T "T" Series

System Designs MagPower 486SP/100A

System Designs MagPower P54TI/90

T-DATA LIN 486-100 DX4

T-DATA LIN 486-40 DX

T-DATA LIN 486-50 DX2

T-DATA LIN 486-66 DX2

T-DATA LIN 486-80 DX2

T-DATA LIN PENTIUM 60 PCI

T-DATA LIN PENTIUM 90 PCI

Tagram Computers Platinum-Thunderbolt P100

Tagram Computers Platinum-Thunderbolt P120

Tagram Computers Platinum-Thunderbolt P75

Tagram Computers Platinum-Thunderbolt P90

Tandy 4100 MT

Tandy MMPC

Tangent 486PCI/100 Desktop

Tangent 486PCI/100 Just N' Case

Tangent 486PCI/100 MT5

Tangent 486PCI/100 Rack Server

Tangent 486PCI/100 Server

Tangent 486PCI/100 Tower 8

Tangent 486PCI/66 Desktop

Tangent 486PCI/66 Just N' Case

Tangent 486PCI/66 MT5

Tangent 486PCI/66 Rack Server

Tangent 486PCI/66 Server

Tangent 486PCI/66 Tower 8

Tangent Just N' Case Dual SMP Server (1p)

Tangent Just N' Case Dual SMP Server 250 (1p)

Tangent P590 PCI EISA Dual SMP /M (1p)

Tangent P590 PCI EISA Dual SMP /T (1p)

Tangent P590 PCI EISA Dual SMP PowerStation (1p)

Tangent P590 PCI EISA Dual SMP Server (1p)

Tangent P75PCI Desktop

Tangent P75PCI Just N' Case

Tangent P75PCI MT5

Tangent P75PCI Rack Server

Tangent P75PCI Server

Tangent P75PCI Tower 8

Tangent P90PCI Desktop

Tangent P90PCI Just N' Case

Tangent P90PCI MT5

Tangent P90PCI Rack Server

Tangent P90PCI Server

Tangent P90PCI Tower 8

Tangent P90PCI2 Desktop

Tangent P90PCI2 Just N' Case

Tangent P90PCI2 MT5

Tangent P90PCI2 Rack Server

Tangent P90PCI2 Server

Tangent P90PCI2 Tower 8

Tangent VL433 Server

Tangent VL433sd

Tangent VL433sm

Tangent VL433st

Tangent VL450 Server

Tangent VL450d

Tangent VL450m

Tangent VL450t

Tatung TCS-5210P54C/90 ISA/PCI

Tatung TCS-5230 P54C ISA/PCI Pentium 90

Tatung TCS-5510P54C/90 ISA/PCI

Tatung TCS-5600P5 PCI/EISA

Tatung TCS-5720 SINGLE P54C/90 PCI/ISA

Tatung TCS-9130DX266 VL/PCI

Tatung TCS-9130DX4 VL/PCI

Tatung TCS-9130SX33 VL/PCI

Tatung TCS-9270DX266 ISA/PCI

Tatung TCS-9345DX266 VL/PCI

Tatung TCS-9345DX4 VL/PCI

Tatung TCS-9345SX33 VL/PCI

Tatung TCS-9510 VL/ISA

Tatung TCS-9545DX266 ISA/PCI

Tatung TCS-9545DX4 ISA/PCI

Tatung TCS-9545SX33 ISA/PCI

Tatung TCS-9546DX266 ISA/PCI

Tatung TCS-9546DX4 ISA/PCI

Tatung TCS-9560DX266 ISA/PCI

Tatung TCS-9560DX4 ISA/PCI

Tatung TCS-9570DX266 ISA/PCI

Tatung TCS-9730DX266 VL/PCI

Tatung TCS-9730DX4 VL/PCI

Tatung TCS-9730SX33 VL/PCI

Tatung TMP-5000 P54C ISA/PCI Pentium 75

Tatung TMP-9000DX266 PCI/ISA

Technologies Dr GEMMA-486SG66

Techway Endeavour E62VL

Techway Endeavour E62VL-D SX33 Green

Techway Endeavour E62VL-GX4

Techway Endeavour E62VL-M SX33 Green

Techway Endeavour E62VL-T SX33 Green

Techway Endeavour E77VL

Techway Endeavour E77VL-D DX2/66 Green

Techway Endeavour E77VL-D DX33 Green

Techway Endeavour E77VL-D DX4/100 Green

Techway Endeavour E77VL-GX4

Techway Endeavour E77VL-M DX2/66 Green

Techway Endeavour E77VL-M DX33 Green

Techway Endeavour E77VL-M DX4/100 Green

Techway Endeavour E77VL-T DX2/66 Green

Techway Endeavour E77VL-T DX33 Green

Techway Endeavour E77VL-T DX4/100 Green

Techway Endeavour E84VL

Techway Endeavour E84VL-GX4

Techway Endeavour E84VL100-GX4

Techway Endeavour II 486 DX2 66 F (Incl. M and D models)

Techway Endeavour II 486DX4 100 F (incl. M and D models)

Techway Endeavour II Notebook 66

Techway Endeavour II Notebook DX 100

Techway Endeavour II Pentium 100 F (Incl. M and D models)

Techway Endeavour II Pentium 66 F (Incl. M and D models)

Techway Endeavour II Pentium 75 F (Incl. M and D models)

Techway Endeavour II Pentium 90 F (Incl. M and D models)

TELEMECANIQUE FTX417-40

TELEMECANIQUE FTX507-9T

Texas Instruments TravelMate 4000 WinDX2 145

Texas Instruments TravelMate 4000E in TravelMate DeskTop

Texas Instruments TravelMate 5000M P/75

Texas Instruments TravelMate 5100

Texas Instruments TravelMate 5200

Texas Instruments TravelMate 5300

Texas Instruments TravelMate TM4000E TFT

Texas Microsystems D486DX4C/100

Texas Microsystems OmniRack Xpress/RX Pentium 66

Texas Microsystems P590

The Panda Project Archistrat 4S Pentium 133M

Tomtronic HIGHNAME DX2 66MHz PCI /ISA

Tomtronic HIGHNAME Pentium 90MHz  PCI

Toshiba Satellite Pro 100

Toshiba Satellite Pro 400CS

Toshiba Satellite Pro 410CDT/810

Toshiba Satellite Pro 410CS

Toshiba T1910CS/200

Toshiba T1950CT/320

Toshiba T2100/260

Toshiba T2100CS/320

Toshiba T2100CT/320

Toshiba T2110 Mono

Toshiba T2110CS/350

Toshiba T2130CS/500

Toshiba T2130CT/500

Toshiba T2400CS/250

Toshiba T2450CT/500

Toshiba T3600CT/500

Toshiba T4400SX

Toshiba T4400SXC

Toshiba T4600C/200 146

Toshiba T4850CT/500

Toshiba Tecra 700CS

TOTAL PERIPHERALS PENTIUM 100 SYSTEM

TOTAL PERIPHERALS TP P5SP3AV-I Pentium 100

TOTAL PERIPHERALS TP P5SP3AV-S Pentium 100

TOTAL PERIPHERALS TP P5XE-I Pentium 100

TOTAL PERIPHERALS TP PRO-P6 (150Mhz) 140

Touch 410M

Touch 433M

Touch 450M

Touch 466M

Touch 486DM-100 (incl. DP and DE Models)

Touch 486DM-33 (incl DP and DE Models)

Touch 486DM-33E (incl. DP and DE Models)

Touch 486DM-40E (incl. DP and DE Models)

Touch 486DM-50 (incl DP and DE Models)

Touch 486DM-50E (incl. DP and DE Models)

Touch 486DM-66 (incl. DP and DE Models)

Touch 486DM-S50 (incl. DP and DE Models)

Touch 486DX-33 ELP

Touch 486DX-33 Mini

Touch 486DX-33 Mini 72P

Touch 486DX-33 Tower

Touch 486DX-33E Mini

Touch 486DX2-50 ELP

Touch 486DX2-50 Mini

Touch 486DX2-50 Mini 72P

Touch 486DX2-50 Tower

Touch 486DX2-50E ELP

Touch 486DX2-50E Mini

Touch 486DX2-66 ELP

Touch 486DX2-66 Mini

Touch 486DX2-66 Mini 72P

Touch 486DX2-66 Tower

Touch 486DX4-100 Mini

Touch 486SX-25 ELP

Touch 486SX-25 Mini

Touch 486SX-33 ELP

Touch 486SX-33 Mini

Touch 486SX-33 Tower

Touch 560M

Touch DM-S33 (incl. DP and DE Models)

Touch LT433C Notebook

Touch Platinum DM90

Touch Platinum DP90

Touch Plato P54C

Touch SMP50P

Tower Computer Vista 486/66P

Transource 486-66

Transource P5-100

Transource P5-75

Transource P5-90

Trenton Terminals PENTIUM EISA 90

Trenton Terminals PENTIUM TR-P5PCI 100MHz

Tri-Star PENTIUM 100 MINI-T Tricad 3d

Tri-Star SOHO Pentium 60

Tri-Star Tri-CAD I PCI/90Mhz

Tri-Star Tri-CAD Ultimate 464V PCI P60

Tricord PowerFrame DS1000/5100

Tricord PowerFrame DS1000/566

Tricord PowerFrame DS1000LX/100

Tricord PowerFrame DS1000LX/90

Tricord PowerFrame DS1500/5100

Tricord PowerFrame DS1500/566

Tricord PowerFrame DS1700/5100

Tricord PowerFrame Enterprise Server ES/133 (1p)

Tricord PowerFrame Enterprise Server ES8000 Pentium 133 (1p)

Tricord PowerFrame M300/100C

Tricord PowerFrame M40/66C

Tricord PowerFrame M400/100C

Trident TCI Pentium 90 System

TriGem 486 GP (80486DX2 66 Mhz)

TriGem 486/66VC

TriGem 486G/T10(incl. 486H+ T10G model)

TriGem 486G/T15(incl. 486G+ T15 model)

TriGem 486G/T20

TriGem 486G/T25(incl. 486G+ T25 model)

TriGem 486G/T40(incl. 486H+ T40G,T43G models)

TriGem 486G/T45(incl. 486G+ T45 model)

TriGem 486G/T50

TriGem 486G/T55(incl. 486G+ T55 model)

TriGem 486GP T15

TriGem 486GP T25

TriGem 486GP T45

TriGem 486GP T55

TriGem GEMPOWER 4420

TriGem GEMPOWER 4440-A

TriGem GEMPOWER 4530

TriGem P5/PT

TriGem P5/T

TriGem P54C/CM

TriGem P54C/EP T100 (incl. P54C/DT T100)

TriGem P54C/EP T200 (incl. P54C/DT T200)

TriGem TG 486 AP T75

TriGem TG P5/SP (PENTIUM 60Mhz)

TriGem TG486AP T55 (Cyrix DX2 66Mhz)

Trinity Technology Pentium 90

Tulip DT 4/50

Tulip Vision Line DE 4/100

Tulip Vision Line DE 4/33S

Tulip Vision Line DE 4/50

Tulip Vision Line DE 4/50S

Tulip Vision Line DE 4/66

Tulip Vision Line DE 5/100

Tulip Vision Line DE 5/120

Tulip Vision Line DE 5/133

Tulip Vision Line DE 5/150

Tulip Vision Line DE 5/166

Tulip Vision Line DE 5/60

Tulip Vision Line DE 5/75

Tulip Vision Line DE 5/90

Tulip Vision Line DS 4/100

Tulip Vision Line DS 4/66

Tulip Vision Line DS 5/100

Tulip Vision Line DS 5/120

Tulip Vision Line DS 5/133

Tulip Vision Line DS 5/60

Tulip Vision Line DS 5/90

Tulip Vision Line DT 4/100

Tulip Vision Line DT 4/33S

Tulip Vision Line DT 4/50S

Tulip Vision Line DT 4/66

Tulip Vision Line DT 5/100

Tulip Vision Line DT 5/120

Tulip Vision Line DT 5/133

Tulip Vision Line DT 5/150

Tulip Vision Line DT 5/150

Tulip Vision Line DT 5/166

Tulip Vision Line DT 5/60

Tulip Vision Line DT 5/75

Tulip Vision Line DT 5/90

Tulip Vision Line ID 4/100

Tulip Vision Line ID 5/133

Tulip Vision Line TR 5/100

Tulip Vision Line TR 5/120

Tulip Vision Line TR 5/133

Tulip Vision Line TR 5/150

Tulip Vision Line TR 5/166

Tulip Vision Line WS 4/33S

Tulip WS 4/66

U.S. Micro Jet 386DX-33

U.S. Micro Jet 386DX-40

U.S. Micro Jet 486DLC-33

U.S. Micro Jet 486DLC-40

U.S. Micro Jet 486DX-33

U.S. Micro Jet 486DX-40

U.S. Micro Jet 486DX-50

U.S. Micro Jet 486DX2-50

U.S. Micro Jet 486DX2-66

U.S. Micro Jet 486SX-25

U.S. Micro Jet P5-60 PCI/EISA

U.S. Micro Jet P5-60 PCI/ISA

U.S. Micro Jet P5-66 PCI/EISA

U.S. Micro Jet P5-66 PCI/ISA

U.S. Micro Jet P5-75 PCI/ISA

U.S. Micro Jet P5-90 PCI/ISA

U.S. Micro Jet P5T-100 PCI/ISA

U.S. Micro Jet P5T-120 PCI/ISA

U.S. Micro Jet P5T-133 PCI/ISA

U.S. Micro Jet PCI 486DX-33

U.S. Micro Jet PCI 486DX2-50

U.S. Micro Jet PCI 486DX2-66

U.S. Micro Jet PCI 486SX-25

U.S. Micro Jet PVI 486DX2-80

U.S. Micro Jet VL 486BL-75

U.S. Micro Jet VL 486DX-33

U.S. Micro Jet VL 486DX-40

U.S. Micro Jet VL 486DX-50

U.S. Micro Jet VL 486DX2-50

U.S. Micro Jet VL 486DX2-66

U.S. Micro Jet VL 486DX4-100

U.S. Micro Jet VL 486DX4-75

U.S. Micro Jet VL 486SLC2-50

U.S. Micro Jet VL 486SLC2-66

U.S. Micro Jet VL 486SX-25

U.S. Micro Jet VL/EISA 486DX-33

U.S. Micro Jet VL/EISA 486DX-40

U.S. Micro Jet VL/EISA 486DX-50

U.S. Micro Jet VL/EISA 486DX2-50

U.S. Micro Jet VL/EISA 486DX2-66

U.S. Micro Jet VL/EISA 486SX-25

U.S. Micro Jet VL/PCI 486DX-33

U.S. Micro Jet VL/PCI 486DX2-50

U.S. Micro Jet VL/PCI 486DX2-66

U.S. Micro Jet VL/PCI 486DX4-100

U.S. Micro Jet VL/PCI 486DX4-75

U.S. Micro Jet VL/PCI 486SX-25

Ultra Technologies UL P5 60

Ultra Technologies UL486DX 50

Ultra Technologies UL486DX/2 66

Ultra-Comp 486DX24913

Unidata Power Desk 486 66Mhz PCI

Unique Computers, Ltd. Pentium 60

Unisys CMT 510071

Unisys CMT 513371

Unisys CMT 57571

Unisys CWD 46611

Unisys CWD 51311

Unisys CWD 57511

Unisys CWD 59001

Unisys CWP 510032

Unisys CWP 510062

Unisys CWP 512032

Unisys CWP 512062

Unisys CWP 513332

Unisys CWP 513362

Unisys CWP 515033

Unisys CWP 516633

Unisys CWP 516673

Unisys CWP 520073

Unisys CWP 57532

Unisys CWP 57562

Unisys CWP 59032

Unisys CWP 59062

Unisys NBF 5121042

Unisys NBF 5751041

Unisys NBF 5901041

Unisys Pathway Series 5669

Unisys Pathway Series CWP 410031

Unisys Pathway Series CWP 410032

Unisys Pathway Series CWP 410062

Unisys Pathway Series CWP 46632

Unisys Pathway Series CWP 46662

Unisys Pathway Series CWP 59061

Unisys Pathway Series MDP 56052

Unisys Pathway Series MDP 56652

Unisys Pathway Series PS243-331

Unisys Pathway Series PS243-661

Unisys Pathway Series PS246-331

Unisys Pathway Series PS246-661

Unisys Pathway Series PS255-601

Unisys Pathway Series PSA445-661

Unisys Pathway Series PSA458-601

Unisys PW2 Advantage 3256

Unisys PW2 Advantage 3336

Unisys PW2 Advantage CWP 410061

Unisys PW2 Advantage CWP 46661

Unisys PW2 Advantage Partner ELI 46635

Unisys PW2 Advantage Plus 4668

Unisys SFR 510091

Unisys SFR 616681

Unisys SME 510091

Unisys SME 513391

Unisys SME 516691

Unisys SuperGen Series 3500

Unisys SuperGen Series 4000

Unisys SuperGen Series 4100

Unisys SuperGen Series 6000

Unisys SuperGen Series 6100

Unisys SuperGen Series 7000

Unisys SuperGen Series 7100

Unisys SVD 510071

Unisys SVD 513371

Unisys SVD 516683

Unisys SVE 56681

Unisys SVE 56691-FDD 137

Unisys SVE 590101

Unisys SVI 59071

Unisys U6000/230

Unisys U6000/430

Unisys WIN Labs KP-9600 Pentium 75 Notebook

Unisys WIN Labs Pentium 100 Workstation

Unisys WIN Labs Pentium 120 Workstation

Unisys WIN Labs Pentium 75 Workstation

UNITEK Power Vesa 486DX2

Vektron PCI Power Station P66

Vextrec Technologies P5IPS/133

Vextrec Technologies P5SPV/133

Vextrec Technologies VTI486D66SG

Vextrec Technologies VTI4VL56SGDX4

Vextrec Technologies VTI5PCI100GL

Vextrec Technologies VTI5PCI90GL

Vextrec Technologies VTIP566PCI

Vextrec Technologies VTIP590PCI

Viglen Contender II

Viglen Eisa Express Single Processor.

Viglen Genie 4DX33

Viglen Genie PCI 486DX2/66

Viglen Genie PCI Pentium 66

Viglen Genie PCI Pentium 90

Viglen PCI Pentium 60MHz

Vikomt Monsoon ATTACUS Pentium 90

Virtual Axxess 1590 Pentium

Virtual Axxess 2590S Pentium

Virtual Axxess 4100PCI

Vtech 410M

Vtech 433M

Vtech 450M

Vtech 466M

Vtech 486CS100

Vtech 486CS66

Vtech 486CS66E (AMD)

Vtech 486CS80E (AMD)

Vtech 486CX100

Vtech 486CX66

Vtech 486CX66E (AMD)

Vtech 486CX80E (AMD)

Vtech 486DM-100 (incl. DP and DE Models)

Vtech 486DM-33 (incl DP and DE Models)

Vtech 486DM-33E (incl. DP and DE Models)

Vtech 486DM-40E (incl. DP and DE Models)

Vtech 486DM-50 (incl. DP and DE Models)

Vtech 486DM-50E (incl. DP and DE Models)

Vtech 486DM-66 (incl. DP and DE Models)

Vtech 486DM-S33 (incl. DP and DE models)

Vtech 486DM-S50 (incl. DP and DE Models)

Vtech 486DM100

Vtech 486DM100E (AMD)

Vtech 486DM66

Vtech 486DM66E (AMD)

Vtech 486DM66E (Cyrix V)

Vtech 486DM66E (Cyrix)

Vtech 486DM75

Vtech 486DM80E (AMD)

Vtech 486DM80E (Cyrix V)

Vtech 486DP100

Vtech 486DP100E (AMD)

Vtech 486DP66

Vtech 486DP66E (AMD)

Vtech 486DP66E (Cyrix V)

Vtech 486DP66E (Cyrix)

Vtech 486DP75

Vtech 486DP80E (AMD)

Vtech 486DP80E (Cyrix V)

Vtech 486DX-33

Vtech 486DX-33 ELP

Vtech 486DX-33 Mini

Vtech 486DX-33 Mini 72P

Vtech 486DX-33 Tower

Vtech 486DX-33E Mini

Vtech 486DX2-50 ELP

Vtech 486DX2-50 Mini

Vtech 486DX2-50 Mini 72P

Vtech 486DX2-50 Tower

Vtech 486DX2-50E ELP

Vtech 486DX2-50E Mini

Vtech 486DX2-66 ELP

Vtech 486DX2-66 Mini

Vtech 486DX2-66 Mini 72P

Vtech 486DX2-66 Tower

Vtech 486DX4-100 Mini

Vtech 486SX-25 ELP

Vtech 486SX-25 Mini

Vtech 486SX-33 ELP

Vtech 486SX-33 Mini

Vtech 486SX-33 Mini 72P

Vtech 486SX-33 Tower

Vtech 486VM100

Vtech 486VM100E (AMD)

Vtech 486VM66

Vtech 486VM66E (AMD)

Vtech 486VM66E (Cyrix V)

Vtech 486VM66E (Cyrix)

Vtech 486VM75

Vtech 486VM80E (AMD)

Vtech 486VM80E (Cyrix V)

Vtech 486VP100

Vtech 486VP100E (AMD)

Vtech 486VP66

Vtech 486VP66E (AMD)

Vtech 486VP66E (Cyrix V)

Vtech 486VP66E (Cyrix)

Vtech 486VP75

Vtech 486VP80E (AMD)

Vtech 486VP80E (Cyrix V)

Vtech 560M

Vtech 566M

Vtech 590M

Vtech 590P

Vtech LT432 Notebook

Vtech LT433C Color Notebook

Vtech LT433C Notebook

Vtech LT453C Notebook

Vtech LT473C Notebook

Vtech LT845 Sub-Notebook

Vtech NST 150

Vtech NST 166

Vtech Platinum DM90

Vtech Platinum DP90

Vtech Platinum NS100

Vtech Platinum NS75

Vtech Platinum NS90

Vtech Platinum NST 120

Vtech Platinum NST 133

Vtech Platinum NSV P120

Vtech Platinum NSV P133

Vtech Platinum NSV P150

Vtech Platinum NSV P166

Vtech Platinum NX100

Vtech Platinum NX75

Vtech Platinum NX90

Vtech Platinum RS100

Vtech Platinum RS75

Vtech Platinum RS90

Vtech Platinum RX100

Vtech Platinum RX75

Vtech Platinum RX90

Vtech Plato P54C

Vtech Royal RN100

Vtech Royal RN120

Vtech Royal RN133

Vtech SMP50P

Vtech SMP66P (1p)

Wang DT266

Wang Microsystems PC 350/40C

Western Computer 486V-100 DX4 EISA

Western Computer 486V-100 DX4 VESA

Western Computer 486V-33 DX EISA

Western Computer 486V-33 DX VESA

Western Computer 486V-33 SX VESA

Western Computer 486V-50 DX EISA

Western Computer 486V-50 DX VESA

Western Computer 486V-66 DX2 EISA

Western Computer 486V-66 DX2 VESA

Western Computer 586G 60 EISA/PCI

Western Computer 586G 66 EISA/PCI

Western Computer 586G S90S EISA/PCI

Western Computer WS 486-66DX2 ISA

Western Technology Inc. WT-2100 Pentium 133 Server

Wichman & Partners  ARGUS 486DX2-PCI

Wichman & Partners  ARGUS Pentium 90 PCI

Win Laboratories KP5200 Pentium Notebook 133Mhz

Win Laboratories KP5200 Pentium Notebook 75Mhz

Win Laboratories Pentium 166Mhz Workstation

Win Laboratories WIN P5/75-S

Win Laboratories WIN P5/75-W

Win Laboratories WIN P5120-S

Win Laboratories WIN P5120-W

WIPRO E-590

WIPRO Fusion 510

WIPRO LANDMARK E SQUARE - MODEL 200

WIPRO Super Genius 486DX4-100

Wyse Decision 486se-66DX2

Wyse Decision 486si-66DX2

Wyse Forte` GSV

Wyse Series 6000i, Model 665

X-Bit 486 PCI Pro Series 100

X-Bit 486 PCI Pro Series 486DX2/66

X-Bit 486 VL Pro Series 66

X-Bit Pentium Pro Series 100

X-Bit Pentium Pro Series 90

Zenith Data Systems Desktop/Tower P5-60

Zenith Data Systems Desktop/Tower Pentium 90

Zenith Data Systems Z-386/33E

Zenith Data Systems Z-486/33E

Zenith Data Systems Z-486/33ET

Zenith Data Systems Z-486SX/25E

Zenith Data Systems Z-NOTE GT P75

Zenith Data Systems Z-NOTE GT P90

Zenith Data Systems Z-NOTE MX (Pentium 75MHZ)

Zenith Data Systems Z-NOTEFLEX 486DX2/50

Zenith Data Systems Z-NOTEFLEX 486DX4/75

Zenith Data Systems Z-NOTEFLEX 486SX/33

Zenith Data Systems Z-NOTEFLEX P (P75)

Zenith Data Systems Z-SELECT 100 DX2/66

Zenith Data Systems Z-SELECT 100 XE DX2/50

Zenith Data Systems Z-SELECT 100 XE DX2/66

Zenith Data Systems Z-SELECT 100 XE DX33

Zenith Data Systems Z-SELECT 100 XE DX4/100

Zenith Data Systems Z-SELECT 100 XE SX2/50

Zenith Data Systems Z-SELECT 100 XE SX33

Zenith Data Systems Z-SELECT PT 58660m

Zenith Data Systems Z-SERVER EX 90E Model 2000

Zenith Data Systems Z-SERVER EX P60E Model 1000A (incl. Model 2000A)

Zenith Data Systems Z-SERVER EX P60E Model 500 (incl. Model 1000)

Zenith Data Systems Z-SERVER EX P90E Model 1000

Zenith Data Systems Z-SERVER LT P60E Model 1000A (incl. Model 2000A)

Zenith Data Systems Z-SERVER LT P60E Model 500 (incl. Model 1000)

Zenith Data Systems Z-SERVER MX Pentium 100

Zenith Data Systems Z-SERVER MX Pentium 133

Zenith Data Systems Z-SERVER MX Pentium 166

Zenith Data Systems Z-SERVER WG Pentium 120

Zenith Data Systems Z-SERVER WG Pentium 75

Zenith Data Systems Z-SERVER WX Pentium 120

Zenith Data Systems Z-SERVER WX Pentium 90

Zenith Data Systems Z-Star 486DX2/50

Zenith Data Systems Z-Star EX  486 DX2\50

Zenith Data Systems Z-Star EX  486DX4/75

Zenith Data Systems Z-STATION 500 Model 433

Zenith Data Systems Z-STATION 500 Model 450

Zenith Data Systems Z-STATION 510 DX2/50

Zenith Data Systems Z-STATION 510 DX2/66

Zenith Data Systems Z-STATION 510 DX33

Zenith Data Systems Z-STATION 510 DX4/100

Zenith Data Systems Z-STATION 510 SX2/50

Zenith Data Systems Z-STATION 510 SX33

Zenith Data Systems Z-STATION EX 586/90M

Zenith Data Systems Z-STATION EX II 586/90M

Zenith Data Systems Z-STATION GT (Pentium 100)

Zenith Data Systems Z-STATION GT (Pentium 120)

Zenith Data Systems Z-STATION GT (Pentium 133)

Zenith Data Systems Z-STATION GT (Pentium 150)

Zenith Data Systems Z-STATION GT (Pentium 166)

Zenith Data Systems Z-STATION GT (Pentium 75)

Zenith Data Systems Z-STATION GT 500 (Pentium 100)

Zenith Data Systems Z-STATION GT 500 (Pentium 133)

Zenith Data Systems Z-STATION GT 500 (Pentium 166)

Zenith Data Systems Z-STATION GT 500 (Pentium 200)

Zenith Data Systems Z-STATION LC  (486DX2/66)

Zenith Data Systems Z-STATION LC  (Pentium75)

Zenith Data Systems Z-STATION LX2 (Pentium 100)

Zenith Data Systems Z-STATION LX2 (Pentium 133)

Zenith Data Systems Z-STATION LX2 (Pentium 166)

Zenith Data Systems Z-STATION LX2 (Pentium 200)

Zenith Data Systems Z-STATION VP (486DX2/66)

Zenith Data Systems Z-Station VP (486DX4/100)

Zenith Data Systems Z-STATION VP Pentium 100

Zenith Data Systems Z-STATION VP Pentium 120

Zenith Data Systems Z-STATION VP Pentium 133

Zenith Data Systems Z-STATION VP Pentium 75

Zenith Data Systems Z-STATION VP Pentium 90

ZEOS 486DX-33ISA

ZEOS 486DX-50

ZEOS 486DX2-66 (PCI)

ZEOS Meridian 400 486DX4-100

ZEOS Pantera 486DX2-50

ZEOS Pantera 486DX2-66

ZEOS Pantera 486DX4-100

ZEOS Pantera Pentium-100

ZEOS Pantera Pentium-120

ZEOS Pantera Pentium-166

ZEOS Pantera Pentium-60

ZEOS Pantera Pentium-75

ZEOS Pantera Pentium-90

Zymos Computer AXXESS 486 VLG-266

Zymos Computer AXXESS 486 VPCI-266

Zymos Computer AXXESS Pentium XP-100

Zymos Computer AXXESS Pentium XP-120


Windows NT 3.51 Tested MIPS RISC Architecture Computers

The following MIPS RISC architecture uniprocessor systems have been tested with Windows NT 3.51 only , but are expected to run Windows NT 4.0.

ACER ARC1

Carrera R4000

DeskStation Technology Evolution E4400 RISC PC

DeskStation Technology Evolution R4000 RISC PC

DeskStation Technology Tyne v4633x RISC PC

NEC Express RISCserver 150MHz

NeTpower FASTseries MP 200MHz

NeTpower FASTseries SMP Server 200MHz

NeTpower FASTseries SP

NeTpower NeTstation 100

Olivetti PWS4000

Progen R4400-50/100

Shuttle RiscPC 4475

UniMicro RISCStation 4400NT


Windows NT 3.51 Tested Digital Alpha RISC Architecture Computers

The following Digital Alpha RISC architecture uniprocessor systems have been tested with Windows NT 3.51 only, but are expected to run Windows NT 4.0.

Aspen Alpine 166 RS

Aspen Alpine 233 XS

Carrera Cobra 275

Carrera Cobra 275 with Gamaray 4500

Carrera Cobra EV5-266

Carrera Cobra EV5-266 with Gamaray 5000

Carrera Cobra EV5-300

Carrera Cobra EV5-300 with Gamaray 5000

Carrera Cobra EV5-333

Carrera Cobra EV5-333 with Gamaray 5000

Carrera Cobra EV56-366

Carrera Cobra EV56-366 with Gamaray 5600

Digital Equipment Corp. AlphaServer 1000 5/300

Digital Equipment Corp. AlphaStation 255 4/266

Digital Equipment Corp. DECpc XL AXP 233

Polywell Alpha 275


Technical Notes

The Windows NT Driver Library is provided on the Windows NT CD-ROM in the \DRVLIB directory, as well as several locations for electronic transmission.

     1	This device requires a driver from the \DRVLIB directory on the Windows NT CD-ROM, or the Windows NT Driver Library.

     2	This system has been tested with the NeoMagic video driver located in the \drvlib\video\x86\neomagic directory located on the Windows NT 4.0 CD-ROM.

     3	This system has been tested with the ESS audio driver located in the \drvlib\audio\ess directory located on the Windows NT 4.0 CD-ROM.

     4	PCMCIA network adapters not supported when configured at IRQ 10 on this model.

     5	This system has been tested with the Chips & Technologies video driver located in the \drvlib\video\x86\chips directory located on the Windows NT 4.0 CD-ROM.

     6	This system has been tested with the the Trident 9320 video driver located in the \drvlib\video\x86\trident directory located on the Windows NT 4.0 CD-ROM.

     7	This system has been tested with the IBM Mwave for Thinkpad driver located in the \drvlib\mwave directory located on the Windows NT 4.0 CD-ROM.  Refer to Windows NT 4.0 Release notes for installation instructions.

     8	COMPAQ ProLiant 5000 systems with Bios revisions dated 06/04/96 or earlier may experience shutdown/restart problems with Windows NT 4.0.  If this problem is encountered then upon completing a shutdown a powercycle is required to successfully reboot the system.  Contact COMPAQ for a BIOS upgrade.

     9	Supported on x86, Alpha, and PowerPC platforms only.

    10	For best performance, this adapter should be configured to IRQ-11.

    11	This adapter is only supported for use with IBM PowerPC Systems.

    12	Tested with firmware revisions 3.10 and 3.20.

    13	This adapter must be configured for synchronous I/O to work with the Quantum xp32150 hard disk drive.

    14	This adapter requires an active terminator for proper performance.

    15	This adapter must be configured for 5 Mb/second asynchronous I/O to work with listed CD-ROM drives from NEC.

    16	This adapter must be configured for 5 Mb/second asynchronous I/O to work with listed CD-ROM drives from Chinon, Hitachi, and NEC.

    17	AIC-7770c and AIC-7770e are supported.

    18	Tested with the Digital Equipment Corp. Prioris XL Server 566.

    19	Removable media drives that do not implement media locking are not supported with write-cache enabled.

    20	Tested with COMPAQ Deskpro XL 466 and HP Vectra XU 5/90c.

    21	Scanners are not supported with this adapter.

    22	Tested with Firmware revision 4.25J and BIOS revision 4.92E.

    23	Tested with the COMPAQ ProLiant 4500 Model 5/100(4p).

    24	Tested with the COMPAQ ProLiant 1500 Model 5/166(2p).

    25	Tested with Firmware revision 7C.

    26	To configure this adapter in MIPS systems, the DPT Storage Manager Configuration Utility, MIPS version, is required.  See the Release Notes for more information.

    27	To configure this adapter in PowerPC systems, the DPT Storage Manager Configuration Utility, PowerPC version, is required.  See the Release Notes for more information.

    28	To use removable media drives with this adapter, disable disk caching for the drive with DPT's Storage Manager utility.

    29	This adapter cannot be installed during Setup on MIPS systems.  Use the SCSI Adapter applet in the Control Panel to add this adapter after NT is installed.

    30	Some non-wide SCSI devices may require the disabling of wide transfer negotiations to function properly.

    31	To use this adapter, at least one device on the bus must provide termination power.

    32	Refer to SETUP.TXT for information on configuring this adapter.

    33	Removable media is not supported with this adapter.

    34	This adapter does not support the WangTek 5150es tape drive.

    35	SCSI BIOS dated before 1991 requires PS/2 Reference Diskette version 1.12 or later.

    36	This adapter cannot be used for CD Setup.  To install Windows NT with this adapter, use the WINNT.EXE Setup method.

    37	Tape drives are not supported with this adapter.

    38	The driver for this adapter defaults to IRQ-15.

    39	Adapter requires either a DOS boot partition or a Mylex-configured partition less than 2gb prior to installation of Windows NT.  See Knowledge Base article #Q143141 for specific details.

    40	Tested with NEC RISCstation 2000.

    41	Tested with Dell Omniplex 560.

    42	Tested with NeTpower FASTseries MP 2x150MHz.

    43	Tested with Digital Equipment Corp. AlphaServer 2100 4/200 (Digital Equipment Corp. 2100 Server model A500MP).

    44	Tested with COMPAQ Portable 486c.

    45	Tested with NCR System 3000 Model 3360.

    46	This adapter is only supported on IRQ-5.

    47	Tested with firmware revision 005.

    48	Requires firmware revision 008.

    49	Not supported with the NCR 8250S SCSI controller.

    50	This CD-R drive was tested for CD read capabilities only.

    51	Users may encounter problems with some CD-R (recordable) discs.

    52	Requires firmware revision 2.5 for proper operation, please contact NEC Technical support (800-388-8888) for assistance.

    53	This drive is not supported on the Alpha platform for this release.

    54	This drive is not supported with the IBM PS/2 Microchannel SCSI Host Adapter.

    55	Tested with firmware revision R.

    56	This drive is not supported on the PowerPC platform for this release.

    57	Requires firmware revision W11 or greater to function properly with Windows NT.

    58	Supported with CD-ROM drives based on Panasonic CR-52x and CR-56x models only.

    59	Requires firmware revision S02 or greater to function properly with Windows NT.

    60	Tested with firmware revision BA02 and BA01.

    61	Tested with firmware revision BB02, BG01, and BB03.

    62	Tested with firmware revision 0.2f and 1.0c.

    63	This drive is not supported with the Adaptec AHA-1640 adapter.

    64	NTBackup does not support autoloaders.  This drive is supported in single-tape operation only.

    65	Requires firmware version 484 or later for proper operation.

    66	This drive is not supported with the Future Domain TMC-850M(ER).

    67	This drive is not supported on the MIPS platform for this release.

    68	Tested with firmware revision ARCHIVE IBM4326NP/RP !D04AP

    69	This drive is not supported with the IBM PS/2 Microchannel SCSI Host Adapter (with cache).

    70	This drive is not supported with the Adaptec AHA-1510 adapter.

    71	The Future Domain TMC-1670 with bios version 3.0 requires that the bios be disabled when used with this drive.

    72	Compression jumper must be in enabled position on this drive.

    73	This drive is not supported with the UltraStor 24fa adapter.

    74	Requires firmware revision DEC9314

    75	Tested with firmware revision DEC4318

    76	This drive is not supported with the Adaptec AHA-1742A adapter.

    77	Firmware version 1.05 is required for proper operation.

    78	This drive is not supported on the MIPS platform.

    79	Formatting a Floppy (QIC-117) 80/3010/3020/Travan tape drive may require disconnecting from the network to enable tape to format properly.

    80	For best results use pre-formatted tapes.

    81	After inserting a tape, wait until the drive light is off before any operation is started.

    82	If an incompatible tape cartridge is inserted into a drive a "Bad Tape" error will occur.  If a QIC-3020 tape is inserted into a drive functioning in QIC-3010 mode, a "Bad Tape" error will occur.

    83	This tape drive requires a floppy controller capable of transferring 1mbps or greater for QIC-3020 support.  Otherwise the drive will work in QIC-3010 mode.  1 and .5 mbps controllers can be verified by looking in HKEY_LOCAL_MACHINE\hardware\devicemap\tape\unit 0 key (after the backup software has been run at least once).

    84	The driver for this controller is provided on the Windows NT 4.0 CDROM in the directory \drvlib\storage\fenb\cms.

    85	The driver for this controller is provided on the Windows NT 4.0 CDROM in the directory \drvlib\storage\fenb\conner.

    86	This drive must have the on-board cache disabled to function properly with Windows NT 4.0.

    87	Tested on X86 only.

    88	This drive is not supported with the Windows NT boot floppy setup method.

    89	Requires DeskScan II 2.2 for proper operation.  Please see the Release Notes for further information.

    90	Supported in GreyScale mode only with DeskScan II 2.2.

    91	Differential device.  Tested with DEC KZPSA on DEC Alpha.  Tested with QLogic PCI, BusLogic 956D, and Adaptec 2944W adapters on x86 systems.

    92	Tested with COMPAQ SmartCache2 adapter only.

    93	Tested with DEC KZPSA-BB SCSI controller only.

    94	Differential device.  Tested with QLogic PCI, BusLogic 956D, and Adaptec 2944W adapters on x86 systems.

    95	Requires firmware version 1.15.15s for proper performance.

    96	Versions of this board based on the 688LX or 68003 chip require more than 1mb of video memory to support 800x600x65k.

    97	Some revisions of this board are not supported under Windows NT.  Please see the Release Notes on how to identify these boards.

    98	The AVGA driver will occasionally present "snow" on the screen at 800x600.

    99	This adapter only supported in COMPAQ DeskPro product line.

   100	Refer to SETUP.TXT on the Windows NT CDROM for information on configuring this machine/device before installation.

   101	Requires Firmware revision E. BIOS 3.09 for proper performance.

   102	Tested with NCR System 3000 Model 3445.

   103	Tested with NCR System 3000 Model 3350.

   104	This card is not supported on the Alcor platform for this release.

   105	This card requires the use of AlphaBIOS 5.2 or greater.

   106	This adapter is only supported on the IBM Power Personal Developer's ToolBox Program Standard Desktop System.

   107	Tested as on-board video chipset.

   108	Random pixel corruption may occur on Pentium based systems.

   109	Some laptops using this chipset may experience irregularities in VDM apps after several repeated mode changes.

   110	65k colors are supported with a 565 DAC, 32k colors with a 555 DAC.

   111	The S3 911/911a/924 Chipset will not work in Alpha using the Alpha BIOS Firmware for this release

   112	Some older 928 chips do not support 800x600xTRUE with 2Mb of RAM.

   113	Not all video board/monitor combinations are able to properly display 1600x1200.

   114	This adapter has been verified to work with Network Monitor

   115	Plug and Play mode is not supported on this adapter.  Use the manufacturer's configuration utility to disable PnP functionality.

   116	This adapter may not function properly on fast Pentium or PentiumPro systems.

   117	This adapter is not supported on the COMPAQ ProSignia 500.

   118	This adapter uses the 'Novell NE2000 compatible Adapter' driver.

   119	This adapter uses the 'AMD PCNET Family Ethernet Adapter' driver.

   120	FDDI tested only.

   121	This adapter is not supported on Motorola PowerPC models.

   122	Not supported with Multiprocessor MIPS systems.

   123	This adapter is not supported with DMA mode enabled.

   124	Not compatible with IBM Thinkpad 700.

   125	Non-bidirectional parallel port machines may suffer performance degradation when the driver for this adapter is installed.

   126	The Toshiba 4700CS and 4800CT are not supported in Bi-directional mode with this adapter.

   127	External TA(CSU/DSU/ISU) required.

   128	Please see the Windows NT 4.0 Release Notes for more information on installation of the driver for this hardware.

   129	No support for Advanced Wave-Table Effects.

   130	FM Synthesis not supported on Cards with 1747 OPL FM Synthesis chip.

   131	Not supported in Sound Blaster 1.x compatibility mode.

   132	Supported in Sound Blaster 1.x compatibility mode.

   133	This device requires a driver from the Online Windows NT Driver Library(WNTDL).

   134	Does not support SPACE or MARK Parity or 1.5 stop bits.

   135	Tested as standard serial ports only.

   136	Supported on x86 only.

   137	System requires ALR EISA Config utility 2.13 or later to enable COM ports in Windows NT.

   138	External Cache must be disabled to run Windows NT.

   139	Requires AST BIOS revision 1.02 to install and run Windows NT.

   140	This system was tested with NT 3.51 Service Pack-3.

   141	Must copy ABIOS.SYS and *.BIO from reference diskette to root directory of boot drive to install Windows NT on this system.

   142	Requires the IBM RAID Controller v2.0 driver located in Windows NT Driver Library.

   143	This system only supports 640x480x16 video resolution.

   144	Contact Panasonic at 1-800-LAPTOP5 for CD-ROM compatibility with Windows NT 3.51.

   145	To install Windows NT on this system SCSI detection must be skipped during setup.

   146	Refer to setup.txt to properly configure this system for printing in Windows NT.

   147	Contact the manufacturer for information on running Windows NT on this machine.

   148	This model has firmware support for third party add-in video(INT 10).


Disclaimer
While we have endeavored to supply as complete and accurate a list as possible, MICROSOFT MAKES NO WARRANTIES, EXPRESS OR IMPLIED, AS TO THE COMPLETENESS AND ACCURACY OF THIS LIST.  This list does not constitute an endorsement of any particular manufacturer.

Microsoft and BallPoint are registered trademarks and Windows and Windows NT are trademarks of Microsoft Corporation


1	This device requires a driver from the \DRVLIB directory on the Windows NT CD-ROM, or the Windows NT Driver Library.


2	This system has been tested with the NeoMagic video driver located in the \drvlib\video\x86\neomagic directory located on the Windows NT 4.0 CD-ROM.


3	This system has been tested with the ESS audio driver located in the \drvlib\audio\ess directory located on the Windows NT 4.0 CD-ROM.


4	PCMCIA network adapters not supported when configured at IRQ 10 on this model.


5	This system has been tested with the Chips & Technologies video driver located in the \drvlib\video\x86\chips directory located on the Windows NT 4.0 CD-ROM.


6	This system has been tested with the the Trident 9320 video driver located in the \drvlib\video\x86\trident directory located on the Windows NT 4.0 CD-ROM.


7	This system has been tested with the IBM Mwave for Thinkpad driver located in the \drvlib\mwave directory located on the Windows NT 4.0 CD-ROM.  Refer to Windows NT 4.0 Release notes for installation instructions.


8	COMPAQ ProLiant 5000 systems with Bios revisions dated 06/04/96 or earlier may experience shutdown/restart problems with Windows NT 4.0.  If this problem is encountered then upon completing a shutdown a powercycle is required to successfully reboot the system.  Contact COMPAQ for a BIOS upgrade.


9	Supported on x86, Alpha, and PowerPC platforms only.


10	For best performance, this adapter should be configured to IRQ-11.


11	This adapter is only supported for use with IBM PowerPC Systems.


12	Tested with firmware revisions 3.10 and 3.20.


13	This adapter must be configured for synchronous I/O to work with the Quantum xp32150 hard disk drive.


14	This adapter requires an active terminator for proper performance.


15	This adapter must be configured for 5 Mb/second asynchronous I/O to work with listed CD-ROM drives from NEC.


16	This adapter must be configured for 5 Mb/second asynchronous I/O to work with listed CD-ROM drives from Chinon, Hitachi, and NEC.


17	AIC-7770c and AIC-7770e are supported.


18	Tested with the Digital Equipment Corp. Prioris XL Server 566.


19	Removable media drives that do not implement media locking are not supported with write-cache enabled.


20	Tested with COMPAQ Deskpro XL 466 and HP Vectra XU 5/90c.


21	Scanners are not supported with this adapter.


22	Tested with Firmware revision 4.25J and BIOS revision 4.92E.


23	Tested with the COMPAQ ProLiant 4500 Model 5/100(4p).


24	Tested with the COMPAQ ProLiant 1500 Model 5/166(2p).


25	Tested with Firmware revision 7C.


26	To configure this adapter in MIPS systems, the DPT Storage Manager Configuration Utility, MIPS version, is required.  See the Release Notes for more information.


27	To configure this adapter in PowerPC systems, the DPT Storage Manager Configuration Utility, PowerPC version, is required.  See the Release Notes for more information.


28	To use removable media drives with this adapter, disable disk caching for the drive with DPT's Storage Manager utility.


29	This adapter cannot be installed during Setup on MIPS systems.  Use the SCSI Adapter applet in the Control Panel to add this adapter after NT is installed.


30	Some non-wide SCSI devices may require the disabling of wide transfer negotiations to function properly.


31	To use this adapter, at least one device on the bus must provide termination power.


32	Refer to SETUP.TXT for information on configuring this adapter.


33	Removable media is not supported with this adapter.


34	This adapter does not support the WangTek 5150es tape drive.


35	SCSI BIOS dated before 1991 requires PS/2 Reference Diskette version 1.12 or later.


36	This adapter cannot be used for CD Setup.  To install Windows NT with this adapter, use the WINNT.EXE Setup method.


37	Tape drives are not supported with this adapter.


38	The driver for this adapter defaults to IRQ-15.


39	Adapter requires either a DOS boot partition or a Mylex-configured partition less than 2gb prior to installation of Windows NT.  See Knowledge Base article #Q143141 for specific details.


40	Tested with NEC RISCstation 2000.


41	Tested with Dell Omniplex 560.


42	Tested with NeTpower FASTseries MP 2x150MHz.


43	Tested with Digital Equipment Corp. AlphaServer 2100 4/200 (Digital Equipment Corp. 2100 Server model A500MP).


44	Tested with COMPAQ Portable 486c.


45	Tested with NCR System 3000 Model 3360.


46	This adapter is only supported on IRQ-5.


47	Tested with firmware revision 005.


48	Requires firmware revision 008.


49	Not supported with the NCR 8250S SCSI controller.


50	This CD-R drive was tested for CD read capabilities only.


51	Users may encounter problems with some CD-R (recordable) discs.


52	Requires firmware revision 2.5 for proper operation, please contact NEC Technical support (800-388-8888) for assistance.


53	This drive is not supported on the Alpha platform for this release.


54	This drive is not supported with the IBM PS/2 Microchannel SCSI Host Adapter.


55	Tested with firmware revision R.


56	This drive is not supported on the PowerPC platform for this release.


57	Requires firmware revision W11 or greater to function properly with Windows NT.


58	Supported with CD-ROM drives based on Panasonic CR-52x and CR-56x models only.


59	Requires firmware revision S02 or greater to function properly with Windows NT.


60	Tested with firmware revision BA02 and BA01.


61	Tested with firmware revision BB02, BG01, and BB03.


62	Tested with firmware revision 0.2f and 1.0c.


63	This drive is not supported with the Adaptec AHA-1640 adapter.


64	NTBackup does not support autoloaders.  This drive is supported in single-tape operation only.


65	Requires firmware version 484 or later for proper operation.


66	This drive is not supported with the Future Domain TMC-850M(ER).


67	This drive is not supported on the MIPS platform for this release.


68	Tested with firmware revision ARCHIVE IBM4326NP/RP !D04AP


69	This drive is not supported with the IBM PS/2 Microchannel SCSI Host Adapter (with cache).


70	This drive is not supported with the Adaptec AHA-1510 adapter.


71	The Future Domain TMC-1670 with bios version 3.0 requires that the bios be disabled when used with this drive.


72	Compression jumper must be in enabled position on this drive.


73	This drive is not supported with the UltraStor 24fa adapter.


74	Requires firmware revision DEC9314


75	Tested with firmware revision DEC4318


76	This drive is not supported with the Adaptec AHA-1742A adapter.


77	Firmware version 1.05 is required for proper operation.


78	This drive is not supported on the MIPS platform.


79	Formatting a Floppy (QIC-117) 80/3010/3020/Travan tape drive may require disconnecting from the network to enable tape to format properly.


80	For best results use pre-formatted tapes.


81	After inserting a tape, wait until the drive light is off before any operation is started.


82	If an incompatible tape cartridge is inserted into a drive a "Bad Tape" error will occur.  If a QIC-3020 tape is inserted into a drive functioning in QIC-3010 mode, a "Bad Tape" error will occur.


83	This tape drive requires a floppy controller capable of transferring 1mbps or greater for QIC-3020 support.  Otherwise the drive will work in QIC-3010 mode.  1 and .5 mbps controllers can be verified by looking in HKEY_LOCAL_MACHINE\hardware\devicemap\tape\unit 0 key (after the backup software has been run at least once).


84	The driver for this controller is provided on the Windows NT 4.0 CDROM in the directory \drvlib\storage\fenb\cms.


85	The driver for this controller is provided on the Windows NT 4.0 CDROM in the directory \drvlib\storage\fenb\conner.


86	This drive must have the on-board cache disabled to function properly with Windows NT 4.0.


87	Tested on X86 only.


88	This drive is not supported with the Windows NT boot floppy setup method.


89	Requires DeskScan II 2.2 for proper operation.  Please see the Release Notes for further information.


90	Supported in GreyScale mode only with DeskScan II 2.2.


91	Differential device.  Tested with DEC KZPSA on DEC Alpha.  Tested with QLogic PCI, BusLogic 956D, and Adaptec 2944W adapters on x86 systems.


92	Tested with COMPAQ SmartCache2 adapter only.


93	Tested with DEC KZPSA-BB SCSI controller only.


94	Differential device.  Tested with QLogic PCI, BusLogic 956D, and Adaptec 2944W adapters on x86 systems.


95	Requires firmware version 1.15.15s for proper performance.


96	Versions of this board based on the 688LX or 68003 chip require more than 1mb of video memory to support 800x600x65k.


97	Some revisions of this board are not supported under Windows NT.  Please see the Release Notes on how to identify these boards.


98	The AVGA driver will occasionally present "snow" on the screen at 800x600.


99	This adapter only supported in COMPAQ DeskPro product line.


100	Refer to SETUP.TXT on the Windows NT CDROM for information on configuring this machine/device before installation.


101	Requires Firmware revision E. BIOS 3.09 for proper performance.


102	Tested with NCR System 3000 Model 3445.


103	Tested with NCR System 3000 Model 3350.


104	This card is not supported on the Alcor platform for this release.


105	This card requires the use of AlphaBIOS 5.2 or greater.


106	This adapter is only supported on the IBM Power Personal Developer's ToolBox Program Standard Desktop System.


107	Tested as on-board video chipset.


108	Random pixel corruption may occur on Pentium based systems.


109	Some laptops using this chipset may experience irregularities in VDM apps after several repeated mode changes.


110	65k colors are supported with a 565 DAC, 32k colors with a 555 DAC.


111	The S3 911/911a/924 Chipset will not work in Alpha using the Alpha BIOS Firmware for this release


112	Some older 928 chips do not support 800x600xTRUE with 2Mb of RAM.


113	Not all video board/monitor combinations are able to properly display 1600x1200.


114	This adapter has been verified to work with Network Monitor


115	Plug and Play mode is not supported on this adapter.  Use the manufacturer's configuration utility to disable PnP functionality.


116	This adapter may not function properly on fast Pentium or PentiumPro systems.


117	This adapter is not supported on the COMPAQ ProSignia 500.


118	This adapter uses the 'Novell NE2000 compatible Adapter' driver.


119	This adapter uses the 'AMD PCNET Family Ethernet Adapter' driver.


120	FDDI tested only.


121	This adapter is not supported on Motorola PowerPC models.


122	Not supported with Multiprocessor MIPS systems.


123	This adapter is not supported with DMA mode enabled.


124	Not compatible with IBM Thinkpad 700.


125	Non-bidirectional parallel port machines may suffer performance degradation when the driver for this adapter is installed.


126	The Toshiba 4700CS and 4800CT are not supported in Bi-directional mode with this adapter.


127	External TA(CSU/DSU/ISU) required.


128	Please see the Windows NT 4.0 Release Notes for more information on installation of the driver for this hardware.


129	No support for Advanced Wave-Table Effects.


130	FM Synthesis not supported on Cards with 1747 OPL FM Synthesis chip.


131	Not supported in Sound Blaster 1.x compatibility mode.


132	Supported in Sound Blaster 1.x compatibility mode.


133	This device requires a driver from the Online Windows NT Driver Library(WNTDL).


134	Does not support SPACE or MARK Parity or 1.5 stop bits.


135	Tested as standard serial ports only.


136	Supported on x86 only.


137	System requires ALR EISA Config utility 2.13 or later to enable COM ports in Windows NT.


138	External Cache must be disabled to run Windows NT.


139	Requires AST BIOS revision 1.02 to install and run Windows NT.


140	This system was tested with NT 3.51 Service Pack-3.


141	Must copy ABIOS.SYS and *.BIO from reference diskette to root directory of boot drive to install Windows NT on this system.


142	Requires the IBM RAID Controller v2.0 driver located in Windows NT Driver Library.


143	This system only supports 640x480x16 video resolution.


144	Contact Panasonic at 1-800-LAPTOP5 for CD-ROM compatibility with Windows NT 3.51.


145	To install Windows NT on this system SCSI detection must be skipped during setup.


146	Refer to setup.txt to properly configure this system for printing in Windows NT.


147	Contact the manufacturer for information on running Windows NT on this machine.


148	This model has firmware support for third party add-in video(INT 10).


 3	This system has been tested with the ESS audio driver located in the \drvlib\audio\ess directory located on the Windows NT 4.0 CD-ROM.

 4	PCMCIA network adapters not supported when configured at IRQ 10 on this model.


 4	PCMCIA network adapters not supported when configured at IRQ 10 on this model.

 5	This system has been tested with the Chips & Technologies video driver located in the \drvlib\video\x86\chips directory located on the Windows NT 4.0 CD-ROM.


 3	This system has been tested with the ESS audio driver located in the \drvlib\audio\ess directory located on the Windows NT 4.0 CD-ROM.

 6	This system has been tested with the the Trident 9320 video driver located in the \drvlib\video\x86\trident directory located on the Windows NT 4.0 CD-ROM.


 3	This system has been tested with the ESS audio driver located in the \drvlib\audio\ess directory located on the Windows NT 4.0 CD-ROM.

 5	This system has been tested with the Chips & Technologies video driver located in the \drvlib\video\x86\chips directory located on the Windows NT 4.0 CD-ROM.


 6	This system has been tested with the the Trident 9320 video driver located in the \drvlib\video\x86\trident directory located on the Windows NT 4.0 CD-ROM.

 7	This system has been tested with the IBM Mwave for Thinkpad driver located in the \drvlib\mwave directory located on the Windows NT 4.0 CD-ROM.  Refer to Windows NT 4.0 Release notes for installation instructions.


 4	PCMCIA network adapters not supported when configured at IRQ 10 on this model.

 7	This system has been tested with the IBM Mwave for Thinkpad driver located in the \drvlib\mwave directory located on the Windows NT 4.0 CD-ROM.  Refer to Windows NT 4.0 Release notes for installation instructions.


 12	Tested with firmware revisions 3.10 and 3.20.

 13	This adapter must be configured for synchronous I/O to work with the Quantum xp32150 hard disk drive.


 19	Removable media drives that do not implement media locking are not supported with write-cache enabled.

 25	Tested with Firmware revision 7C.


 11	This adapter is only supported for use with IBM PowerPC Systems.

 27	To configure this adapter in PowerPC systems, the DPT Storage Manager Configuration Utility, PowerPC version, is required.  See the Release Notes for more information.


 31	To use this adapter, at least one device on the bus must provide termination power.

 32	Refer to SETUP.TXT for information on configuring this adapter.

 33	Removable media is not supported with this adapter.


 31	To use this adapter, at least one device on the bus must provide termination power.

 32	Refer to SETUP.TXT for information on configuring this adapter.


 1	This device requires a driver from the \DRVLIB directory on the Windows NT CD-ROM, or the Windows NT Driver Library.

 21	Scanners are not supported with this adapter.

 36	This adapter cannot be used for CD Setup.  To install Windows NT with this adapter, use the WINNT.EXE Setup method.

 37	Tape drives are not supported with this adapter.


 1	This device requires a driver from the \DRVLIB directory on the Windows NT CD-ROM, or the Windows NT Driver Library.

 37	Tape drives are not supported with this adapter.

 38	The driver for this adapter defaults to IRQ-15.


 1	This device requires a driver from the \DRVLIB directory on the Windows NT CD-ROM, or the Windows NT Driver Library.

 31	To use this adapter, at least one device on the bus must provide termination power.

 37	Tape drives are not supported with this adapter.

 46	This adapter is only supported on IRQ-5.


 1	This device requires a driver from the \DRVLIB directory on the Windows NT CD-ROM, or the Windows NT Driver Library.

 31	To use this adapter, at least one device on the bus must provide termination power.

 46	This adapter is only supported on IRQ-5.


 50	This CD-R drive was tested for CD read capabilities only.

 51	Users may encounter problems with some CD-R (recordable) discs.

 56	This drive is not supported on the PowerPC platform for this release.


 51	Users may encounter problems with some CD-R (recordable) discs.

 52	Requires firmware revision 2.5 for proper operation, please contact NEC Technical support (800-388-8888) for assistance.


 54	This drive is not supported with the IBM PS/2 Microchannel SCSI Host Adapter.

 55	Tested with firmware revision R.


 53	This drive is not supported on the Alpha platform for this release.

 56	This drive is not supported on the PowerPC platform for this release.


 49	Not supported with the NCR 8250S SCSI controller.

 53	This drive is not supported on the Alpha platform for this release.


 53	This drive is not supported on the Alpha platform for this release.

 56	This drive is not supported on the PowerPC platform for this release.

 64	NTBackup does not support autoloaders.  This drive is supported in single-tape operation only.


 53	This drive is not supported on the Alpha platform for this release.

 66	This drive is not supported with the Future Domain TMC-850M(ER).


 56	This drive is not supported on the PowerPC platform for this release.

 69	This drive is not supported with the IBM PS/2 Microchannel SCSI Host Adapter (with cache).

 70	This drive is not supported with the Adaptec AHA-1510 adapter.

 71	The Future Domain TMC-1670 with bios version 3.0 requires that the bios be disabled when used with this drive.


 53	This drive is not supported on the Alpha platform for this release.

 69	This drive is not supported with the IBM PS/2 Microchannel SCSI Host Adapter (with cache).

 70	This drive is not supported with the Adaptec AHA-1510 adapter.

 71	The Future Domain TMC-1670 with bios version 3.0 requires that the bios be disabled when used with this drive.

 72	Compression jumper must be in enabled position on this drive.


 69	This drive is not supported with the IBM PS/2 Microchannel SCSI Host Adapter (with cache).

 70	This drive is not supported with the Adaptec AHA-1510 adapter.

 71	The Future Domain TMC-1670 with bios version 3.0 requires that the bios be disabled when used with this drive.

 72	Compression jumper must be in enabled position on this drive.


 69	This drive is not supported with the IBM PS/2 Microchannel SCSI Host Adapter (with cache).

 70	This drive is not supported with the Adaptec AHA-1510 adapter.

 71	The Future Domain TMC-1670 with bios version 3.0 requires that the bios be disabled when used with this drive.


 53	This drive is not supported on the Alpha platform for this release.

 74	Requires firmware revision DEC9314


 53	This drive is not supported on the Alpha platform for this release.

 76	This drive is not supported with the Adaptec AHA-1742A adapter.


 69	This drive is not supported with the IBM PS/2 Microchannel SCSI Host Adapter (with cache).

 76	This drive is not supported with the Adaptec AHA-1742A adapter.


 79	Formatting a Floppy (QIC-117) 80/3010/3020/Travan tape drive may require disconnecting from the network to enable tape to format properly.

 80	For best results use pre-formatted tapes.

 81	After inserting a tape, wait until the drive light is off before any operation is started.

 82	If an incompatible tape cartridge is inserted into a drive a "Bad Tape" error will occur.  If a QIC-3020 tape is inserted into a drive functioning in QIC-3010 mode, a "Bad Tape" error will occur.


 89	Requires DeskScan II 2.2 for proper operation.  Please see the Release Notes for further information.

 90	Supported in GreyScale mode only with DeskScan II 2.2.


 1	This device requires a driver from the \DRVLIB directory on the Windows NT CD-ROM, or the Windows NT Driver Library.

 98	The AVGA driver will occasionally present "snow" on the screen at 800x600.


 108	Random pixel corruption may occur on Pentium based systems.

 111	The S3 911/911a/924 Chipset will not work in Alpha using the Alpha BIOS Firmware for this release


 110	65k colors are supported with a 565 DAC, 32k colors with a 555 DAC.

 112	Some older 928 chips do not support 800x600xTRUE with 2Mb of RAM.


 114	This adapter has been verified to work with Network Monitor

 115	Plug and Play mode is not supported on this adapter.  Use the manufacturer's configuration utility to disable PnP functionality.


 1	This device requires a driver from the \DRVLIB directory on the Windows NT CD-ROM, or the Windows NT Driver Library.

 116	This adapter may not function properly on fast Pentium or PentiumPro systems.


 1	This device requires a driver from the \DRVLIB directory on the Windows NT CD-ROM, or the Windows NT Driver Library.

 114	This adapter has been verified to work with Network Monitor

 117	This adapter is not supported on the COMPAQ ProSignia 500.


 1	This device requires a driver from the \DRVLIB directory on the Windows NT CD-ROM, or the Windows NT Driver Library.

 120	FDDI tested only.


 1	This device requires a driver from the \DRVLIB directory on the Windows NT CD-ROM, or the Windows NT Driver Library.

 115	Plug and Play mode is not supported on this adapter.  Use the manufacturer's configuration utility to disable PnP functionality.


 1	This device requires a driver from the \DRVLIB directory on the Windows NT CD-ROM, or the Windows NT Driver Library.

 123	This adapter is not supported with DMA mode enabled.


 1	This device requires a driver from the \DRVLIB directory on the Windows NT CD-ROM, or the Windows NT Driver Library.

 114	This adapter has been verified to work with Network Monitor


 1	This device requires a driver from the \DRVLIB directory on the Windows NT CD-ROM, or the Windows NT Driver Library.

 124	Not compatible with IBM Thinkpad 700.

 125	Non-bidirectional parallel port machines may suffer performance degradation when the driver for this adapter is installed.


 1	This device requires a driver from the \DRVLIB directory on the Windows NT CD-ROM, or the Windows NT Driver Library.

 114	This adapter has been verified to work with Network Monitor

 124	Not compatible with IBM Thinkpad 700.

 125	Non-bidirectional parallel port machines may suffer performance degradation when the driver for this adapter is installed.

 126	The Toshiba 4700CS and 4800CT are not supported in Bi-directional mode with this adapter.


 1	This device requires a driver from the \DRVLIB directory on the Windows NT CD-ROM, or the Windows NT Driver Library.

 128	Please see the Windows NT 4.0 Release Notes for more information on installation of the driver for this hardware.


 1	This device requires a driver from the \DRVLIB directory on the Windows NT CD-ROM, or the Windows NT Driver Library.

 128	Please see the Windows NT 4.0 Release Notes for more information on installation of the driver for this hardware.

 129	No support for Advanced Wave-Table Effects.


 1	This device requires a driver from the \DRVLIB directory on the Windows NT CD-ROM, or the Windows NT Driver Library.

 128	Please see the Windows NT 4.0 Release Notes for more information on installation of the driver for this hardware.

 129	No support for Advanced Wave-Table Effects.

 130	FM Synthesis not supported on Cards with 1747 OPL FM Synthesis chip.


 1	This device requires a driver from the \DRVLIB directory on the Windows NT CD-ROM, or the Windows NT Driver Library.

 134	Does not support SPACE or MARK Parity or 1.5 stop bits.