Main menu.
ESC
Service menu.
F2
Alignment: Transmit deviation.
F2 -> F2
Alignment: Reference deviation.
F2 -> F2
Alignment: Per channel transmit & reference deviation.
F2 -> F3
Alignment: Microphone signal gain.
F2 -> F4
Alignment: Tone signalling encoder level.
F2 -> F4
Alignment: Rx audio full scale volume level.
F2 -> F4
Alignment: Squelch tuning.
F2 -> F4
Get - Save - Program menu.
F3
Get data from radio.
F3 -> F2
Get data from archive disc file.
F3 -> F3
Save codeplug data to archive disc file.
F3 -> F7
Program codeplug data into radio codeplug.
F3 -> F8
Change create viev menu.
F4
Channel selection.
F4 -> F2 -> ENTER
Channel information.
F4 -> F2 -> ARROW DOWN -> ENTER
MSH350  Channel or zone entry via keypad disabled.
F4 -> F2
MSH690  20 kHz channel spacing.
F4 -> F2
MSH346  Zone display
F4 -> F2 -> ENTER
MSH347  16-pos channel selector.
F4 -> F2 -> ENTER
MSH348  Channel names with turn-knob selector disabled.
F4 -> F2 -> ENTER
Clockshift - selfquieting
F4 -> F2 -> ARROW DOWN -> ENTER -> F9
MSH661  Non standard start up information
F4 -> F3
Prompts in display.
F4 -> F3
std  English prompts in display.
F4 -> F3 -> ARROW DOWN -> ENTER
MSH669  Danish prompts in display.
F4 -> F3 -> ARROW DOWN -> ENTER
MSH666  French prompts in display.
F4 -> F3 -> ARROW DOWN -> ENTER
MSH667  German prompts in display.
F4 -> F3 -> ARROW DOWN -> ENTER
MSH668  Spanish prompts in display.
F4 -> F3 -> ARROW DOWN -> ENTER
MSH670  Swedish prompts in display.
F4 -> F3 -> ARROW DOWN -> ENTER
MSH681  Italian prompts in display.
F4 -> F3 -> ARROW DOWN -> ENTER
User defined prompts in display.
F4 -> F3 -> ARROW DOWN -> ENTER
MSH150  Acoustic feedback enabled
F4 -> F3
MSH151  Non standard level for call tones.
F4 -> F3
MSH152  Call tones following volume control.
F4 -> F3
MSH153  Omit audio feedback.
F4 -> F3
MSH684  End of message tone.
F4 -> F3
Signalling system.
F4 -> F4 -> ENTER
MSH809  Omit 5-tone encode/decode.
F4 -> F4 -> ENTER
std  ZVEI 1  signalling system.
F4 -> F4 -> ENTER
MSH768  ZVEI 2 signalling system.
F4 -> F4 -> ENTER
MSH736  ZVEI 3 signalling system.
F4 -> F4 -> ENTER
MSH712  CCIR signalling system.
F4 -> F4 -> ENTER
MSH736  EEA signalling system.
F4 -> F4 -> ENTER
MSH779  Non standard encoder pretime.
F4 -> F4
MSH746  Extended 1'st tone.
F4 -> F4
MSH648  Non standard acknowledge delay time.
F4 -> F4
std  Auto reset set to 7 sec.
F4 -> F5 -> ENTER
MSH785  Non standard auto reset with carrier override.
F4 -> F5 -> ENTER
MSH780  Omit auto reset with carrier override.
F4 -> F5 -> ENTER
std  Time out timer set to 60 sec.
F4 -> F5 -> ARROW DOWN -> ENTER
MSH901  Non standard time out timer.
F4 -> F5 -> ARROW DOWN -> ENTER
MSH781  Omit time out timer.
F4 -> F5 -> ARROW DOWN -> ENTER
std  PTT admit only if channel free.
F4 -> F5 -> 2*ARROW DOWN -> ENTER
MSH443  PTT admit only if loudspeaker open.
F4 -> F5 -> 2*ARROW DOWN -> ENTER
MSH444  PTT admit if channel free or loudspeaker open.
F4 -> F5 -> 2*ARROW DOWN -> ENTER
MSH445  PTT admit always allowed.
F4 -> F5 -> 2*ARROW DOWN -> ENTER
std  Call transmit in channel free.
F4 -> F5 -> 3*ARROW DOWN -> ENTER
MSH453  Call transmit only if loudspeaker open.
F4 -> F5 -> 3*ARROW DOWN -> ENTER
MSH454  Call transmit if loudspeaker open or channel free.
F4 -> F5 -> 3*ARROW DOWN -> ENTER
MSH455  Call transmit always allowed
F4 -> F5 -> 3*ARROW DOWN -> ENTER
std  Quiet monitor on toggle switch.
F4 -> F5 -> 4*ARROW DOWN -> ENTER
MSH275  Quiet monitor on push-button.
F4 -> F5 -> 4*ARROW DOWN -> ENTER
MSH276  Open squelch monitor on push-button.
F4 -> F5 -> 4*ARROW DOWN -> ENTER
MSH277  Omit monitor (Privacy).
F4 -> F5 -> 4*ARROW DOWN -> ENTER
MSH279  Omit monitor after call transmission.
F4 -> F5 -> 5*ARROW DOWN -> ENTER
MSH280  Close loudspeaker after channel shift.
F4 -> F5 -> 5*ARROW DOWN -> ENTER
MSH663  ID decode enabled.
F4 -> F6
MSH645  Clear down decoder enabled.
F4 -> F6
MSH114  Softkey related 1'st call button.
F4 -> F6
MSH115  Turn-knob related 1'st call button.
F4 -> F6
MSH101  Turn-knob related 2'nd call button.
F4 -> F6
MSH641  Non standard fixed multicall range
F4 -> F6
MSH462  Names specified for fixed multicalls
F4 -> F6
MSH463  Omit numbers from fixed multicalls
F4 -> F6
MSH464  Omit fixed multicall.
F4 -> F6
MSH467  Non standard multicall length.
F4 -> F6 -> PAGE DOWN
MSH468  Omit multicall.
F4 -> F6 -> PAGE DOWN
MSH470  Fixed multistatus enabled.
F4 -> F6 -> PAGE DOWN
MSH471  Non standard fixed multistatus range.
F4 -> F6 -> PAGE DOWN
MSH472  Names specified for fixed multistatus.
F4 -> F6 -> PAGE DOWN
MSH473  Omit numbers from fixed multistatus.
F4 -> F6 -> PAGE DOWN
MSH476  Multisstatus enabled.
F4 -> F6 -> PAGE DOWN
MSH477  Non standard multistatus length.
F4 -> F6 -> PAGE DOWN
MSH750  Non standard group tone.
F4 -> F6 -> 2*PAGE DOWN
MSH751  Group call in fixed multicall and multicall.
F4 -> F6 -> 2*PAGE DOWN
MSH752  Group call decoding enabled.
F4 -> F6 -> 2*PAGE DOWN
MSH754  1'st auxiliary telegram.
F4 -> F6 -> 2*PAGE DOWN
MSH755  2'nd auxiliary telegram.
F4 -> F6 -> 2*PAGE DOWN
MSH958  Call on every PTT.
F4 -> F6 -> 2*PAGE DOWN
MSH960  Call on first PTT.
F4 -> F6 -> 2*PAGE DOWN
MSH682  Repeated call on PTT.
F4 -> F6 -> 2*PAGE DOWN
MSH964  Emergency - scheme ZVEI 2.
F4 -> F7
MSH623  Emergency encode lockout.
F4 -> F7
MSH965  Emergency reset code.
F4 -> F7
MSHXXX  Emergency acoustic feedback.
F4 -> F7
MSHYYY  Emergency channel.
F4 -> F7
MSH756  Hang up encode.
F4 -> F7
MSH620  Auto acknowledge on ID decoded.
F4 -> F7
MSH646  Auto acknowledge on decoded clear down.
F4 -> F7
MSH647  Auto acknowledge on emergency reset tone.
F4 -> F7
MSH541  Toggle controlled encryption.
F4 -> F8
MSH543  Delete Clear Mode Alert Tone
F4 -> F8
MSH444  Delete Proper Code Detect
F4 -> F8
MSH543  Omit encryption off warning.
F4 -> F8
MSH-FP  Omit Rx Auto Key select.
F4 -> F8
MSH-FP  CipherNet System Parameters.
F4 -> F8 -> 5*ARROW DOWN -> ENTER
MSH-FP  Disable XL per channel.
F4 -> F8 -> 4*ARROW DOWN -> ENTER
MSH-FP  CipherNet keys per channel.
F4 -> F8 -> 4*ARROW DOWN -> ENTER
MSH345  Radio lock enabled.
F4 -> F8
Print codeplug data to screen.
F5 -> F2
Print codeplug data to printer.
F5 -> F3
Radio hardware configuration.
F7
Frequency band.
F7 -> F2
Other hardware settings.
F7 -> F3
Version control.
F7 -> F8
Serial number.
F7 -> F5
Computer configuration
F9

