201
200 CP1000 Fieldprogrammer Codeplug Printout
201 ----------------------------------------
95  Bandsplit:    136.0 - 151.0 MHz
96  Bandsplit:    146.0 - 162.0 MHz
97  Bandsplit:    157.0 - 174.0 MHz
98  Bandsplit:    403.0 - 433.0 MHz
99  Bandsplit:    438.0 - 470.0 MHz
88  Frontcover:   Frontcover without display or keypad
89  Frontcover:   Frontcover with display and 3 button keypad
90  Frontcover:   Frontcover with display and full keypad
102 Radio with SecureNet encryption module
103 12.5 kHz channel spacing
104 Power level:  2 watt
105 Power level:  4 or 5 watt
201
200 CHANNEL INFORMATION
201 -------------------
14  Channel selection:          MSH346 Zone display.
15  Channel selection:          MSH347 16-pos turn-knob selector.
16  Channel selection:          MSH348 Channel names with turn-knob
16                                     selection disabled.
201 Channel information:               See table below...
17  MSH350  Channel or zone entry via keypad disabled
18  MSH690  20 KHz channel spacing.
201
200 USER INTERFACE SETTINGS
201 -----------------------
2   Prompts in display:             std  English prompts.
3   Prompts in display:          MSH669  Danish prompts.
4   Prompts in display:          MSH666  French prompts.
5   Prompts in display:          MSH667  German prompts.
6   Prompts in display:          MSH668  Spanish prompts.
7   Prompts in display:          MSH670  Swedish prompts.
110 Prompts in display:          MSH681  Italian prompts.
54  Prompts in display:                  User defined prompts.
12  MSH153  Omit audio feedback.
11  MSH152  Call tones following volume control.
9   MSH150  Acoustic feedback enabled.
13  MSH684  End of message tone.
201
200 SEQUENTIAL SIGNALLING
201 ----------------------
19  Signalling system:                std  ZVEI 1 (ZVEI)
20  Signalling system:             MSH768  ZVEI 2 (French mod. ZVEI).
21  Signalling system:             MSH736  ZVEI 3 (Modified ZVEI).
22  Signalling system:             MSH712  CCIR (100 msec.)
24  Signalling system:             MSH745  EEA
25  MSH809  Omit 5-tone encode/decode.
201
200 MONITOR AND TRANSMIT SETTINGS
201 -----------------------------
28     std  Auto reset set to 7 seconds.
30  MSH780  Omit auto reset with carrier override.
31     std  Time out timer set to 60 seconds.
33  MSH781  Omit time out timer.
34     std  PTT admit if channel free.
35  MSH443  PTT admit only if loudspeaker open.
36  MSH444  PTT admit if loudspeaker open or channel free.
37  MSH445  PTT admit always allowed.
38     std  Call transmit if channel free.
39  MSH453  Call transmit only if loudspeaker open.
40  MSH454  Call transmit if loudspeaker open or channel free.
41  MSH455  Call transmit always allowed.
42     std  Quiet monitor on toggle switch.
43  MSH275  Quiet monitor on pushbutton.
44  MSH276  Open squelch monitor on pushbutton.
45  MSH277  Omit monitor (Privacy).
47  MSH279  Omit monitor after call transmission.
48  MSH280  Close loudspeaker after channel shift.
52  MSH115  Turn-knob related 1'st call button.     See table below.
53  MSH101  Turn-knob related 2'nd call button.     See table below.
58  MSH464  Omit fixed multicall.
56  MSH462  Names specified for fixed multicalls.   See table below.
57  MSH463  Omit numbers from fixed multicall.
65  MSH468  Omit multicall.
61  MSH472  Names specified for fixed multistatus.  See table below.
62  MSH473  Omit numbers from fixed multistatus.
201
200 MSH751  Group call in multicall and fixed multicall enabled
201         Accepted in following position(s) in the variable call code.
201
200 MSH752  Group call decode enabled.
201         Group call decode on the following position(s) in telegram.
113 MSH-FP  Emergency acoustic feedback.
114 MSH-FP  Emergency channel.
200
84  MSH541  Toggle controlled encryption.
116 MSH444  Delete proper code detect.
86  MSH245  Delete clear mode alert tone
201
200 CHANNEL INFORMATION
201 -------------------
200 zone   zone   chan   chan   transmit     receive      pl        pl
201  no.   name    no.   name   frequency    frequency   encode   decode
200  chan     transmit      receive       pl         pl
201   no.     frequency     frequency    encode    decode
200  chan    chan    transmit      receive       pl         pl
201   no.    name    frequency     frequency    encode    decode
201
200 TURN-KNOB RELATED CALLS
201 -----------------------
201  turn knob pos  tone sequence  ext 1 tone  non std pretime  aux1 aux2
201
200 FIXED MULTICALL
201 ---------------
200        Names specified for associated fixed multicalls
201        no.   Fixed multicall number:      Multicall name
201
200 FIXED MULTISTATUS.
201 ------------------
200       Names specified for associated fixed multistatus
201        no.   Fixed multistatus number:    Multistatus name
MSH114  Softkey related 1st call button    BASECDN:
        Auxiliary telegram 1 (BASEAUX1).
        Auxiliary telegram 2 (BASEAUX2).
        Extended first tone  (BASEEXTN).
        Non-std. pretime     (BASEPRTM).
MSH960  Call on first PTT                UNIDX:
        Auxiliary telegram 1 (UNIDAUX1).
        Auxiliary telegram 2 (UNIDAUX2).
        Extended first tone  (UNIDEXTN).
        Non-std. pretime     (UNIDPRTM).
MSH964  Emergency - scheme ZVEI2         EMERIDX:
        Auxiliary telegram 1 (EMERAUX1).
        Auxiliary telegram 2 (EMERAUX2).
        Extended first tone  (EMEREXTN).
        Non-std. pretime     (EMERPRTM).
MSH756  Hangup encode          HANGUP:
        Auxiliary telegram 1 (HANGAUX1).
        Auxiliary telegram 2 (HANGAUX2).
        Extended first tone  (HANGEXTN).
        Non-std. pretime     (HANGPRTM).
MSH620  Auto acknowledge on ID decode       AUTOACK:
        Auxiliary telegram 1 (xxxxxxxx).
        Auxiliary telegram 2 (xxxxxxxx).
        Extended first tone  (ACKEXTN).
        Non-std. pretime     (ACKPRTM).
MSH646  Auto acknowledge for clear down decoder  CLEAACK:
        Auxiliary telegram 1 (xxxxxxxx).
        Auxiliary telegram 2 (xxxxxxxx).
        Extended first tone  (CLEAEXTN).
        Non-std. pretime     (CLEAPRTM).
MSH647  Auto acknowledge on emergency reset code     EMERACK:
        Auxiliary telegram 1 (xxxxxxxx).
        Auxiliary telegram 2 (xxxxxxxx).
        Extended first tone  (EMAKEXTN).
        Non-std. pretime     (EMAKPRTM).
MSH754  1'st Auxiliary telegram           AUX1:


        Extended first tone  (AUX1EXTN).
        Non-std. pretime     (AUX1PRTM).
MSH755  2'nd Auxiliary telegram           AUX2:


        Extended first tone  (AUX2EXTN).
        Non-std. pretime     (AUX2PRTM).


  MSH661  Non standard start
-2        up information                STARINFO:
-2MSH151  Non standard call tone level  CALLEVEL:
-2MSH779  Non standard encoder pretime  PRETIME:
-2MSH746  Extended 1st tone             N1STONE:
  MSH648  Non standard auto acknowledge
-2        delay time                    AUACKDEL:
  MSH785  Non standard auto reset with carrier
-2        override                      AUTORESX:
-2MSH901  Non standard time out timer   TIMEOUT:
  GENERAL ENCODE AND DECODE FUNCTIONS
  -----------------------------------
-2MSH663  ID decode                           DECODEN:
-2MSH645  Clear down decoder enabled          CLEADEC:
     std  Fixed multicall 00-99
  MSH641  Non standard fixed multicall range.
-2MSH467  Non-standard multicall length.    MULLENG:
     std  2-digit multicall.
  MSH470  Fixed multistatus enabled.
  MSH471  Non standard fixed multistatus range.
  MSH476  Multistatus enabled.
-2MSH477  Non-standard multistatus length.    STATLENG:
-2MSH750  Non-standard group tone          GRTONE:
     std  Group call according to signalling system.
-2MSH682  Repeated call on PTT             UNIDINT:
  TASK SPECIFIC ENCODE AND DECODE FUNCTIONS
  -----------------------------------------
  MSH623  Emergency encode lockout.
-2MSH965  Emergency reset code             RESETID:
-9           Emergency Tx freq.:
-9           Emergency Rx freq.:
-2           Emergency PL encode freq.:
  SECURITY FUNCTIONS
  ------------------
-2MSH345  Radio lock enabled     LOCKCODE:
-3File :
-2Radio serial number:
  MSH-FP  Disable XL per channel      see table below.
  Disable XL per channel.
  -----------------------
  CipherNet Keys per channel.
  --------------------------
          ch 1  ch 2  ch 3  ch 4  ch 5  ch 6  ch 7  ch 8  ch 9  ch 10
  Perfect RF Environment.
  Normal RF Environment.
  Rapid RF Fade.
  Rapid and deep RF Fade.
  MSH-FP  Encryption Key Per Channel    See table below...
  MSH-FP  Omit Rx Auto Key Select
  CipherNet System Parameters:


















