rΦ╥╤G╥ ╙ßTG	╕æ
Σ7t╣áIhD¿╪⌐/¬å½░¼δ ¡'"\₧(qH*r▒*s+tå+u≥+v╜,wë-xK.äδ/à▒:å¡Ep;F1G╚▄H,òKÉòN(#6Q≡#
UU${VX$▐]σ%Φ^µ%'dτ%µdΦ%ΩeΘ%≡fΩ%─gδ%Æhτgi
ÉNOTICE
É------
It should be noted that the DeskTrac programmer software does not replace
the standard RSS for the radio unit but is intended to be used with standard
MAXTRAC MOBILE RSS.

Programming and tuning of the radios has to be done prior to using
this programmer.

âMainéMenu
â----------
éThis screen provides the following functions:

àF1é- HELP
Main Menu (continued)

àF2é- Align Remote Option
ïProvides the ability to align the remote option.
ïA connected DeskTrac with a remote option is required.
àF3é- GET/SAVEé
ïReading and writing either into/from the DeskTrac
ïor an archive file.
àF4é- CHANGE/VIEW CODE or FILE
ïProvides the ability to view or change values
ïread in F3
àF5é- PRINT CODE
ïPrint out the contents of the codeplug
Main Menu (continued)

àF6é- FILE MAINTENANCE
ïProvides the ability to change or update
ïYour archives
àF9é- SETUP Computer Configuration
àF10 - EXIT DeskTrac Field Programmer, Return to DOS

âF1 ...................... Help Information¥
âF2-F9 ................... Execute Labeled Function
âF10 ..................... Return to Previous Menu
âESC ..................... Return to Main Menu and abort changes
âTAB (or ENTER) .......... Advance Cursor to Next Data Field
âSHIFT TAB ............... Back Up Cursor to Last Data Field
âUP/DOWN ARROW KEYS ...... Increment/Decrement Value of Selection
âLEFT/RIGHT ARROW KEYS ... Move Cursor Within Data Field
âINSERT .................. Insert Characters at Current Cursor Position
âBACKSPACE ............... Erase Character to Left of Cursor
âDELETE .................. Erase Character under Cursor
âPAGE-UP / PAGE-DOWN ..... Scroll Displayed data Up or Down
¥or Move to Previous/Next Page
âHOME .................... Move Cursor to Upper Left Data Field
âEND ..................... Move Cursor to Lower Right Data Field


äRX LEVEL:
ÄAudio level into line. Default level equals 0 DBM.
Ä"1" is minimum (-20 DBM) and "254" is maximum (+5 DBM)
 
äChange value either by programming directly using F8 
äor fine tuning by using F9



äTX LEVEL:
ÄThe default equals 3 KHZ deviation. "1" is
Äminimum and "254" is maximum deviation.

äChange value either by programming directly using F8 
äor fine tuning by using F9



ìDIGITAL REMOTE is in Your DESKTRAC.
äYou can't change any remote parameters in Your system.


äRX LEVEL:
ÄAudio level into line. Default level equals 0 DBM.
Ä"1" is minimum (-20 DBM) and "254" is maximum (+5 DBM)
 
äTX LEVEL:
ÄThe default equals 3 KHZ deviation. "1" is
Äminimum and "254" is maximum deviation.

äFine tune by use of up and down arrows. To program value use
äF8. To send current value use F3.


ôGET/SAVE
Æ==========
äF1é- HELP

äF2é- READ from DeskTrac
èRSS automatically identifies the available configuration
è(Base/Repeater with/without Remote board).
èDuring reading the RSS requests to change the position of 
èprogramming selector which is located on the front Panel 
èof the DeskTrac.

éNote:âAfter reading the code the DeskTrac displayécan be changed
è(without affecting the READ/PROGRAM processes). To return
èto the normal state use front panel buttons. 
éGET/SAVEé(contd.)

äF3é- GET archive FILE
èA file containing DeskTrac data which was previously written to 
èdisk can be read using this key.

äF7é- SAVE archive FILE
èThe current data that is contained in the computer memory is saved
èto disk. The user supplies a customer id for each file. 

éGET/SAVEé(contd.)

äF8é- PROGRAM CODE
èThis key writes the codeplug data back to the DeskTrac.
èProgramming using this key is needed after any change of DeskTrac 
èparameters.

éNote:âAfter programming the code the DeskTrac displayécan be changed
è(without affecting the PROGRAM process). To return
èto the normal state use front panel buttons. 

äF10 - EXIT
èReturn to MAIN MENU.


ÿGET FILE MENU
ù===============

This menu enables reading the codeplug of the DeskTrac radio and remote
board (option) from a file which was primarily saved by the DeskTrac RSS. 
The files are loaded from archive directories each directory can contain 
up to 40 different archive files. The number of archive directories is 
limited only by disk space.

Each file is accompanied by a user supplied Customer ID.

The serial number of the DeskTrac is used as the name of the saved file.



GET FILE MENU (contd.)

F1 - HELP 

F4 - CHANGE ARCHIVE - Change of the current archive directory from where 
the archive files will be read. These directories should exist prior to 
using the change archive key.

F5 - PRINT SCREEN - Prints the current screen.

F8 - GET SELECTED - Enables reading the selected file to computer memory.

F10 - EXIT - Return to GET/SAVE menu.

ÿSAVE FILE MENU
ù================

This menu enables storing the codeplug of the DeskTrac radio and remote
board (option) in a file. The files are stored in directories each 
directory can contain up to 40 different archive files and the number of 
archive directories is limited only by disk space.

Each file is accompanied by a user supplied Customer ID.

The serial number of the DeskTrac is used for the name of the saved file.
Two or more files cannot exist at the same directory with the same serial 
number.
SAVE FILE MENU (contd.)

F1 - HELP

F4 - CHANGE ARCHIVE - Change of the current archive directory where the
archive files will be saved. These directories should exist prior to 
using the CHANGE ARCHIVE key.

F5 - PRINT SCREEN - Prints the current screen.

F8 - SAVE SELECTED - Enables saving the selected file as a disk file.

F10 - EXIT - Return to GET/SAVE menu.


öCHANGE/VIEW MENU
ô==================

After reading a DeskTrac or a disk file containing DeskTrac parameters this 
menu enables view or change of the data.

F2- Timeout : Limit length of continuous transmission

F5- Mode configuration : This function key enables changing general radio 
äparameters like frequencies or squelch codes.

F7- Remote option configuration: This function key enables changing 
äoperating parameters of the remote board (optional) like function of 
äeach tone.


TIME-OUT-TIMER (TOT)é- FOR NON TRUNKED DESKTRAC VERSIONS ONLY.
Use the UP/DOWN arrow keys to select the TIME-OUT-TIMER value or enter the
desired value directly. TOT values range from DISABLED to 255 secondséand
may be selected in increments of 1 second. To disable the TOT, enter 'OFF'
or '000'.é
The TOT will limit the maximum time allowed for any continuous transmission
to prevent accidentally locking up a repeater or channel. If you attempt to
transmit longer than the programmed timer value, the radio automatically
ends your transmission. On standard Base/Control stations you will hear a 
low pitched continuous warning tone 4 seconds before the transmission times
out. As shipped from the factory, the TOT is programmed to 60 seconds in 
standard Base/Control stations and 180 seconds in Repeaterséand radios with
the EXTENDED DUTY option. Receive operation is not affected by the TOT.



NAME

NAMEéis the number displayed on the two digit seven segment display.éThe
NAMEédata field allows the number displayed to be different than the mode
number.éThis,éfor example,éallowséthe channels to be displayedéinéan
unusualéorder such as 1,2,4,5. Any sequence desired can be choosen.
Valid numbers are between 01 and 99.





RECEIVE FREQUENCY - Rx Frequency╡

Enter the RECEIVE frequency directly in MHz, or use the UP/DOWN arrow keys
to increment/decrement to the next valid channel.

Blank RECEIVE frequencies are NOT allowed.

Referéto the MOTOROLA Catalog Sheets / Price Pages or your ServiceéManual
for valid RECEIVE frequencies for this model.



TRANSMIT FREQUENCY - Tx Frequency▓

Enter the TRANSMIT frequency directly in MHz, or use the UP/DOWN arrow keys
to increment/decrement to the next valid channel.

Referéto the MOTOROLA Catalog Sheets / Price Pages or your ServiceéManual
for valid TRANSMIT frequencies for this model.



RECEIVE SQUELCH TYPE╗

Useéthe UP/DOWN arrow keys to select the SQUELCH type:

äCarrieré- Carrier Squelch
ëTPL - Private Line
ëDPL - Digital Private Line.
äInv. DPL - Digital Private Line with inverse digital code.
à
Data fields for transmit and receive codes will be displayed for TPL and DPL. 




TRANSMIT SQUELCH TYPE╗

Useéthe UP/DOWN arrow keys to select the SQUELCH type:

äCarrieré- Carrier Squelch
ëTPL - Private Line
ëDPL - Digital Private Line.
äInv. DPL - Digital Private Line with inverse digital code.
à
Data fields for transmit and receive codes will be displayed for TPL and DPL. 




TPL SQUELCH CODE╕

Enter the TPL frequency directly in Hz (Ex: 192.8), or enter the 
alphanumeric code (Ex: 7A). Nonstandard TPL frequencies may also be selected 
by entering the desired frequency in HZ (Ex: 100.5),ébut onlyéfrequencies
withinéthe range of standard TPL frequencies (67.0 to 250.3) are allowed. 
å
Valid codes may also be selected via the UP/DOWN arrow keys.é

Standard TPL frequencies are listed on the next page: 
TPL SQUELCH CODE (contd.)

Standard Tone Private Line Frequencies / MOTOROLA Code:

FreqéCodeäFreqéCodeàFreqéCodeàFreqéCodeàFreqéCode
67.0âXZà91.5âZZå123.0é3Zå167.9é6Zå225.7éM4
69.3âWZà94.8âZAå127.3é3Aå173.8é6Aå229.1é9Z
71.9âXAà97.4âZBå131.8é3Bå179.9é6Bå233.6éM5
74.4âWAà100.0é1Zå136.5é4Zå186.2é7Zå241.8éM6
77.0âXBà103.5é1Aå141.3é4Aå192.8é7Aå250.3éM7
79.7âWBà107.2é1Bå146.2é4Bå203.5éM1
82.5âYZà110.9é2Zå151.4é5Zå206.5é8Z
85.4âYAà114.8é2Aå156.7é5Aå210.7éM2
88.5âYBà118.8é2Bå162.2é5Bå218.1éM3


DPL SQUELCH CODE 

EnterétheéDPLécodeédirectly (Ex:é031);énote thatéleadingézeroséare
required. Nonstandard DPL codes are not allowed. 

Valid codes may also be selected via the UP/DOWN arrow keys.
 
╕
Valid DPL codes are listed on the next page:é
DPL SQUELCH CODE (contd.)

Valid DPL Codes:

CodeâCodeäCodeäCodeäCodeäCodeäCodeäCodeäCode
023ä071à134à223à306à411à503à631à734
025ä072à143à226à311à412à506à632à743
026ä073à152à243à315à413à516à654à754
031ä074à155à244à331à423à532à662
032ä114à156à245à343à431à546à664
043ä115à162à251à346à432à565à703
047ä116à165à261à351à445à606à712
051ä125à172à263à364à464à612à723
054ä131à174à265à365à465à624à731
065ä132à205à271à371à466à627à732



âMODE:
êThe mode shows what type of remote control is available.

âVERSION:
ëFirmware version on the remote board.


âRECEIVE AUDIO PATH (for version "B" only):
êChoice between flat audio or de-emphasized audio. For full 
êfeatures operation select filtered audio(de-emphasized), 
êfor 'A' model compatibility select flat audio.


âF6 - DEFAULT: This key restores the default value (for version "B" only).


àMinimum guard tone duration.

àIt is not recommended to do any changes in the default values.



àMaximum guard tone duration.

àIt is not recommended to do any changes in the default values.



àMinimum function tone duration.

àIt is not recommended to do any changes in the default values.



àMinimum function tone duration.

àIt is not recommended to do any changes in the default values.



àLow level guard tone is not detected.
àDefine the maximum allowable "Holes" (No Tones) in the tone sequence.

àIn most cases it is not recommended to do any changes in the 
àdefault values.



àHigh level guard tone is not detected.
àDefine the maximum allowable "Holes" (No Tones) in the tone sequence.

àIn most cases it is not recommended to do any changes in the 
àdefault values.



àFunction tone is not detected.
àDefine the maximum allowable "Holes" (No Tones) in the tone sequence.

àIn most cases it is not recommended to do any changes in the 
àdefault values.


âLINE SENSITIVITY: 
àThis parameter defines the threshold between signal (audio)
àand noise on the input lines. Setting the parameter to "0"
àmeans maximum sensitivity and "254" means minimum sensitivity.
àIn most cases the default value should be adequate.
àOn a noisy line, set this parameter to a higher number, just
àabove the point that the noise on the line activates the PTT
à(Keys the Radio).


àTone Functions Select
à----------------------
The remote board (option) can accepté15 differentétones and 
can be programed to command the base or repeater to function
according to the accepted tone.

Channel 1 - Channel 16é: The tone commands the DeskTrac to transmit 
at certain channel.

MONITOR : The tone commands the DeskTrac to open the audio channel to 
hear if the channel is busy. Monitor is normally used with TPL/DPL
systems.
Tone Functions Select (contd.)

MONITOR SQ : The tone instructs the DeskTrac to hear the channel even
if no carrier is detected. This function is useful during fringe reception.

MONITOR SQ OFF : The tone commands the DeskTrac to stop MonitorSQ operation.

REPEATER ON: The tone commands the DeskTrac to enable repeating 
ìoperation.

REPEATER OFF: The tone commands the Desktrac to disable repeating
Äoperation.

EMPTY : The tone does not command the DeskTrac.
Tone Functions Select (contd.)

SCAN OPERATIONâ(with remote)

Two modes of SCAN operation are available: Scan mode 1 & Scan mode 2.

1. Scan mode 1
Only SCAN function is defined. The operator is able to respond a message
during the scan talk back time. He has only to press the PTT button and
answer. To exit the Scan mode at desired channel, the appropriate channel
button at the remote deskset must be pressed.
Note: the SCAN button at the remote deskset must be defined from the
åF(unction) buttons.
Tone Functions Select (contd.)

2. Scan mode 2
SCAN and SCAN OFF functions must be defined. To respond a message in this
case the operator has first to press the received channel button at the
remote deskset, then to press the PTT and answer. The SCAN/SCAN OFF 
button at the remote deskset must be defined as a WILDCARD (toggle)
button (RPTR ON/RPTR OFF button can be used).

Tone Functions Select (contd.)
SCAN :äThe tone commands the DeskTrac to enter the scan mode. The scan 
èlist must be pre-programmed or user defined at appropriate channel
SCAN OFF: The tone commands the DeskTrac to exit the scan mode (used
èin scan mode 2 only).
RESET:äPerforms general reset to return to normal mode from any special
èdisplay (EE, H/L,etc..). ALWAYS PRESS the desired Function (F1,
èF2...) button after the RESET was activated. This will prevent 
èfrom the radio to remain in reset state.ç
PTTIGD:âPTT operation regardless the channel displayed on the remote
èdeskset.

äNote:éThe functions on the screen are for version "B" only.
Tone Functions Select (contd.)

F1 - HELP.

F5 - PRINT SCREEN - Prints the data on the current screen.

F6 - DEFAULT - Restores the default data of this screen to the same values
Åas it comes out of factory.

F10 - EXIT - Return to previous menu.


åDC Functions Select
à----------------------
The remote board (option) can accepté6 differentéDC currents and 
can be programed to command the base or repeater to function
according to the accepted DC current.é

Channel 1 - Channel 16é: The DC current commands the DeskTrac to transmit 
at certain channel.

MONITOR : The DC current commands the DeskTrac to open the audio channel to 
hear if the channel is busy. This is the normally used Monitor with TPL/DPL
systems.

DCéFunctions Select (contd.)

MONITOR SQ : The DC current instructs the DeskTrac to hear the channel even
if no carrier is detected. This function is useful during fringe reception.

MONITOR SQ OFF : The DC current commands the DeskTrac to stop MonitorSQ 
operation.

REPEATER ON: The DC current commands the DeskTrac to enable repeating 
ìoperation.

REPEATER OFF: The DC current commands the Desktrac to disable repeating
Äoperation.

EMPTY : The DC current does not command the DeskTrac.

DCéFunctions Select (contd.)

SCAN OPERATIONâ(with remote)

Two modes of SCAN operation are available: Scan mode 1 & Scan mode 2.

1. Scan mode 1
Only SCAN function is defined. The operator is able to respond a message
during the scan talk back time. He has only to press the PTT button and
answer. To exit the Scan mode at desired channel, the appropriate channel
button at the remote deskset must be pressed.
Note: the SCAN button at the remote deskset must be defined from the
åF(unction) buttons.
DCéFunctions Select (contd.)

2. Scan mode 2
SCAN and SCAN OFF functions must be defined. To respond a message in this
case the operator has first to press the received channel button at the
remote deskset, then to press the PTT and answer. The SCAN/SCAN OFF 
button at the remote deskset must be defined as a WILDCARD (toggle)
button (RPTR ON/RPTR OFF button can be used).

DCéFunctions Select (contd.)
SCAN :äThe DC commands the DeskTrac to enter the scan mode. The scan list
èmust be pre-programmed or user defined at appropriate channel.
SCAN OFF: The DC commands the DeskTrac to exit the scan mode (used
èin scan mode 2 only).
RESET:äPerforms general reset to return to normal mode from any special
èdisplay (EE, H/L,etc..). ALWAYS PRESS the desired Function (F1,
èF2...) button after the RESET was activated. This will prevent 
èfrom the radio to remain in reset state.ç
PTTIGD:âPTT operation regardless the channel displayed on the remote
èdeskset.

äNote:éThe functions on the screen are for version "B" only.
DCéFunctions Select (contd.)

F1 - HELP.

F5 - PRINT SCREEN - Prints the data on the current screen.

F6 - DEFAULT - Restores the default data of this screen to the same values 
Åas it comes out of factory.

F10 - EXIT - Return to previous menu.


åDC DURATION
à-------------

åDC DELAY: Time to sample the D.C. control current, must be greateré
Éthan the remote current rise time.

FILE MAINTENANCE╖

TheéFile Maintenance Menu is designed to help you manage youréfiles.âIt 
canébe used to restore lost Archive Files from your Back-up Files,écreate 
new Back-up Files, create directory paths, and delete Archive Files.


CREATE DIRECTORY PATH▓

Thiséscreenéwillécreateéanyédesiredédirectoryépathébyéaddingésub-
directories that can be accepted by the DOS operating system.

Enter the new directory path and press the Enter key.

An Example directory path would be:

C:\MRSS\RADMBL\ARCHIVE\LOCAL <Enter>

Thisâwouldâaddétheésub-directoryé"LOCAL"éunderétheâsub-directory 
"ARCHIVE".éOnly one sub-directory may be added at a time.



DELETE ARCHIVE FILE┤

TheéDelete Archive File screen allows you to delete any Archive Fileéfrom 
the directory displayed in the Archive Path.
Function Key Descriptions:

F3 - The CHANGE ARCHIVE function allows you to change the Archive Directory 
àPath.éEnter the new Path and Press the Enter key.

F5 - TheéPRINT function prints the on-screen information to your printer.


F7 - TheéDELETEéFILE functionéwill delete the file associatedéwithéthe 
àhighlightedéserial number.éYou can move the highlight cursor toéthe 
àdesiredéserial number by using the Tab and Enter keys.éPresséF7éto 
àdeleteéthe file.éThe Computer will ask you to confirm the deleteéby 
àpressing F7 again.

RESTORE ARCHIVE╕
Thiséscreenéis used to restore lost Archive Files froméaéBack-upéFiles 
Disk.

Function Key Descriptions:

F3 - TheéCHANGE SOURCE function is used to point to the Back-upédirectory 
àPath.éEnter the new Path and press the Enter Key.

F4 - TheéCHANGE TARGET function is used to point to the Archiveédirectory 
àwhereéyouéwant to store the recovered Archive File.éEnterétheénew 
àPath and press the Enter Key. 


F5 - TheéPRINT function prints the on-screen information to your printer.

F7 - TheéRESTOREéFILEéfunctionéiséusedétoémoveétheéBack-upâFile, 
àhighlightedéon the display, to the directory displayed on theéTarget
àpath.éYou can move the highlight cursor to the desired serialénumber 
àby using the Tab and Enter keys.

UPDATE BACK-UP FILES│
The Update Back-up Files Screen allows you to create new back-up copieséof 
your archive files.

F3 - TheéCHANGE SOURCE function is used to point to the Archiveédirectory 
àPath that you want to back-up.éEnter the new Path and press the Enter 
àKey.

F4 - TheéCHANGE TARGET function is used to point to the Back-upédirectory 
àwhereéyouéwant to store the Back-up Files.éEnter the newéPathéand 
àpress the Enter Key. 

F5 - TheéPRINT function prints the on-screen information to your printer.

F7 - TheéUPDATEéBACKUPéfunctionéwillécopyéthe selectedéArchiveéFile 
àcontained in the Source Path to the directory of the Target Path.


SETUP┬

TheéSETUPéfunctions are used to configure your Radio Service Softwareéto
your particular application and computer environment.

Function Key Descriptions:

F3 - PCéCONFIGURATION is used to set default disk drive paths foréArchive
àfiles.éIt is also used to select which AsynchronouséCommunicationsé
àPorté(COM 1 or COM 2) the RIB (RadioéInterfaceéBox) will be 
àconnected to.

àPleaseâreferétoéyourécomputeréowner'sémanualéforéaâcomplete
àdescription of path names and Asynchronous Communication Ports.

SETUP (contd.)

Note:éYouréRadioéService Software will automatically determineéatéwhat
çclockéspeedéyourécomputeréiséoperating.äNoâuser-selectable
çparameters are required.

F7 - SCREENéCOLORéiséusedéto enable theéColorédisplayéoption.âThe
àstandardédefaultéconfiguration for Radio Service Software iséforéa
àCOLOR display monitor.âIf you have a color system, theédisplay 
àquality will be greatly enhanced by enabling the color option.


MOTOROLA Radio Service Software

Part No. (3 1/2) ......RVN4080/4094
ë(5 1/4) ......RVN4079/4093
Software Version .........R03.04.00
Dateâ...............31.JANUARY.95

Manual ...............68P02982G55-B

RIB Part No.é...........0180353A74
Cable Part No.
âPC/XT/PS-2 to RIB ....3080369B71
âAT to RIBà........3080369B72
âRIB to radioé........3080070N01

CONFIGURE COMPUTER╡

PCéCONFIGURATION is used to set default disk drive paths for Archive files.
ItéiséalsoéusedétoéselectéwhichâAsynchronous Communicationsé
Port (COM 1 or COM 2) the RIB (Radio Interface Box) will be connected to.

Please refer to your computer owner's manual for a complete descriptionéof
directory path names and Asynchronous Communication Ports.

CONFIGURE COMPUTER (contd.)

Function Key Descriptions:

F3 - COMM TEST is used to verify that your computer is set up properlyéand
àis able to READ and PROGRAM a DeskTrac codeplug properly.

àAfteréyourécomputeréand RIB are connected per your DeskTrac Radioé
àService Software manual and you have selected the appropriate 
àcommunication port, turn on your DeskTrac and execute COMM TEST by 
àpressing F3.

 *** VERIFY THAT THE PROGRAMMING SELECTOR IS AT POSITION 1 FOR THIS TEST ***

àCOMMéTEST will verify your system is functioning properly byésending
àcommandsétoétheéDeskTrac and checking for theéproperéresponse. No
àcodeplug changes will result from these commands.éAn OK response will
àbe displayed in the Status Window if the system checks OK.

àIf you do not accept the OK message recheck your connections and that
àyour RIB and DeskTrac are ON.
CONFIGURE COMPUTER (cont.)

àOtherwise,éerrorémessages will be displayed,éand you should consult
àyour manual for proper corrective action.

F8 - SAVEéis used to save the configuration information to a file onéyour
àprogramédisk.âEvery time you use the RadioéServiceéSoftware,éthe
àconfigurationéthatéyouéSAVED last will beéused.âAtéanytimeéthe
àconfiguration may be changed and SAVED.

F9 - RESETéDEFAULTéiséused to reset the parameters on this screenétoéa
àdefaultâvalue.äHowever,âRESETâDEFAULTédoeséNOTâsaveâthe
àconfiguration.âIf the default values are desired, you must save them
àvia the SAVE (F8) function.


COMPUTER SERIAL PORTS

You canéselectéwhichâAsynchronous CommunicationséPort (COM 1 or COM 2)
the RIB (Radio Interface Box) will be connected to.

Please refer to your computer owner's manual for a complete descriptionéof
Asynchronous Communication Ports.

CONFIGURE COMPUTER SCREEN«

SCREENéCOLORéis used to select the type of display monitor that youéare 
using with your computer, i.e. MONOCHROME or COLOR.é

Foréproperécoloréoperation,éyouémustéhave aécolorémonitoréandéthe 
appropriate color display interface card installed in you computer.éPlease 
referétoéyour computer owner's manual and/or your computer dealer iféyou 
have questions regarding the color capability of your computer.

Youémayéalso further customize your screen by selectingécolorséforéthe
screen TEXT,éSTATUS LINE,éMESSAGE LINE,éTEXT HIGHLIGHT,éBACKGROUND, and 
SCREEN OUTLINE.

Function Key Descriptions:

F8 - SAVEéis used to save the configuration information to a file onéyour 
àprogramédisk.âEveryétime you use the Radio ServiceéSoftware,éthe 
àconfigurationéthatéyouéSAVED last will beéused.âAtéanytimeéthe 
àconfiguration may be changed and SAVED.

F9 - RESETéDEFAULTéiséused to reset the parameters on this screenétoéa 
àdefaultâvalue.äHowever,âRESETâDEFAULTédoeséNOTâsaveâthe 
àconfiguration.âIf the default values are desired, you must save them 
àvia the SAVE (F8) function.

MONITOR TYPE (Default = Color)

Useéthe UP/DOWN arrow keys to select either a MONOCHROME or COLORédisplay 
monitor.

Screen configuration changes must be SAVED (F8) before you EXIT (F10)éthis 
screen.
TEXT (Default = Yellow)░

Use the UP/DOWN arrow keys to select the desired color for screen TEXT.é

Screen configuration changes must be SAVED (F8) before you EXIT (F10)éthis 
screen.
STATUS LINE (Default = White)¬

Useéthe UP/DOWN arrow keys to select the desired color for the STATUS LINE 
located in the lower portion of the top right-side window.

Screen configuration changes must be SAVED (F8) before you EXIT (F10)éthis 
screen.
MESSAGE LINE (Default = White)⌐

Use the UP/DOWN arrow keys to select the desired color for the MESSAGE LINE 
located in the upper portion of the top right-side window.

Screen configuration changes must be SAVED (F8) before you EXIT (F10)éthis 
screen.
HIGHLIGHT (Default = White)¼

Use the UP/DOWN arrow keys to select the desired color for theéHIGHLIGHTED 
screen text.

Screen configuration changes must be SAVED (F8) before you EXIT (F10)éthis 
screen.
BACKGROUND (Default = Blue)¼

UseétheéUP/DOWNéarrow keys to select the desired coloréforétheéscreen 
BACKGROUND.

Screen configuration changes must be SAVED (F8) before you EXIT (F10)éthis 
screen.
SCREEN OUTLINE (Default = Lt Red)ª

UseétheéUP/DOWNéarrowékeys to select the desired coloréofétheéscreen 
OUTLINE.é

Screen configuration changes must be SAVED (F8) before you EXIT (F10)éthis 
screen.



åEND OF HELP FILE


