    Print Codeplug Data
    ===================

        In selecting the print codeplug options you can specify to have the 
    currently selected options printed in either full listing format, or 
    STIC listing format.  The lists can either be viewed on the screen or 
    sent to a printer.  

        The printer port is selectable via the configuration screen, <F7> 
    from the main menu, as either lpt1 or lpt2. 






    List Codeplug data to Screen
    ----------------------------

        To view the options selected in the current personality file in the 
    full listing format, press <F2>.  You can move through the list using 
    <Pg_up> and <Pg_dn> keys to move by a screen at a time. 


    List Codeplug data to Printer
    -----------------------------

        To produce a hard copy of the options selected in the full listing 
    format, press the <F3> key. 



    List STIC Data to Screen
    ------------------------

        To view the options selected in the current personality file in the 
    STIC listing format press <F4>.  You can move through the list using the 
    <Pg_up> and <Pg_dn> keys to move by a screen at a time. 


    List STIC Data to Printer
    -------------------------

        To produce a hard copy of the options selected in the STIC listing 
    format, press the <F5> key. 

