    List Codeplug data to Printer
    =============================

        To produce a hard copy of the options selected in the full listing 
    format, press the <F3> key. 

        The printer port is selectable via the configuration file, 
    FPROG.CFG.  To change the printer port edit the configuration file to 
    include the keyward 'printer_path' with either lpt1 or lpt2 as the 
    parameter.
    

