    List STIC Data to Printer
    =========================

        To produce a hard copy of the options selected in the STIC listing 
    format, press the <F5> key. 

        The printer port is selectable via the configuration file, 
    FPROG.CFG.  To change the printer port edit the configuration file to 
    include the keyward 'printer_path' with either lpt1 or lpt2 as the 
    parameter.
    
