    Hardware Configuration
    ======================

    (1) If a '2 channel Radio' is selected, then the programmer will only 
        give you access to channels 1 and 2 of the channel related 
        information.  If you change a 2 channel personality to an 8 channel 
        personality, channels 3 to 8 will be overwritten with channel 2 
        information, the following warning will also be issued :-

            "Channel 2 data copied to channels 3 to 8" 

        The 'Non Standard Channels' option will be set if the programmer 
        reads a radio which has neither 2 nor 8 channels, you are able to 
        select either the 2 channel or 8 channel options for such a radio, 
        however you cannot make a 2 or 8 channel radio Non Standard. 
         
    (2) The bandsplit information tells you which bandsplit the current 
        personality is set up for.  Changing the bandsplit will give the 
        following warning :-

            "Please realign channel frequencies" 
            "to new bandsplit"

        This warning will not be enforced, but a check will be made whenever 
        you try to write the codeplug data to radio or disc, or when you try
        to change the channel frequencies. 

    (3) The radio communications field allows you to specify which 
        commmunications port will be used to interface with the RIB.  
        ie. Communications via COM1 or COM2. 
    
