        The following table allows you to specify which functions are to 
    omitted on a per channel bases, however before a function can be omitted 
    per channel it must be enabled on the radio.  The table below also 
    specifies which options on the codeplug edit screen must be enabled in 
    order for the function to be omitted per channel. 
 

        Option                |    Requirements
    --------------------------|------------------------------------------
    Omit 5 tone decode code   | Std 5 Tone Decode code OR H642 Decode only
    Omit multicall code       | H626 multicall
    Omit auto acknowledge     | H620 Auto acknowledge
    Omit PL Decode            | H643 PL decode
    Omit PL Encode            | H644 PL Encode


        To completely disable a function on the codeplug options screen it 
    is necessary that the function is either enabled or disabled on every 
    channel on the Omit functions screen. 

        The number of active channels in the current personality is 
    controlled from the 'Software Configuration' screen, <F7><F2> from the 
    main menu.  In this screen you have the oppotunity to convert the 
    personality to either 2 or 8 channel, converting to 8 channel will copy 
    all the data from the last active channel over the other channels upto 
    channel 8. 

        <F9> gives you the facility to duplicate data from one channel to 
    another, see help from the codeplug options screen for further 
    information on this. 

