        This table allows you to specify the sequences to be transmitted 
    from the PTT button.

        Before a sequence can be used in this table it must be defined on 
    the codeplug options screen.  Note that the four sequences are common to 
    both the PTT and the CALL button.  On the codeplug options screen you 
    can specify to have the ptt sequence transmitted :-
    
        i)   H958 - Every press of the PTT.
        ii)  H960 - Upon the first press of the PTT and not again until either
             the PTT has been inoperative for the duration of the reset period, 
             or the channel has not been busied for the duration of the 
             reset period.
        iii) H967 - Upon every release of the PTT button.


        The number of active channels in the current personality is 
    controlled from the 'Software Configuration' screen, <F7><F2> from the 
    main menu.  In this screen you have the oppotunity to convert the 
    personality to either 2 or 8 channel, converting to 8 channel will copy 
    all the data from the last active channel over the other channels upto 
    channel 8. 

        <F9> gives you the facility to duplicate data from one channel to 
    another, see help from the codeplug options screen for further 
    information on this. 








