     ^rHelp for Keyboard Usage^r
     
     The  following  defines  the  keys  that  are available when using the
     field  programmer  and  their  meanings.  In  general  the   following
     function keys are available:

     [Pg_dn]  This  will bring the next page of an option screen/table or a
     help text onto the screen. The pointer/cursor will be located at   the
     home position for the new page. 
     
     [Pg_up] Converse of [Pg_dn]. 





     [F1]   Calls  up  help  information  of  the active menu screen or the
     selected options. 
     
     [F2]-[F9] On a menu screen these keys are used to  select  a  specific
     option from the menu. 
     
     [F10] Exits to the next higher screen or menu. 

     [Esc] Returns the user to the main menu. 

     [Home]   This  key  moves the pointer on an option screen to the first
     position on the current screen. On a table screen it moves the  cursor
     to the top left data field. 
     
     [End] Converse of home.   

     [Tab]   This  function  moves the cursor to the next data field. For a
     table screen the cursor will be moved to the first field on  the  line
     if it is on the last field of a line. 
     
     [Shift Tab] Converse of [Tab]. 

     [Cur_ri]  Moves the cursor one character position to the right when in
     a data field. If the cursor is on the  last  character  of  the  field
     then it does not move. 
     
     [Cur_le] Converse of [Cur_ri]. 





     [Cur_dn]    Moves  the  pointer  on  an  option  screen  to  its  next
     position.  On a table screen this key will activate the field that  is
     vertically  below  the  current field. If the pointer/cursor is at the
     bottom position of the display area then the screen  may  be  scrolled
     to accommodate the new position of the pointer/cursor. 
     
     [Cur_up] Converse of [Cur_dn]. 

                         * * *  END OF HELP TEXT  * * *
