     ^rHelp for Radio Configuration^r
     
     This  menu  allows the setting of the radio hardware configuration and
     the radio serial number. Normally it is not required to set the  radio
     model.   It  is  automatically selected when reading data from disk or
     from a radio. The serial number field shows the current  radio  serial
     number. 

     When  programming a radio from scratch or when interchanging data from
     one model to another, the desired target can be selected here. 






     Radio serial number :
     
     The radio serial number will always change to the default number  when
     selecting  a  model  manually.  A new serial number can be entered for
     the target radio. The serial number is  always  ten  characters  long.
     The  first  three  characters  are  fixed to '186'. The digits 4-6 are
     alpha characters only, all entries are converted to  lowercase.   This
     gives  a  visual  indication  if  the  factory  serial number has been
     overwritten.  The digits 7-10 are numeric only. 

     Only  those  options  and  features  that  match   with   the   actual
     configuration   will be shown in the "Entry and Edit of Radio Codeplug
     Data" screen. 



     The  following  setups  can  be  defined  for   the   radio   hardware
     configuration:

     Radio Model :
     
        Model M110 CSQ/PL
        Model M110 Select 5









     Radio RF range :
     
        MB        66- 88 MHz
        VHF low  136-162 MHz
        VHF high 146-174 MHz
        UHF low  403-433 MHz
        UHF high 438-470 MHz
        UHF X1   403-433 MHz(R) 438-470(T)
        UHF X2   438-470 MHz(R) 403-433(T)

     Radio Channel Spacing :
     
        12.5 kHz channel spacing
        20.0 kHz channel spacing
        25.0 kHz channel spacing

     Radio RF power :
     
        Low  power RF PA
        High power RF PA

                         * * *  END OF HELP TEXT  * * *
