     ^rHelp for Radio Configuration^r
     
     This  menu  allows the setting of the radio hardware configuration and
     the radio serial number. Normally it is not required to set the  radio
     model,  it  is  automatically  selected when reading data from disk or
     from a radio. The serial number field shows the current  radio  serial
     number. 

     When  programming a radio from scratch or when interchanging data from
     one model to another, the desired target can be selected here. 






     ^rRadio serial number :^r
     
     The radio serial number will always change to the default number  when
     selecting  a  model  manually.  A new serial number can be entered for
     the target radio. The serial number is  always  ten  characters  long.
     The  first  three  characters  are  fixed to '186'. The digits 4-6 are
     alpha characters only, all entries are converted to  lowercase.   This
     gives  a  visual  indication  if  the  factory  serial number has been
     overwritten.  The digits 7-10 are numeric only. 







     ^rRadio model selection^r
     
     Two different M110 models can be selected,  the  Carrier  Squelch/  PL
     version or the Select 5 version. Select one of: 
     
        Model M110 CSQ/PL
        Model M110 Select 5

     Switching  from  one version to the other can result in a reset of all
     unique data  fields  to  default  data.  Data  fields  used  for  both
     versions are unchanged. 

                         * * *  END OF HELP TEXT  * * *
