     ^rFrequency band selection^r
     
     Normally  set  automatically when reading data from disk or radio. The
     frequency band can be  changed  manually  when  either  programming  a
     radio  from  scratch. Only the frequency data and model information is
     affected by this operation, all  other  data  remains  unchanged.  The
     receive  and  transmit  frequencies  and  clock shift are set to their
     default values, if the band changed (e.g. VHF to UHF).  For  a  change
     of a subband (e.g.  VHF low to VHF high) all data remains unchanged. 

         ^r Note that the actual RF frequency band of a radio is not ^r
         ^r         affected, this is for information only.          ^r

                         * * *  END OF HELP TEXT  * * *
