     ^rChannel spacing^r
     
     Normally  set  automatically when reading data from disk or radio. Can
     be manually overwritten with  this  option.  All  other  data  remains
     unchanged. 

          ^r Note that the actual Channel spacing of a radio is not ^r
          ^r      affected, this is for information only.           ^r

                         * * *  END OF HELP TEXT  * * *
