     ^rRF PA power level^r
     
     Normally  set  automatically when reading data from disk or radio. Can
     be manually overwritten with this option. 

          ^r Note that the actual RF power output of a radio is not ^r
          ^r         affected, this is for information only.        ^r

                         * * *  END OF HELP TEXT  * * *
