     ^rChannel Information^r
     
     Dependent  on  the  radio  model  settings  the  following columns can
     appear in the Channel information field:

       - CSQ/PL   model:     RF freq: Table
       - Select 5 model:     RF freq: Table   Selective Call: Table

     To enter one of the Table screens select the desired table  field  and
     press the "Enter Key"






     The table screens contain the following fields :
     
       - CSQ/PL RF freq: Table :
     
               - Channel Number
               - RF receive frequency
               - RF transmit frequency
               - Clock shift
               - PL decode frequency
               - PL encode frequency
               - Transmit admit mode
               - Monitor enable/disable




       - Select 5 RF freq: Table :
     
               - Channel Number
               - RF receive frequency
               - RF transmit frequency
               - Clock shift
               - Transmit admit mode
               - Monitor enable/disable








       - Select 5 selective Call: Table :
     
               - Channel Number
               - PL encode frequency
               - Call button Select 5 sequence
               - PTT button Select 5 sequence
               - Auto Ack. Select 5 sequence
               - Select 5 decoder enable/disable

     For  more  information  about each field use the help function on  the
     table screens. 

                         * * *  END OF HELP TEXT  * * *
