     ^rTime Out Timer / Rekey Delay^r
     
     This  option allows definition of a Transmit Time Out Time and a Rekey
     Delay. 

     Allowed data ranges for the ^rCSQ/PL^r version :
     
        Keyword  Field Programmer  Step size
     
        TIMEOUT  5-1200 sec        5 sec
        REKEY    0-255  sec        1 sec





     Allowed data ranges for the ^rSelect 5^r version :
     
        Keyword  Field Programmer  Step size
     
        TIMEOUT  1-255 sec         1 sec
        REKEY    0-255 sec         1 sec

     The field programmer automatically rounds up the  data  entry  to  the
     next valid duration the radio will handle. 

     If  no  Transmit Time Out Timer is required then the "Select Key" [F2]
     should be used. The value "0" entered in the  TIMEOUT  data  field  or
     the  "CLEAR  Key"  [F4]  can also be used to disable the Transmit Time
     out Timer. 


     To omit the Rekey Delay only the value "0" must  be  entered  or   the
     "Clear Key" [F4] should be used in the REKEY data field. 

     Enabling  the  Time  Out  Timer  sets TIMEOUT to 60 sec and REKEY to 0
     sec. 

                         * * *  END OF HELP TEXT  * * *
