     ^rEncoder Sequences A-D^r
     
     Four  independent encoder tone sequences can be defined. Each sequence
     may consist of 1-6 tones from the  tone  set  {'0'..'9',  'A','R'  and
     'k','l','m'}.   The  digits  {'0'..'9', 'A', 'R'} indicate fixed tones
     from the system tone table.  Normally it is  not  required  to  define
     the  "R"   tone when equal numbers are following. The software accepts
     sequences like "11122". 

     The digits {'k','l','m'} indicate variable  tones  from  the  display,
     which  are  filled  in at the time the sequence is used. They refer to
     the contents of the following display positions (from left to right)
     
                     1 2 3 4 5 6 7 8
                           k l   m

     Digits 'k' and 'l' are normally  used  for  multicall,  digit  'm'  is
     normally used as channel number, 

     Extended  first  tone  duration  may  be selected for each sequence by
     entering a '+' as the first character of the  sequence,  '+18121'  for
     example. 

     The 'CLEAR' key can be used to disable an encoder sequence. 

     The default encode sequence is 'disable' for all sequences A-D. 

                         * * *  END OF HELP TEXT  * * *
