     ^rDecoder code^r
     
     To  program the select 5 decoder code. A tone sequence with 2-6 tones.
     For the first tone, any of {'0'..'9', 'A', 'R'} may be entered. 

     Tones 2-6 may be entered from the toneset {'0'..'9', 'A'}. 

     Extended first tone duration may be selected by  entering  a  '+'   as
     the first character of the sequence, '+18121' for example. 

     The 'CLEAR' key can be used to disable the decoder. 

     Default decoder code is 'disabled'. 



     ^rDecoder Grouptone^r
     
     To  define  the decoder group tone out of the toneset {'0'..'9', 'A'}.
     The default decoder group tone is 'A'. 

     ^rDecoder Groupcall Level^r
     
     To define the decoder tone digits on which group call is  allowed.   A
     'G'  character  is  enterred  for  every digit which allows the group-
     tone. A '-' character is enterred for  all  digits  not  allowing  the
     group tone. 

     Use  the  [F2  key]  to disable the decoder groupcall.  This option is
     disabled by default. 


                         * * *  END OF HELP TEXT  * * *
