     ^rAuto reset^r
     
     To  select  one  of two auto reset schemes and to program the duration
     of the auto reset timer. 

     The 'SELECT' key F2 can be used to select either scheme. 

     The currently selected scheme is displayed in inverse video. 

     The auto reset timer can be  programmed  from  1-125  seconds  in  one
     second  steps.  To  disable the Auto reset timer enter a timeout value
     of '0' or use the 'CLEAR' key. 

     The default auto reset timer is 2 seconds with carrier override. 


                         * * *  END OF HELP TEXT  * * *
