                         NN   NN    OOOO   TTTTTTTT
                         NNN  NN   OO  OO     TT
                         NNNN NN  OO    OO    TT
                         NN NNNN   OO  OO     TT
                         NN  NNN    OOOO      TT
     
             OOOO    FFFFFF  FFFFFF  EEEEEE  RRRRR    DDDDD
            OO  OO   FF      FF      EE      RR  RR   DD  DD
           OO    OO  FFFFFF  FFFFFF  EEEEEE  RRRRR    DD   DD
            OO  OO   FF      FF      EE      RR RR    DD  DD
             OOOO    FF      FF      EEEEEE  RR  RR   DDDDD





     ^rExternal alarm^r
     
     To program the duration of the external alarm output. 

     The timer can be programmed from 0-63 seconds in one seconds steps. 

     To  disable  the  External  alarm  timer  enter '0' or use the 'CLEAR'
     key. 

     The default external alarm time is 7 seconds. 

                         * * *  END OF HELP TEXT  * * *
