     ^rAuto Acknowledge delay^r
     
     To program the duration of the auto acknowledge delay. 

     Valid range is 0-1984 milliseconds in 1 ms steps. 

     Enter '0' or use the 'CLEAR' key to disable the acknowledge delay. 

     The default auto ack delay is 0 ms. 

     Due  to  the  radio software algorithm generating the Auto Acknowledge
     delay,   not  every  delay  can  be  achieved   exactly.   The   Field
     Programmer   computes  the  codeplug  data  from the desired delay and
     recomputes the real Auto Acknowledge delay from this data. 
     

                         * * *  END OF HELP TEXT  * * *
