     ^rEncoder Pretime^r
     
     To program the duration of the select 5 encoder pretime. 

     Valid range is 141-1984 milliseconds in 1 ms steps. 

     ^rThis option cannot be deleted.^r

     The default encoder pretime is 141 ms. 

     Due  to  the  radio software algorithm generating the Encoder Pretime,
     not  every  delay  can  be  achieved  exactly.  The  Field  Programmer
     computes  the  codeplug data from the desired delay and recomputes the
     real Encoder Pretime from this data. 
     

                         * * *  END OF HELP TEXT  * * *
