     ^rIntersequence delay^r
     
     To program the duration of the intersequence delay. 

     Valid range is 141-1984 milliseconds in 1ms steps. 

     ^rThis option cannot be deleted.^r

     The default intersequence delay is 141 ms. 

     Due  to  the  radio  software  algorithm  generating the Intersequence
     delay,   not  every  delay  can  be  achieved   exactly.   The   Field
     Programmer   computes  the  codeplug  data  from the desired delay and
     recomputes the real Intersequence delay from this data. 


                         * * *  END OF HELP TEXT  * * *
