     ^rRadio Frequency (RF)^r
     
     The  radios  receive  and  transmit  frequency in Megahertz. The valid
     number range depends on the radios frequency band and is

           Mid band :  66.0000 -  88.0000 MHz
           VHF      : 136.0000 - 174.0000 MHz
           UHF      : 403.0000 - 470.0000 MHz

     The frequency band is automatically  set  when  reading  data  from  a
     radio  or  disk.  There  will  be  no  limitation to enter frequencies
     outside the current subrange (VHF and UHF) but a  warning  message  is
     displayed if so. 

     These  data  fields  can  not  be  left  before a valid entry has been
     made. 
     The default radio frequency is the lowest possible  frequency  of  the
     selected frequency band. 

                         * * *  END OF HELP TEXT  * * *
