     ^rClock shift^r
     
     To  select  whether the radios micro processor crystal frequency is to
     be shifted or not, it should be toggled if  there  is  any  indication
     for self quieting on a channel. 

     This  is  a  toggle  switch  with  two  selections 'YES' and 'NO'. The
     'SELECT' key F2 can be  used  to  toggle  the  current  setting.   The
     entries  'Y'  /  'YES',  or  'N' / 'NO' are also permitted to select a
     clock shift setting. 

                         * * *  END OF HELP TEXT  * * *
