     ^rMonitor inhibit^r
     
     To enable or disable the function of the radios monitor button. 

     This  is  a  toggle  field  with  two  selections  'YES'  or 'NO'. The
     'SELECT' key F2 is used to toggle the selections. In addition,  'Y'  /
     'YES' or 'N' / 'NO' can be entered to set the monitor inhibit. 

     The default monitor inhibit setting is 'NO'. 

                         * * *  END OF HELP TEXT  * * *
