     ^rPL frequency^r

     PL  codes  are not accepted from the field programmer, this table  can
     be used to convert PL codes to frequencies:

       XZ= 67.0  WZ= 69.3  XA= 71.9  WA= 74.4  XB= 77.0  WB= 79.7  YZ= 82.5
       YA= 85.4  YB= 88.5  ZZ= 91.5  ZA= 94.8  ZB= 97.4  1Z=100.0  1A=103.5
       1B=107.2  2Z=110.9  2A=114.8  2B=118.8  3Z=123.0  3A=127.3  3B=131.8
       4Z=136.5  4A=141.3  4B=146.2  5Z=151.4  5A=156.7  5B=162.2  6Z=167.9
       6A=173.8  6B=179.9  7Z=186.2  7A=192.8  M1=203.5  8Z=106.5  M2=210.7
       M3=218.1  M4=225.7  M5=233.6  M6=241.8  M7=250.3





     The following types of data entries are accepted here:

     - a PL frequency in the range 67.0-250.3 Hz  and  0.0  Hz  in  0.1  Hz
     steps

     - a blank field generated with either the space bar or with the
       CLEAR key. This has the same meaning as a frequency of zero;

     This  data  field  can only be left after a valid data entry. The data
     will be reformatted as follows:

     - if the data field was cleared or the frequency is zero, the field
       will be blank;



     Every PL frequency should be a 'real' PL frequency.  Due to the  radio
     software   decoder  algorithm  generating  the  PL  tones,  not  every
     frequency can be achieved exactly. The Field Programmer  computes  the
     codeplug  data  from  the desired PL frequency and recomputes the real
     PL frequency from this data. 

     The default PL decode frequency is 'disable'. 

                         * * *  END OF HELP TEXT  * * *
