01760010000017848401300005679160190100655320020000074784302100009190110200100983947022000115281202230011951160225001276416022700136091602600014448040262001460616026210151780502622015374050262301558005026240157900502625015988100264001636214026600168610702680017077060300001729162033000200074003301021742100330202212710034000226120303401022697030350002278205037000229332803701024041040371002423423037110252221004000025604460420002763015042030284541104204028999140421502977606042200299631604221030731120423003132011042310319341004232032463110423303304410042340336251304235034253120423703496708042900354200204291035503910429204026609042930408120704294041170080450004164014045010423972304503043375090450404368310045070440481404508044397270450904549028045100466330904511046965080451204730222045130483540804580048789140458104938811045820498380504583050031110458405043114045850510991604586051747120458705225413045880528021404589053434130456105398228046000552800504601055444080460205587107047000562300604702056514100470305710345047040595690904705059986290470606144111047070621031304708062817070470906317114047100637810704711064121100471206471209047130652641304714066088140471506688716047160678740804717068331180471806943322047190706101104720071279130472107207212047220727941004723073362100472407367906047250739840904726074519060472707480505050000750193905200076667160900007721927093000784104109301080334090930208066712093030812531009304081607150970008238626097010836660809702083928100970308418508097040844970809705084809080970608507508097070853400801500085606070150108591915015020864222101503087271200150408810818049000888361704901089689070490209003805049030902211004904090753180490509162107049060919931604907092718040490809286305049090930990404910093210050000009343800}
.m
.m
.p
.o
..
MAIN MENU                                                              1000
The  MAIN  Menu is the top level of the program from which you  select  the 
type of function that you wish to perform.  All selections are made via the 
"Function  Keys", labeled F1 thru F10, on your keyboard.  Press the  ESCape 
key to return to the MAIN Menu from any where in the program.
                                                                         
After  making a selection, you will be directed to similar menus and  /  or 
data  entry screens for RF alignment or codeplug data.  You must  initially 
load  data from a radio (or  disk) via the F3 GET/SAVE function before  you 
will be permitted to CHANGE or VIEW any codeplug data.

Call   Radius   Product Services 800-356-1520 in  Mt.   Pleasant, Iowa  for 
problems  not covered in your Radio Service Software User's manual or  your 
radio Service manual.

.P
MAIN MENU (cont)

Function Key Descriptions:

F1 - Additional  information  is available for every menu via the  F1  HELP 
     key.    Specific  help is also available for each field  on  all  data 
     entry  screens.  Generic help is available within any HELP screen  via 
     the MORE HELP function.

F2 - SERVICE  is a multi-level menu that permits access to radio  ALIGNMENT 
     and   BOARD  REPLACEMENT   screens.   Radius   contains  no   internal 
     alignment  or tuning adjustments; all alignment is performed  via  the 
     SERVICE screens.   

.P
MAIN MENU (cont)

     A radio must be connected to your computer via the RIB before you will 
     be  permitted  to  access the SERVICE screens.   All  SERVICE  screens 
     access  the codeplug directly; therefore, you do NOT have to read  the 
     codeplug  data (via the GET/SAVE functions) before using  the  SERVICE 
     screens.  
 
F3 - GET/SAVE is used to read codeplug data from a radio and/or retrieve an 
     archived  codeplug from a diskette or hard disk for  editing  purposes 
     (via  the  CHANGE/VIEW function).  GET/SAVE is also  used  to  program 
     edited codeplug data back into the radio or to create an archive  file 
     on a diskette (or hard disk).  

.P
MAIN MENU (cont)

F4 - CHANGE/VIEW  is  a multi-level menu that is used to change,  view,  or 
     modify  codeplug  features and option  configurations.     All  Radius  
     codeplug  parameters  are classified as either RADIO-WIDE  or  CHANNEL 
     related.  CHANGE/VIEW permits access to each of these categories.

     Unlike  the  SERVICE  function, a codeplug must be  loaded  into  your 
     computer's  memory (via the GET/SAVE functions) before you can  access 
     the CHANGE/VIEW screens.  You may CHANGE/VIEW an archive file  without 
     a radio connected.  


.P
MAIN MENU (cont)

F5 - A PRINT utility is available to produce permanent records of   codeplug 
     configurations  and/or RF alignment settings.  A printer  is   required 
     and should be connected to your computer per your instruction manual. 

F6 - A FILE MAINTENANCE utility is available to create sub-directory  paths, 
     delete old archive files, restore archive files, and create new back-up 
     files.

F7 - Not Used.

F8 - Not Used.

.P
MAIN MENU (cont)

F9 - SETUP  is  used to configure your  Radius  Radio Service  Software  to 
     your  particular  application.   Default  disk  drives,  communication 
     ports,  and  even  screen colors may be customized  to  your  specific 
     needs.

F10 - Select  EXIT  to quit the program and return to  DOS.   Be  sure  all 
      desired codeplug changes have been programmed back to the radio,  and 
      that  an archive copy has been made.   Otherwise all changes will  be 
      lost  since  returning  to DOS erases this data from  the  computer's 
      memory. 

.P
     
                            KEYBOARD OPERATION

      TAB (or ENTER):         Advance Cursor to Next Data Field
      Shift TAB:              Backup Cursor to Last Data Field
      UP / DOWN Arrow Keys:   Increment / Decrement Value or Selection
      LEFT / RIGHT Arrow:     Move Cursor Within Data Field
      INSERT:                 Insert Space at Current Cursor Position
      BACKSPACE:              Erase Data Within Field & Move Cursor Left
      DELETE:                 Erase Current Character
      PAGE UP / PAGE DN:      Scroll Displayed Data UP or DOWN
      HOME:                   Move Cursor To Upper Left Data Field
      F1:                     Additional Information
      F2 - F8:                Execute Labeled Function
      F10:                    Return to the PREVIOUS Menu
      ESC:                    Return to the MAIN Menu
.P

MOTOROLA Radio Service Software              Radius  Mobile
                                                       
Part # (3 1/2).......HVN9173H               Model #........
       (5 1/4).......HVN9173H               Serial #.......
Serial #.............                       Software Ver...
Software Version.....
Date.................                       Band...........
                                                  
Manual #.............6880900Z20-E      
                                                  
RIB Part #...........01-80353A74
                     HLN9214A                  
.P
CABLE Part #'s                                    
  PC/XT -> RIB.......30-80369B71
                     HKN9215A                   
  AT    -> RIB.......30-80369B72
                     HKN9216A                  
  RIB   -> Radio.....30-80070N01                  
                     HKN9217A
.P

SERVICE                                                                2000

All radio alignment and board replacement procedures are accessed from  the 
SERVICE  menu.   A radio must be connected to your computer via a  RIB  and 
cables  and the radio turned on before you will be permitted to access  the 
SERVICE screens. 
                             !!!  WARNING  !!!

Do  NOT switch radios in the middle of any SERVICE procedure.   Always  use 
the EXIT key to return to the previous menu screen before disconnecting the 
radio.  

Call  Radius  Product Services  (800) 356-1520 in Mt.  Pleasant,  Iowa  for 
problems  not covered in your Radio Service Software User's manual or  your 
radio Service manual.
.P
SERVICE (cont)

All  SERVICE screens read and program the radio codeplug directly;  you  do 
NOT  have to use the GET/SAVE functions unless you are editing or  printing 
data.   You will be prompted at each SERVICE screen to save the new  values 
before exiting the screen.

Refer  to your  Radius  Radio Service Software User's Manual  for  detailed 
service procedures.



.P
SERVICE (cont)

Function Key Descriptions:

F2 - The ALIGNMENT function is used to perform standard radio alignment  on 
     Transmitter VCO Deviation, Reference Oscillator Warp, and  Transmitter 
     Power Set.

F4 - The  UPDATE DEFAULT DATA FILE function is used to update  the  default 
     data of models stored in the Radio Service Software.

F6 - The  BOARD REPLACEMENT function is used for servicing the  radio  when 
     board   repairs   and/or  replacement  are   required.    Step-by-step 
     instructions are given for all re-alignment procedures.

.P

UPDATE DEFAULT DATA FILE                                               2100

Enter  the 30 digit data string provided with the service bulletin.   After 
entering  the data press Enter.  The data contains error  detection  coding 
and  if  the data is incorrectly entered it will be detected by  the  Radio 
Service  Software.   If  the data is not correct you will  be  prompted  to 
correct  the  data.  If the data entered is for a model not  known  to  the 
Radio  Service  Software you will need a newer version of the  software  to 
service  this model.  If the data entered is correct the default data  file 
will be updated.
.P

BLANK BOARD INITIALIZATION                                             2001

The Radio Service Software has determined that there is a Logic board  with 
an  uninitialized  EEPROM in this radio.  The EEPROM  must  be  initialized 
before calibration.

                              !!! WARNING !!!

Once an uninitialized EEPROM is programmed with default information it  CAN 
NOT BE CHANGED AGAIN.  Make sure the information on the screen is correct. 

Four pieces of information are required to determine the default date to be 
programmed  into the EEPROM.  They are Model Name, Model Number,  Frequency 
Range, and Serial Number.

.P
BLANK BOARD INITIALIZATION (cont)

Use  the UP/DOWN arrow keys to select Model Name and Number, and  Frequency 
Range. Enter the serial number from the keyboard.  This information  should 
be found on the radio.

Press F8 to program the default data into the EEPROM.

Press PgDn to see a list of products and their panel numbers. 
.P

Panel #          Product/Model Used

  0              All 2 Frequency Models : RadiusM100
                 Voice Reporter Models : H1135_, H1136_, H1138_,
                                         H1139_, H1134_
  
  1              All 8/6 & 16 Frequency Models: Radius M216/214 & M208/206

  2              All  6  Frequency Models with  Signalling or Accessory 
                 Connector Option : Radius M204

.P

Panel #          Product/Model Used

 51              Radius M800 Trunked : D__LRA5GB3_K

 53              Radius M805 Trunked : D__LRA5GB7_K

 55              Trunked Voice Reporter : H5011_

 56              Radius M800 Trunked : D__LRA5GB4_K
.P

ALIGNMENT                                                              2200

Refer  to your  Radius  Radio Service Software User's Manual for  ALIGNMENT 
procedures.

Standard  periodic  alignment procedures are performed from  the  ALIGNMENT 
Menu.  These include:

              Transmitter VCO Deviation Adjustment
              Reference Oscillator Warp Adjustment
              Transmitter Power Set 
.P

DEVIATION                                                              2230

Refer  to  your   Radius   Radio Service Software  User's  Manual  for  the 
DEVIATION ALIGNMENT procedure.

Transmitter  Deviation is increased or decreased by first keying the  radio 
via  F6,  and  then by pressing the UP/DOWN  arrow  keys  respectively.   A 
relative  deviation  value will be displayed, but  the  actual  transmitter 
deviation  must  be determined from your service monitor.  The  radio  will 
transmit  on  the test frequencies displayed on the screen  and  should  be 
terminated into a 50 ohm load or service monitor.  

Using  the UP/DOWN arrow keys, adjust Tx Deviation per your User's  Manual. 
Press F6 again to de-key the radio, and then press F8 to program the  value 
to the radio.
.P

REFERENCE OSCILLATOR                                                   2250

Refer  to  your   Radius   Radio Service Software  User's  Manual  for  the 
REFERENCE OSCILLATOR ALIGNMENT procedure.

The  Reference Oscillator is warped by first keying the radio via  F6,  and  
then  by  pressing the UP/DOWN arrow keys respectively.   A  relative  warp 
position  will be displayed, but the actual transmitter frequency  must  be 
determined from your frequency counter or service monitor.  The radio  will 
transmit  on  the  test frequency displayed on the  screen  and  should  be 
terminated into a 50 ohm load or service monitor.

Using  the UP/DOWN arrow keys, adjust the Reference Oscillator Warp to  the 
displayed frequency.  Press F6 again to de-key the radio, and then press F8 
to program the value to the radio.
.P

TRANSMITTER POWER                                                      2270

Refer  to  your   Radius   Radio Service Software  User's  Manual  for  the 
TRANSMITTER POWER ALIGNMENT procedure.

Transmitter Power is adjusted by first keying the radio via F6, and then by 
pressing the UP/DOWN arrow keys to increase or decrease power respectively. 
A  relative Tx Power value (not watts!) will be displayed, but  the  actual 
transmitter power output must be determined from your service monitor.  The 
radio  will  transmit  on the test frequency displayed on  the  screen  and 
should be terminated into a 50 ohm load or service monitor.

Using the UP/DOWN arrow keys, adjust the Transmitter Power per your  User's 
Manual.   Press F6 again to de-key the radio, and then press F8 to  program 
the value to the radio.
.P

BOARD REPLACEMENT                                                      2600

Refer to your  Radius  Service Manual for BOARD REPLACEMENT procedures.
.P

LOGIC BOARD or RF BOARD                                                2620

Refer  to  your   Radius  Service Manual  for  LOGIC/RF  BOARD  REPLACEMENT 
procedures.

This  menu is structured for execution of the calibration procedures  in  a 
top-to-bottom order to ensure proper calibration.

Steps  7 & 8 are model-dependent and will be by-passed for  non  applicable 
models.

                             !!!  WARNING  !!!

After  Step  8  is completed, the radio codeplug should be  READ  and  then 
archived (SAVED) via the GET/SAVE functions.
.P

REFERENCE CRYSTAL DATA                                                 2621

Refer  to your  Radius  Radio Service Software User's Manual  for  entering 
the Crystal Coefficient Data.  
.P

CALIBRATE Tx POWER                                                     2622

Refer  to  your   Radius   Radio Service Software  User's  Manual  for  the 
TRANSMITTER POWER CALIBRATION procedure. 
.P

CALIBRATE Tx DEVIATION                                                 2623

Refer  to  your   Radius   Radio Service Software  User's  Manual  for  the 
TRANSMITTER DEVIATION CALIBRATION procedure. 
.P

PL DEVIATION                                                           2624
 
Refer  to  your  Radius  Radio Service Software User's Manual  for  the  PL 
DEVIATION ALIGNMENT procedure. 
.P

DPL DEVIATION                                                          2625

Refer  to  your  Radius  Radio Service Software User's Manual for  the  DPL 
DEVIATION ALIGNMENT procedure. 

                             !!!  WARNING  !!!  

After  Step  8  is completed, the radio codeplug should be  READ  and  then 
archived (SAVED) via the GET/SAVE functions.
.P

POWER AMPLIFIER BOARD                                                  2640

Refer  to  your   Radius   Service Manual for  the  POWER  AMPLIFIER  BOARD 
REPLACEMENT procedures.

This  menu is structured for execution of the calibration procedures  in  a 
top-to-bottom order to ensure proper calibration.


                             !!!  WARNING  !!!  

After  Step  2  is completed, the radio codeplug should be  READ  and  then 
archived (SAVED) via the GET/SAVE functions.
.P

DISPLAY BOARD                                                          2660

Refer  to  your  Radius  Service Manual for the DISPLAY  BOARD  REPLACEMENT 
procedure.

No ALIGNMENT procedures are required.
.P

SWITCH BOARD                                                           2680

Refer  to  your  Radius  Service Manual for the  SWITCH  BOARD  REPLACEMENT 
procedure.

No ALIGNMENT procedures are required.
.P
GET/SAVE                                                               3000

The  GET/SAVE functions are used to transfer codeplug data from your  radio 
or an archive file into your computer in order for you to Change, View,  or 
Print it.  GET/SAVE functions also permit you to PROGRAM modified data back 
into your radio or to SAVE a copy of the codeplug data in an archive file.

                             !!!  WARNING  !!!

Do  NOT  turn  off  the radio or disconnect  it  from  the  computer  while 
attempting  to PROGRAM the codeplug.  Interrupting the programming  process 
WILL destroy the codeplug contents and completely DISABLE the radio!


.P
GET/SAVE (cont)

Function Key Descriptions:

F2 - The READ CODEPLUG function reads the information (data) stored in  the 
     radio codeplug (EEPROM) and transfers it to the computer's memory.

     A  radio and RIB must be properly connected to the computer and  power 
     turned on before you attempt the READ function.

     The  time  required to READ a codeplug will depend  directly  on  your 
     computer  type  and  the size of the codeplug you  are  reading.   The 
     status of the READ operation is displayed at the bottom of the screen.

.P
GET/SAVE (cont)

F3 - The  GET  FILE  function is used to retrieve an archive  file  from  a 
     diskette  or hard disk to the computer.  Once retrieved, the file  may 
     be  modified via the CHANGE/VIEW functions or programmed into a  radio 
     just  as  codeplug  information read from the radio via  the  F2  READ 
     function.

F5 - The CLONE CODEPLUG function is used to clone codeplug information from
     either an archive file or a radio to another radio.  Refer to the RSS
     user manual for instructions on this function.

.P
GET/SAVE (cont)

F7 - The  SAVE FILE function is used to create (or update) an archive  copy 
     of the codeplug information onto a diskette or hard disk.   An archive 
     copy  of every radio installed or serviced is STRONGLY recommended  in 
     order to be able to quickly restore customer information is case of  a 
     codeplug failure.  

.P
GET/SAVE (cont)

F8 - The PROGRAM CODEPLUG function is used to transfer codeplug information 
     from the computer to the radio codeplug.  

     A  radio and RIB must be properly connected to the computer and  power 
     turned on before you attempt the PROGRAM function.

     The  time required to PROGRAM a codeplug will depend directly on  your 
     computer  type and the size of the codeplug you are programming.   The 
     status  of  the PROGRAM operation is displayed at the  bottom  of  the 
     screen. 

.P

GET FILE                                                               3300

The  GET FILE function is used to retrieve an archive file from a  diskette 
or hard disk.  Once retrieved, the file may be modified via the CHANGE/VIEW 
functions or programmed into a radio just as codeplug information read from 
the radio via the F2 READ function. 

Use  the TAB (or ENTER) key to select the serial number of the radio to  be 
retrieved.    The  corresponding  model  number,   customer  identification 
information,  and  the date the file was made will be displayed across  the 
middle  of  the screen.    The F8 function key is used to GET the  selected 
file as described below.

.P
GET FILE (cont)

Function Key Descriptions:

F2 - The  CHANGE  ARCHIVE function is used to specify  the  directory  path 
     where  the  archive file is to be located.   The default archive  path 
     will  always be the specified default path  from the SETUP  Menu  (See 
     MAIN MENU, F9).

F5 - The  PRINT ARCHIVE function prints a summary of the archive files in
     the current archive path.


.P
GET FILE (cont)

F6 - The  ENTER S/N (serial number) function permits you to enter  directly 
     the  serial number of the file you wish to retrieve.   After  entering 
     the  serial  number,  press  ENTER and the computer  will  search  the 
     specified  directory path to locate the file for that  serial  number.
     The  F8  function  key is used to GET the selected file  as  described 
     below.

F8 - The  GET SELECTED function is used to GET the archive file highlighted 
     on the screen.   After the file is retrieved, the computer will return 
     to the GET/SAVE menu.

.P

ARCHIVE PATH                                                           3301

Enter  the  directory path where the archive file is to  be  located.   

The  default archive path will always be the specified default  path   from 
the SETUP Menu (See MAIN MENU, F9).

Please  refer to your computer owner's manual for a complete description of 
directories and path names.
.P

SERIAL NUMBER                                                          3302

Enter  the  serial  number of the codeplug archive file that  you  wish  to 
retrieve and press ENTER.  The computer will search the specified directory 
path  to  locate the file if it exists.   Only the specified path  will  be 
searched.

Once the  file  is located,  press F8 to GET the SELECTED file.   A  Status 
message will inform you if the file does not exist on the specified path.
.P

TCMS UPDATE                                                            3400

.P

TCMS PATH                                                              3401

.P

CLONE ARCHIVE FILE                                                     3500 

Refer to the Radio Service Software Manual for instructions.

.P

SAVE FILE                                                              3700

The SAVE FILE function is used to create (or update) an archive copy of the 
codeplug information onto a diskette or hard disk.  If you are creating the 
file  on  a hard disk,  you will automatically be instructed to backup  the 
data onto a diskette. 

An optional 15-character name can be given to an archive file to facilitate 
tracking.  

You  are  STRONGLY  encouraged  to  make an archive  copy  of  every  radio 
installed  or  serviced  in order to be able to  quickly  restore  customer 
information is case of a codeplug failure.  

.P
SAVE FILE (cont)

Function Key Descriptions:

F2 - The  CHANGE  ARCHIVE function is used to specify  the  directory  path 
     where  the  archive file is to be located.   The default archive  path 
     will  always be the specified default path  from the SETUP  Menu  (See 
     MAIN MENU, F9).

F8 - The  SAVE FILE function executes the save process.   Do NOT  press  F8 
     until you have entered the customer identification information.  


.P

CUSTOMER ID                                                            3701

Enter  an  optional  15-character  (max)  name  for  the  archive  file  to 
facilitate tracking purposes. 
.P
BACKUP FILE                                                            3710

The BACKUP FILE procedure is used to make a backup copy of any archive file 
SAVED on a hard disk.   If you are archiving to a diskette, you will NOT be 
prompted  for a backup.  

Diskette  backups should be handled via standard DOS file copy  procedures.  
Refer to your computer user's manual for additional information.

.P
BACKUP FILE (cont)

Function Key Descriptions:

F2 - The CHANGE BACKUP path function is used to specify the directory  path 
     where the backup file is to be located.   The default backup path will 
     always  be  the specified default path  from the SETUP Menu (See  MAIN 
     MENU, F9).

F8 - The MAKE BACKUP function executes the backup process.  After verifying 
     that  the Backup Path is correct and the backup diskette is installed, 
     press F8 to make the backup copy.   You will automatically be returned 
     to the GET/SAVE menu.
.P

BACKUP PATH                                                            3711

Enter  the  directory path where the backup file is to  be  located.   

The default backup path will always be the specified default path  from the 
SETUP Menu (See MAIN MENU, F9).

Please  refer to your computer user's manual for a complete description  of 
directories and path names.
.P
}
CHANGE/VIEW                                                            4000

CHANGE/VIEW is a multi-level menu that is used to change,  view,  or modify 
codeplug features and option configurations.    All codeplug parameters are 
classified  as either RADIO-WIDE or CHANNEL related.   CHANGE/VIEW  permits 
access to each of these categories.

Unlike the SERVICE function, a codeplug must be loaded into your computer's 
memory  (via the GET/SAVE functions) before you can access the  CHANGE/VIEW 
screens.  You may CHANGE/VIEW an archive file without a radio connected.  


.P
CHANGE/VIEW (cont)

Warning:  CHANGE/VIEW does NOT actually modify the radio codeplug data, but 
          instead  it  modifies  a  copy of the  data  retrieved  from  the 
          codeplug (or archive file) via the GET/SAVE functions.

          After  all  CHANGE/VIEW modifications  are  completed,  you  MUST 
          return to the GET/SAVE menu and PROGRAM the changes back into the 
          radio  or  SAVE  them  to a  new  archive  file.   Otherwise  the 
          modifications will be lost when you turn off your computer. 


.P
CHANGE/VIEW (cont)

Function Key Descriptions:

F2 - RADIO-WIDE  Configuration is used to CHANGE/VIEW radio parameters  and 
     options that affect overall radio operation, i.e. those not related to 
     a specific channel such as the time-out-timer. 

F5 - MODE Configuration is used to CHANGE/VIEW channel specific information 
     such as frequencies, squelch type, squelch codes and scan lists.

.P
CHANGE/VIEW (cont)

F6 - PHONE MEMORY Configuration is used to CHANGE/VIEW a list of phone
     numbers which can be auto dialed via the SELECT button.

F7 - SIGNAL SYSTEM Configuration is used to CHANGE/VIEW Signalling System 
     parameters and options such as ID's, Pretimes, and Emergency operation.

F9 - CALL  LIST Configuration is used to CHANGE/VIEW Call List  parameters 
     such as ID's, Acknowledge Expected, and Strip PL.  
.P

CHANGE/VIEW RADIO-WIDE CONFIGURATION                                   4000

RADIO-WIDE  Configuration  is  used to  CHANGE/VIEW  radio  parameters  and 
options that affect overall radio operation, i.e. those not just related to 
a specific channel such as the time-out-timer. 

Warning:  CHANGE/VIEW does NOT actually modify the radio codeplug data, but 
          instead  it  modifies  a  copy of the  data  retrieved  from  the  
          codeplug (or archive file) via the GET/SAVE functions.

          After  all  CHANGE/VIEW modifications  are  completed,  you  MUST 
          return to the GET/SAVE menu and PROGRAM the changes back into the 
          radio  or  SAVE  them  to a  new  archive  file.   Otherwise  the 
          modifications will be lost when you turn off your computer. 
.P

TIME-OUT-TIMER (TOT)                                                   4203

If Enabled, the TOT will limit the maximum time allowed for any  continuous 
transmission  from  1  to 255 seconds on all  transmit  channels.   Receive 
operation is not affected by the TOT.

Use  the UP/DOWN arrow keys to select the desired time.  You will  see  the 
display  change  in  one second increments.  The data  field  may  also  be 
changed  by typing the desired time or "OFF" from the keyboard.  The  range 
is from OFF to 255 seconds.
.P

SECOND PRIORITY SCAN                                                   4204

Only  certain models of the  Radius radio are capable of  scanning  receive 
mode  frequencies.  Scanning radios have two priority frequencies that  are 
scanned  periodically  whether or not there is channel activity.   In  Mode 
Slaved  Scan the first priority is the current Mode displayed when Scan  is 
activated.   The  second  priority is radio wide and  can  be  selected  or 
disabled on this screen.

You  may enter the Mode Number for the desired second priority or  you  may 
enter 'OFF' which will remove the second priority.  You may also use the up 
and  down arrow keys to select the desired Mode.  If the Mode  is  invalid, 
you will be prompted for a new value. 
.P

SERIAL NUMBER                                                          4215

The radio Serial Number, which is stored in the codeplug, can be viewed but 
cannot be changed.  

.P

EMERGENCY ENABLE                                                       4220  

Emergency  is a "Radio Wide" feature instead of a "Mode" feature  to  allow 
Emergency  to  be available at all times even when the radio is on  a  non-
signalling  mode.  Use  the  Up/Down arrow keys to select a  "standard"  or 
"silent" emergency or no,  "none",  emergency.  It is recommended that this 
field  be  set  to "NONE" whenever there is NO  Emergency  Switch  function 
enabled on the "Other Accessory" screen. 

                                NOTE

It is important to have a emergency switch connected to the radio when  the 
codeplug is changed.  If you do not the radio will immediately go into  the 
Emergency sequence and turn on the transmitter.

.P

EMERGENCY REVERT MODE                                                  4221

This is the mode number on which the Emergency Alarm will be transmitted.
This mode must have a valid signalling system assigned to it. 

To transmit the Emergency Alarm on the mode selected by the operator of the
radio, enter 00 (or NONE) for this field.

It is recommended that the emergency revert mode be used in order that all
emergency alarms in the system will be directed to the same mode.  If no
emergency mode is selected, all modes must be programmed to transmit an 
emergency alarm.
.P
PRIORITY SAMPLING RATE                                                4230

When the channel scan is stopped on a non-priority channel, it periodically 
"looks back" at the priority channel for activity.  The rate at which  this 
"look  back"  occurs  is  the priority sample  rate.   The  are  two  rates 
available,  slow  and fast.  Slow is 1.5 seconds between "look  backs"  and 
Fast is 0.5 seconds between "look backs".  Slow is the default.  To  change 
the sample rate use the up and down arrow keys to select the rate.

Note : Earlier radio software versions do not support this feature! 
.P

HANDSET                                                               4231

The  radio needs to know when a handset is connected to the radio in  order 
to  know when to mute the loudspeaker.  The loudspeaker is muted  when  the 
handset  is removed from the hang-up cup.  To enable handset  muting,  move 
the  cursor  to the Handset data field and use the up and  down  arrows  to 
select "N" for no handset muting and "Y" for handset muting.

Note : Earlier radio software versions do not support this feature!
.P

SCAN TALK BACK                                                        4232

The conventional channel scan has the capability to revert to the home mode 
(home  revert) or stay on the busy channel (talk back) when the  microphone 
is removed from the hang-up clip.  These capabilities are now  programmable 
from  Radio  Service  Software.  The default is  home  revert.   To  change 
capabilities  use the up and down arrow keys to select "N" for home  revert 
scan and "Y" for talk back scan.

Note: Earlier radio software versions do not support this feature!.  
.P

ACC INTERNAL                                                           4233

Internal  accessories are accessories that are physically placed inside the 
radio and do not actually use the connector.  Connections are made internal 
to  the radio but still use the pin functions.  At this time there is  only 
one Internal Accessory.  This is the DTMF decoder board. The decoder should 
be installed in the radio BEFORE programming. Use the Up/Down arrow keys to 
either enable or disable the DTMF decoder board. Trunked radios do not have 
any internal accessory.   
.P

ACC EXTERNAL                                                           4234

External Accessories interface to the radio through the Expanded  Accessory 
Connector.  Using  the  Up/Down  arrow keys will scroll  through  the  five 
external accessories  -  1.  Public Address,   2.  Remote,  3. General I/O,  
4.  Phone Patch, 5.  Moden Paging, and 6. RPB50 Interface.

                        !!!! WARNING !!!!

Once  ANY  of the external accessory information has been changed from  the 
default  values,  the  information  will be lost  if  you  switch  external 
accessories using the Up/Down arrow keys. 
.P

OTHER RADIO WIDE                                                       4235
 
These  enable the different types of calls that can be made from the call 
list as you press the Select button on the front panel of the radio.  Voice 
Selcall  is represented by an "SC" on the front panel of  the  radio.  Call 
Alert is represented by a "CA" on the front panel of the radio. Radio Check 
is represented by a "CH" on the front panel of the radio (ONLY MDC1200 call 
list  entries).  Only  turn on the particular types of calls your  customer 
needs.

Note  :  On  2  channel radios,  it is not recommended that  any  of  these 
features be turned on because there is no Select button to access them.   
.P
SCAN HANG TIME                                                         4237

The Scan Hang Time determines how long the radio will remain on the channel
after receiving the end of a transmission.  During this time, the radio
will still perform priority samples as required.  The scan hang time should
be as short as necessary to maintain message continuity.  The default value
is 2.5 seconds.  The hang time can range from 0.0-4.1 seconds.

.P
OPTION CONNECTOR                                                       4290
.P

FUNCTION DESCRIPTION                                                   4291    
                             !! WARNING !!
  
Mismatching  the Data Direction with the accessory may result in damage  to 
the  radio  or accessory or both.  Therefore,  use caution  when  selecting 
functions for non standard accessories.  The direction is determined by the 
selected function and is not programmable.  ALWAYS program the radio BEFORE 
connecting  a new option.  Also verify that the new option does not  exceed 
the limits of the radio's drive circuitry. In general, the limits look like 
this:                                                 
                    outputs:  open collector, 200 mA amximum drive           
                              with a saturation voltage of 0.3 V max.       
                    inputs:   0 to 16 Volts, signals below 1.0 V logic low, 
                              signals above 3.0 V are logic high.     
.P
Each  programmable  pin  has a limited number of functions  that  can  be 
assigned  to  it.  Some  internal and  external  accessories  need  certain 
functions  in  order  to  operate  properly.  These  functions  are  called 
'dependent'  functions.  Dependent functions will NOT changed and will  get 
skipped.  Remaining functions are 'independent' of specific accessories and 
are  called  'independent'  functions.   "General  I/O"  with  no  internal 
accessory allows the most programmable 'independent' functions.

WARNING:  Do not use the SAME 'independent' function more than once on this 
          screen.  The radio will not respond as expected to two or more of 
          the same 'independent' functions. 
.P
The following is a list of the available independent functions:

function: Null            
  pin(s): 4,6,8,9,12,14                                
 purpose:  The  correct  definition  for any pin which is not  being  used. 

function: External Alarm
  pin(s): 4
 purpose:  An  output  which can drive a normally  open  relay.  The  relay 
           connects to the vehicle horn/lights. Driven by an open collector 
           transistor which saturates to A+,  with the capability to source 
           200 mA. 
.P
function: Tx PL Inhibit
  pin(s): 6,8,9,12,14
 purpose:  An input which can inhibit the generation of PL while the  radio 
           is  transmitting.  A typical application would be 'stripping PL' 
           when sending a page from an attached paging  terminal.  Normally 
           this  line should be toggled prior to asserting PTT,  since  the 
           radio  will need to dekey and rekey if the line is toggled while 
           transmitting. 

function: TOC Disable
  pin(s): 6,8,9,12,14
 purpose: This input to the radio will disable the generation of PL reverse 
          burst and DPL turn off code when a transmission ends. This can be 
          useful  for some base station and phone patch  setups. 
.P
function: Tx Audio Mute
  pin(s): 6,8,9,12,14
 purpose:  This  input to the radio mutes the MIC AUDIO input,  allowing an 
           external  option to drive the FLAT TX AUDIO INPUT.  This is  for 
           connections to paging encoders,  data terminals,  etc. To ensure 
           that the transmit deviation never exceeds the legal limits,  the 
           device  connected should not gate audio to FLAT TX  AUDIO  INPUT 
           unless  Tx  Audio  Mute is asserted FIRST. 

function: PL/DPL & CSQ Detect
  pin(s): 4,8,12,14
 purpose:  This output from the radio indicates that a carrier with correct 
           PL is present. 
.P
function: CSQ Detect
  pin(s): 4,8,12,14
 purpose:  This  output from the radio indicates that there is a carrier on 
           the channel. 

function: Emergency Switch
  pin(s): 6,8,9,12,14
 purpose: This input to the radio is used in conjunction with signalling to 
          send  and receive emergency alarms.  It defaults to  the  correct 
          active level for a normally closed switch connected to ground. It 
          is  recommended that this function be removed when the  Emergency 
          Alarm  field on the RADIO WIDE screen is set to 'NONE'.  
.P
The following is a list of independent functions that are ONLY available on
radios with V21.00 or later software:

function: Rx Audo Mute 
  pin(s): 6,8,9,12,14
 purpose: This input to the radio mutes receive audio for data applications.

function: Special Off Hook
  pin(s): 6,8,9,12,14
 purpose: This input to the radio readies the audio amplifier to accept
          externally generated sidetones.

function: Channel Steer 1-3
  pin(s): 6,8,9,12,14
 purpose: This input to the radio works as a BCD channel selector input.
.P
DEBOUNCE                                                               4292

Debounce determines whether the radio waits a short period of time before 
acting.  This  is  done to make sure that any mechanical switch  bounce  is 
accounted for.  It is only active on INPUTS. Debouncing is usually required 
for  pins that are driven by relays or other mechanical devices.  Functions 
that  have Debounce as "NO" should not use relays or mechanical devices  to 
drive them. Use the Up/Down arrow keys to enable "Yes" or disable "No".
.P

ACTIVE LEVEL                                                           4293

Active  Level determines whether the pins will become active on either  a 
high voltage or a low voltage.  Some non standard accessories may not  have 
the  same active level as the default active level.  Use the Up/Down  arrow 
keys to enable "High" or disable "Low".
.P

POWER UP DELAY                                                         4294

The radio ignores the active levels on the programmable pins during power 
up.  This  is done to give the accessory device time to initialize  itself. 
The time that the radio delays is the Power Up Delay.  The default time for 
this  delay  is 0.2 seconds.  If this delay needs to be  changed,  use  the 
Up/Down arrow keys. This value can range from 0.0 seconds to 4.3 seconds.
.P

CHANGE/VIEW MODE CONFIGURATION                                         4500

MODE Configuration is used to CHANGE/VIEW channel specific information such 
as frequencies, squelch type, squelch codes, and scan lists.

Warning:  CHANGE/VIEW does NOT actually modify the radio codeplug data, but 
          instead  it  modifies  a  copy of the  data  retrieved  from  the 
          codeplug (or archive file) via the GET/SAVE functions.

          After  all  CHANGE/VIEW modifications  are  completed,  you  MUST 
          return to the GET/SAVE menu and PROGRAM the changes back into the 
          radio  or  SAVE  them  to a  new  archive  file.   Otherwise  the 
          modifications will be lost when you turn off your computer. 
.P

NAME                                                                   4501

NAME  is the number displayed on the two digit seven segment display.   The 
NAME  data field allows the number displayed to be different than the  mode 
number.  This,  for  example,  allows  the channels to be displayed  in  an 
unusual  order such as 1,2,4,5.  Any sequence desired can be chosen.  A few  
words of caution should be given:
    
     a.   Earlier radio software versions do NOT support this feature! 
     b.   The name will have no effect on 2 channel radios.

.P

     c.   Choose names  which  are not easily  confused  with  the  numbers 
          displayed by the call list entries.
     d.   On  low  band radios there may be difficulties viewing the  noise 
          blanker status.
     e.   When programming a user scan list,  channel names greater than 19 
          tend to be hard to recognize.   

Valid numbers are between 01 and 99.
.P



RECEIVE FREQUENCY                                                      4503

Enter  the RECEIVE frequency directly in MHz.   

Blank RECEIVE frequencies are NOT allowed.

Refer  to the MOTOROLA Catalog Sheets / Price Pages or your Service  Manual 
for valid RECEIVE frequencies for this model.
.P

TRANSMIT FREQUENCY                                                     4504

Enter  the TRANSMIT frequency directly in MHz.   

For a "Receive-Only" channel,  enter a B.   The TRANSMIT frequency will  be 
displayed as BLANK.

Refer  to the MOTOROLA Catalog Sheets / Price Pages or your Service  Manual 
for valid TRANSMIT frequencies for this model.
.P

SQUELCH TYPE                                                           4507

Use  the UP/DOWN arrow keys to select the SQUELCH type:

     CSQ - Carrier Squelch
     TPL - Private Line
     DPL - Digital Private Line.
     INV.DPL - Inverse DPL

Data  fields  for transmit and receive codes will be displayed for  PL  and 
DPL.


.P

PL SQUELCH CODE                                                        4508

Enter  the  PL  frequency  directly in  Hz  (Ex:   192.8),   or  enter  the 
alphanumeric code (Ex:  7A).
 
Enter a B for Carrier Squelch operation.

Valid codes may also be selected via the UP/DOWN arrow keys.

Standard PL frequencies are listed on the next page:


.P
PL SQUELCH CODE (cont)

Standard Private Line Frequencies / MOTOROLA Code:

Freq  Code    Freq  Code     Freq  Code     Freq  Code     Freq  Code     
67.0   XZ     91.5   ZZ      123.0  3Z      167.9  6Z      225.7  M4
69.3   WZ     94.8   ZA      127.3  3A      173.8  6A      229.1  9Z
71.9   XA     97.4   ZB      131.8  3B      179.9  6B      233.6  M5
74.4   WA     100.0  1Z      136.5  4Z      186.2  7Z      241.8  M6
77.0   XB     103.5  1A      141.3  4A      192.8  7A      250.3  M7
79.7   WB     107.2  1B      146.2  4B      203.5  M1
82.5   YZ     110.9  2Z      151.4  5Z      206.5  8Z
85.4   YA     114.8  2A      156.7  5A      210.7  M2
88.5   YB     118.8  2B      162.2  5B      218.1  M3
.P

DPL SQUELCH CODE                                                       4509
Enter  the  DPL  code  directly (Ex:  031);  note that  leading  zeros  are 
required.  

Enter a B for Carrier Squelch operation.

Valid codes may also be selected via the UP/DOWN arrow keys.

Valid DPL codes are listed on the next page:



.P
DPL SQUELCH CODE (cont)

Valid DPL Codes:

Code   Code    Code    Code    Code    Code    Code    Code    Code
023    071     134     223     306     411     503     631     732 
025    072     143     226     311     412     506     632     734 
026    073     152     243     315     413     516     645     743    
031    074     155     244     331     423     532     654     754    
032    114     156     245     343     431     546     662         
043    115     162     251     346     432     565     664         
047    116     165     261     351     445     606     703         
051    125     172     263     364     464     612     712         
054    131     174     265     365     465     624     723         
065    132     205     271     371     466     627     731
.P

RX SIGNALLING SYSTEM                                                   4510

Enter the number of the Signalling System that is desired for the  receiver 
of  this  mode. Signalling Systems are set-up under the  Signalling  System 
Configuration Screen.   

If there is no Signalling System for this mode enter "00".

.P

TX SIGNALLING SYSTEM                                                   4511

Enter  the  number  of  the  Signalling  System that  is  desired  for  the 
transmitter of this mode. Signalling Systems are set-up under the  
Signalling System Configuration Screen.  

If there is no Signalling System for this mode enter "00".
.P

BUSY CHANNEL LOCKOUT                                                   4512

Busy  Channel Lockout may be enabled by choosing "Y".  When enabled,  the 
radio will be 'polite' to other users on the channel.  In other words,  the 
radio will not let you hear conversations of other users and will not allow 
you  to transmit on top of another user.  The only calls you will hear  are 
those  with  your PL code,  even if you are off hook or press  the  monitor 
button.  If  you  press PTT on the radio while there is a  carrier  on  the 
channel, the radio follows this protocol:

.P

          a. If the carrier has your PL, then you are allowed to transmit
             just like normal.
          b. If the carrier has no PL or the wrong PL, then you will hear
             a  busy  tone while you hold PTT.  Release PTT and  try  again 
             later.

If you choose "N", then the radio will transmit and receive like a normal 
two-way radio.     

NOTE : Earlier radio software version do NOT support this feature!
.P

PHONE SIGNALLING SYSTEM                                                4513

This  lets  you assign the phone access/deaccess code on  a  mode  basis. 
Enter  here  the number of the DTMF/PHONE signalling system  that  has  the 
access and deaccess code you want to use on this channel. The access  (ANI) 
sequence  is  sent  when the 'select' button is pressed. If  phone  is  not 
desired, do NOT assign a system here.
.P
 
MODE UTILITY                                                           4580

The  MODE  UTILITY  screen is used for  adding,  deleting,  or  moving  the 
location  (order)  of  Conventional  modes.    Modes  may  also  be  copied 
(duplicated), including scan lists (Mode-Slaved only).

TCMS must be used for all Trunking mode modifications.

The  F8  (EXECUTE)  function key is used to execute the  changes  once  all 
information has been entered.

The  GET/SAVE functions must be used to program the changes into the radio, 
as is required for all CHANGE/VIEW modifications. 
.P

UTILITY (Default = Add Mode)                                           4581

Use  the  UP/DOWN arrow keys to select the desired UTILITY  function:   Add 
Mode, Copy Mode, Delete Mode, or Move Mode.

The  F8  (EXECUTE)  function key is used to execute the  changes  once  all 
information has been entered.

The  GET/SAVE functions must be used to program the changes into the radio, 
as is required for all CHANGE/VIEW modifications.
.P

MODE TYPE (Default = Conventional)                                     4582

Mode Type is Conventional and cannot be changed.  TCMS must be used for all 
Trunking mode modifications.
.P

INSERT AT MODE (Default = Blank)                                       4583

Enter the mode number that the mode is to be INSERTED AT.

After entering this number and pressing Enter,  the mode name for that mode 
will  be  displayed.   Use  the name to verify that the proper  number  was 
entered.

For  Dual-Mode  radios,  all Trunking modes must precede  all  Conventional 
modes.
.P

NEW MODE NAME (Default = Mode nn)                                      4584 

Enter the 8-character alpha-numeric MODE NAME.   The Mode Name will default 
to "Mode nn", where nn = mode number.  If Mode Names are disabled, you will 
not be able to change this field. 

Each  mode  may be assigned a Name to facilitate ease  of  operation.   The 
[Mode] rocker button is used to scroll forward or backward through the list 
of modes programmed in the radio.

Since  the mode number is required for direct keypad mode selection via the 
[Home] button for keypad models,  using the mode number as part of the mode 
name is desirable, but not required.
.P

MODE TO COPY FROM (Default = Blank)                                    4585

Enter the Mode Number TO COPY FROM.  Any valid conventional mode number may 
be entered.

After entering this number and pressing Enter,  the mode name for that mode 
will  be  displayed.   Use  the name to verify that the proper  number  was 
entered.

Frequencies  (Rx,  Tx,  T/A),  squelch type,  squelch codes,  and all  mode 
options  will  be copied.   You may choose to copy the  channel  scan  list 
(mode-slaved  only)  or  to enter a new one.

This  field is required for the Copy Mode function;  it is optional for the 
Add Mode function.
.P

COPY SCAN LIST (Default = N)                                           4586

Use the UP/DOWN arrow keys to select Y to copy the channel scan list (mode-
slaved only) or N for a blank list.

If  the  copied  list  is full (16 modes),  the new mode  will  assume  the 
priority of the copied mode and the copied mode will not be part of the new 
list. 

Otherwise,  the new mode will assume the priority of the copied  mode,  and 
the copied mode will be a non-priority mode on the new list.
.P

MODE TO COPY TO (Default = Blank)                                      4587

Enter  the Mode Number TO COPY TO.

After entering this number and pressing Enter,  the mode name for that mode 
will  be  displayed.   Use  the name to verify that the proper  number  was 
entered.

Frequencies  (Rx,  Tx,  T/A),  squelch type,  squelch codes,  and all  mode 
options  will  be copied.   You may choose to copy the  channel  scan  list 
(mode-slaved  only)  or  to  enter a new one after returning  to  the  Mode 
Configuration screen.
.P

MODE TO DELETE (Default = Blank)                                       4588 

Enter the Mode Number TO DELETE.  

After entering this number and pressing Enter,  the mode name for that mode 
will  be  displayed.   Use  the name to verify that the proper  number  was 
entered.

CAUTION:  After  the F8 (EXECUTE) function key has been pressed,  the  mode 
          will be deleted and may not be recovered.  However, if you make a 
          mistake  AND the data has not been programmed or saved  (GET/SAVE 
          functions), you may re-read the codeplug or original archive file 
          and start over.
.P

MODE TO MOVE (Default = Blank)                                         4589

Enter  the  Mode Number TO MOVE.   Any valid conventional mode  number  may 
moved.  

After entering this number and pressing Enter,  the mode name for that mode 
will  be  displayed.   Use  the name to verify that the proper  number  was 
entered.

The mode and all related parameters will be moved to the new position.  All 
mode-slaved  channel scan lists (if applicable) will reflect the  new  mode 
location, but otherwise will not be affected.  
.P

MODE SLAVED SCAN LIST                                                  4561

This  screen displays the available modes and their scan TYPE for the  mode 
display in the upper left side of the display.  The scan types are  changed 
by  moving  the cursor with the Enter or Tab keys to the desired  Mode  and 
changing its TYPE by using the up and down arrow keys.  Note that  Priority 
One  is  always  the Mode that the current scan list is  slaved  to.   This 
priority cannot be changed.  

Function Key Descriptions:

F2 -  GO TO MODE allows you to go to the Mode Slaved Scan List you want  to 
      modify  without  returning  to  the  MODE  CONFIGURATION  screen  and 
      stepping through the modes in-between.  

.P
MODE SLAVED SCAN LIST (cont)

F3 & F4  - NEXT MODE will advance the screen to the next Mode  Slaved  Scan 
      List.  If you are at the last Mode in the radio then pressing F4 will 
      take  you to Mode 1.  PREVIOUS MODE will return you to  the  previous 
      Mode.   If you are at Mode 1, pressing F3 will take you to  the  last 
      Mode in the Radio.

F5 -  PRINT SCREEN will send the currently displayed Mode Slaved Scan  List 
      to the printer.

F7 -  ERASE LIST will remove all of the Modes from the current scan list.
.P

DISPLAY NAME                                                           4600 

This is the number you will see displayed when dialing this phone number.
.P


PHONE NUMBER                                                           4601

This is the number you want to send. It is one (1) to sixteen (16) digits 
in  length.  Valid  digits are 0 - 9, *, and #.  Pauses  are  NOT  allowed. 
There  is no need to fill in all the phone number slots; it will be  faster 
to  find the number if you enter as few numbers as possible ... enter  only 
frequently used phone numbers!
.P

DIAL SIGNALLING SYSTEM                                                 4602

This is the signalling system that will be used to dial phone numbers. We 
made this separate from the access signalling system so that you may 
customize  things  such as dialing speed. For example, some  phone  systems 
will allow faster dialing than the phone patch.
.P

SYSTEM                                                                 4700

This  screen  allows  you to configure one or  more  signalling  systems.  
These  signalling systems will be used by the Call List and Mode screens to 
determine when and where decode or encode.
.P

TYPE                                                                   4702

When this screen is displayed the cursor is placed on the TYPE data  field.  
There  are  seven available system types.   They are None,  STAR,  MDC1200, 
QCII  (QUIK CALL), DTMF, Singletone and DTMF/PHONE. The  system  types  are 
selected  by using the Up/Down arrow keys.    None implies that all of  the 
signalling  systems in the radio are  deactivated.    When  STAR,  MDC1200, 
QCII,  Singletone, DTMF, or Singletone is activated  the associated
parameter data fields will be displayed.  
.P

ID                                                                     4703

MDC1200 :
  MDC1200 requires that each radio have a unique four digit ID number.  The 
  default is the last four digits of the radio serial number.  The range is 
  from  0001 to DEEE.   Four zeroes will show up as "NONE";  this is useful 
  when you desire the radio to "listen only". An example of a "listen only" 
  situation  might  be  a  volunteer fireman  monitoring  a  fire  dispatch 
  channel. 

DTMF :
  DTMF  requires each radio to have a unique 1 to 8 digit ID  number.   The 
  default is the last four digits of the radio serial number.   Digits 0 to 
  9, *, and # may be used. Any unused digits may be filled in with a '-'
  character.
.P

STAR :
  STAR  requires that each radio have a unique four digit ID  number.   The 
  default is the last four digits of the radio serial number.  The range is 
  from  0000 to 16383.  You may enter the ID in two ways.  The first way is 
  without the tag bits added to the ID.  In this case, you will type in the 
  ID that you want to have appear on the dispatcher's console  first.  Then 
  on the tag bit line you will set the proper combination for the customer. 
  If  the channel is only being used by one customer,  then chances are the 
  tags will be 0 0. The third line shows you what the ID would look like in 
  a  system  which  uses  the tag bits as  an  extension  of  the  ID.  For 
  reference, the first tag bit adds 8192 to the ID and the second adds 4096 
  to the ID.   
.P

QCII :
  QCII ID corresponds to tones A, B, and C. It requires at least two unique
  tones.  The default is 358.6 Hz (tone A), 903.s Hz (tone B), and  0.0  Hz
  (tone C). The range is from 304.0 to 2470.0 Hz. Don't be alarmed if the
  frequency that you type in changes by a few Hertz. This change can occur
  because the program must calculate the nearest frequency that the radio
  can understand. You will find that the error will always be within the
  acceptable industry bandwidth.

SINGLETONE :
  This is the frequency of the tone that is sent. The default is 1049.7 Hz, 
  with available tones ranging from 304.0 to 2470.0 Hz. Don't be alarmed if 
  the  program "rounds" the frequency up or down by a few  Hertz.  Remember 
  that  the  tones will tend to have a higher distortion as  the  frequency 
  drops; we suggest tones above 1 kHz when installing new systems.    
.P

GROUP ID                                                               4704

The  MDC1200 id is a three hex digit number common to a group  of  radios 
and ranges from 000 to EEE.

The DTMF id is a 1 to 8 digit id.   The digits 0 to 9,  *,  and # may  be 
used.   It is IMPORTANT that the number of group digits does not exceed the 
number of id digits because the radio will never decode the group ID.
.P

CALL FORMAT                                                            4705

There are 8 different choices for this field.  The choice determines  the 
sequence  in which this radio needs to see the QCII tones for an individual 
or group call. The Up/Down arrow keys will scroll through the choices.  The 
following is a list of those choices:  

                  A-B  Tone A followed by Tone B.
              A-B/A-C  Tone A followed by Tone B or Tone A followed by Tone 
                       C 
              A-B/C-B  Tone A followed by Tone B or Tone C followed by Tone 
                       B
           A-B/Long B  Tone A followed by Tone B or Long Tone B
           A-B/Long C  Tone A followed by Tone B or Long Tone C
.P

       A-B/A-C/Long C  Tone A followed by Tone B or Tone A followed by Tone 
                       C or Long Tone C
    A-B/Long B/Long C  Tone A followed by Tone B or Long Tone B  or  Long 
                       Tone C
A-B/A-C/Long B/Long C  Tone A followed by Tone B or Tone A followed by Tone 
                       C or Long Tone B or Long Tone C   

In  this table the first sequence is considered an "individual call"  while 
the other sequences would be considered "group calls."  For example:
 
For  choice   A-B/A-C/LONG C,  an A-B sequence would be an "individual 
call" while an A-C or LONG C would be a "group call". Group calls normally  
cannot be acknowledged.      
.P

CALL TYPE                                                              4706

There are three different choices for this field.  The Up/Down arrow keys 
will scroll through the following choices :  Call Alert,  Call Alert/Voice, 
and  Voice  Selcall.   Call Alert leaves call indication at  the  receiving 
radio.    Call  Alert/Voice  leaves  a  call  indication  and  unmutes  the 
loudspeaker  of the receiving radio.   Voice Selcall unmutes loudspeaker on 
receiving radio but does not leave any call indication.   MDC1200 does  not 
allow Voice Selcall call type since Voice Selcall is an inherent feature of 
all MDC1200 signalling systems.
.P

PL/DPL REQUIRED                                                        4707

The Up/Down arrow keys will allow the choices of either "Y" or "N".   "Y" 
implies the correct PL/DPL is required to recieve data.  "N" implies PL/DPL 
is  not  required  to receive data.  In most systems you  may  choose  "N", 
however,  when  you  share  a channel with other users who  have  the  same 
signalling type then you should choose "Y". Choosing "Y" on shared channels 
will ensure that you don't accidentally receive a call which is directed to 
another user. 

Note :  Some existing DTMF and Quik Call systems require PL stripping, and 
therefore it is recommended that an "N" be chosen in these cases. 
.P

ACKNOWLEDGE                                                            4708

The Up/Down arrow keys will allow the choices of either "Y" or "N".   "Y" 
implies an acknowledge transpond tone will be sent after a valid call.  "N" 
implies no acknowledge will be sent after a valid call.  The radio normally 
will not acknowledge "group calls".
.P

ACKNOWLEDGE TYPE                                                       4709

The acknowledge type can be one of the four following choices :

  1.  DIGIT - One DTMF digit will be transmitted after a valid call.  Digit 
              is entered on the Acknowledge Digit data field.
  2.  ID - The ID of the radio will be transmitted after a valid call.
  3.  TONE - A predetermined tone will be transmitted after a valid call.
  4.  NO - No acknowledge will be sent after a valid call.

The Up/Down arrow keys will scroll through the allowable choices.

NOTE : QCII only has choices 3 and 4.
.P

ACKNOWLEDGE DIGIT                                                      4710

This  field  is is used in conjunction with the Acknowledge  type  field.  
This is the digit that is transmitted after a valid call if the acknowledge 
type is "DIGIT".  Digits 0 to 9, *, and # may be used to create a ONE digit  
acknowledge digit.
.P

ACK PRETIME                                                            4711

Systems   that  use Call Alert require that the radio  acknowledge  (ACK)  
that the  Call Alert has been received.  ACK Pretime is the delay from when  
the  radio  receives  a  Call Alert to when it starts  the  ACK   sequence.   
The default ACK pretime is 0.5 seconds.  If a different pretime is required 
for your  system move the cursor to the ACK Pretime data field and   change  
the time  using  the up and down arrow keys.  The range can be from 0.2  to  
2.0 seconds in 0.1 second steps.
.P

HORN/LIGHTS                                                            4712         

When a Call Alert is received,  an external output may be activated  that 
can  be  used to control a vehicle's horn or lights.   Horn/Lights  may  be 
selectable,  permanent,  or  not available.   If horn/lights are selectable 
then  they may be defeated by the front panel Select button.   If they  are 
permanent,  they cannot be defeated without an external switch in the relay 
cable.  If they are not available, then they can never be activated.
.P

HORN/LIGHTS DELAY                                                      4713

When   External   Alarm  or Horn/Lights is activated by   the   operator,   
Call   Alerts   will   activate  the  external  alarm  for  six    seconds.  
Horn/Lights Delay will delay the activation of the external alarm to allow 
the operator time,  if  he is in the vehicle, to respond to the Call  Alert  
before   the  external alarm is activated.   If the operator  does  respond 
during  the  delay time  the  external alarm will not  be  activated.   The 
default  time  is  10.0 seconds.    If  a different Delay Time is  required 
move  the   cursor   to  the Horn/Lights  Delay data field  and  enter  the 
desired  delay.   Use the up  and down arrow keys to select a delay  of  0, 
5.0, 10.0 or 15.0 seconds.
.P
        
SIGNALLING SQUELCH                                                     4714

This  feature can either be enabled "Y" or disabled "N" using the Up/Down 
arrow  keys.   If this feature is enable "Y",  then the front panel monitor 
button  can  be used to put the radio into  signalling  squelch.   If  this 
feature  is  disabled "N",  then signalling squelch is not  activated.  The 
default is "N".

Signalling  Squelch is similar to Private Line.  When enabled,  the radio 
will  only unmute for Call Alerts and Voice Selcalls.  Like  Private  Line, 
Signalling  Squelch  can  be  disabled by pressing the  monitor  button  or 
removing  the  microphone  from  the hang  up  clip.  You  will  find  that 
Signalling Squelch is automatically disabled when channel scan is on.    
.P

DOS HOLDOFF                                                            4715

Data   Operated   Squelch  (DOS)  is  used with  data signalling  systems 
(such  as  MDC-1200)   to    mute    the  data  transmissions   to   reduce  
operator  annoyance.   DOS  attempts  to  mute  the  speaker  when data  is 
present  on  the channel.    DOS Holdoff keeps  the speaker muted   for   a  
preset period  of time from when carrier is  detected   by    the   squelch 
circuit.    This  allows the DOS time to detect any data  activity, further  
reducing the annoyance of data being heard from the speaker. 

The  default  holdoff  is 0.5 seconds.    If a different holdoff time  is 
required  for   your system  move the cursor to the DOS Holdoff data  field 
and  change the   time using the Up/Down arrow keys.  The range can be from 
0.0   to  4.3  seconds  in  0.1 second  steps.   The  radio   automatically  
defeats  DOS Holdoff while channel scan is turned on. 
.P

PTT ID                                                                 4716

If you want your unit id to be sent on each Push-to-talk (PTT),  then set 
this field to "PRE", "POST", or "BOTH".  "PRE" sends the id at the press of 
PTT. "POST" sends the id upon release of PTT. "BOTH" sends the id twice per 
transmission,  once  at  the press and once at the release of PTT.  If  you 
choose "NONE", then the id will not be sent during PTT.     
.P

PTT SIDETONE                                                           4717

PTT   sidetones   are  used when PTT ID is  activated.    Sidetones   are  
heard  through the speaker when the operator first presses the  PTT.   They 
are  used  to  tell  the  operator   that he cannot  speak  until  the   ID  
has   been transmitted.  There are two sidetones available in the  Radius.  
The  PTT  ID Sidetone  is a continuous tone heard from PTT until the ID has  
been  sent.  The second tone, PTT Short Sidetone, is a short beep after the 
ID  has   been sent.    Both  tell  the operator when he is  permitted   to  
speak  into  the microphone.   One,  both  or no Sidetones maybe activated. 
They   can  be activated  by moving the cursor to the desired sidetone  and 
using the Up/Down arrow keys to choose either "Y" or "N" to either activate 
or deactivate the sidetones. 
.P

  The Sidetone choice is also used when sending a call from the Call  List. 
It is suggested that if this signalling system is to be used by a Call List 
entry that the Sidetone(s) be enabled.  
.P

PTT SHORT SIDETONE                                                     4718

PTT   sidetones   are  used when PTT ID is  activated.    Sidetones   are  
heard  through the speaker when the operator first presses the  PTT.   They 
are  used to  tell  the  operator  that he cannot yet speak until  the   ID  
has   been transmitted.  There are two sidetones available in the  Radius.  
The PTT  ID Sidetone  is a continuous tone heard from PTT until the ID  has  
been  sent.  The second tone, PTT Short Sidetone, is a short beep after the 
ID  has   been sent.    Both  tell  the operator when he is  permitted   to  
speak  into  the microphone.   One,  both  or no Sidetones maybe activated. 
They   can  be activated  by moving the cursor to the desired sidetone  and 
using  the  Up/Down arrow keys to choose either "Y" or "N" to  activate  or 
deactivate the sidetones. 
.P

The  Sidetone choice is also used when sending a call from the Call  List 
and whenever a sequence is generated by pressing the 'Select' button. 
It is suggested that if this signalling system is to be used by a Call List 
entry that the Sidetone(s) be enabled.  
.P


 

PRETIME                                                                4719

The    pretime    is  the  delay from the start  of  transmit  (when  the 
operator pushes PTT) to when  the data signalling begins.    This delay  is 
required   in  order  to  allow   the  radio    to   completely   open  the 
communications  path  through   repeaters  or  other   system   components.    
The  default   pretime   is 0.5 seconds.    If  a  different   pretime   is  
required  for your  system move the cursor  to  the Pretime data field  and 
change the  time using the Up/Down arrow keys.   The 
range can be from 0.1 to 4.3 seconds in 0.1 second steps.
.P

FIXED RETRY WAIT                                                       4720

When  emergency  is  activated  by  the  operator  the  radio  expects an 
acknowledge from the base station.  If no acknowledge is received then  the 
radio   will repeat the emergency sequence after a delay.  The radio always 
waits a random time greater than twice the Pretime.  The additional time is 
the  Fixed Retry Wait time.  Fixed Retry Wait is the time the  radio  waits 
between emergency tries.  The default  is 0.0  seconds (STAR default is 8.1 
seconds).   If  a  different Wait Time is required move the cursor to   the 
Fixed  Retry  Wait data field and change the time using the  Up/Down  arrow 
keys.   The  range  can be from 0.0 seconds to 16.9 seconds in  0.4  second 
steps.
.P

DECODE DISPLAY                                                         4721

When a PTT ID transmission is received by the radio it contains the ID of 
the  transmitting  radio.   The name of the call entry associated with  the 
transmitting radio ID will be displayed on the screen.  If no call entry is 
associated with the transmitting radio ID, then "00" (not for DTMF) will be 
displayed  on  the radio.   Use the Up/Down arrow keys to choose either  to 
have the transmitting radio "name" displayed on the front  panel,  "Y",  or 
not  to  have the transmitting radio "name" displayed on the  front  panel, 
"N".  Since  2  channel radios do not have a display,  choosing "Y" is  not 
recommended. 
.P

CONSOLE                                                                4722

One  radio  in  the  system should be designated  as  the  Console  Radio 
(Control Unit).   The purpose of this radio is to acknowledge the receiving 
Emergency Alert.   If this field is enabled "Y",  the radio will respond to 
an Emergency with an acknowledge transmission.   Use the Up/Down arrow keys 
to  choose either "Y" or "N".  Since 2 channel radios do not have a display 
to show the unit ID of the transmitting radio,  they are not recommended as 
Console radios.
.P

TX TONE DURATION                                                       4723

This is the length of each digit that is transmitted by the  radio.   The 
default  is 101.4 msec..   Use the Up/Down arrow keys to change the default 
value.  The range is 50.7 to 4296 msec..  in 16.9 msec. intervals.
.P




 
TX TONE INTERVAL                                                       4724

This is the time between the transmission of different DTMF digits.   The 
default  is 50.7 msec..   Use the Up/Down arrow keys to change the  default 
value.  The range is 50.7 to 4286 msec. in 16.9 msec. intervals.
.P

RESET DURATION                                                         4725

After   the  DTMF  decoder  has  received  a  valid  digit  it  waits   a 
predetermined  time for the next expected tone before resetting.  Resetting 
causes the decoder to look for the first digit of the ID. Reset Duration is 
the time period that the decoder waits before resetting.  This duration may 
be  set  from 0.2 to 33.0 seconds.  The default is  2.5  seconds.  Use  the 
Up/Down arrow keys to change the default value if necessary.
.P

ACCESS CODE                                                            4726

The DTMF sequence which is used to "access" or open the phone patch  goes 
here.  Typically, this is a * followed by one (1) to three (3)  number 
digits. This is commonly known as an ANI sequence!
.P

DEACCESS CODE                                                          4727

The DTMF sequence which is used to terminate a phone call, or  "deaccess" 
the phone patch goes here. This is often a # digit.
.P

PRINT                                                                  5000

The  PRINT  function is  used to  produce  permanent  records  of  codeplug 
configurations  and/or  RF alignment settings.   A printer is required  and 
should  be  connected  to your computer per your  computer  user's  manual.
Graphics capability is NOT required.  

You  must use the GET/SAVE functions to first READ or GET a  codeplug   for 
printing  radio configuration data (see F2 below);  you must have  a  radio 
connected  to the computer for printing an alignment summary (see F5 below).

Each printout contains radio model and serial number information,  software 
version numbers,  Radio Service Software version numbers,  and the date and 
time of the printout.

.P
PRINT (cont)

Function Key Descriptions:

F2 - The  RADIO  CONFIGURATION function displays a menu to the user which
     allows printing of the RADIO-WIDE Configuration, the MODE summary or
     the full MODE configuration. 

F4 - The PHONE LIST Summary prints the PHONE MEMORY configuration.
     
F5 - The  ALIGNMENT  Summary  function prints the  current  relative  value 
     setting for all SERVICE alignment adjustments.
.P
PRINT (cont)

Function Key Descriptions:

F6 - The  ARCHIVE  Files function prints a list of all  codeplug  files  by 
     serial number for a specified directory path.  

F7 - The  SIGNALLING LIST SUMMARY function prints a compressed  summary  of 
     all signalling systems that are programmed in the radio. 
 
F9 - The  CALL LIST SUMMARY function  prints a compressed list of the  call 
     list entries. 
.P
PRINT RADIO CONFIGURATION                                              5200

This menu provides the user with the ability to print out various radio
configuration data.

Function Key Descriptions:

F2 - The RADIO-WIDE Configuration function prints the RADIO-WIDE screen, 
     along with the MORE RADIO-WIDE screen.

F4 - The MODE CONFIGURATION Summary function prints a one-page summary of
     the modes.

F5 - The MODE CONFIGURATION (All Parameters) function prints a listing of
     the modes as the appear on the MODE screen.
.P

SETUP                                                                  9000

The  SETUP  functions are used to configure your Radio Service Software  to 
your particular application and computer environment. 

Function Key Descriptions:

F3 - PC  CONFIGURATION is used to set default disk drive paths for  Archive 
     files and Backup files.   It is also used to select which Asynchronous 
     Communications  Port  (COM 1 or COM 2) the RIB (Radio  Interface  Box) 
     will be connected to.

     Please   refer  to  your  computer  owner's  manual  for  a   complete 
     description of path names and Asynchronous Communication Ports.

.P
SETUP (cont)

Note:  Your  Radio  Service Software will automatically determine  at  what 
       clock  speed  your  computer  is  operating.    No   user-selectable 
       parameters are required.

F7 - SCREEN  COLORS  is  used  to enable the  Color  display  option.   The 
     standard  default  configuration for Radio Service Software is  for  a 
     MONOCHROME display monitor.   However, if you have a color system, the 
     display quality will be greatly enhanced by enabling the color option.  

.P

CONFIGURE COMPUTER                                                     9300

PC  CONFIGURATION is used to set default disk drive paths for Archive files 
and  Backup  files.    It  is  also  used  to  select  which   Asynchronous 
Communications  Port (COM 1 or COM 2) the RIB (Radio Interface Box) will be 
connected to.

Please refer to your computer owner's manual for a complete description  of 
directory path names and Asynchronous Communication Ports.


.P
CONFIGURE COMPUTER (cont)

Function Key Descriptions:

F3 - COMM TEST is used to verify that your computer is set up properly  and 
     is able to READ and PROGRAM a radio codeplug properly.

     After  your  computer  and RIB are connected per  your  Radio  Service 
     Software  manual  and you have selected the appropriate  communication 
     port, turn on your radio and execute COMM TEST by pressing F3.  
 
     COMM  TEST will verify your system is functioning properly by  sending 
     commands  to  the  radio and checking for  the  proper  response.   No 
     codeplug changes will result from these commands.  An OK response will 
     be displayed in the Status Window if the system checks OK.
.P
CONFIGURE COMPUTER (cont)

     Otherwise,  error  messages will be displayed,  and you should consult 
     your manual for proper corrective action. 

F8 - SAVE  is used to save the configuration information to a file on  your 
     program  disk.   Every time you use the Radio  Service  Software,  the 
     configuration  that  you  SAVED last will be  used.   At  anytime  the 
     configuration may be changed and SAVED.

F9 - RESET  DEFAULT  is  used to reset the parameters on this screen  to  a 
     default   value.    However,   RESET   DEFAULT  does  NOT   save   the 
     configuration.   If the default values are desired, you must save them 
     via the SAVE (F8) function.
.P

ARCHIVE DISK DRIVE PATH NAME                                           9301

Enter the DEFAULT directory path where archive files are to be located.  

The GET/SAVE SAVE FILE function will default to this path.  

Please  refer to your computer owner's manual for a complete description of 
directories and path names.
.P

BACKUP DISK DRIVE PATH NAME                                            9302

Enter the DEFAULT directory path where backup files are to be located.  

The  GET/SAVE  BACKUP FILE function will default to this path  when  making 
backup  copies  of  codeplug  files archived to a hard  disk.  If  you  are 
archiving to a diskette, you will not be prompted for a backup. 

Diskette  backups should be handled via standard DOS file copy  procedures.  
Refer  to your computer user's manual for additional information  regarding 
coping files, directories, and path names.
.P

TCMS DISK DRIVE PATH NAME                                              9303

Enter  the  DEFAULT  directory path from where TCMS Update  files  will  be 
retrieved.  

The GET/SAVE GET TCMS file function will default to this path.  

Please  refer to your computer owner's manual for a complete description of 
directories and path names.
.P

SERIAL COMMUNICATIONS PORT (Default = COM 1)                           9304

Use  the UP/DOWN arrow keys to select to which Asynchronous  Communications 
Port (COM 1 or COM 2) your RIB (Radio Interface Box) is connected.   

If  you  are  not sure how your computer is configured or if you  have  two 
Asynchronous Communications Ports, first select COM 1 and use the COMM TEST 
(F3) function to communicate with a radio.  If the test fails, select COM 2 
and  repeat  COMM  TEST.   Be sure that all cables and power  supplies  are 
connected  per  the  instructions in your  Radio  Service  Software  User's 
manual.  

Please refer to your computer owner's manual for a complete description  of 
Asynchronous Communication Ports and how to configure them.
.P

CONFIGURE COMPUTER SCREEN                                              9700

SCREEN  COLORS  is used to select the type of display monitor that you  are 
using with your computer, i.e. MONOCHROME or COLOR.  

For  proper  color  operation,  you  must  have a  color  monitor  and  the 
appropriate color display interface card installed in you computer.  Please 
refer  to  your computer owner's manual and/or your computer dealer if  you 
have questions regarding the color capability of your computer.

You  may  also further customize your screen by selecting  colors  for  the 
screen TEXT,  STATUS LINE,  MESSAGE LINE,  TEXT HIGHLIGHT,  BACKGROUND, and 
SCREEN OUTLINE.

.P
Function Key Descriptions:

F8 - SAVE  is used to save the configuration information to a file on  your 
     program  disk.   Every  time you use the Radio Service  Software,  the 
     configuration  that  you  SAVED last will be  used.   At  anytime  the 
     configuration may be changed and SAVED.

F9 - RESET  DEFAULT  is  used to reset the parameters on this screen  to  a 
     default   value.    However,   RESET   DEFAULT  does  NOT   save   the 
     configuration.   If the default values are desired, you must save them 
     via the SAVE (F8) function.
.P

MONITOR TYPE (Default = Mono)                                          9701

Use  the UP/DOWN arrow keys to select either a MONOCHROME or COLOR  display 
monitor.

Screen configuration changes must be SAVED (F8) before you EXIT (F10)  this 
screen.
.P

TEXT (Default = Yellow)                                                9702

Use the UP/DOWN arrow keys to select the desired color for screen TEXT.  

Screen configuration changes must be SAVED (F8) before you EXIT (F10)  this 
screen.
.P



 
STATUS LINE (Default = White)                                          9703

Use  the UP/DOWN arrow keys to select the desired color for the STATUS LINE 
located in the lower portion of the top right-side window.

Screen configuration changes must be SAVED (F8) before you EXIT (F10)  this 
screen.
.P

MESSAGE LINE (Default = White)                                         9704

Use the UP/DOWN arrow keys to select the desired color for the MESSAGE LINE 
located in the upper portion of the top right-side window.

Screen configuration changes must be SAVED (F8) before you EXIT (F10)  this 
screen.
.P

HIGHLIGHT (Default = White)                                            9705

Use the UP/DOWN arrow keys to select the desired color for the  HIGHLIGHTED 
screen text.

Screen configuration changes must be SAVED (F8) before you EXIT (F10)  this 
screen.
.P

BACKGROUND (Default = Blue)                                            9706

Use  the  UP/DOWN  arrow keys to select the desired color  for  the  screen 
BACKGROUND.

Screen configuration changes must be SAVED (F8) before you EXIT (F10)  this 
screen.
.P

SCREEN OUTLINE (Default = Lt Red)                                      9707

Use  the  UP/DOWN  arrow  keys to select the desired color  of  the  screen 
OUTLINE.  

Screen configuration changes must be SAVED (F8) before you EXIT (F10)  this 
screen.
.P
}
FILE MAINTENANCE                                                       1500

The  File Maintenance Menu is designed to help you manage your  files.   It 
can  be used to restore lost Archive Files from your Back-up Files,  create 
new Back-up Files, create directory paths, and delete Archive Files.

.P

CREATE DIRECTORY PATH                                                  1501

This  screen  will  create  any  desired  directory  path  by  adding  sub-
directories that can be accepted by the DOS operating system.

Enter the new directory path and press the Enter key.

An Example directory path would be:

C:\MRSS\RADMBL\ARCHIVE\LOCAL <Enter>

This   would   add  the  sub-directory  "LOCAL"  under  the   sub-directory 
"ARCHIVE".  Only one sub-directory may be added at a time.

.P

DELETE ARCHIVE FILE                                                    1502

The  Delete Archive File screen allows you to delete any Archive File  from 
the directory displayed in the Archive Path.

Function Key Descriptions:

F3 - The CHANGE ARCHIVE function allows you to change the Archive Directory 
     Path.  Enter the new Path and Press the Enter key.

F5 - The  PRINT function print the serial numbers of the archived files  to 
     your printer.

.P
DELETE ARCHIVE FILE (cont)

F7 - The  DELETE  FILE function  will delete the file associated  with  the 
     highlighted  serial number.  You can move the highlight cursor to  the 
     desired  serial number by using the Tab and Enter keys.  Press  F7  to 
     delete  the file.  The Computer will ask you to confirm the delete  by 
     pressing F7 again.
.P

RESTORE ARCHIVE                                                        1503

This  screen  is used to restore lost Archive Files from  a  Back-up  Files 
Disk.

Function Key Descriptions:

F3 - The  CHANGE SOURCE function is used to point to the Back-up  directory 
     Path.  Enter the new Path and press the Enter Key.

F4 - The  CHANGE TARGET function is used to point to the Archive  directory 
     where  you  want to store the recovered Archive File.  Enter  the  new 
     Path and press the Enter Key. 
.P
RESTORE ARCHIVE (cont)

F7 - The  RESTORE  FILE  function  is  used  to  move  the  Back-up   File, 
     highlighted  on the display, to the directory displayed on the  Target  
     path.  You can move the highlight cursor to the desired serial  number 
     by using the Tab and Enter keys.
.P

UPDATE BACK-UP FILES                                                   1504

The Update Back-up Files Screen allows you to create new back-up copies  of 
your archive files.

F3 - The  CHANGE SOURCE function is used to point to the Archive  directory 
     Path that you want to back-up.  Enter the new Path and press the Enter 
     Key.

F4 - The  CHANGE TARGET function is used to point to the Back-up  directory 
     where  you  want to store the Back-up Files.  Enter the new  Path  and 
     press the Enter Key. 

.P
UPDATE BACK-UP FILES (cont)

F7 - The  CREATE  BACKUP  function  will  copy  the selected  Archive  File 
     contained in the Source Path to the directory of the Target Path.
.P
}
CALL LIST                                                              4900

This screen allows you to configure a call list so that you may selectively 
call  other radios.  Once this call list is complete,  you may use  the 
'Select'  button  on  the front of your radio to select the  individual  or 
group that you wish to call.

The  list  is built one entry at a time.  The sequence of  the  entries  is 
exactly  the same as the order you would select them from the front of  the 
radio. The entry sequence may be important for your customer, so it is best 
to check with him/her first.
                                          
You  may mix different signalling formats in any order in the list.  Up  to 
99  different  entries are allowed.  To create the first entry in  a  blank 
list, you will have to use the F8 key.
.P


DISPLAY NAME                                                           4901    

The  name/number that will show on the radio display whenever this entry is 
being selected. This will can be any number from 1 to 126.  We suggest that 
the number be large so that your customer can easily distinguish that  this 
is not a channel number.
.P

SIGNALLING SYSTEM                                                      4902

This  determines  which  signalling  format and timing will  be  used  when 
sending the call. 
.P

REVERT MODE                                                            4903

This field determines on which channel the call will be sent. If you always 
want  the call to go out on whatever channel your customer is on, then  you 
want 'NONE'; do this by using the UP/DOWN keys or typing '00'.

If you always want the call to be sent on a specific channel,  then use the 
UP/DOWN keys until this channel is displayed.  Remember, however, that when 
the  call is complete the radio will remain on the sending channel.
.P

ACKNOWLEDGE EXPECTED                                                   4904

This  determines  whether or not the radio will expect an acknowledge  from 
unit(s) being called.  If an acknowledge is expected,  the radio will:   a) 
send the call up to 5 times  b) display an 'A' if the call is  acknowledged 
or a '-A' if not acknowledged.

If  an acknowledge is not expected,  the radio will only send the call  one 
time and will not show any type of acknowledge display. 

.P

In general,  you would like to answer 'YES'. Group calls, however, normally 
should  be  'NO'.   No acknowledge is expected for DTMF or Quik Call (their 
acknowledge is heard only by the user and is not decoded). 

Answering  'NO' to MDC1200 individual entries is acceptable for call  alert 
and voice selcall, however, to send a radio check you MUST answer 'YES'.
.P

STRIP PL                                                               4905

Answering  'YES'  to this question will cause the radio to  send  the  call 
without  PL  or  DPL.  This can be useful if you want to selectively call a  
group  or  unit  without disturbing everyone else  on  the  channel   (this 
normally CANNOT be done on a community repeater!)
.P

ID TYPE                                                                4906

If  this field is shown,  use your UP/DOWN keys to determine if this is  an 
INDIVIDUAL, GROUP, or FLEET call.

Individual  Id - It is four digits long.   The numbers 0-9 and letters  A-F   
                 can  be  used.  'F'  acts as a wildcard  and  'E'  is  not 
                 available for the first digit.

Group Id - Three selectable digits,  0-F.  The first digit is automatically 
           inserted by the program. 
.P
Fleet Id - One selectable digits, 0-F. The first digit is automatically set 
           to 'E' and the third and fourth digits are set to 'F'. 

All - All digits are automatically set to 'F'.
.P

ID                                                                     4907

This is the ID of the unit or group that you want to call.
.P

CALL FORMAT                                                            4908

This only applies to Quik Call.  You may choose 'TWOTONE' or 'LONGTONE'. Be 
sure to type in the frequencies you want in fields FREQ 1 and FREQ 2.
.P
  
CAP CODE PREFIX                                                        4909

This is for future use.
.P
 
FREQ                                                                   4910

This is the frequency of the tone(s) to be sent in Hertz.  Don't be alarmed 
if the number rounds up or down a few Hertz once it is entered.
.P

