  TRANSMIT LIGHT RE-ENABLE ON REVERT


  This option Enables/Disables the Transmit Light Re-enable On the Emergency
  Revert Channel.  The normal state of the transmit light on the revert
  channel is off.  This option is enabled if the user wants the transmit
  light to function normally while using the revert channel.  This feature
  does not affect the transmit light during the emergency sequence, only on
  subsequent transmissions after the emergency sequence is complete.
