  CHANGE MENU


  The Change Menu allows you to access the PL Table (F2), the Quik Call II
  Table (F3), the Signalling menu (F4), the Per-Radio Features (F5), the Per-
  Channel Features (F6), the Scan Features and List (F8), and the Bandsplit
  (F9) by pressing the corresponding function key.
