  TRANSMIT FREQUENCY


  The Transmit Frequency , in MHz, must be directly entered using the Numeric
  Keys, and it must be divisible by 5.0 KHz or 6.25 KHz.  The decimal places
  and trailing zeroes need not be entered.
