  PHONE NUMBERS


  This screen allows you to modify the DTMF Phone Numbers.  The following
  entries are valid:  0 - 9, *, #, and P (indefinite pause).  Dashes (-)
  and blank spaces can be entered to separate parts of the number, but
  will not be programmed into the radio.  Indefinite pause allows the
  user to enter a pause in the middle of a numeric sequence.  An example
  where this would be used is in a system where a connect sequence is
  necessary to make a phone call.  The connect sequence should be entered
  followed by a pause and the desired phone number.  Each phone number
  may have up to 16 entries.
