  QUIK CALL II AUTO RESET


  This option Enables/Disables the Quik Call II Auto Reset.  If enabled,
  the radio will automatically reset back to the Quik Call II mode 10
  seconds after the carrier drops.  If disabled, the monitor button must
  be pressed to reset the radio back into the Quik Call II mode.
