  SCAN FEATURES


  The Scan Screen allows you to modify the Scan Features, and to set up the
  Scan Channels List.  Use the Up/Down Arrow Keys to Enable/Disable.  Use
  the Numeric Keys to enter the time and the channel numbers, or the Up/Down
  Arrow Keys to scroll through the values.

  CHANNEL SCAN - This feature allows you to select one of the following:
  Non-Priority Scan, Priority Scan, Non-Priority PL Scan, Priority PL Scan,
  and No Scan.



                                                                <Page Down> 
.P

  NOTE: CHANNEL SCAN can only be enabled if Tx INHIBIT on Busy Channel
  (Per-Channel feature) is set to disable on all channels.


  USER SCAN PROGRAM - This option, when enabled, allows you to manually
  program the scan channels.  If disabled, the scan channels are not
  programmable by the user, but can be modified through the use of the
  Radio Service Software.




                                                 <Page Down>    <Page Up> 
.P

  TALK BACK SCAN - This option, when enabled, will do the following:  If
  listening to a channel while in Scan Mode, or if in Scan Hang Time, press-
  ing the PTT will allow you to transmit on that channel.  When disabled,
  pressing the PTT will allow you to transmit on the Priority Channel, if
  the radio is in the Priority Scan Mode; or will transmit on the channel
  you were on before the radio went on into the Scan Mode.


  FIXED PRIORITY CH - This option, when enabled, fixes the priority channel
  to the desired channel number.  The priority channel can also be changed
  by using the channel selector controls while in the channel scan mode.

                                                 <Page Down>    <Page Up> 
.P


  SCAN HANG TIME - This option sets the number of seconds the radio waits
  after one of the following:  monitor, channel change, dekey, loss of
  channel activity before going back to scanning the channels.

  SCAN LIST - The Scan Screen allows you to set up the channels to be
  scanned by the radio when in the scan mode.  The Scan Channel Number
  may be entered directly with the Numeric Keys or scrolled with the Up/
  Down Arrow Keys.  You may program up to 8 channels to be scanned.  The
  Scan Channel Number may be 00 to 99. The 00 entry indicates a None.


                                                                  <Page Up> 
