
    REQUIRED EQUIPMENT                    MOTOROLA PART NUMBER

    IBM Personal Computer                 N/A

    Radio Interface Box (RIB)             RLN-4008

    RIB Power Supply                      01-80357A57 (110v)
                                          01-80358A56 (220v)

    Computer Interface Cable              30-80369B71 (25 pin)
                                          30-80369B72 ( 9 pin)

    Program/Test Cable                    RTK-4205
                                                                <Page Down> 
.p

    REQUIRED EQUIPMENT (cont)             MOTOROLA PART NUMBER

    Portable Products Test Set            RTX-4005B

    MT1000 Radio Service Software         RVN-4017J (R03.01.02)








                                                                  <Page Up> 
