  SIGNALLING DEVIATION ADJUSTMENT


  The Signalling Deviation Alignment Screen allows the digital signalling and
  Singletone deviation adjustments to be performed.  NOTE:  The Worskpace must
  match the radio's Codeplug before the Signalling Deviation Alignment is
  performed.  The Numeric, Edit, and Up/Down Arrow Keys are valid in all
  fields.  The deviation adjustment values may be changed by direct entry
  using the Numeric Keys or scrolled using the Up / Down Arrow Keys.  The
  minimum adjustment allowed is 0.  The maximum adjustment varies from radio
  to radio and the programmer will set this value.  The user will not be
  allowed to go past the lowest channel deviation setting in the radio.  The
  maximum adjustment can not go beyond -15.  As the alignment procedure is
  performed, the Radio Service Software updates the Digital Signalling
                                                                <Page Down> 
.P
  Deviation Adjustment and Singletone Deviation Adjustment also adjusts
  the radio transmit deviation values in the radio's RAM (not the radio's
  EEPROM) to provide immediate feedback.

  Tx FREQ - This is the frequency that the radio will transmit on when
  performing Digital Signalling Tuning.  The radio is automatically
  programmed to this frequency and the channel selector can not affect this.

  DIGITAL SIG DEV ADJUST - When the cursor is in this field the deviation
  for the Digital Signalling can be adjusted.  The number shown is the value
  that will be subtracted from the transmit deviation of the channel when
  transmitting Digital Signalling.  A value of 0 subtracts 0 from the radio
  transmit deviation and is the value that gives the highest deviation.  A
  value of -15 subtracts 15 from the radio transmit deviation and is the
  value that gives the lowest deviation.          <Page Down>    <Page Up> 
.P

  SINGLETONE DEV ADJUST - When the cursor is in this field the deviation for
  the Singletone Signalling can be adjusted. The number shown is the value
  that will be subtracted from the transmit deviation of the channel when
  transmitting Digital Signalling.  A value of 0 subtracts 0 from the radio
  transmit deviation and is the value that gives the highest deviation.  A
  value of -15 subtracts 15 from the radio transmit deviation and is the
  value that gives the lowest deviation.

  F3 (TRANSMIT ON/OFF) - By pressing the F3 key, the radio is put into
  transmit and the deviation can be adjusted to the proper level by only
  adjusting the numeric values in the cursor field.  No external input is
  needed and it is not necessary to press the PTT.
                                                  <Page Down>   <Page Up> 
.P


  F8 (PROGRAM VALUES) - The Digital Sig Dev Adjust and Singletone Dev Adjust
  shown will be updated in the front cover's EEPROM by pressing the F8 key
  ( all other parameters will remain intact) or by programming the entire
  radio in the MAIN/GET-SAVE/PROGRAM RADIO Screen.              <Page Up> 











