  PL DEVIATION

  This feature adjusts the PL Deviation values.  Use Up Arrow/Down Arrow
  Keys to adjust the PL Deviation to levels of 500, 750, and 1000 Hz.
  NOTE: PL DEVIATION is not programmed when the F8 key is pressed.
  To program PL DEVIATION you must program the entire radio from
  the GET-SAVE menu.

