^rHelp for Keyboard Usage^r

The following defines the keys that are available when using  the field
programmer and their meanings.  In general the following function keys
are available:

[F1]  Calls up  help  information of  the active  menu  screen  or the
selected options.

[F2]-[F9] On a menu screen  these keys  are used to select  a specific
option from the menu.

[F10] Exits to the next higher screen or menu.

[Esc] Returns the user to the main menu.

[Home]  This key moves  the pointer on  an option screen  to the first
position on the current screen.  On a table screen it moves the cursor
to the top left data field.

[End] Converse of home.   

[Tab]  This function moves the cursor  to  the next data field.  For a
table screen the cursor will be moved to  the first field on  the line
if it is on the last field of a line.

[Shift Tab] Converse of [Tab].

[Cur_ri] Moves the cursor one character position to  the right when in
a data field. If the cursor is on the last character of the field then
it does not move.

[Cur_le] Converse of [Cur_ri].

[Cur_dn]  Moves the pointer on an  option screen to its next position. 
On a table screen this key will activate the field that  is vertically
below the current  field.  If  the  pointer/cursor  is  at  the bottom
position of  the display area  then  the  screen  may  be  scrolled to
accommodate the new position of the pointer/cursor. 

[Cur_up] Converse of [Cur_dn].

[Pg_dn] This will bring the next page  of an option  screen/table onto
the screen.  The pointer/cursor will  be located at the  home position
for the new page.

[Pg_up] Converse of [Pg_dn].

[+] This will be used on tuning screens to increment the value for the
selected data field.

[-] Converse of [+].

                 * * *  END  OF  HELP  TEXT  * * *
