^rHelp for Radio Alignment and Service Aids^r

 This screen allows you to tune various parameters of a radio on both a
 per  radio and per channel basis.  It  is important  that whenever you
 tune  a radio in  this  way that  on  entering  or  leaving  the tuner
 features  screen  the  radio  is  turned  on  and  connected   to  the
 programmer in the correct way.
 
       - Before you can tune the radio,  you will need to first program
         the  radio  to the personality that is required  in the radio. 
         If the radio has already been programmed,  then you must first 
         read the personality of the  radio  before you  can  tune  it.
         In  either  case,  a radio personality file  must exist in the 
         workspace  before  the  system  will  allow  you to access the 
         "Radio Alignment and Service Aids Menu".
 
 Once all tuning  has been completed,  you must reprogram the  radio so
 that  it  will  contain the values  for the parameters  that  you have
 adjusted.
 
 Tune Radio allows tuning of the following parameters:  Oscillator  Warp
 and four RF power output levels.
 
 Tune Channel allows  tuning of the following parameters:  Squelch,  VCO 
 and Reference Oscillator.
 
 The tuning  procedure will  be  explained on  the help  screen for the
 different tuning function.
 



^r Required hardware:^r
 
 * Computer Interface Cable # 30-80369B72 (PC-AT) or
 * Computer Interface Cable # 30-80369B71 (PC-XT, PC-AP)
 
 * Radio Interface Box (RIB)  01-80353A74
 
 * RIB Power Supply 240 V     EPN4040
                    220 V     EPN4041          
 
 * Programming Cable          RTK4203A
       required for           RTX4005B    Portable Product Test Set or
                              RTX4005A    (equipped with RPX4665A Field
                                           Mod Kit)
 

 * Programming Cable          GTF291A    
       required for           GTF285      Portable Test Box
 
 * Battery Eliminator         RTL4224A   

                 * * *  END  OF  HELP  TEXT  * * *
