^rHelp for Print Codeplug Data^r

This function will  print a list showing  the current codeplug
settings.  It  will  be  possible  to list either  the complete option
settings or just those settings that appear on  the STIC  form. In the
latter case the list will show the STIC setting that is closest to the
current option setting.  The listing will resemble the option list for
the 'Edit Codeplug Data'  function,  as far as possible. However, only
the  enabled options will  be  listed.  Tables will be expanded at the
end of all listed options. Note that the STIC listing will not produce
a STIC form as such,  but it will be possible  to complete a STIC form
from a STIC listing.
 



Following functions are available:      



        - [F3] List Codeplug Data to Printer
        - [F5] List STIC Data to Printer










^r[F3] - List Codeplug Data to Printer:^r

When this function is selected all enabled options will be send to the
printer that is defined in the MX1000.CFG file.
The data fields will show the values that are stored in the PC file.
No check will be made if the data will be  compatible  with   sticform 
requirements.
                                      
^r[F5]  - List STIC Data to Printer:^r
When this function is selected only the Stic Form options will be send
to the printer. The data will be  checked if they are valid  for  stic
form  and Tech  Edit  requirements  (Upper / lower range; increments).
Only enabled options will be shown.  When data in the PC file will  be
incompatible with the Stic  Form  requirements then the  listing  will
contain the next  possible  data  that  matches the Stic Form,  
eg:  programmed data does not match the increment that is required, or
the programmed  data  will we out of  the range  that is  defined  for
the  stic.   When  differences  are  found there will be a note on the
printout about the deviations that will exist.

                 * * *  END  OF  HELP  TEXT  * * *
