^rHelp for Radio Configuration^r

This menu allows the setting of both the radio hardware configuration 
and the radio software configuration. Only those options  and features
that match with the actual configuration will be shown on the option 
screen in the "Entry and Edit of Radio Codeplug Data" screen.

The following setups can be defined by the radio hardware 
configuration:

Radio Model MX1000                    DEF_MX1.PC will be loaded
Radio Model MX2000                    DEF_MX2.PC will be loaded
Radio Model MX3000                    DEF_MX3.PC will be loaded
####                                
MB  TX-High Power  66.0 -  80.0 MHz   All frequencies will be  66 MHz
MB  TX-High Power  74.0 -  88.0 MHz   All frequencies will be  74 MHz
VHF TX-Low  Power 146.0 - 174.0 MHz   All frequencies will be 146 MHz
VHF TX-High Power 146.0 - 162.0 MHz   All frequencies will be 146 MHz
VHF TX-High Power 157.0 - 174.0 MHz   All frequencies will be 157 MHz
UHF TX-Low  Power 403.0 - 433.0 MHz   All frequencies will be 403 MHz
UHF TX-Low  Power 440.0 - 470.0 MHz   All frequencies will be 440 MHz
UHF TX-High Power 403.0 - 433.0 MHz   All frequencies will be 403 MHz
UHF TX-High Power 440.0 - 470.0 MHz   All frequencies will be 440 MHz
####                                
Wide Band   - 20/25 kHz radio     Only channel spacing will be changed
Narrow Band -  12.5 kHz radio     Only channel spacing will be changed

Following features can be configured by the radio software
configuration

Std. 5 Tone Encode/Decode  
H924 Encode Only                 Sel 5 Decoder options will be deleted
H624 Decode Only                 Sel 5 Encoder options will be deleted
H809 Omit 5 Tone Encode/ Decode  Sel 5 Enc/Dec options will be deleted
####                                
Std. Channel Radio               All Zone relations will be lost
H372 Zone Radio                  All Channel number relations will be 
                                 lost.

                 * * *  END  OF  HELP  TEXT  * * *
