^rHelp for Check Codeplug-Size^r   




If CORE and COPE  messages contain  information that bytes  are free
then all  options and features fit into the radio.
 
If too many bytes are needed the following table contains information
how to decrease the  required number of  bytes. This always  requires 
the deleting of  options, channels or call sequences.

 



^rOption                            MX1000     MX2000      MX3000^r
Default                               --        825         825
Unnamed channel                       19         21          21
Named channels                        --         29          29
H396 Channel entry via keypad         --        367         367
H372 Zone radio                       --        456         456
     Each zone                        --         30          30
12.5 kHz                              10         --          --
Each unique PL code                    2         --          --
Each unique Encode Sequence            5          7           7
H693 Repeater Access Selectable       --         --        1472 
Std. Multicall                        --       1189        1672
Unique variable sequences             --          7           7
H646 Auto Ack with status             --         --         844
H368 Alphanumeric Shortcall           --        974         974
H369 Programmable Numeric Shortcall   --         --        2299    
^rOption                            MX1000     MX2000      MX3000^r
H626 Fixed Alphanumeric Multicall     --        671          --
H375 Selectable PL Encode only        --        243         243
H649 Selectable PL Encode/Decode      --        243         243
H694 Mute Keypad Tones                --        186         186
H349 Menu Lock                        --        186         186
H397 Menu Security Lock               --         --         584
H345 Radio Lock                       --         --         436
Password for H397 and/or H345         --         --           8
H344 Scanning                         --       1440        1440 
     each scan list                   --         30          30
     each channel in scan list        --          1           1
H273 Operator Selectable Scanning     --         --        2171
H297 DTMF Interconnect                --         --        1124  
                 * * *  END  OF  HELP  TEXT  * * *
