^rHelp for Save Codeplug Data to Disk^r
On entry to this function the Central Screen area will  be cleared and
a list of codeplug data files from the current DOS  directory  will be
displayed on  the screen  as  shown below.  To  save a  file 'SAVE' is
pressed, which changes the file spec prompt to:

Save file : 
<                  DOS compatible file specification                 >

The user  will  be  prompted  for a DOS compatible  file specification
(refer to DOS documentation of the computer).  The field will show the
current DOS directory path and the actual filename. The cursor will be
positioned after the last character of the file specification eg :

     Save file :
     A:\DATA\SYSTEM0\RADIO3.MX3_
Upon  pressing  the  [Enter]  key  the  file  specification   will  be
validated.  If the name of an existing file is specified, confirmation
will be requested from the user by displaying the following Instruction
Message:
               | OK that save will overwrite existing  |
               | file (Y/N)?                           |

When  the file  has been  written  following  Status  Message  will be
displayed:
              | File successfully written.            |
              |                                       |

[F2] - "DIR"    : will work in the same manner as described in "[F3] -
Load Codeplug Data from Disk".


[F3] - "CANCEL" : will work in the same manner as described in "[F3] -
Load Codeplug Data from Disk".

[F4] - "CLEAR"  : will work in the same manner as described in "[F3] -
Load Codeplug Data from Disk".

[F6] -  "SAVE"    :  is pressed to recall the "Load  File" prompt when
"DIR"  was selected before.  The saving procedure will be the same as
described above.  It  changes the file  spec prompt to  the last valid
directory path and filename:
Save File: 
<A:\DATA\SYSTEM0\RADIO3.MX3        DOS compatible  file specification> 
Editing and selecting a filename will be done as described above.

                 * * *  END  OF  HELP  TEXT  * * *
