^rH380AC Channel Radio Display^r

When  this  option  is  enabled on  the  option  screen,  the "Channel
Information  Frequency  Table"  contains  an  additional  column "H380
Channel Display"  which allows the entry of max. 8 alphanumeric digits
for the channel name.  Per default all channel names will  be  blank. 
Only capital letters can be programmed into the radio.

Disabling  this  option  on the  option screen will  erase all channel
names and deletes the "H380  Channel  Display"  column  in the Channel
Frequency Table.

The [F2] Select key must be used to enable or disable this option.
      


Incompatible options:

         H372 Zones


Applicable Models: MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
