^rPL Encode^r
If this option is enabled on the option  screen  then a minimum of one
channel  will  contain a PL  Encode  frequency.  PL frequencies can be
entered  only  in  the  "Channel  Information  Frequency  Table".  Any
frequency  between 50.0 and  300.0 Hz can  be entered in 0.1 Hz steps. 
The following list of commonly used frequencies  may be entered on the
stic form using the codes shown.

XZ = 67.0   WZ = 69.3   XA = 71.9   WA = 74.4   XB = 77.0   WB = 79.7
YZ = 82.5   YA = 85.4   YB = 88.5   ZZ = 91.5   ZA = 94.8   ZB = 97.4
1Z =100.0   1A =103.5   1B =107.2   2Z =110.9   2A =114.8   2B =118.8
3Z =123.0   3A =127.3   3B =131.8   4Z =136.5   4A =141.3   4B =146.2
5Z =151.4   5A =156.7   5B =162.2   6Z =167.9   6A =173.8   6B =179.9
7Z =186.2   7A =192.8   M1 =203.5   8Z =106.5   M2 =210.7   M3 =218.1
M4 =225.7   M5 =233.6   M6 =241.8   M7 =250.3

The PL codes are not accepted from the field programmer  but are valid
for a STIC Form entry.

Disabling this option  on the option screen  will erase  all PL Encode
frequencies on all channels.

Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
