^rPL Decode^r
If this option is enabled on the option  screen  then a minimum of one
channel  will  contain a PL  Decode  frequency.  PL frequencies can be
entered  only  in  the  "Channel  Information  Frequency  Table".  Any
frequency  between 50.0 and  300.0 Hz can be  entered in 0.1 Hz steps. 
The following list of commonly used  frequencies may be entered on the
STIC form using the codes shown.

XZ = 67.0   WZ = 69.3   XA = 71.9   WA = 74.4   XB = 77.0   WB = 79.7
YZ = 82.5   YA = 85.4   YB = 88.5   ZZ = 91.5   ZA = 94.8   ZB = 97.4
1Z =100.0   1A =103.5   1B =107.2   2Z =110.9   2A =114.8   2B =118.8
3Z =123.0   3A =127.3   3B =131.8   4Z =136.5   4A =141.3   4B =146.2
5Z =151.4   5A =156.7   5B =162.2   6Z =167.9   6A =173.8   6B =179.9
7Z =186.2   7A =192.8   M1 =203.5   8Z =106.5   M2 =210.7   M3 =218.1
M4 =225.7   M5 =233.6   M6 =241.8   M7 =250.3

The PL codes are not accepted from the field programmer  but are valid
for a STIC Form entry.

Disabling this option  on the option screen  will erase  all PL Decode
frequencies on all channels.

Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
