^rChannel Information^r

Dependent on the radio configuration or option  settings the following
columns can appear in Frequency or Assignment table:

Zone #, Ch. #:  These columns are  for  reference  only  and  cannot be
edited. 

^rTo  insert or delete zones [shift]+[F7]  or [shift]+[F8] must be used,
to insert or delete channels [F7] or [F8] must be used.^r
 
^rH346 Zone  Dsp.^r:  When "H346  Zone Display"  is disabled on the option
screen then this column contains  the default names for  the different
zones.  Default names are "Z1" ... "Zn" where "n" is the number of the
last zone. By changing a minimum of one zone name in this column 
"H346 Zone Display" becomes enabled.
^rH380  Channel Display^r:  In a zone radio 5 alphanumeric digits and in a
channel  radio up  to  8  alphanumeric digits  can be  defined for the
channel display in this column.


^rTransmit Frequency and Receive Frequency^r:   This columns always appear
in this table. To define a receive only channel the Transmit Frequency
field must be cleared with [F4] or filled with space characters.


^rPL  Encode,  PL Decode^r:   This columns  always  appear. For MX1000 radio
max. 20 different PL frequencies and for MX2000/3000 max. 32 different PL 
frequencies can be defined.                 

Refer to the assigned PL option on the option screen and press F1 Help to
get a reference for the PL codes. 


^rRF Power level^r:  Individual power levels per channel can be defined in
this column. Refer to options RF Power for more information.    


                 * * *  END  OF  HELP  TEXT  * * *
